목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

vESA는 안티스팸 또는 안티바이러스 업데이트를 다운로드 및 적용할 수 없음

올바른 동적 호스트 URL을 사용하도록 어플라이언스 설정

다음을 확인합니다.

문제 해결

관련 정보

소개

이 문서에서는 가상 어플라이언스의 라이센스가 올바르게 지정되어 있더라도 vESA(Virtual Email Security Appliance)가 Cisco 안티스팸 엔진(CASE) 또는 Sophos 및/또는 McAfee 안티바이러스 업데이트를 다운로드하여 적용하지 않는 경우를 설명합니다.

사전 요구 사항

요구 사항

다음 주제에 대한 지식을 보유하고 있으면 유용합니다.

- ESA(Email Security Appliance)

- vESA, vWSA(virtual Web Security Appliance), vSMA(virtual Security Management Appliance)

- AysncOS

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- AsyncOS 8.0.0 이상을 실행하는 vESA

- AsyncOS 7.7.5 이상을 실행하는 vWSA

- AsyncOS 9.0.0 이상을 실행하는 vSMA

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다.현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

vESA는 안티스팸 또는 안티바이러스 업데이트를 다운로드 및 적용할 수 없음

안티스팸 또는 안티바이러스를 업데이트하면 update force 명령을 입력해도 서비스 엔진이나 규칙 세트에 도달하여 업데이트할 수 없습니다.

다음 명령 중 하나가 vESA의 CLI에서 직접 입력되었을 수 있습니다.

> antispamupdate ironport

> antispamupdate ironport force

> antivirusupdate force

> updatenow force

tail updater_logs를 실행할 때 표시되는 오류는 다음과 유사합니다.

Mon Oct 21 17:48:43 2013 Info: Dynamic manifest fetch failure: Received invalid update manifest response

업데이트 컨피그레이션과 연결된 동적 호스트 URL이 올바른 업데이터 매니페스트에 올바르게 도달할 수 없음을 나타냅니다.동적 호스트 URL은 updateconfig 명령 내에서 설정됩니다.하위 명령인 dynamichost는 여기서 강조 표시된 대로 updateconfig 내의 숨겨진 명령입니다.

myesa.local> updateconfig

Service (images): Update URL:

------------------------------------------------------------------------------

Feature Key updates http://downloads.ironport.com/asyncos

McAfee Anti-Virus definitions Cisco IronPort Servers

RSA DLP Engine Updates Cisco IronPort Servers

PXE Engine Updates Cisco IronPort Servers

Sophos Anti-Virus definitions Cisco IronPort Servers

IronPort Anti-Spam rules Cisco IronPort Servers

Intelligent Multi-Scan rules Cisco IronPort Servers

Outbreak Filters rules Cisco IronPort Servers

Timezone rules Cisco IronPort Servers

Cisco IronPort AsyncOS upgrades Cisco IronPort Servers

IMS Secondary Service rules Cisco IronPort Servers

Service (list): Update URL:

------------------------------------------------------------------------------

McAfee Anti-Virus definitions Cisco IronPort Servers

RSA DLP Engine Updates Cisco IronPort Servers

PXE Engine Updates Cisco IronPort Servers

Sophos Anti-Virus definitions Cisco IronPort Servers

IronPort Anti-Spam rules Cisco IronPort Servers

Intelligent Multi-Scan rules Cisco IronPort Servers

Outbreak Filters rules Cisco IronPort Servers

Timezone rules Cisco IronPort Servers

Service (list): Update URL:

------------------------------------------------------------------------------

Cisco IronPort AsyncOS upgrades Cisco IronPort Servers

Update interval: 5m

Proxy server: not enabled

HTTPS Proxy server: not enabled

Choose the operation you want to perform:

- SETUP - Edit update configuration.

[]> dynamichost

Enter new manifest hostname : port

[update-manifests.sco.cisco.com:443]>

올바른 동적 호스트 URL을 사용하도록 어플라이언스 설정

Cisco를 통해 연결된 방식에 따라 고객에게 사용되는 두 가지 동적 호스트 URL이 있습니다.

1. update-manifests.cisco.com:443

- 사용법:고객 vESA, vWSA, vSMA

2. stage-stg-updates.ironport.com:443

- 사용법:Friendly, Beta 가상 및 하드웨어 어플라이언스

참고:하드웨어 어플라이언스(C1x0, C3x0, C6x0, C6x0 및 X10x0)는 update-manifests.ironport.com:443의 동적 호스트 URL만 사용해야 합니다. ESA 및 vESA가 모두 포함된 클러스터 컨피그레이션이 있는 경우 updateconfig를 시스템 레벨에서 구성한 다음 동적호스트가 설정되었는지확인해야 합니다.

참고:고객은 Cisco를 통해 베타 사용을 위한 사전 프로비저닝에 액세스한 경우에만 스테이징 업데이트 서버 URL을 사용해야 합니다.베타 사용에 유효한 라이센스가 적용되지 않은 경우 어플라이언스는 스테이징 업데이트 서버에서 업데이트를 받지 않습니다.

updateconfig 및 dynamichost 하위 명령에서 연속적으로 필요에 따라 동적 호스트 URL을 입력하고 기본 CLI 프롬프트로 돌아가서 변경 사항을 커밋합니다.

Enter new manifest hostname : port

[update-manifests.sco.cisco.com:443]> stage-stg-updates.ironport.com:443

[]> <<<HIT RETURN TO GO BACK TO THE MAIN CLI PROMPT>>>

myesa.local> commit

다음을 확인합니다.

어플라이언스가 이제 올바른 동적 호스트 URL에 도달하고 업데이트가 성공했는지 확인하려면 다음 단계를 완료하십시오.

1. updater_logs를 디버그로 늘립니다.
Currently configured logs:> logconfig

Log Name Log Type Retrieval Interval

---------------------------------------------------------------------------------

1. antispam Anti-Spam Logs Manual Download None

[SNIP FOR BREVITY]

28. updater_logs Updater Logs Manual Download None

29. upgrade_logs Upgrade Logs Manual Download None

Choose the operation you want to perform:

- NEW - Create a new log.

- EDIT - Modify a log subscription.

- DELETE - Remove a log subscription.

- SETUP - General settings.

- LOGHEADERS - Configure headers to log.

- HOSTKEYCONFIG - Configure SSH host keys.

[]> edit

Enter the number of the log you wish to edit.

[]> 28 [NOTE, log # will be different on a per/appliance basis]

Please enter the name for the log:

[updater_logs]>

Log level:

1. Critical

2. Warning

3. Information

4. Debug

5. Trace

[3]> 4

[SNIP FOR BREVITY]

myesa_2.local> commit

2. 안티스팸(antispamupdate force) 또는 안티바이러스(antivirusupdate force)에서 강제 업데이트를 실행합니다.
myesa.local> antivirusupdate force

Sophos Anti-Virus updates:

Requesting forced update of Sophos Anti-Virus.

3. 마지막으로, tail updater_logs는 어플라이언스가 다음과 같이 동적 호스트에 도달할 수 있는지 확인합니다.
Mon Oct 21 18:19:12 2013 Debug: Acquiring dynamic manifest from stage-stg-updates.ironport.com:443

문제 해결

문제를 해결하려면 다음 단계를 완료하십시오.

1. 기본 updateconfig가 사용되는지 확인합니다.vESA 또는 호스트가 방화벽 뒤에 있는 경우 정적 서버로 업데이트를 사용 중인지 확인합니다.

2. 선택한 대로 동적 호스트 URL에 텔넷을 할 수 있는지 확인합니다.
> telnet

Please select which interface you want to telnet from.

1. Auto

2. Management (172.16.6.165/24: myesa_2.local)

3. new_data (192.168.1.10/24: myesa.local_data1)

[1]>

Enter the remote hostname or IP address.

[]> stage-stg-updates.ironport.com

Enter the remote port.

[25]> 443

Trying 208.90.58.24...

Connected to stage-stg-updates.ironport.com.

Escape character is '^]'.

^] ["CTRL + ]"]

telnet> quit

Connection closed.

관련 정보

- 정적 서버를 사용한 Content Security Appliance 업그레이드 또는 업데이트

- 기술 지원 및 문서 − Cisco Systems