목차

소개

Cisco AMP for Endpoints Linux 커넥터와 호환되지 않는 알려진 AV는 무엇입니까?

소개

이 문서에서는 AMP for Endpoints Linux 커넥터의 AV(Anti-Virus) 비호환성에 대해 설명합니다.

Cisco AMP for Endpoints Linux 커넥터와 호환되지 않는 알려진 AV는 무엇입니까?

AMP for Endpoints Linux 커넥터를 간섭하는 것으로 알려진 AV 애플리케이션 목록은 다음과 같습니다.

- RHEL/CentOS 6.x의 F-Secure Linux 보안

- Kaspersky 엔드포인트 보안.

- Linux용 McAfee VSE.

- Linux용 McAfee 엔드포인트 보안.

- RHEL/CentOS 6.x 기반 Sophos Server Security 9.

- Symantec 엔드포인트 보호.

- RHEL 7의 Carbon Black

- Trend Micro DSA(Deep Security Agent).

참고: 호환되는 응용 프로그램이 문제가 될 수 있는 추가 응용 프로그램이나 업데이트가 있을 수 있습니다.자세한 내용은 사용 설명서, 특히 Linux 장을 참조하십시오(https://docs.amp.cisco.com/en/A4E/AMP%20for%20Endpoints%20User%20Guide.pdf ).