목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

배경 정보

개념

구성

UTD 제거

사전 검사

설정

다음을 확인합니다.

구성

UTD 설치

사전 검사

설정

다음을 확인합니다.

문제 해결

관련 정보

소개

이 문서에서는 SDWAN 라우터에서 CLI를 통해 UTD(Unified Threat Defense)를 설치 및 제거하는 절차에 대해 설명합니다.

사전 요구 사항

요구 사항

다음 주제에 대한 지식을 보유하고 있으면 유용합니다.

- Cisco SD-WAN(Software-defined Wide Area Network)

- Cisco IOS® XE 명령줄 인터페이스(CLI)

사용되는 구성 요소

이 문서는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- 라우터 ISR4461/K9

- 소프트웨어 버전 17.3.4

- 컨트롤러 모드의 라우터

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우 모든 명령의 잠재적인 영향을 미리 숙지하시기 바랍니다.

배경 정보

이 단계는 cedge가 CLI 모드에 있거나 vManage와 cedge 간에 제어 연결이 없을 때 적용해야 합니다.

그러나 제어 플레인이 있고 cedge가 vManage 모드인 경우 이 다른 문서를 검토하십시오.

개념

이 문서의 구체적인 요구 사항은 다음과 같습니다.

- Cisco vManage Release 20.3 이상

- Cisco Integrated Services Router 4431 릴리스 17.3.4

지원되는 플랫폼에 대한 자세한 내용은 SDWAN 지원 플랫폼 및 제한 사항에 대한 UTD로 이동합니다.

구성

UTD 제거

사전 검사

이것은 cedge 라우터가 이전 UTD 제거와 어떻게 다른지를 보여주는 예입니다.

* 디바이스가 컨트롤러 모드에 있고 템플릿이 첨부되어 있지 않지만 UTD 컨피그레이션이 적용됩니다.

cedge#show sdwan system

Viptela (tm) vEdge Operating System Software

Copyright (c) 2013-2022 by Viptela, Inc.

Controller Compatibility: 20.3

Version: 17.03.04a.0.5574

Build: Not applicable

Model name: ISR4461/K9 Services: None vManaged: false Commit pending: false Configuration template: None cedge#show platform software device-mode Device Operating-mode: Controller-Managed cedge#show run | sec utd utd multi-tenancy utd engine standard multi-tenancy threat-inspection whitelist profile Sig-white-list generator id 3 signature id 22089 generator id 3 signature id 36208 threat-inspection profile IPS-POLICY threat detection policy balanced logging level alert whitelist profile Sig-white-list policy utd-policy-vrf-1 vrf 511 all-interfaces threat-inspection profile IPS-POLICY app-hosting appid utd app-vnic gateway0 virtualportgroup 0 guest-interface 0 guest-ipaddress 192.168.1.2 netmask 255.255.255.252 app-vnic gateway1 virtualportgroup 1 guest-interface 1 guest-ipaddress 192.0.2.2 netmask 255.255.255.252 app-resource package-profile urlf-low start cedge# cedge#show running-config | section VirtualPortGroup0 interface VirtualPortGroup0 description Management interface vrf forwarding 65529 ip address 192.168.1.1 255.255.255.252 no mop enabled no mop sysid cedge#show running-config | section VirtualPortGroup1 interface VirtualPortGroup1 description Data interface ip address 192.0.2.1 255.255.255.252 no mop enabled no mop sysid cedge#

참고: UTD 컨피그레이션을 제거하려면 먼저 해당 컨피그레이션을 제거해야 합니다.

설정

1. UTD 서비스를 중지합니다.

cedge#config-transaction

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# no start

cedge(config-app-hosting)# commit

Commit complete.

참고: UTD 상태는 시작이 적용되지 않으면 실행에서 배포됨으로 변경됩니다.

cedge#show app-hosting list

App id                                   State

---------------------------------------------------------

utd                                      DEPLOYED

cedge#

2. UTD 구성을 제거합니다.

cedge#config-transaction

cedge(config)# utd engine standard multi-tenancy

cedge(config-utd-multi-tenancy)# no policy utd-policy-vrf-1

cedge(config-utd-multi-tenancy)# commit

Commit complete.

cedge(config-utd-multi-tenancy)#

cedge#config-transaction

cedge(config)# utd multi-tenancy

cedge(config)# utd engine standard multi-tenancy

cedge(config-utd-multi-tenancy)# no threat-inspection whitelist profile Sig-white-list

cedge(config-utd-multi-tenancy)# no threat-inspection profile IPS-POLICY

cedge(config-utd-multi-tenancy)# exit

cedge(config)# commit

Commit complete.

cedge(config)# no utd engine standard multi-tenancy

cedge(config)# commit

Commit complete.

cedge(config)#

cedge#config-transaction

cedge(config)# no utd multi-tenancy

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# no app-vnic gateway0 virtualportgroup 0 guest-interface 0

cedge(config-app-hosting)# no app-vnic gateway1 virtualportgroup 1 guest-interface 1

cedge(config-app-hosting)# no app-resource package-profile urlf-low

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#exit

cedge(config)# no app-hosting appid utd

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# no interface VirtualPortGroup0

cedge(config)# no interface VirtualPortGroup1

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# no iox

cedge(config)# commit

Commit complete.

cedge(config)#

3. 확인

이것은 UTD 컨피그레이션이 제거된 후 cedge 라우터가 어떻게 작동하는지 보여주는 예입니다.

cedge#show running-config | section iox

cedge#show running-config | section VirtualPortGroup0

cedge#show running-config | section VirtualPortGroup1

cedge#show running-config | section utd

cedge#

cedge#show platform software utd global

UTD Global state

=========================

Engine : Standard

Global Inspection : Disabled

Operational Mode : Intrusion Detection

Fail Policy : Fail-open

Container technology : LXC

Redirect interface : Not specified

UTD interfaces

No interfaces are protected by UTD

<snipped>

참고: 컨피그레이션이 제거되었지만 UTD에 설치된 것이 표시됩니다. 이는 예상된 결과입니다.

cedge#show utd engine standard version

UTD Virtual-service Name: utd

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

UTD Installed Version: 1.0.16_SV2.9.16.1_XE17.3

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 1

Total virtual services activated : 0

<snipped>

cedge#show app-hosting list

The process for the command is not responding or is otherwise unavailable   >>>> Expected because UTD config was removed but UTD engine remains installed

** Before to remove Configuration **

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : 1.0.16_SV2.9.16.1_XE17.3

** After configuration is removed **

cedge#

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : None

4. UTD 엔진을 제거합니다.

팁: UTD 엔진을 제거하려면 iox 및 앱 호스팅 appid utd가 활성화되어야 합니다.

다음은 iox 및 앱 호스팅 활성화 없이 UTD를 삭제하면 발생하는 일의 예입니다.

cedge#app-hosting uninstall appid utd    >>>> No action is taken.

cedge#

다음은 UTD를 성공적으로 제거하는 예입니다.

cedge#config-transaction

cedge(config)# iox

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#

*Mar 3 20:25:24.889: %UICFGEXP-6-SERVER_NOTIFIED_START: R0/0: psd: Server iox has been notified to start

*Mar 3 20:25:50.268: %IM-6-IOX_RECONCILE_INFO: R0/0: ioxman: App-hosting application reconcile process start

*Mar 3 20:25:51.956: %IM-6-IOX_ENABLEMENT: R0/0: ioxman: IOX is ready.

cedge#

cedge#app-hosting uninstall appid utd

Uninstalling 'utd'. Use 'show app-hosting list' for progress.

cedge#

*Mar 3 20:26:31.653: %VIRT_SERVICE-5-INSTALL_STATE: Successfully uninstalled virtual service utd

*Mar 3 20:26:32.706: %IM-6-INSTALL_MSG: R0/0: ioxman: app-hosting: Uninstall succeeded: utd uninstalled successfully

cedge#

다음을 확인합니다.

다음 명령을 실행하여 UTD가 제거되었는지 확인합니다.

cedge#show app-hosting list

No App found

cedge#show virtual-service version name utd running

% Error: Virtual-service utd is not found

cedge#show utd engine standard version

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 0

Total virtual services activated : 0

<snipped>

구성

UTD 설치

사전 검사

UTD 지원 버전을 검토하고 bootflash에 다운로드합니다.

cedge#

cedge#show utd engine standard version

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

cedge#

cedge#dir bootflash: | i utd

36 -rw- 55050240 Mar 1 2022 01:08:29 +00:00 secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar

cedge#

설정

1. iox 및 앱 호스팅 활성화

cedge#config-transaction

cedge(config)# iox

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#

*Mar 3 20:25:24.889: %UICFGEXP-6-SERVER_NOTIFIED_START: R0/0: psd: Server iox has been notified to start

*Mar 3 20:25:50.268: %IM-6-IOX_RECONCILE_INFO: R0/0: ioxman: App-hosting application reconcile process start

*Mar 3 20:25:51.956: %IM-6-IOX_ENABLEMENT: R0/0: ioxman: IOX is ready.

cedge#

2. UTD 엔진을 설치합니다.

cedge#app-hosting install appid utd package bootflash:secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar

Installing package 'bootflash:secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar' for 'utd'. Use 'show app-hosting list' for progress.

cedge#

*Mar 3 21:07:43.529: %VMAN-5-PACKAGE_SIGNING_LEVEL_ON_INSTALL: R0/0: vman: Package 'secapp-utd.17.03.04a.1.0.16_SV2.9.16.1_XE17.3.x86_64.tar' for service container 'utd' is 'Cisco signed', signing level cached on original install is 'Cisco signed'

*Mar 3 21:07:56.332: %VIRT_SERVICE-5-INSTALL_STATE: Successfully installed virtual service utd

*Mar 3 21:07:56.922: %IM-6-INSTALL_MSG: R0/0: ioxman: app-hosting: Install succeeded: utd installed successfully Current state is deployed

cedge#

3. UTD 엔진이 설치되어 있는지 확인합니다. 다음 명령을 실행합니다.

참고: DEPLOYED 상태는 UTD가 설치되었지만 구성되지 않았음을 의미합니다. RUNNING 상태는 UTD Installed and configured를 의미합니다.

cedge#show app-hosting list

App id                                   State

---------------------------------------------------------

utd                                      DEPLOYED

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : None >>>> "None", it is expected due to the fact that no config yet

cedge#show utd engine standard version

UTD Virtual-service Name: utd

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

UTD Installed Version: 1.0.16_SV2.9.16.1_XE17.3 >>>> UTD Package installed

cedge#

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 1 >>>> Installed 1 but Activated 0 as expected

Total virtual services activated : 0

4. UTD를 RUNNING 상태로 만들려면 IPS/URL을 구성합니다. 이 예는 Lab의 예입니다.

cedge#config-transaction

cedge(config)# interface VirtualPortGroup0

cedge(config-if)# description Management interface

cedge(config-if)# vrf forwarding 65529

cedge(config-if)# ip address 192.168.1.1 255.255.255.252

cedge(config-if)# exit

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# interface VirtualPortGroup1

cedge(config-if)# description Data interface

cedge(config-if)# ip address 192.168.2.1 255.255.255.252

cedge(config-if)# exit

cedge(config)# commit

Commit complete.

cedge(config)#

cedge(config)# app-hosting appid utd

cedge(config-app-hosting)# app-vnic gateway0 virtualportgroup 0 guest-interface 0

cedge(config-app-hosting-gateway)# guest-ipaddress 192.168.1.2 netmask 255.255.255.252

cedge(config-app-hosting-gateway)# exit

cedge(config-app-hosting)# app-vnic gateway1 virtualportgroup 1 guest-interface 1

cedge(config-app-hosting-gateway)# guest-ipaddress 192.168.2.2 netmask 255.255.255.252

cedge(config-app-hosting-gateway)# exit

cedge(config-app-hosting)# app-resource package-profile urlf-low

cedge(config-app-hosting)# start

cedge(config-app-hosting)# commit

Commit complete.

cedge(config-app-hosting)#

cedge(config-app-hosting)# exit

cedge(config)# utd multi-tenancy

cedge(config)# utd engine standard multi-tenancy

cedge(config-utd-multi-tenancy)# threat-inspection whitelist profile Sig-white-list

cedge(config-utd-mt-whitelist)# generator id 3 signature id 22089

cedge(config-utd-mt-whitelist)# generator id 3 signature id 36208

cedge(config-utd-mt-whitelist)# exit

cedge(config-utd-multi-tenancy)# threat-inspection profile IPS-POLICY

cedge(config-utd-mt-threat)# threat detection

cedge(config-utd-mt-threat)# policy balanced

cedge(config-utd-mt-threat)# whitelist profile Sig-white-list

cedge(config-utd-mt-threat)# logging level alert

cedge(config-utd-mt-threat)# exit

cedge(config-utd-multi-tenancy)# commit

Commit complete.

cedge(config-utd-multi-tenancy)#

cedge(config-utd-multi-tenancy)# policy utd-policy-vrf-1

cedge(config-utd-mt-policy)# vrf 511

cedge(config-utd-mt-policy)# all-interfaces

cedge(config-utd-mt-policy)# fail close

cedge(config-utd-mt-policy)# threat-inspection profile IPS-POLICY

cedge(config-utd-mt-policy)# exit

cedge(config-utd-multi-tenancy)# commit

Commit complete.

cedge(config-utd-multi-tenancy)#

cedge(config-utd-multi-tenancy)# end

cedge#

5. 구성이 완료되었는지 확인합니다.

cedge#show run | section utd

utd multi-tenancy

utd engine standard multi-tenancy

threat-inspection whitelist profile Sig-white-list

generator id 3 signature id 22089

generator id 3 signature id 36208

threat-inspection profile IPS-POLICY

threat detection

policy balanced

logging level alert

whitelist profile Sig-white-list

policy utd-policy-vrf-1

vrf 511

all-interfaces

threat-inspection profile IPS-POLICY

fail close

app-hosting appid utd

app-vnic gateway0 virtualportgroup 0 guest-interface 0

guest-ipaddress 192.168.1.2 netmask 255.255.255.252

app-vnic gateway1 virtualportgroup 1 guest-interface 1

guest-ipaddress 192.168.2.2 netmask 255.255.255.252

app-resource package-profile urlf-low

start

cedge#

다음을 확인합니다.

1. show logging을 실행하고 다음에 표시된 것과 유사한 로그를 얻었는지 확인합니다.

*Mar 3 23:17:17.573: %LINK-3-UPDOWN: Interface VirtualPortGroup0, changed state to up

*Mar 3 23:17:18.094: %LINK-3-UPDOWN: Interface VirtualPortGroup1, changed state to up

*Mar 3 23:17:18.572: %LINEPROTO-5-UPDOWN: Line protocol on Interface VirtualPortGroup0, changed state to up

*Mar 3 23:17:19.095: %LINEPROTO-5-UPDOWN: Line protocol on Interface VirtualPortGroup1, changed state to up

*Mar 3 23:17:25.630: %LINEPROTO-5-UPDOWN: Line protocol on Interface Tunnel2000000001, changed state to up

*Mar 3 23:19:36.863: %VIRT_SERVICE-5-ACTIVATION_STATE: Successfully activated virtual service utd

*Mar 3 23:19:37.577: %IM-6-START_MSG: R0/0: ioxman: app-hosting: Start succeeded: utd started successfully Current state is running

*Mar 3 23:19:38.318: %ONEP_BASE-6-CONNECT: [Element]: ONEP session Application:utd_snort Host:cedge ID:6633 User: has connected.

*Mar 3 23:19:50.428: %IOSXE_UTD-4-MT_CONFIG_DOWNLOAD: UTD MT configuration download has started

*Mar 3 23:20:06.460: %IOSXE_UTD-4-MT_CONFIG_DOWNLOAD: UTD MT configuration download has completed

*Mar 3 23:20:08.389: %IOSXE-5-PLATFORM: R0/0: cpp_cp: QFP:0.0 Thread:011 TS:00000780131568867961 %SDVT-5-SDVT_HEALTH_UP: Service node is up for channel Threat Defense. Current Health: Green, Previous Health: Down

참고: 컨피그레이션이 성공적으로 완료되면 현재 상태가 작동 중지에서 녹색으로 변경됩니다.

2. 다음 명령을 실행하여 UTD 설치를 확인합니다.

cedge#show app-hosting list

App id                                   State

---------------------------------------------------------

utd                                      RUNNING   >>> State change from Deployed to Running

cedge#show utd engine standard version

UTD Virtual-service Name: utd

IOS-XE Recommended UTD Version: 1.0.16_SV2.9.16.1_XE17.3

IOS-XE Supported UTD Regex: ^1\.0\.([0-9]+)_SV(.*)_XE17.3$

UTD Installed Version: 1.0.16_SV2.9.16.1_XE17.3

cedge#show virtual-service version name utd running

Virtual service utd running version:

Name : UTD-Snort-Feature

Version : 1.0.16_SV2.9.16.1_XE17.3 >>>> Changed from NONE to "1.0.16_SV2.9.16.1_XE17.3" after config.

cedge#

cedge#show virtual-service

Virtual Service Global State and Virtualization Limits:

Infrastructure version : 1.7

Total virtual services installed : 1

Total virtual services activated : 1 >>>>>>>>> Now it is activated

cedge#show virtual-service version name utd running Virtual service utd running version: Name : UTD-Snort-Feature Version : 1.0.16_SV2.9.16.1_XE17.3

문제 해결

이 섹션에서는 설정 문제 해결에 사용할 수 있는 정보를 제공합니다.

유용한 명령

show platform software device-mode

show app-hosting list

show virtual-service version name utd running

show utd engine standard version

show utd engine standard status

show virtual-service

관련 정보

- 보안 컨피그레이션 가이드: Unified Threat Defense, Cisco IOS XE 17

- 보안 컨피그레이션 가이드: Unified Threat Defense, Cisco IOS XE 16

- SDWAN용 UTD 지원 플랫폼 및 제한 사항.

- vManage를 사용하여 UTD를 설치합니다.