소개

이 문서에서는 Cisco Intersight를 통해 Cisco Nutanix HCI 클러스터의 펌웨어 업그레이드를 수행하는 프로세스에 대해 설명합니다.

배경 정보

ISM/IMM 클러스터용 펌웨어를 교정할 때는 LCM(Life Cycle Manager)을 사용하는 것이 좋지만, 버그 또는 FN(Field Notice)와 같은 특정 시나리오에서는 업그레이드 또는 다운그레이드할 특정 버전을 선택해야 할 수 있습니다. 이러한 경우 Intersight를 통해 펌웨어 변경을 적용할 수 있습니다.

LCM 프로세스와 달리, 오프라인 업그레이드는 호스트 단위로 펌웨어를 수동으로 수정하고 패치해야 합니다. 이러한 작업을 실행하기 전에 클러스터의 워크로드와 용량을 이해해야 합니다.

사용자는 수동으로 호스트를 유지 보수 모드로 전환하고 Intersight를 통해 펌웨어 변경 사항을 적용한 다음 유지 보수 모드를 종료합니다. 이는 클러스터의 각 노드에 대해 반복됩니다.

팁: 클러스터가 견딜 수 있는 동시 누락 노드 수에 대한 자세한 내용은 Nutanix 설명서 Cluster Fault Tolerance를 참조하십시오.

수동 업그레이드 단계 요약

1. 새 펌웨어 버전으로 각 펌웨어 정책을 수정합니다.

2. 펌웨어를 스테이징하기 위해 즉시 재부팅하지 않고 모든 프로파일을 구축합니다.

3. 프리즘 요소 또는 프리즘 센트럴을 통해 단일 노드를 유지 보수 모드로 배치합니다.

4. 서버의 전원을 껐다가 켜고 펌웨어를 적용하려면 Maintenance Mode(유지 보수 모드)에서 서버의 프로필을 활성화합니다.

5. 클러스터의 모든 노드에 대해 3단계와 4단계를 반복합니다.

6. 업그레이드가 완료되었으며 클러스터가 정상인지 확인합니다.

펌웨어 정책 수정

Intersight는 펌웨어 정책을 통해 펌웨어를 푸시합니다. 각 노드에는 자체 정책이 있으며, 이러한 정책을 수정하여 새 버전을 선택합니다.

펌웨어 정책 이름의 구문은 다음과 같습니다. ntnx_firmware_<일련 번호>_<배포 UUID>

정책 찾기 및 수정

Policies(정책) > Filters(필터) > Check Firmware(펌웨어 확인)로 이동합니다.

수정할 정책을 선택하고 edit를 클릭합니다.

드롭다운 목록에서 원하는 펌웨어 버전을 선택한 다음 Save & Deploy(저장 및 구축)를 클릭합니다.

펌웨어 준비

서버 프로필이 재배포된 경우 Reboot Immediately(즉시 재부팅) 옵션이 선택 취소되어 있는지 확인합니다. 이렇게 하면 블레이드에 새 펌웨어가 스테이징됩니다. 변경은 다음 전원 사이클 이후에만 실행됩니다.

구축이 시작되면

- 요청 탭에 새 워크플로가 나타납니다.

- 펌웨어 다운로드가 시작됩니다.

- 서버를 즉시 재부팅하지 않고 배포한 후 서버 프로필에 Inconsistent 상태가 표시됩니다. 이는 프로필이 활성화될 때까지 필요합니다.

계속해서 다른 모든 펌웨어 정책을 수정하고 즉시 재부팅 없이 구축합니다.

Prism Central 또는 Prism 요소를 통해 서버를 유지 보수 모드로 전환

중단을 방지하려면 재부팅 전에 워크로드를 마이그레이션하기 위해 서버를 유지 관리 모드로 전환해야 합니다.

프리즘 요소를 통해서

1. Hardware > Diagram으로 이동합니다.

2. AHV#를 선택합니다.

3. 유지 보수 모드 입력을 선택합니다.

프리즘 센트럴을 통해

1. Infrastructure(인프라) > Hardware(하드웨어) > Clusters(클러스터)로 이동합니다.

2. 클러스터를 선택합니다.

3. 특정 노드를 선택하여 유지 보수 모드로 전환합니다.

프로파일 활성화 및 펌웨어 푸시

호스트가 유지 보수 모드에 있으면 펌웨어를 노드로 푸시할 수 있습니다

1. 프로파일 탭으로 이동합니다.

2. Maintenance Mode(유지 보수 모드)에서 Serial Number(시리얼 번호)로 서버 프로파일을 찾습니다.

3. 작업 > 활성화를 선택합니다.

(선택 사항) KVM 콘솔을 통해 펌웨어 업그레이드 진행 상황을 모니터링합니다.

업그레이드 확인 및 유지 관리 모드 종료

활성화가 완료되면 Server Profile(서버 프로필) 상태가 OK(확인)로 전환됩니다.

이제 노드를 유지 보수 모드에서 해제할 수 있습니다.

모든 프로파일이 OK Status(확인 상태)를 표시할 때까지 나머지 노드에 대해 이 과정을 반복합니다.

클러스터 상태 확인

Prism에서 클러스터 복원력이 정상인지 확인합니다.

관련 정보

Cisco UCS 하드웨어 호환성 목록

Nutanix 플랫폼 호환성 및 상호 운용성 매트릭스

KB-15110 LCM 사전 확인: test_cisco_validate_credentials_and_setup

Perform Cisco Nutanix HCI Cluster Offline Upgrade Through Intersight

## Introduction

This document describes the process to manually perform an offline firmware upgrade for Cisco Nutanix HCI clusters using Cisco Intersight when LCM is not used.

## Background Information

While it is recommended to use Life Cycle Manager (LCM) when remediating firmware for ISM/IMM Clusters, specific scenarios—such as hitting a bug or Field Notice (FN)—may require selecting a specific version for an upgrade or downgrade. In these cases, firmware changes can be applied through Intersight.

Unlike the LCM process, an offline upgrade requires editing and patching firmware on a per-host basis. It is mandatory to understand the workload and capacity of the cluster before performing these actions. During this process, the user manually places the host in Maintenance Mode, applies the firmware change via Intersight, and then exits Maintenance Mode. This is repeated for each node in the cluster.

## Manual Upgrade Steps at a Glance

1. Edit the Firmware Policy with the new firmware version.

2. Deploy all profiles without an immediate reboot to stage the firmware.

3. Place the node in Maintenance Mode via Prism Element or Prism Central.

4. Activate the profile for the server in Maintenance Mode to power cycle the server and apply firmware.

5. Repeat steps 3 and 4 for all nodes in the cluster.

## Modify Firmware Policies

Intersight pushes firmware through a Firmware Policy. Each node has its own policy, and new versions are selected by editing these policies.

The syntax for the firmware policy name is: `ntnx_firmware_

_

`

### Locate and Edit Policies

1. Navigate to **Policies** > Click **Filters** > **Type** > Check **Firmware**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image.png)

2. Select the Policy and click **Edit**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%201.png)

3. Select the desired firmware version from the drop-down list and click **Save & Deploy**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%202.png)

### Stage the Firmware

When redeploying the server profile, ensure the **Reboot Immediately** option is **unchecked**. This stages the new firmware on the blade; the change is only executed after the next power cycle. This method saves time by staging firmware across all nodes simultaneously.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%203.png)

Once deployment starts:

* A new workflow appears in the **Requests** tab.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%204.png)

* The firmware download is initiated.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%205.png)

* After the server is deployed without an immediate reboot, the Server Profile will show an **Inconsistent** status. This is expected until the profile is activated.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%206.png)

## Place Servers in Maintenance Mode Through Prism Central or Prism Element

To avoid disruption, servers must be placed into Maintenance Mode to migrate workloads before the reboot.

### Using Prism Element

1. Navigate to **Hardware** > **Diagram**.

2. Select the **AHV#**.

3. Select **Enter Maintenance Mode**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%207.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%208.png)

### Using Prism Central

1. Navigate to **Infrastructure** > **Hardware** > **Clusters**.

2. Select the **Cluster**.

3. Select the specific **Node** to place it in Maintenance Mode.

## Activate Profiles and Push Firmware

Once the host is in Maintenance Mode, you can push the firmware.

1. Navigate to the **Profiles** tab.

2. Locate the profile of the server in Maintenance Mode using its Serial Number.

3. Select **Actions** > **Activate**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%209.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2010.png)

4. (Optional) Monitor the firmware upgrade progress through the KVM console.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2011.png)

## Verify Upgrade and Exit Maintenance Mode

Once the activation is complete:

1. The Server Profile status transitions to **OK**.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2012.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2013.png)

2. The node can now be taken out of Maintenance Mode.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2014.png)

3. Repeat the process for the remaining nodes until all profiles show an **OK** status.

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2015.png)

![image.png](Cisco%20Nutanix%20HCI%20Cluster%20Offline%20Upgrade%20through%20/image%2016.png)