목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

구성

로그 내보내기 정책 구성

로깅 레벨 컨피그레이션

다음을 확인합니다.

외부 서버

문제 해결

관련 정보

소개

이 문서에서는 로그를 보존하기 위해 SCP(Secure Copy Protocol)를 사용하여 외부 서버로 내보낼 DME(Data Management Engine) 로그를 구성하는 방법에 대해 설명합니다.

UCSM(Unified Computing System Manager)은 프로세스에 대한 로그 파일을 /var/sysmgr/sam_logs/에 저장합니다. 이러한 로그는 관리자가 UCSM 기술 지원을 수집하거나 tail-mgmt-log 명령을 사용하여 로컬 관리 범위에서 읽을 수 있습니다.

사전 요구 사항

요구 사항

다음 주제에 대한 지식을 보유하고 있으면 유용합니다.

- UCS 도메인에 대한 명령줄(CLI) 액세스

- 외부 서버

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- UCS 6248 Fabric Interconnect

- UCSM 2.2(7b)

- CentOS 6.7

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다.네트워크가 작동 중인 경우 모든 명령의 잠재적인 영향을 이해해야 합니다.

구성

로그 내보내기 정책 구성

참고:이러한 컨피그레이션 단계는 Cisco UCS Manager CLI System Monitoring Guide의 Configuring Settings for Faults, Events and Logs(결함, 이벤트 및 로그에 대한 설정 구성) 섹션 > Log File Exporter(로그 파일 내보내기) 섹션에 설명되어 있습니다.모니터링 가이드 전체를 읽는 것이 좋습니다.

1단계. 현재 로그 내보내기 정책의 검사부터 시작합니다.

ucs-04-B# scope monitoring

ucs-04-B /monitoring # scope sysdebug

ucs-04-B /monitoring/sysdebug # scope log-export-policy

ucs-04-B /monitoring/sysdebug/log-export-policy # show

Log Export Policy:

Remote server:

admin state: Disabled

Use Passwordless Ssh: Yes

2단계. 수정할 수 있는 설정을 봅니다.

ucs-04-B /monitoring/sysdebug/log-export-policy # set

admin-state       admin state

descr             Description

hostname          Remote server

passwd            password

passwordless-ssh  Use Passwordless Ssh

path              remote path

proto             protocol

user              remote user

3단계. 외부 서버를 구성합니다.

ucs-04-B /monitoring/sysdebug/log-export-policy # set hostname 192.168.0.100

ucs-04-B /monitoring/sysdebug/log-export-policy* # set user ucs

ucs-04-B /monitoring/sysdebug/log-export-policy* # set passwd

password:

ucs-04-B /monitoring/sysdebug/log-export-policy* # set path /var/log/

ucs-04-B /monitoring/sysdebug/log-export-policy* # set admin-state enabled

ucs-04-B /monitoring/sysdebug/log-export-policy* # set proto scp

ucs-04-B /monitoring/sysdebug/log-export-policy* # set passwordless-ssh yes

ucs-04-B /monitoring/sysdebug/log-export-policy* # commit-buffer

ucs-04-B /monitoring/sysdebug/log-export-policy #

로깅 레벨 컨피그레이션

관리자가 특정 로깅 모듈에 대한 로깅 레벨을 늘려야 할 수 있습니다.이 명령은 구성할 수 있는 모듈을 보여줍니다.

ucs-04-B # scope monitoring

ucs-04-B /monitoring # scope sysdebug

ucs-04-B /monitoring/sysdebug # scope mgmt-logging

ucs-04-B /monitoring/sysdebug/mgmt-logging #

reset  Reset mgmt logging levels

save   Save mgmt logging parameters

set    Set mgmt logging property values

show   Show system information

ucs-04-B /monitoring/sysdebug/mgmt-logging # show

Log File Size Limit:         5242880

Name                  Level  Default Level

--------------------- ------ -------------

adaptor               Info   Info

agdriver              Info   Info

ape                   Info   Info

app_hostag_agcore     Info   Info

app_sam_bladeAG       Info   Info

app_sam_cim           Info   Info

app_sam_controller    Info   Info

app_sam_dcosAG        Info   Info

app_sam_dme           Info   Info

app_sam_hostagentAG   Info   Info

app_sam_licenseAG     Info   Info

app_sam_nicAG         Info   Info

app_sam_portAG        Info   Info

app_sam_rsdAG         Info   Info

app_sam_serverAG      Info   Info

app_sam_snmp          Info   Info

app_sam_statsAG       Info   Info

app_sam_svcmonAG      Info   Info

app_sam_switchAG      Info   Info

app_synagent_fileAG   Info   Info

app_unittest_testsvc  Info   Info

auth                  Info   Info

autocond              Info   Info

bio_stream            Info   Info

bios                  Info   Info

callhome              Info   Info

catalog               Info   Info

char_stream           Info   Info

compute               Info   Info

core_transactor       Info   Info

core_utils            Info   Info

diag                  Info   Info

doer                  Info   Info

domain                Info   Info

equipment             Info   Info

ether                 Info   Info

event_                Info   Info

event_channel         Info   Info

exception_handling    Info   Info

fabric                Info   Info

fault                 Info   Info

fcpool                Info   Info

filter                Info   Info

fsm                   Info   Info

http_client           Info   Info

ippool                Info   Info

iptfwconfig           Info   Info

locator               Info   Info

여기서 명령은 관리자가 app_sam_dme의 로깅 레벨, DME 로깅 모듈을 수정하는 방법을 보여줍니다.

ucs-04-B /monitoring/sysdebug/mgmt-logging # set

all     All mgmt logging modules

file    Mgmt logging file parameters

module  Specific mgmt logging module

ucs-04-B /monitoring/sysdebug/mgmt-logging # set module app_sam_dme

crit    Crit

debug0  Debug0

debug1  Debug1

debug2  Debug2

debug3  Debug3

debug4  Debug4

info    Info

major   Major

minor   Minor

warn    Warn

ucs-04-B /monitoring/sysdebug/mgmt-logging # set module app_sam_dme debug4

ucs-04-B /monitoring/sysdebug/mgmt-logging # show

Log File Size Limit:         5242880

Name                  Level  Default Level

--------------------- ------ -------------

adaptor               Info   Info

agdriver              Info   Info

ape                   Info   Info

app_hostag_agcore     Info   Info

app_sam_bladeAG       Info   Info

app_sam_cim           Info   Info

app_sam_controller    Info   Info

app_sam_dcosAG        Info   Info

app_sam_dme           Info   Debug4

app_sam_hostagentAG   Info   Info

app_sam_licenseAG     Info   Info

app_sam_nicAG         Info   Info

app_sam_portAG        Info   Info

app_sam_rsdAG         Info   Info

app_sam_serverAG      Info   Info

app_sam_snmp          Info   Info

app_sam_statsAG       Info   Info

app_sam_svcmonAG      Info   Info

app_sam_switchAG      Info   Info

app_synagent_fileAG   Info   Info

app_unittest_testsvc  Info   Info

auth                  Info   Info

autocond              Info   Info

bio_stream            Info   Info

bios                  Info   Info

callhome              Info   Info

catalog               Info   Info

char_stream           Info   Info

compute               Info   Info

core_transactor       Info   Info

core_utils            Info   Info

diag                  Info   Info

doer                  Info   Info

domain                Info   Info

equipment             Info   Info

ether                 Info   Info

event_                Info   Info

event_channel         Info   Info

exception_handling    Info   Info

fabric                Info   Info

fault                 Info   Info

fcpool                Info   Info

filter                Info   Info

fsm                   Info   Info

http_client           Info   Info

ippool                Info   Info

iptfwconfig           Info   Info

locator               Info   Info

로깅 레벨이 증가하면 로깅된 메시지 수가 증가합니다. 대부분의 경우 Cisco TAC(Technical Assistance Center)에서 요청한 경우에만 수정해야 합니다.

다음을 확인합니다.

이 섹션을 사용하여 컨피그레이션이 제대로 작동하는지 확인합니다.

외부 서버

여기에 표시된 것처럼 syslog 서버에는 UCS 도메인에서 내보낸 여러 .tgz 파일이 포함되어 있습니다.

[admin@localhost /var/log]# ls -la logs.ucs-04-B* | tail -n 5

-rw-r--r--. 1 root root 476911 Dec  8 09:10 logs.ucs-04-B.151208141033.tgz

-rw-r--r--. 1 root root 276423 Dec  8 09:29 logs.ucs-04-B.151208142904.tgz

-rw-r--r--. 1 root root 456043 Dec  8 09:33 logs.ucs-04-B.151208143342.tgz

-rw-r--r--. 1 root root 480427 Dec  8 09:57 logs.ucs-04-B.151208145722.tgz

-rw-r--r--. 1 root root 119322 Dec  8 10:04 logs.ucs-04-B.151208150403.tgz

이 중 하나를 예로 추출하면 svc_sam_dme.log.6.gz 파일이 포함되어 있습니다. 이 컨피그레이션이 없는 경우 UCS는 새 로그 메시지를 저장하기 위해 삭제해야 합니다.

[admin@localhost /var/log]# tar -vxzf logs.ucs-04-B.151208145722.tgz

bootflash/sysdebug/log_export/ucs-04-B/151208145722/

bootflash/sysdebug/log_export/ucs-04-B/151208145722/svc_sam_dme.log.6.gz

문제 해결

현재 이 컨피그레이션에 사용할 수 있는 특정 문제 해결 정보가 없습니다.

관련 정보

- Cisco UCS 모니터링 리소스 핸드북

- 기술 지원 및 문서 − Cisco Systems