목차

질문

질문

환경:Cisco ESA(Content Security Email Security Appliance) 또는 WSA(Web Security Appliance) 및 모든 버전의 AsyncOS입니다.

AsyncOS에서는 네트워크 컨피그레이션에 따라 미디어 속도 설정을 변경할 수 있습니다.미디어 속도를 설정할 수 있는 명령은 etherconfig입니다.이 7가지 속도 설정 중 하나를 선택할 수 있습니다.

1. 자동 선택

2. 10baseT/UTP 반이중

3. 10baseT/UTP 전이중

4. 100baseTX 반이중

5. 100baseTX 전이중

6. 1000baseTX 반이중

7. 1000baseTX 전이중

CLI를 사용하여 Cisco Content Security Appliance에 로그온하고 여기에 설명된 단계를 수행합니다.

================AsyncOS=================

example.com> etherconfig

Ethernet interfaces:

1. Data 1 (Autoselect: 100baseTX full-duplex)

2. Data 2 (Autoselect: 100baseTX full-duplex)

3. Management (Autoselect: 100baseTX full-duplex)

Choose the operation you want to perform:

- EDIT - Edit an Ethernet interface.

- PAIRING - Configure pairing.

[]> edit

Enter the name or number of the ethernet interface you wish to edit.

[]> 2

Please choose the Ethernet media options for the Data 2 interface.

1. Autoselect

2. 10baseT/UTP half-duplex

3. 10baseT/UTP full-duplex

4. 100baseTX half-duplex

5. 100baseTX full-duplex

6. 1000baseTX half-duplex

7. 1000baseTX full-duplex

[1]> 5

Ethernet interfaces:

1. Data 1 (Autoselect: 100baseTX full-duplex)

2. Data 2 (100baseTX full-duplex)

3. Management (Autoselect: 100baseTX full-duplex)

Choose the operation you want to perform:

- EDIT - Edit an ethernet interface.

- PAIRING - Configure pairing.

[]>

example.com> commit

Please enter some comments describing your changes:

[]> Changed media speed settings from Auto to 100baseTX full-duplex.

[]>Changes committed: Mon Mar 28 13:45:24 2005 PST

example.com> etherconfig

Ethernet interfaces:

1. Data 1 (Autoselect: 100baseTX full-duplex)

2. Data 2 (100baseTX full-duplex)

3. Management (Autoselect: 100baseTX full-duplex)

=================출력 완료======================

변경 사항이 올바른 인터페이스에 올바르게 적용되었는지 확인하십시오.

이더넷 인터페이스의 미디어 설정에 대한 자세한 내용은 Cisco Content Security Support 포털의 AsyncOS Advanced User Guide를 참조하십시오.