목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

CatOS와 Cisco IOS System Software의 차이점

Catalyst 6500/6000 CatOS 및 Cisco IOS 소프트웨어 이미지

CatOS 및 Cisco IOS 소프트웨어에 대한 소프트웨어 이미지 이름 표기 규칙 이해

CatOS와 Cisco IOS 소프트웨어의 기본 시스템 차이점

Cisco IOS System 소프트웨어의 인터페이스 이해

Cisco IOS 소프트웨어의 인터페이스(포트) 모드

L2 이더넷 인터페이스 구성

포트 구성 및 상태 CatOS/Cisco IOS 명령 매트릭스

Cisco IOS Software에서 range 명령의 사용 이해

Cisco IOS 소프트웨어 구성

Cisco IOS Software에서 트렁크 구성

Cisco IOS Software에서 EtherChannel 구성

Cisco IOS Software에서 VLAN 구성

Cisco IOS Software에서 VTP 구성

CatOS/Cisco IOS Software 명령 매트릭스

관련 정보

소개

이 문서에서는 Catalyst OS(CatOS) 사용자를 Cisco IOS® System Software에서 사용하는 레이어 2(L2) 컨피그레이션에 대해 다룹니다.이 문서에서는 명령 및 포트/인터페이스, 트렁크, 채널, VLAN, VTP(Virtual Trunk Protocol)와 같은 개념에 대한 CatOS와 Cisco IOS Software의 유사점과 차이점을 다룹니다. 이 문서에서는 가장 인기 있는 명령과 관련된 빠른 참조를 위해 CatOS/Cisco IOS Software Command Matrix를 제공합니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서는 특정 소프트웨어 및 하드웨어 버전으로 한정되지 않습니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참고하십시오.

CatOS와 Cisco IOS System Software의 차이점

Supervisor Engine의 CatOS 및 MSFC의 Cisco IOS Software(하이브리드):CatOS 이미지는 Catalyst 6500/6000 스위치에서 Supervisor Engine을 실행하는 시스템 소프트웨어로 사용할 수 있습니다.MSFC 옵션이 설치된 경우 별도의 Cisco IOS Software 이미지를 사용하여 MSFC를 실행합니다.

수퍼바이저 엔진 및 MSFC 모두에 Cisco IOS Software(네이티브):단일 Cisco IOS 소프트웨어 이미지를 시스템 소프트웨어로 사용하여 Catalyst 6500/6000 스위치에서 Supervisor Engine과 MSFC를 모두 실행할 수 있습니다.

참고: 자세한 내용은 Cisco Catalyst 6500 Series Switch에 대한 Cisco Catalyst 및 Cisco IOS 운영 체제 비교 문서를 참조하십시오.

Catalyst 6500/6000 CatOS 및 Cisco IOS 소프트웨어 이미지

Catalyst 6500/6000 스위치에는 두 가지 유형의 소프트웨어 중 하나를 실행할 수 있는 옵션이 있습니다.

CatOS:이 구현은 RSM(Route Switch Module)을 사용하는 Catalyst 5500/5000 시리즈 스위치와 논리적으로 동일합니다. CatOS 모드에서 실행할 경우 두 개의 개별 소프트웨어 이미지가 있습니다.MSFC는 기존 Cisco IOS 소프트웨어 이미지를 실행하며 Supervisor Engine은 기존 CatOS를 실행합니다.각 디바이스에는 고유한 컨피그레이션 파일이 있습니다.

Cisco IOS 소프트웨어:이 구현은 "라우터 같은" 단일 인터페이스를 제공합니다.라우터(이름이 RP[Route Processor])와 스위치 수퍼바이저 엔진(이름이 SP[Switch Processor])의 분리는 사용자에게 투명합니다.단일 콘솔 연결, 구성 파일 및 소프트웨어 이미지가 있습니다.

참고: MSFC1이 제대로 로드되도록 하려면 항상 MSFC1 부팅 이미지가 필요합니다.부트 이미지는 하드웨어 지원을 위해 필요하며 부트 이미지는 긴급 복구 상황에 대한 백업을 제공합니다.소프트웨어 이미지는 실제로 라우터의 전체 기능에 필요한 소프트웨어를 로드합니다.

MSFC 외에 PFC(Policy Feature Card)가 필요합니다.

CatOS 및 Cisco IOS 소프트웨어에 대한 소프트웨어 이미지 이름 표기 규칙 이해

CatOS에서 스위치 수퍼바이저 엔진과 MSFC는 별도의 소프트웨어 이미지를 실행합니다.

Supervisor Engine에 대한 참조를 사용하면 두 가지 이미지 유형이 있습니다.하나는 Supervisor Engine용 이고 다른 하나는 Supervisor Engine II용 엔진입니다.cat6000-sup 접두사 뒤에 오는 숫자는 이미지의 차이를 나타냅니다.

2가 cat6000-sup 접두사를 따르는 경우 이미지는 Catalyst Supervisor Engine II용 이미지입니다.720이 cat6000-sup 접두사를 따르는 경우 이미지는 Catalyst Supervisor Engine 720에 대한 것입니다. cat600-sup 접두사를 따르지 않는 경우 이미지는 Catalyst Supervisor Engine I에 대한 이미지입니다.예를 들어 이름이 "cat6000-sup.6-2-3.bin"인 파일은 Supervisor Engine I에 사용됩니다. 이름이 "cat6000-sup2.6-2-3.bin"인 파일은 Supervisor Engine II에 사용됩니다.이러한 이미지를 다운로드하려면 소프트웨어 다운로드 - Catalyst 6500/6000 CatOS 시스템 소프트웨어(등록된 고객만 해당)를 참조하십시오.

MSFC1, MSFC2 또는 MSFC3에서 Cisco IOS Software를 사용하여 CatOS를 실행하면 각 MSFC 유형은 고유한 개별 이미지를 실행합니다.Download Software Area(소프트웨어 다운로드 영역(등록된 고객만 해당)는 이제 이러한 이미지를 통합합니다.MSFC1, MSFC2 또는 MSFC3에 대한 이미지를 다운로드하려면 Cisco Software Download 페이지로 이동하십시오.

Cisco IOS System Software는 Supervisor Engine과 MSFC 부속 카드 모두에 대해 결합된 소프트웨어 이미지를 실행합니다.사용자는 Flash에 로드할 이미지가 하나만 있습니다.Supervisor Engine 및 MSFC 설치 유형은 각 이미지를 분류합니다.소프트웨어 다운로드 영역의 이미지 범주(등록된 고객만 해당)는 다음과 같습니다.

- Supervisor Engine 720/MSFC3(CAT6000-SUP720/MSFC3)

- Supervisor Engine 2/MSFC2(CAT6000-SUP2/MSFC2)

- Supervisor Engine 1/MSFC2(CAT6000-SUP1/MSFC2)

- 수퍼바이저 엔진 1/MSFC1(CAT6000-SUP1/MSFC1)

Cisco IOS System Software 이미지를 다운로드하려면 Software Download - Catalyst 6500/6000 Cisco IOS System Software(등록된 고객만 해당)를 참조하십시오.

참고: Supervisor Engine II는 MSFC2 도터 카드를 사용해야 합니다.수퍼바이저 엔진 II는 원래 MSFC 부속 카드를 사용할 수 없습니다.

현재 실행 중인 이미지를 확인하려면 show version 명령을 실행합니다.

참고:하이브리드 모드에서 실행 중인 현재 이미지를 확인하려면 각 모듈에 show version 명령을 실행합니다.

예를 들어, 여기서 show version 명령은 MSFC2가 있는 Catalyst 6500을 나타내며, MSFC에서 CatOS를 실행하고 MSFC에서 Cisco IOS 소프트웨어를 실행합니다.

Hybrid_Cat6500>(enable) show version

WS-C6509 Software, Version NmpSW: 7.6(4)

Copyright (c) 1995-2003 by Cisco Systems

NMP S/W compiled on Nov  4 2003, 19:22:09

System Bootstrap Version: 5.3(1)

System Boot Image File is 'bootflash:cat6000-supk8.7-6-4.bin'

System Configuration register is 0x2102

Hardware Version: 2.0  Model: WS-C6509  Serial #: SCA043500S2

PS1  Module: WS-CAC-1300W    Serial #: SON04340836

PS2  Module: WS-CAC-1300W    Serial #: SNI05470791

Mod Port Model               Serial #    Versions

--- ---- ------------------- ----------- --------------------------------------

1   2    WS-X6K-SUP1A-2GE    SAD04500AFW Hw : 7.4

Fw : 5.3(2)

Fw1: 5.4(2)

Sw : 7.6(4)

Sw1: 7.6(4)

WS-X6K-SUP1A-2GE    SAD04500AFW Hw : 7.4

Sw :

2   2    WS-X6K-SUP1A-2GE    SAL0549F477 Hw : 7.1

Fw : 5.3(1)

Fw1: 5.4(2)

Sw : 7.6(4)

Sw1: 7.6(4)

WS-X6K-SUP1A-2GE    SAL0549F477 Hw : 7.1

Sw :

3   48   WS-X6148-GE-TX      SAD0746052K Hw : 4.0

Fw : 7.2(1)

Sw : 7.6(4)

4   48   WS-X6248-RJ-45      SAD04281CZY Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

5   48   WS-X6248-RJ-45      SAD042608NZ Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

6   48   WS-X6248-RJ-45      SAD04170CG9 Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

7   48   WS-X6248-RJ-45      SAD04270N9U Hw : 1.2

Fw : 5.1(1)CSX

Sw : 7.6(4)

15  1    WS-F6K-MSFC2        SAD04520C65 Hw : 1.7

Fw : 12.1(19)E1

Sw : 12.1(19)E1

16  1    WS-F6K-MSFC2        SAL0548F2TE Hw : 2.0

Fw : 12.1(19)E1

Sw : 12.1(19)E1

DRAM                    FLASH                   NVRAM

Module Total   Used    Free    Total   Used    Free    Total Used  Free

------ ------- ------- ------- ------- ------- ------- ----- ----- -----

2      130944K  50017K  80927K  16384K  10857K   5527K  512K  389K  123K

Uptime is 142 days, 4 hours, 27 minutes

CatOS와 Cisco IOS 소프트웨어의 기본 시스템 차이점

기능

CatOS

Cisco IOS 소프트웨어

구성 파일

2개의 구성 파일:하나는 Supervisor Engine(NMP^1)용, 다른 하나는 MSFC용

구성 파일 1개

소프트웨어 이미지

두 이미지:하나는 Supervisor Engine용, 다른 하나는 MSFC용

소프트웨어 이미지 1개,MSFC가 제대로 로드되도록 하려면 MSFC 부팅 이미지도 필요합니다.

기본 포트 모드

모든 포트는 L2 스위치 포트임

모든 포트는 L3^2 라우팅 포트(인터페이스)입니다.

기본 포트 상태

모든 포트가 활성화됨

모든 포트(인터페이스)가 종료 상태입니다.

구성 명령 형식

명령 키워드 set가 각 컨피그레이션 명령 앞에 옵니다.

전역 및 인터페이스 레벨 명령을 사용하는 Cisco IOS 명령 구조

구성 모드

컨피그레이션 모드 없음(set, clear 및 show 명령)

이 명령은 terminal 및 VLAN 데이터베이스 활성화 컨피그레이션 모드를 구성합니다.

구성 제거/변경

clear, set 및/또는 enable/disable 명령을 사용하여

Cisco IOS 명령 구조와 동일키워드 no는 명령을 부정합니다.

1 NMP = 네트워크 관리 프로세서

2 L3 = 레이어 3

Cisco IOS System 소프트웨어의 인터페이스 이해

Cisco IOS 소프트웨어의 인터페이스(포트) 모드

Cisco IOS Software의 포트를 인터페이스로 참조합니다.Cisco IOS Software에는 두 가지 유형의 인터페이스 모드가 있습니다.

- L3 라우티드 인터페이스

- L2 스위치 인터페이스

참고: 기본값은 L3 라우티드 인터페이스입니다.

L2 이더넷 인터페이스 구성

포트/인터페이스를 L2 스위치 인터페이스로 만들려면 다음 예와 같이 인터페이스 아래에 switchport 명령을 추가합니다.

Cat6500# show running-config interface fastethernet 5/10

Building configuration...

Current configuration:

!

interface FastEthernet5/10

no ip address

switchport

end

L2 스위치 포트의 기본 인터페이스 컨피그레이션은 CatOS와 다릅니다.예를 들어 포트에 L2 포트 컨피그레이션이 있는 경우 트렁크 모드가 auto 대신 바람직합니다.show interface switchport 명령은 L2 스위치 포트의 현재 컨피그레이션에 대한 세부 정보를 제공합니다.예를 들면 다음과 같습니다.

Cat6500# show interfaces fastethernet 5/10 switchport

Name: Fa5/10

Switchport: Enabled

Administrative Mode: dynamic desirable

Operational Mode: down

Administrative Trunking Encapsulation: negotiate

Negotiation of Trunking: On

Access Mode VLAN: 1 ( default)

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Cisco IOS Software에는 세 가지 기본 L2 스위치 포트 모드가 있습니다.

- 액세스:인터페이스를 비트렁킹 모드로 설정합니다.

- 동적:액세스 또는 트렁크 모드에 대해 동적으로 협상하도록 인터페이스를 설정합니다.이 설정에 대한 두 가지 옵션은 다음과 같습니다.

- 권장 사항:이 컨피그레이션을 사용하면 인접 디바이스가 권장 또는 자동 모드에서 트렁크 컨피그레이션을 가질 경우 포트가 트렁크가 됩니다.바람직한 모드는 포트에 스위치 포트 컨피그레이션이 있는 경우 기본 모드입니다.

- 자동:이 컨피그레이션을 사용하면 다른 네이버가 권장 모드에서 트렁크 컨피그레이션을 가지고 있는 경우 포트가 트렁크가 될 수 있습니다.

- 트렁크:인터페이스를 영구 트렁크 모드로 설정합니다.

포트 구성 및 상태 CatOS/Cisco IOS 명령 매트릭스

함수

CatOS

PortFast를 활성화하려면

CatOS (enable) set spantree portfast 4/1 enable

Warning: Spantree port fast start should only

be enabled on ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port 4/1 fast start enabled.

호스트 액세스를 위한 포트를 구성합니다.이 명령은 PortFast를 활성화하고 CatOS에서 트렁킹 및 채널링을 비활성화합니다.

CatOS (enable) set port host 4/2

Port(s) 4/2 channel mode set to off.

Warning: Spantree port fast start should only be

enabled on ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port 4/2 fast start enabled.

Port(s) 4/2 trunk mode set to off.

CatOS (enable)

포트 상태를 표시하려면

show port

show port mod

show port mod/port

show port counters

show port counters mod/port

함수

Cisco IOS 소프트웨어

PortFast를 활성화하려면

CiscoIOS(config)# interface fastethernet 4/2

CiscoIOS(config-if)# spanning-tree portfast

Warning: portfast should only be enabled on

ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to this interface when

portfast is enabled can cause temporary

spanning tree loops.

Use with CAUTION

Portfast has been configured on

FastEthernet4/2 but will only have effect

when the interface is in a non-trunking mode.

CiscoIOS(config-if)# ^Z

CiscoIOS#

호스트 액세스를 위한 포트를 구성합니다.이 명령은 PortFast를 활성화하고 CatOS에서 트렁킹 및 채널링을 비활성화합니다.

CiscoIOS(config)# interface fastethernet 4/2

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport mode access

CiscoIOS(config-if)# spanning-tree portfast

%Warning: portfast should only be enabled

on ports connected to a single host.

Connecting hubs, concentrators, switches,

bridges, etc. to this interface when

portfast is enabled, can cause temporary

spanning tree loops.

Use with CAUTION

%Portfast has been configured on

FastEthernet4/2 but will only have effect

when the interface is in a non-trunking mode.

CiscoIOS(config-if)# ^Z

CiscoIOS#

포트 상태를 표시하려면

show interface status

show interface status module mod

show interface status errordisabled

show interface counters error module mod

Cisco IOS Software에서 range 명령의 사용 이해

스위치가 Cisco IOS Software를 실행하더라도 많은 수의 인터페이스를 가질 가능성이 있습니다.따라서 Cisco IOS Software는 여러 포트를 신속하게 구성할 수 있도록 CatOS에서와 같이 여러 인터페이스를 동시에 구성할 수 있습니다.range 명령을 실행하면 동일한 컨피그레이션으로 여러 인터페이스를 빠르게 구성할 수 있습니다.

CiscoIOS(config)# interface range gigabitethernet 1/1 -2, fastethernet 4/1 -24

참고: 이 명령의 구문에서는 첫 번째 인터페이스 범위와 하이픈 사이에 공백이 있습니다.구문은 중요하며 반드시 정확해야 합니다.공간이 없는 경우 CLI(Command Line Interface)는 구문 오류를 반환합니다.

다음은 잘못된 range 명령 사용의 예입니다.

CiscoIOS(config)# interface range gigabitethernet 1/1-2,fastethernet 4/1-24

^

% Invalid input detected at '^' marker.

CiscoIOS(config)# interface range gigabitethernet 1/1 -2,fastethernet 4/1-24

^

% Invalid input detected at '^' marker.

CiscoIOS(config)# interface range gigabitethernet 1/1 -2,fastethernet 4/1 -24

다음 예에서는 VLAN 2에서 4/2-8에서 포트를 설정합니다.

NativeIOS(config)# interface range fastethernet 4/2 -8

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport access vlan 2

CiscoIOS(config-if)# no shut

CiscoIOS(config-if)# ^Z

CiscoIOS# show interface

이 range 명령을 사용한 후 컨피그레이션은 다음과 같이 표시됩니다.

interface FastEthernet4/4

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/5

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/6

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/7

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/8

no ip address

switchport

switchport access vlan 2

!

interface FastEthernet4/9

no ip address

shutdown

Cisco IOS 소프트웨어 구성

Cisco IOS Software에서 트렁크 구성

Cisco IOS Software는 ISL(Inter-Switch Link Protocol) 및 IEEE 802.1Q(dot1q) 트렁킹 모드를 모두 지원합니다.Cisco IOS System 소프트웨어의 인터페이스 이해 섹션에 대해 설명하는 인터페이스 컨피그레이션에 대한 다양한 옵션을 사용할 수 있습니다.Trunking은 CatOS와 동일하게 작동합니다. 단, Cisco IOS Software의 기본 설정은 자동이 아니라 바람직한 것입니다.

함수

CatOS

ISL 트렁크를 활성화하려면

CatOS (enable) set trunk 4/1 on isl

Port(s) 4/1 trunk mode set to on.

Port(s) 4/1 trunk type set to isl.

dot1q 트렁크를 활성화하려면

CatOS (enable) set trunk 4/1 on dot1q

Port(s) 4/1 trunk mode set to on.

Port(s) 4/1 trunk type set to dot1q

CatOS (enable) set vlan 2 4/1

VLAN 2 modified.

VLAN 1 modified.

VLAN Mod/Ports

---- -----------------------

2    1/1

4/1

참고: dot1q의 경우 기본 VLAN이 트렁크 링크 전체에서 매칭되어야 합니다.CatOS에서 set vlan vlan-id mod/port 명령을 사용하여 트렁크에 대한 네이티브 VLAN을 설정합니다.

트렁크 모드를 변경하려면

CatOS (enable) set trunk mod/port {on

| off | desirable | auto | nonegotiate}

[vlans] [isl | dot1q | negotiate]

트렁킹 상태를 표시하려면

show trunk

show trunk mod

show port mod/port

함수

Cisco IOS 소프트웨어

ISL 트렁크를 활성화하려면

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface fastethernet 4/1

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport trunk encapsulation isl

CiscoIOS(config-if)# switchport mode trunk

3d22h: %DTP-SP-5-TRUNKPORTON:

Port Fa4/1 has become isl

CiscoIOS(config-if)# ^Z

CiscoIOS#

dot1q 트렁크를 활성화하려면

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface fastethernet 4/1

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport trunk encapsulation dot1q

CiscoIOS(config-if)# switchport mode trunk

3d22h: %DTP-SP-5-TRUNKPORTON:

Port Fa4/1 has become dot1q

CiscoIOS(config-if)# switchport trunk native vlan 2

CiscoIOS(config-if)# ^Z

CiscoIOS#

트렁크 모드를 변경하려면

CiscoIOS(config-if)# switchport mode {access |

trunk | multi | dynamic {auto | desirable}}

트렁킹 상태를 표시하려면

show interfaces trunk

show interfaces trunk module number

show interfaces interface-type mod/port

show interfaces status

Cisco IOS Software에서 트렁크 정보를 확인하는 여러 가지 방법이 있습니다.

참고: 라우티드 포트는 L2 트렁크 포트가 아닙니다.

show interfaces trunk 명령은 현재 트렁크 중인 모든 인터페이스를 표시합니다.이 명령은 트렁크에 대한 컨피그레이션이 있지만 활성 트렁크는 없는 포트를 표시하지 않습니다.

Switch# show interfaces trunk

Port Mode      Encapsulation Status   Native vlan

Po41 desirable n-isl         trunking 1

Port Vlans allowed on trunk

Po41 1-1005

Port Vlans allowed and active in management domain

Po41 1-6,1002-1005

Port Vlans in spanning tree forwarding state and not pruned

Po41 1-6,1002-1005

show interfaces trunk module number 명령은 트렁크 상태와 상관없이 지정된 모듈의 모든 인터페이스를 표시합니다.

Switch# show interfaces trunk module 4

Port   Mode      Encapsulation Status       Native vlan

Fa4/1  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/2  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/3  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/4  desirable n-isl         trunk-inbndl 1 (Po41)

Fa4/5  desirable negotiate     not-trunking 1

Fa4/6  desirable negotiate     not-trunking 1

Fa4/7  desirable negotiate     not-trunking 1

Fa4/8  desirable negotiate     not-trunking 1

Fa4/9  desirable negotiate     not-trunking 1

Fa4/10 routed    negotiate     routed       1

Fa4/11 desirable negotiate     not-trunking 1

Fa4/12 desirable negotiate     not-trunking 1

Fa4/13 desirable negotiate     not-trunking 1

Fa4/14 desirable negotiate     not-trunking 1

Fa4/15 desirable negotiate     not-trunking 1

Fa4/16 desirable negotiate     not-trunking 1

Fa4/17 desirable negotiate     not-trunking 1

show interfaces interface-type mod/port trunk 명령을 사용하여 여러 화면을 스크롤하지 않고도 특정 인터페이스의 트렁킹 상태를 확인할 수 있습니다.

Switch# show interfaces fastethernet 4/1 trunk

Port  Mode      Encapsulation Status       Native vlan

Fa4/1 desirable n-isl         trunk-inbndl 1 (Po41)

Port Vlans allowed on trunk

Fa4/1 1-1005

Port Vlans allowed and active in management domain

Fa4/1 1-6,1002-1005

Port Vlans in spanning tree forwarding state and not pruned

Fa4/1 1-6,1002-1005

show interfaces status 명령은 상태 및 트렁킹 상태를 가진 각 인터페이스에 대해 한 줄 표시를 제공합니다.

Switch# show interfaces status

Port Name Status     Vlan   Duplex Speed Type

Gi1/1   connected  routed full    1000 1000BaseSX

Gi1/2   connected  1      full    1000 1000BaseSX

Gi3/1   notconnect routed full    1000 missing

Gi3/2   notconnect routed full    1000 missing

Gi3/3   notconnect routed full    1000 1000BaseSX

Gi3/4   notconnect routed full    1000 1000BaseSX

Gi3/5   notconnect routed full    1000 1000BaseSX

Gi3/6   notconnect routed full    1000 1000BaseSX

Gi3/7   notconnect routed full    1000 1000BaseSX

Gi3/8   notconnect routed full    1000 1000BaseSX

Fa4/1   connected  trunk  full     100 100BaseFX MM

Fa4/2   connected  trunk  full     100 100BaseFX MM

Fa4/3   connected  trunk  full     100 100BaseFX MM

Fa4/4   connected  trunk  full     100 100BaseFX MM

Fa4/5   notconnect 1     full     100 100BaseFX MM

Fa4/6   notconnect 1     full     100 100BaseFX MM

Fa4/7   notconnect 2     full     100 100BaseFX MM

Fa4/8   notconnect 2     full     100 100BaseFX MM

Fa4/9   notconnect 1     full     100 100BaseFX MM

Fa4/10   notconnect routed full     100 100BaseFX MM

Fa4/11   notconnect 1     full     100 100BaseFX MM

Cisco IOS Software에서 EtherChannel 구성

Cisco IOS Software에서 EtherChannel은 CatOS와 매우 다르게 구성합니다.Cisco IOS Software의 포트 그룹에서 EtherChannel을 활성화하려면 포트 채널 인터페이스를 사용해야 합니다.모든 조건이 포트 그룹에 유효한 경우 포트 채널을 형성합니다.기본적으로 모든 인터페이스에는 스위치 포트 컨피그레이션이 있는 경우에도 포트 채널링이 비활성화되어 있습니다.

인터페이스 그룹을 EtherChannel의 일부로 구성하려면 각 인터페이스에서 channel-group group-number 모드 channel-mode 명령을 개별적으로 실행해야 합니다.컨피그레이션에서 switchport 명령을 제거하면 해당 스위치 포트와 관련된 모든 명령이 더 이상 컨피그레이션에 표시되지 않습니다.그러나 포트를 스위치 포트로 재구성하면 이전 명령이 모두 반환됩니다.따라서 포트를 스위치 포트로 구성 및 구성 해제해도 포트 채널 그룹 정보가 지워지지 않습니다.

채널 그룹을 생성한 후에는 개별 물리적 포트가 아닌 포트 채널 인터페이스에서 모든 컨피그레이션을 실행해야 합니다.포트 채널에서 실행하는 모든 명령은 모든 물리적 포트에 투명하게 전파됩니다.채널 멤버의 물리적 인터페이스에서 실행하는 명령은 채널 그룹에서 인터페이스를 제거할 수 있습니다.

함수

CatOS

채널을 만들려면

CatOS (enable) set port channel 4/3-4 on

Port(s) 4/3-4 are assigned to admin group 613.

Port(s) 4/3-4 channel mode set to on.

CatOS (enable)

채널 모드를 설정하려면

CatOS (enable) set port channel

mod/port mode {on | off | desirable |

auto} [silent | non-silent]

포트 채널 상태를 표시하려면

show port channel

show port channel mod/port

show port channel channel-group

함수

Cisco IOS 소프트웨어

채널을 만들려면

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface port-channel 1

CiscoIOS(config-if)# exit

CiscoIOS(config)# interface fastethernet 4/3

CiscoIOS(config-if)# channel-group 1 mode on

CiscoIOS(config-if)# interface fastethernet 4/4

CiscoIOS(config-if)# channel-group 1 mode on

CiscoIOS(config-if)#

채널 모드를 설정하려면

CiscoIOS(config-if)# channel-group

channel-group_number mode {on | auto

[non-silent] | desirable [non-silent]}

포트 채널 상태를 표시하려면

show etherchannel

show etherchannel channel-group

show interfaces etherchannel

show interfaces interface-type mod/port etherchannel

show etherchannel 명령에는 포트 채널 컨피그레이션에 대한 정보를 표시하는 다양한 하위 명령이 있습니다.

show etherchannel channel-group summary 명령은 채널 그룹 컨피그레이션 내의 모든 인터페이스의 상태를 제공합니다.이 명령은 채널 그룹에 속할 인터페이스를 신속하게 찾는 데 매우 유용합니다.

CiscoIOS# show etherchannel 256 summary

Flags: U - in use I - in port-channel S - suspended

D - down I - stand-alone d - default setting

Group Port-channel Ports

-----+------------+-----------------------------------------------------------

256   Po256(U)    Fa5/5(I) Fa5/6(I) Fa5/7(I) Fa5/8(I)

show interfaces etherchannel 명령은 채널 상태에 관계없이 채널 그룹과 연결된 모든 인터페이스를 표시합니다.

CiscoIOS# show interfaces etherchannel

----

GigabitEthernet1/1:

Port state = EC-Enbld Up In-Bndl Usr-Config

Channel group = 254 Mode = Automatic Gcchange = 0

Port-channel = Po254 GC = 0x00FE0001

Port indx = 0 Load = 0x55

Flags: S - Device is sending Slow hello. C - Device is in Consistent state.

A - Device is in Auto mode. P - Device learns on physical port.

Timers: H - Hello timer is running. Q - Quit timer is running.

S - Switching timer is running. I - Interface timer is running.

Local information:

Hello Partner PAgP    Learning Group

Port  Flags   State   Timers   Interval Count Priority Method Ifindex

Gi1/1 SAC     U6/S7   Q     30s     1   128      Any    56

Partner's information:

Partner Partner Partner  Partner        Group

Port Name    Device   ID         Port Age Flags Cap.

Gi1/1   69055180(STELLA) 0010.7bbe.50bb 3/4  12s SC    2

show interfaces interface-type mod/port etherchannel 명령을 사용하여 여러 화면을 스크롤하지 않고도 특정 인터페이스의 채널 상태를 확인할 수 있습니다.

CiscoIOS# show interfaces fastethernet 5/5 etherchannel

Port state = EC-Enbld Up Cnt-bndl Sngl-port-Bndl Cnt-Bndl Not-in-Bndl Usr-Config

Channel group = 256 Mode = Automatic Gcchange = 1

Port-channel = null GC = 0x11000002

Port indx = 0 Load = 0x00

Flags: S - Device is sending Slow hello. C - Device is in Consistent state.

A - Device is in Auto mode. P - Device learns on physical port.

Timers: H - Hello timer is running. Q - Quit timer is running.

S - Switching timer is running. I - Interface timer is running.

Local information:

Hello Partner PAgP  Learning Group

Port  Flags   State Timers   Interval Count Priority Method Ifindex

Fa5/5 SAC     U6/S7 Q  30s   1     128      Any 0

Partner's information:

Partner Partner   Partner Partner        Group

Port Name   Device  ID      Port Age Flags Cap.

Fa5/5   066549452(SINGHA) 00d0.bb3a.c0d9 4/17 29s SC 2

Age of the port in the current state: 00h:30m:31s

Probable reason: pm - different in oper mode (1) with Fa5/8(2)

show interfaces port-channel channel-group etherchannel 명령은 포트 채널의 현재 활성 멤버인 포트를 표시합니다.

CiscoIOS# show interfaces port-channel 256 etherchannel

Age of the Port-channel = 05h:52m:49s

Logical slot/port = 13/64 Number of ports = 2

GC = 0x01000001 HotStandBy port = null

Port state = Port-channel Ag-Inuse

Ports in the Port-channel:

Index  Load   Port   EC state  Configuration

------+------+------+-----------+--------------

1    55     Fa5/7  auto      user

0    AA     Fa5/8  auto      user

Time since last port bundled: 00h:46m:51s Fa5/7

Time since last port Un-bundled: 00h:46m:54s Fa5/8

Cisco IOS Software에서 VLAN 구성

VLAN의 개념과 기능은 Cisco IOS Software와 CatOS 간에 동일합니다.그러나 두 구현 간의 구성 방법은 크게 다릅니다.set 명령이 CatOS에서 VLAN을 생성하는 동안 VLAN은 Cisco IOS Software의 VLAN 데이터베이스 컨피그레이션 모드를 통해 생성됩니다.

함수

CatOS

VLAN을 생성하려면

CatOS (enable) set vlan 2

Vlan 2 configuration successful

VLAN을 삭제하려면

CatOS (enable) clear vlan 2

This command will deactivate all

ports on vlan 2

Do you want to continue(y/n) [n]?y

Vlan 2 deleted

VLAN에 포트 할당

CatOS (enable) set vlan 2 1/1

VLAN 2 modified.

VLAN 10 modified.

VLAN Mod/Ports

---- -----------------------

2    1/1

VLAN 상태를 보려면

show vlan

함수

Cisco IOS 소프트웨어

VLAN을 생성하려면

CiscoIOS# vlan database

CiscoIOS(vlan)# vlan 2

VLAN 2 added:

Name: VLAN0002

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

VLAN을 삭제하려면

NativeIOS# vlan database

CiscoIOS(vlan)# no vlan 2

Deleting VLAN 2...

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

VLAN에 포트 할당

CiscoIOS# configure terminal

Enter configuration commands, one per line.

End with CNTL/Z.

CiscoIOS(config)# interface gigabitethernet2/2

CiscoIOS(config-if)# switchport

CiscoIOS(config-if)# switchport access vlan 2

CiscoIOS(config-if)# ^Z

CiscoIOS#

VLAN 상태를 보려면

show vlan

VLAN의 상태를 확인하려면 show vlan 명령을 사용합니다.

Router# show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active

2    VLAN0002                         active

10   VLAN0010                         active

1002 fddi-default                     active

1003 token-ring-default               active

1004 fddinet-default                  active

1005 trnet-default                    active

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

2    enet  100002     1500  -      -      -        -    -        0      0

10   enet  100010     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    -        0      0

1004 fdnet 101004     1500  -      -      -        ieee -        0      0

1005 trnet 101005     1500  -      -      -        ibm  -        0      0

Primary Secondary Type              Ports

------- --------- ----------------- ------------------------------------------

Cisco IOS Software에서 VTP 구성

VTP는 VTP 도메인에서 VLAN 데이터베이스를 동기화하는 L2 프로토콜입니다.동일한 VTP 도메인 내의 VLAN을 추가, 삭제 또는 수정할 때 VTP는 동일한 VTP 도메인 내의 모든 멤버에 대해 VLAN 데이터베이스를 동기화합니다.VTP 정리는 전파가 필요하지 않은 VLAN에 대한 불필요한 브로드캐스트 및 멀티캐스트 트래픽을 줄여 트렁크의 트래픽을 최소화합니다.

Cisco IOS Software에서 VLAN 데이터베이스 모드는 VTP 컨피그레이션을 정의합니다.VLAN 데이터베이스 및 VTP에 대한 변경 사항은 VLAN 데이터의 애플리케이션에서 발생합니다.이는 사용자가 VLAN 데이터베이스 컨피그레이션 모드에서 나갈 때 발생합니다.기본 Cisco IOS Software VTP 컨피그레이션은 다음과 같습니다.

참고: 기본 VTP 모드는 Server입니다.

CiscoIOS# show vtp status

VTP Version : 2

Configuration Revision : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs : 6

VTP Operating Mode : Server

VTP Domain Name : null

VTP Pruning Mode : Disabled

VTP V2 Mode : Disabled

VTP Traps Generation : Disabled

MD5 digest : 0xE2 0x4F 0xC0 0xD6 0x94 0xBB 0x31 0x9A

Configuration last modified by 0.0.0.0 at 6-27-01 02:04:20

Local updater ID is 0.0.0.0 (no valid interface found)

함수

CatOS

VTP를 구성하려면

CatOS (enable) set vtp domain cisco

VTP domain cisco modified

VTP 모드를 변경하려면

CatOS (enable) set vtp mode client

VTP domain cisco modified

CatOS (enable) set vtp mode server

VTP domain cisco modified

CatOS (enable) set vtp mode transparent

VTP domain cisco modified

VTP 정리를 활성화하려면

CatOS (enable) set vtp pruning enable

This command will enable the pruning

function in the entire management domain.

All devices in the management domain

should be pruning-capable before enabling.

Do you want to continue (y/n) [n]? y

VTP domain cisco modified

VTP 컨피그레이션을 표시하려면

CatOS (enable) show vtp domain

함수

Cisco IOS 소프트웨어

VTP를 구성하려면

CiscoIOS# vlan database

CiscoIOS(vlan)# vtp domain cisco

Changing VTP domain name from null to cisco

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

VTP 모드를 변경하려면

CiscoIOS# vlan database

CiscoIOS(vlan)# vtp client

Setting device to VTP CLIENT mode.

CiscoIOS(vlan)# vtp server

Setting device to VTP SERVER mode.

CiscoIOS(vlan)# vtp transparent

Setting device to VTP TRANSPARENT mode.

CiscoIOS(vlan)# exit

APPLY completed.

Exiting....

VTP 정리를 활성화하려면

CiscoIOS# vlan database

CiscoIOS(vlan)# vtp pruning

Pruning switched ON

CiscoIOS(vlan)# exit

APPLY completed.

VTP 컨피그레이션을 표시하려면

CiscoIOS# show vtp status

CatOS/Cisco IOS Software 명령 매트릭스

이 표는 CatOS 명령 및 명령과 동일한 Cisco IOS Software의 간단한 목록입니다.이 표는 CatOS에서 Cisco IOS Software로 마이그레이션하는 데 빠른 참조를 위해 유용합니다.이 테이블은 자주 사용하는 명령의 약식 목록입니다.이 표에는 각 명령에 대한 모든 매개변수가 나열되지 않습니다.전체 명령 구문 및 매개 변수는 Catalyst 6500 Series Cisco IOS 명령 참조, 12.2SX를 참조하십시오.

이 섹션의 코멘트는 특정 명령에 대한 지원을 제공합니다.주석은 기울임꼴로 표시됩니다.

CatOS 명령

Cisco IOS Software 명령

vlan vlan 지우기

vlan 없음 이 명령은 VLAN 데이터베이스 명령입니다.

CAM agingtime 설정

mac-address-table 에이징 시간 이 명령은 VLAN당 MAC 주소 에이징 시간을 설정합니다.

캠 세트 캠 {정적 설정 | 영구}

mac-address-table 고정 모든 정적 항목도 영구적입니다.

errdisable-timeout 간격 설정

errdisable recovery interval 30-86400 이 명령은 errdisable 복구 시간을 설정합니다.

mls 설정

mls MLS(Multilayer Switching)는 Cisco IOS Software에서 투명하게 발생합니다.

set 옵션 오류

오류 복구 원인 사용 안 함 이 명령은 errdisable 옵션을 구성합니다.

포트 채널 설정 기본 모드는 auto입니다.

channel-group group 모드 기본 모드는 off입니다.

포트 듀플렉스 설정

이중 기본 동작은 라인 카드에 따라 달라집니다.

포트 flowcontrol 송신 설정 [원하는 설정 | 끄기 |일 ]

flowcontrol 보내기[원하는 항목 | 끄기 | on ]

포트 flowcontrol 수신 설정 [원하는 설정 | 끄기 |일 ]

flowcontrol 수신[원하는 | 끄기 | on ]

포트 호스트 설정

switchport switchport mode access spanning tree portfast 액세스 포트에는 채널링/트렁킹이 자동으로 꺼집니다.

포트 협상 모드/포트 비활성화 설정

속도 비협상 기가비트 포트에서만 이 명령을 사용합니다.10/100Mbps 포트에 대해 speed 및 duplex 명령을 사용합니다.

set port negotiation mod/port enable(포트 협상 모드/포트 활성화 설정)

속도 비협상 없음 기가비트 포트에서만 이 명령을 사용합니다.10/100Mbps 포트에 대해 speed 및 duplex 명령을 사용합니다.

포트 속도 설정

속도 기본 동작은 라인 카드에 따라 달라집니다.

qos 설정

mls qos

집합 범위

모니터 세션

스팬트리 설정

스패닝 트리

시스템 크로스바 폴백 설정

서비스 내부 [no] 패브릭 스위칭 모드 허용 [버스 전용 | 잘림]

테스트 진단 수준 설정

진단 수준 부팅 진단 레벨입니다.

추적 설정

디버그 이 명령은 주의하여 사용합니다.일부 디버그가 방해가 됩니다.

트렁크 설정 기본 모드는 auto입니다.

스위치 포트 모드 트렁크 기본 모드가 좋습니다.

설정

우정 이 명령은 전역적으로 인터페이스별로 구성합니다.

vlan 설정

vlan 스위치 포트 액세스 vlan 이 명령은 VLAN 데이터베이스 명령입니다. 이 명령은 interface 명령이며 VLAN을 생성하지 않습니다.

vtp 설정

vtp 이 명령은 VLAN 데이터베이스 명령입니다.

부팅 표시

bootvar 표시 이 명령은 부팅 매개변수를 표시합니다.

CAM 동적 표시

show mac-address-table dynamic

show channel info show port channel

etherchannel 요약 표시

오류 감지 표시

show errdisable detect

show errdisable-timeout

show errdisable 복구

show port show mac

show interface

포트 상태 표시

인터페이스 상태 표시

표시 범위

모니터 표시

저장 프로그램 표시

show idprom 이 명령은 섀시 일련 번호를 확인하는 데 유용합니다.

show system crossbar fallback

show fabric switching mode

테스트 [진단 수준 표시 | 모드]

진단 [수준 표시 | 모듈 수정]

qos 표시

mls qos 표시

트래픽 표시

show catalyst6000 traffic-meter 이 명령은 백플레인 사용률을 표시합니다.

트렁크 표시 포트 트렁크

인터페이스 트렁크 표시

udld 표시

udld 표시

vlan 표시

vlan 표시

vtp 도메인 표시

vtp 상태 표시

스위치 콘솔

원격 로그인 이 명령은 특정 문제 해결을 위해 Cisco Technical Support에서만 사용합니다.

관련 정보

- LAN 제품 지원

- LAN 스위칭 기술 지원

- 툴 및 리소스

- 기술 지원 및 문서 − Cisco Systems