목차

소개

NGUI의 배경

배너 비활성화

배너 다시 활성화

소개

이 문서에서는 SMA(Security Management Appliance)에서 새 웹 인터페이스를 비활성화하는 방법에 대해 설명합니다.

NGUI의 배경

AsyncOS 12.0 이후의 SMA 디바이스에 새로운 웹 인터페이스가 도입되었습니다.이 기능을 구현하면 사용자는 웹 페이지 상단에 새 배너를 볼 수 있었습니다(레거시 웹 인터페이스에 로그인할 때). 클릭하면 새 웹 인터페이스로 사용자를 라우팅합니다.배너의 표시는 여기에서 확인할 수 있습니다.

참고:하위 명령 NGIBANNER는 현재 SMA에서만 사용할 수 있으며 ESA(Email Security Appliance)에서는 사용할 수 없습니다.

배너 비활성화

SSH(Secure Shell) 세션을 통해 디바이스에 연결해야 합니다.연결되면 CLI에 로그인하고 adminaccessconfig 명령을 사용하여 아래와 같이 배너를 비활성화하십시오.

sma.cisco.com> adminaccessconfig

Select the operation you want to perform:

BANNER - Configure pre-login message (banner) for the appliance administrator login.

WELCOME - Configure welcome message (post-login banner) for the appliance administrator login.

IPACCESS - Configure IP-based access for appliance administrative interface.

CSRF - Configure web UI Cross-Site Request Forgeries protection.

NGUIBANNER - Enable/Disable the Next Generation User Interface Banner.

XSS - Configure Cross-Site Scripting Attack protection.

ENCRYPTCONFIG - Configure encryption of sensitive data in the appliance.

HOSTHEADER - Configure option to use host header in HTTP requests.

TIMEOUT - Configure GUI and CLI session inactivity timeout.

[]> nguibanner

The Next Generation User Interface is currently enabled.

Would you like to enable Next Generation User Interface? [Y]N.

sma.cisco.com> commit

변경 사항을 커밋하면 배너가 GUI에 표시되지 않습니다.

배너 다시 활성화

배너를 다시 활성화하려면 동일한 명령 체인을 따라야 하지만, 이번에는 여기와 같이 Y를 입력하여 배너를 활성화해야 합니다.

[]> nguibanner

Next Generation User Interface is currently disabled.

Would you like to enable Next Generation User Interface ? [N]Y

sma.cisco.com> commit