목차

소개

이 문서에서는 SEG(Secure Email Gateway)가 기존 클러스터에 조인할 수 없는 문제를 해결하는 방법에 대해 설명합니다.

사전 요구 사항

다음 주제에 대한 지식을 보유하고 있으면 유용합니다.

- 어플라이언스를 클러스터에 가입시키는 방법(중앙 집중식 관리).

- 모든 ESA의 AsyncOS 버전은 동일해야 합니다(개정판까지).

요구 사항

이 문서의 정보는 특정 랩 환경의 디바이스를 통해 생성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 네트워크가 가동 중인 경우 모든 명령의 잠재력을 파악해야 합니다

문제

기존 클러스터에 SEG(Secure Email Gateway)를 조인할 때 문제가 발생합니다. 이 문제는 연결 시 오류가 발생했다는 것을 나타냅니다. ESA에서 일부 kex 알고리즘/암호 알고리즘이 누락되었기 때문입니다.

클러스터에 가입하지 못했습니다.

오류: "(3, '일치하는 키 교환 알고리즘을 찾을 수 없습니다.')"

클러스터에 있는 시스템의 IP 주소를 입력합니다.

솔루션

sshconfig에 대한 기본값을 사용해야 합니다.

esa> sshconfig

Choose the operation you want to perform:

- SSHD - Edit SSH server settings.

- USERKEY - Edit SSH User Key settings

- ACCESS CONTROL - Edit SSH whitelist/blacklist

[]> sshd

ssh server config settings:

Public Key Authentication Algorithms:

rsa1

ssh-dss

ssh-rsa

Cipher Algorithms:

aes128-ctr

aes192-ctr

aes256-ctr

aes128-cbc

3des-cbc

blowfish-cbc

cast128-cbc

aes192-cbc

aes256-cbc

rijndael-cbc@lysator.liu.se

MAC Methods:

hmac-md5

hmac-sha1

umac-64@openssh.com

hmac-ripemd160

hmac-ripemd160@openssh.com

hmac-sha1-96

hmac-md5-96

Minimum Server Key Size:

1024

KEX Algorithms:

diffie-hellman-group-exchange-sha256

diffie-hellman-group-exchange-sha1

diffie-hellman-group14-sha1

diffie-hellman-group1-sha1

ecdh-sha2-nistp256

ecdh-sha2-nistp384

ecdh-sha2-nistp521

기본값을 적용하려면 단계별 설정에서 CLI > sshconfig > sshd에서 명령을 실행할 수 있습니다.

[]> setup

Enter the Public Key Authentication Algorithms do you want to use

[rsa1,ssh-dss,ssh-rsa]>rsa1,ssh-dss,ssh-rsa

Enter the Cipher Algorithms do you want to use

[aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc]>aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,rijndael-cbc@lysator.liu.se

aes128-ctr,aes192-ctr,aes256-ctr,aes128-cbc,3des-cbc,blowfish-cbc,cast128-cbc,aes192-cbc,aes256-cbc,rijndael-cbc@lysator.liu.se

Enter the MAC Methods do you want to use

[hmac-md5,hmac-sha1,umac-64@openssh.com,hmac-ripemd160]>hmac-md5,hmac-sha1,umac-64@openssh.com,hmac-ripemd160,hmac-ripemd160@openssh.com,hmac-sha1-96,hmac-md5-96, diffie-hellman-group14-sha1

Enter the Minimum Server Key Size do you want to use

[1024]>

Enter the KEX Algorithms do you want to use

[diffie-hellman-group-exchange-sha256,diffie-hellman-group-exchange-sha1]>diffie-hellman-group-exchange-sha256,diffie-hellman-group-exchange-sha1,diffie-hellman-group14-sha1,iffie-hellman-group1-sha1,ecdh-sha2-nistp256,ecdh-sha2-nistp384,ecdh-sha2-nistp521

변경 사항 커밋

esa> commit

Please enter some comments describing your changes:

[]> Edit the SSHD values

변경 후 어플라이언스는 클러스터에 성공적으로 조인합니다

관련 정보

ESA(Email Security Appliance) 클러스터 구성

ESA FAQ: 클러스터 설정을 위한 요구 사항은 무엇입니까?