목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

구성

NX-OS 소프트웨어 릴리스 6.2(9)를 실행하는 MDS 9509

NX-OS Software 릴리스 6.2(9)를 실행하는 MDS 9148

네트워크 다이어그램

MDS 9148(NPV)에서 MDS 9509(NPIV)로의 F-port-channel-trunk

토폴로지

다음을 확인합니다.

MDS 9509

MDS 9148

문제 해결

VSAN 초기화 중

EPP 실패 메시지 표시

소개

이 문서에서는 N_Port ID 가상화(NPIV)와 함께 실행되는 MDS(Multilayer Data Switch) 9500에서 NPV(N_Port Virtualization) 기능을 실행하는 MDS 9148로 F-port-channel-trunk를 구성하는 방법에 대해 설명합니다.

F-port-channel-trunks는 NPV 스위치의 패브릭 로그인을 포트 채널을 통해 가상화할 수 있도록 합니다.이렇게 하면 개별 멤버 링크가 실패할 경우 무중단 이중화가 제공됩니다.기본적으로 개별 링크는 속도 모드 공유 상태이지만 속도 모드 전용일 수도 있습니다.

사전 요구 사항

요구 사항

다음 주제에 대한 지식을 보유하고 있으면 유용합니다.

- N_포트 가상화

- 파이버 채널

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- NX-OS Software 릴리스 6.2(9)를 실행하는 MDS 9509

- 슬롯 2 - DS-X9148 - 48포트 1/2/4Gbps FC Module

- 슬롯 4 - DS-X9124 - 24포트 1/2/4Gbps FC Module

- NX-OS Software 릴리스 6.2(9)를 실행하는 MDS 9148

이 문서는 다음 기능을 사용합니다.

- SAN-OS Software Release 3.3에 NPV 및 NPIV 기능 추가

- 기능 포트 채널 트렁크가 NX-OS 소프트웨어 릴리스 4.1(3)에 추가되었습니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다.현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

구성

참고:이 섹션에 사용된 명령에 대한 자세한 내용을 보려면 Command Lookup Tool(등록된 고객만 해당)을 사용합니다.

참고:

모든 인터페이스는 동일한 VSAN(Virtual Storage Area Network)에 있어야 합니다. 이 예에서는 VSAN 1을 사용합니다.

멤버 인터페이스를 다른 라인 카드에 배포하는 것이 좋습니다.

"switchport rate-mode dedicated"는 선택 사항입니다.기본적으로 TF(Trunking F) 포트 인터페이스는 필요한 경우 공유 속도 모드에서 실행할 수 있습니다.포트 그룹의 대역폭을 사용할 수 있는 경우 switchport rate-mode 전용 명령으로 구성할 수 있습니다.각에서 포트 그룹 및 사용 가능한 대역폭을 보려면 show port-resources module x 명령을 입력할 수 있습니다.

NX-OS 소프트웨어 릴리스 6.2(9)를 실행하는 MDS 9509

feature fport-channel-trunk

feature npiv

interface port-channel 1

channel mode active

switchport mode F

switchport trunk allowed vsan 1

switchport trunk allowed vsan add 20

switchport rate-mode dedicated

interface fc2/2

switchport rate-mode dedicated

switchport mode F

channel-group 1 force

no shutdown

interface fc4/8

switchport rate-mode dedicated

switchport mode F

channel-group 1 force

no shutdown

NX-OS Software 릴리스 6.2(9)를 실행하는 MDS 9148

참고:

9148의 모든 포트는 전용(전체 속도 모드)이므로 9148에서는 전용 포트를 보장하기 위해 컨피그레이션이 필요하지 않습니다.실제로 "switchport rate-mode dedicated" 명령이 자동으로 추가되므로 변경할 수 없습니다.

"feature fport-channel-trunk"는 MDS NPV 스위치에서 구성할 필요가 없습니다.

NPV 모드를 변경하면 현재 컨피그레이션이 지워지고 NPV 모드에서 스위치가 재부팅됩니다.

feature npv

interface port-channel 1

channel mode active

switchport mode NP

switchport trunk allowed vsan 1

switchport trunk allowed vsan add 20

switchport rate-mode dedicated

switchport trunk mode on

interface fc1/2

switchport mode NP

switchport trunk mode on

port-license acquire

channel-group 1 force

no shutdown

interface fc1/14

switchport mode NP

switchport trunk mode on

port-license acquire

channel-group 1 force

no shutdown

네트워크 다이어그램

MDS 9148(NPV)에서 MDS 9509(NPIV)로의 F-port-channel-trunk

토폴로지

MDS 9509 모듈 정보:

mds9509# show mod

Mod  Ports  Module-Type                         Model              Status

---  -----  ----------------------------------- ------------------ ----------

2    48     1/2/4 Gbps FC Module                DS-X9148           ok

4    24     1/2/4 Gbps FC Module                DS-X9124           ok

5    0      Supervisor/Fabric-2                 DS-X9530-SF2-K9    active *

6    0      Supervisor/Fabric-2                 DS-X9530-SF2-K9    ha-standby

MDS 9148 모듈 정보:

mds9148# show mod

Mod  Ports  Module-Type                         Model              Status

---  -----  ----------------------------------- ------------------ ----------

1    48     1/2/4/8 Gbps FC/Supervisor-3        DS-C9148-K9-SUP    active *

다음을 확인합니다.

이 섹션을 사용하여 컨피그레이션이 제대로 작동하는지 확인합니다.

Output Interpreter 도구(등록된 고객만 해당)는 특정 show 명령을 지원합니다.show 명령 출력의 분석을 보려면 [출력 인터프리터 도구]를 사용합니다.

MDS 9509

이 명령은 포트 채널 1에 두 개의 작동 포트가 있음을 나타냅니다.

mds9509# show port-channel summary

------------------------------------------------------------------------------

Interface                 Total Ports        Oper Ports        First Oper Port

------------------------------------------------------------------------------

port-channel 1                 2                 2                  fc4/8

이 명령은 포트 채널 및 모든 멤버 인터페이스를 표시합니다.FOP(First Operational Port)는 별표로 표시됩니다.

mds9509(config-if)# show port-channel data

port-channel1

Administrative channel mode is active

Operational channel mode is active

Last membership update succeeded

First operational port is fc4/8

2 ports in total, 2 ports up

Ports:   fc2/2    [up]

fc4/8    [up] *

이 명령은 포트 채널 1 인터페이스가 원하는 상태인 "trunking" 상태임을 보여줍니다.

참고:VSAN 1과 20은 모두 작동하며, 이는 9148에서 모두 작동 중인 두 VSAN에 포트가 있음을 나타냅니다.

mds9509# show int po1

port-channel 1 is trunking

Hardware is Fibre Channel

Port WWN is 24:01:00:0d:ec:20:ba:00

Admin port mode is F, trunk mode is on

snmp link state traps are enabled

Port mode is TF

Port vsan is 1

Speed is 8 Gbps

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 112 bits/sec, 14 bytes/sec, 0 frames/sec

5 minutes output rate 152 bits/sec, 19 bytes/sec, 0 frames/sec

25798 frames input, 1399932 bytes

0 discards, 0 errors

0 CRC,  0 unknown class

0 too long, 0 too short

23082 frames output, 1013152 bytes

0 discards, 0 errors

18 input OLS, 14 LRR, 29 NOS, 0 loop inits

17 output OLS, 0 LRR, 21 NOS, 0 loop inits

Member[1] : fc4/2

Member[2] : fc4/8

Interface last changed at Thu Mar  6 06:27:36 2014

이 명령은 두 개의 멤버 인터페이스도 "trunking" 상태로 표시합니다.

mds9509# show interface fc2/2, fc4/8

fc2/2 is trunking

Hardware is Fibre Channel, SFP is short wave laser w/o OFC (SN)

Port WWN is 20:42:00:0d:ec:20:ba:00

Admin port mode is F, trunk mode is on

snmp link state traps are enabled

Port mode is TF

Port vsan is 1

Speed is 4 Gbps

Rate mode is dedicated

Transmit B2B Credit is 32

Receive B2B Credit is 16

Receive data field Size is 2112

Beacon is turned off

admin fec state is down

oper fec state is down

Belongs to port-channel1

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 0 bits/sec,0 bytes/sec, 0 frames/sec

5 minutes output rate 0 bits/sec,0 bytes/sec, 0 frames/sec

31 frames input,4476 bytes

0 discards,0 errors

0 invalid CRC/FCS,0 unknown class

0 too long,0 too short

30 frames output,4224 bytes

0 discards,0 errors

3 input OLS,3  LRR,7 NOS,0 loop inits

5 output OLS,0 LRR, 4 NOS, 0 loop inits

16 receive B2B credit remaining

32 transmit B2B credit remaining

32 low priority transmit B2B credit remaining

Last clearing of "show interface" counters  :never

fc4/8 is trunking

Hardware is Fibre Channel, SFP is short wave laser w/o OFC (SN)

Port WWN is 20:c8:00:0d:ec:20:ba:00

Admin port mode is F, trunk mode is on

snmp link state traps are enabled

Port mode is TF

Port vsan is 1

Speed is 4 Gbps

Rate mode is dedicated

Transmit B2B Credit is 32

Receive B2B Credit is 16

Receive data field Size is 2112

Beacon is turned off

admin fec state is down

oper fec state is down

Belongs to port-channel1

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 8 bits/sec,1 bytes/sec, 0 frames/sec

5 minutes output rate 8 bits/sec,1 bytes/sec, 0 frames/sec

45855 frames input,1934340 bytes

0 discards,0 errors

0 invalid CRC/FCS,0 unknown class

0 too long,0 too short

23018 frames output,1115304 bytes

0 discards,0 errors

8 input OLS,5  LRR,8 NOS,0 loop inits

7 output OLS,0 LRR, 6 NOS, 0 loop inits

16 receive B2B credit remaining

32 transmit B2B credit remaining

32 low priority transmit B2B credit remaining

Last clearing of "show interface" counters 2w 1d

MDS 9148

이 명령은 포트 채널 1에 두 개의 작동 포트가 있음을 나타냅니다.

mds9148# show port-channel summary

------------------------------------------------------------------------------

Interface                 Total Ports        Oper Ports        First Oper Port

------------------------------------------------------------------------------

port-channel 1                 2                 2                  fc1/2

이 명령은 포트 채널 1 인터페이스가 원하는 상태인 "trunking" 상태임을 보여줍니다.

참고:VSAN 1과 20은 모두 작동하며, 이는 9148에서 모두 작동 중인 두 VSAN에 포트가 있음을 나타냅니다.

mds9148# show int po1

port-channel 1 is trunking

Hardware is Fibre Channel

Port WWN is 24:01:00:0d:ec:fc:40:c0

Admin port mode is NP, trunk mode is on

snmp link state traps are enabled

Port mode is TNP

Port vsan is 1

Speed is 8 Gbps

Trunk vsans (admin allowed and active) (1,20)

Trunk vsans (up)                       (1,20)

Trunk vsans (isolated)                 ()

Trunk vsans (initializing)             ()

5 minutes input rate 32 bits/sec,4 bytes/sec, 0 frames/sec

5 minutes output rate 32 bits/sec,4 bytes/sec, 0 frames/sec

688 frames input,91096 bytes

0 discards,0 errors

0 invalid CRC/FCS,0 unknown class

0 too long,0 too short

661 frames output,89080 bytes

3 discards,0 errors

14 input OLS,0  LRR,0 NOS,0 loop inits

32 output OLS,29 LRR, 14 NOS, 0 loop inits

Member[1] : fc1/2

Member[2] : fc1/14

Interface last changed at Thu Mar  6 18:48:57 2014

문제 해결

이 섹션에서는 컨피그레이션 문제를 해결하는 데 사용할 수 있는 정보를 제공합니다.

포트 채널이 나타나지 않으면 다음 정보를 검토합니다.

포트와 PortChannel에서 이러한 컨피그레이션이 동일한 경우에만 포트를 고정 PortChannel의 멤버로 구성할 수 있습니다.

- 속도

- 모드

- 속도 모드

- 포트 VSAN

- 트렁킹 모드

- 허용된 VSAN 목록 또는 VF-ID 목록

포트 채널에 없는 포트를 구성하고 해당 포트가 나타나는지 확인합니다.

자세한 내용은 포트 채널 구성을 참조하십시오.

VSAN 초기화 중

MDS 9148의 해당 VSAN에 FLOGI가 연결된 인터페이스가 없는 경우 VSAN은 초기화로 표시됩니다.VSAN이 포트 채널에서 가동되면 MDS 9148의 VSAN에 남아 있는 마지막 포트가 다운되면 VSAN은 작동 상태로 유지됩니다.

EPP 실패 메시지 표시

EPP(트렁크 프로토콜)가 활성화되었는지 확인합니다.이 기능은 해제해서는 안 됩니다.

rtp-san-34-15-9509(config)# show trunk protocol

Trunk Protocol is enabled

트렁크 프로토콜이 비활성화된 경우 다시 켜십시오.

mds9509(config)# show trunk protocol

Trunk Protocol is disabled

mds9509(config)# trunk protocol

mds9509(config)#

mds9509(config)# show trunk protocol

Trunk Protocol is enabled