목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

배경 정보

복구 절차

관련 정보

소개

이 문서에서는 Cisco Catalyst Layer 2 및 Cisco Catalyst Layer 3 고정 구성 스위치의 비밀번호 복구 절차에 대해 설명합니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서는 스위치 2900XL/3500XL, 2940, 2950/2955, 2960, 2970, 3550, 3560 및 3750 시리즈를 기반으로 합니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우 모든 명령의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

배경 정보

이 문서에서는 Cisco Catalyst 레이어 2 고정 설정 스위치 2900XL/3500XL, 2940, 2950/2955, 2960, 2970 Series 및 Cisco Catalyst 레이어 3 고정 설정 스위치 3550, 3560, 3750 Series의 비밀번호 복구 절차를 설명합니다.

복구 절차

비밀번호를 복구하려면

1. 터미널 에뮬레이션(예: 하이퍼 터미널)으로 터미널 또는 PC를 스위치의 콘솔 포트에 연결합니다.

다음 터미널 설정을 사용합니다.

- Bits per second(baud): 9600

- 데이터 비트: 8

- 패리티: 없음

- 정지 비트: 1

- 흐름 제어: Xon/Xoff

참고: 터미널 케이블을 콘솔 포트에 연결하는 방법에 대한 자세한 내용은 Catalyst 스위치의 Connect a Terminal to the Console Port를 참조하십시오.

2. 전원 케이블을 분리합니다.

3. 스위치를 켜고 스위치로 가져옵니다. 프롬프트:

2900XL, 3500XL, 2940, 2950, 2960, 2970, 3550, 3560, 3750 시리즈 스위치에서는 다음을 수행합니다.

전면 패널의 왼쪽에 있는 mode(모드) 버튼을 누른 상태에서 스위치에 전원 케이블을 다시 연결합니다.

Catalyst Switch 시리즈

LED 동작 및 모드 버튼 릴리스 작업

2900XL, 3500XL, 3550

overPort1 LED가 꺼지면 Mode 버튼을 놓습니다.

2940, 2950

상태(STAT) LED가 꺼지면, 약 5초 후에 Mode(모드) 버튼을 놓습니다. Mode(모드) 버튼을 놓으면 SYSTLED가 황색으로 깜박입니다.

2960, 2970

SYSTLED가 황색으로 깜박인 다음 녹색으로 고정되어 켜지면 Mode 버튼을 놓습니다. Mode(모드) 버튼을 놓으면 SYSTLED가 녹색으로 깜박입니다.

3560, 3750

SYST LED가 녹색으로 바뀌면 약 15초 후에 Mode(모드) 버튼을 놓습니다. Mode(모드) 버튼을 놓으면 SYST LED가 녹색으로 깜박입니다.

참고: LED 위치는 모델에 따라 약간 달라질 수 있습니다.

Catalyst 3524XL

Catalyst 3524XL

Catalyst 2950-24

Catalyst 2950-24

2955 시리즈 스위치만 해당:

Catalyst 2955 시리즈 스위치는 비밀번호 복구에 외부 모드 버튼을 사용하지 않습니다. 그 대신 스위치 부트 로더는 암호 복구를 위해 자동 부트 시퀀스를 중지하기 위해 브레이크 키 탐지를 사용합니다. 브레이크 시퀀스는 사용되는 터미널 애플리케이션 및 운영체제에 따라 결정됩니다. Windows 2000에서 실행되는 Hyperterm은 Ctrl + Break를 사용합니다. UNIX를 실행하는 워크스테이션에서 Ctrl-C가 브레이크 키입니다. 자세한 내용은 비밀번호 복구 과정의 표준 브레이크 키 시퀀스 조합을 참조하십시오.

다음 예에서는 Hyperterm을 사용하여 2955에서 switch: 모드를 시작합니다.

C2955 Boot Loader (C2955-HBOOT-M) Version 12.1(0.0.514), CISCO DEVELOPMENT TEST

VERSION

Compiled Fri 13-Dec-02 17:38 by madison

WS-C2955T-12 starting...

Base ethernet MAC Address: 00:0b:be:b6:ee:00

Xmodem file system is available.

Initializing Flash...

flashfs[0]: 19 files, 2 directories

flashfs[0]: 0 orphaned files, 0 orphaned directories

flashfs[0]: Total bytes: 7741440

flashfs[0]: Bytes used: 4510720

flashfs[0]: Bytes available: 3230720

flashfs[0]: flashfs fsck took 7 seconds.

...done initializing flash.

Boot Sector Filesystem (bs:) installed, fsid: 3

Parameter Block Filesystem (pb:) installed, fsid: 4

*** The system will autoboot in 15 seconds ***

Send break character to prevent autobooting.

!--- Wait until you see this message before !--- you issue the break sequence.

!--- Ctrl+Break is entered using Hyperterm.

The system has been interrupted prior to initializing the flash file system to finish

loading the operating system software:

flash_init

load_helper

boot

switch:

4. flash_init 명령을 실행합니다.

switch: flash_init

Initializing Flash...

flashfs[0]: 143 files, 4 directories

flashfs[0]: 0 orphaned files, 0 orphaned directories

flashfs[0]: Total bytes: 3612672

flashfs[0]: Bytes used: 2729472

flashfs[0]: Bytes available: 883200

flashfs[0]: flashfs fsck took 86 seconds

....done Initializing Flash.

Boot Sector Filesystem (bs:) installed, fsid: 3

Parameter Block Filesystem (pb:) installed, fsid: 4

switch:

!--- This output is from a 2900XL switch. Output from

!--- other switches will vary slightly.

5. load_helper 명령을 실행합니다.

switch: load_helper

switch:

6. dir flash: 명령을 실행합니다.

참고: dir 플래시 뒤에 콜론(:)을 입력해야 합니다.

스위치 파일 시스템이 다음과 같이 표시됩니다.

switch: dir flash:

Directory of flash:/

2    -rwx  1803357   <date>               c3500xl-c3h2s-mz.120-5.WC7.bin

!--- This is the current version of software.

4    -rwx  1131      <date>               config.text

!--- This is the configuration file.

5    -rwx  109       <date>               info

6    -rwx  389       <date>               env_vars

7    drwx  640       <date>               html

18   -rwx  109       <date>               info.ver

403968 bytes available (3208704 bytes used)

switch:

!--- This output is from a 3500XL switch. Output from

!--- other switches will vary slightly.

1. 컨피그레이션 파일의 이름을 변경하려면 rename flash:config.text flash:config.old를 입력합니다.

switch: rename flash:config.text flash:config.old

switch:

!--- The config.text file contains the password

!--- definition.

2. boot 명령을 실행하여 시스템을 부팅합니다.

switch: boot

Loading "flash:c3500xl-c3h2s-mz.120-5.WC7.bin"...###############################

################################################################################

######################################################################

File "flash:c3500xl-c3h2s-mz.120-5.WC7.bin" uncompressed and installed, entry po

int: 0x3000

executing...

!--- Output suppressed.

!--- This output is from a 3500XL switch. Output from other switches

!--- will vary slightly.

3. 프롬프트에 "n"을 입력하여 초기 컨피그레이션 대화 상자를 중단합니다.

--- System Configuration Dialog ---

At any point you can enter a question mark '?' for help.

Use ctrl-c to abort configuration dialog at any prompt.

Default settings are in square brackets '[]'.

Continue with configuration dialog? [yes/no]: n

!--- Type "n" for no.

Press RETURN to get started.

!--- Press Return or Enter.

Switch>

!--- The Switch> prompt is displayed.

4. switch 프롬프트에서 en을 입력하여 enable 모드를 시작합니다.

Switch>en

Switch#

5. 컨피그레이션 파일의 이름을 원래 이름으로 바꾸려면 rename flash:config.old flash:config.text를 입력합니다.

Switch#rename flash:config.old flash:config.text

Destination filename [config.text]

!--- Press Return or Enter.

Switch#

6. 컨피그레이션 파일을 메모리에 복사합니다.

Switch#copy flash:config.text system:running-config

Destination filename [running-config]?

!--- Press Return or Enter.

1131 bytes copied in 0.760 secs

Sw1#

이제 컨피그레이션 파일이 다시 로드됩니다.

7. 잊어버린 현재 비밀번호를 덮어쓰기합니다. 하나 이상의 대문자, 숫자, 특수 문자를 포함하는 강력한 비밀번호를 선택합니다.

참고: 필요한 비밀번호를 덮어씁니다. 언급된 모든 비밀번호를 덮어쓰기할 필요는 없습니다.

Sw1#configure terminal

!--- To overwrite existing secret password

Sw1(config)#enable secret

!--- To overwrite existing enable password

Sw1(config)#enable password

!--- To overwrite existing vty password

Sw1(config)#line vty 0 15

Sw1(config-line)#password

Sw1(config-line)#login

!--- To overwrite existing console password

Sw1(config-line)#line con 0

Sw1(config-line)#password

8. write memory 명령을 사용하여 현재 실행 중인 컨피그레이션을 컨피그레이션 파일에 씁니다.

Sw1#write memory

Building configuration...

[OK]

Sw1#

관련 정보

- Cisco 기술 지원 및 다운로드