목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

배경 정보

Cisco Umbrella SIG 개요

Umbrella SIG 터널 대역폭 제한

Cisco Umbrella 포털 정보 보기

키 및 비밀 키 가져오기

조직 ID 가져오기

활성/백업 시나리오로 Umbrella SIG 터널 생성

1단계. SIG 자격 증명 기능 템플릿을 생성합니다.

2단계. SIG 기능 템플릿을 생성합니다.

3단계. 기본 터널에 대한 SIG 공급자를 선택합니다.

4단계. 보조 터널을 추가합니다.

5단계. 하나의 고가용성 쌍을 생성합니다.

6단계. 서비스 측 VPN 템플릿을 편집하여 서비스 경로를 삽입합니다.

활성/백업 시나리오에 대한 WAN 에지 라우터 컨피그레이션

활성/활성 시나리오로 Umbrella SIG 터널 생성

1단계. SIG 자격 증명 기능 템플릿을 생성합니다.

2단계. 2개의 루프백 인터페이스를 생성하여 SIG 터널을 연결합니다.

3단계. SIG 기능 템플릿을 생성합니다.

소개

이 문서에서는 구성 방법을 설명합니다 Cisco Umbrella Secure Internet Gateway (SIG) IPsec이 있는 터널  Active/Active  및 Active/Standby.

사전 요구 사항

요구 사항

Cisco에서는 다음 항목에 대한 지식을 권장합니다.

- Cisco Umbrella

- IPsec 협상

- Cisco SD-WAN(Software-defined Wide Area Network)

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Cisco vManage 버전 20.4.2

- Cisco WAN Edge Router C1117-4PW* 버전 17.4.2

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우 모든 명령의 잠재적인 영향을 미리 숙지하시기 바랍니다.

배경 정보

Cisco Umbrella SIG 개요

Cisco Umbrella 필수 기능을 통합하는 클라우드 기반 보안 서비스입니다.

Umbrella 보안 웹 게이트웨이, DNS 보안, 클라우드 제공 방화벽, 클라우드 액세스 보안 브로커 기능, 위협 인텔리전스를 통합합니다.

심층적인 검사 및 제어를 통해 사용 가능한 웹 정책을 준수하고 인터넷 위협으로부터 보호합니다.

SD-WAN 라우터는 대부분의 처리를 수행하여 엔터프라이즈 트래픽을 보호하는 SIG(Secure Internet Gateway)와 통합될 수 있습니다.

SIG가 설정되면 경로 또는 정책을 기반으로 하는 모든 클라이언트 트래픽이 SIG에 전달됩니다.

Umbrella SIG 터널 대역폭 제한

에 대한 각 IPsec IKEv2 터널 Umbrella 헤드엔드는 약 250Mbps로 제한됩니다. 따라서 여러 개의 터널이 생성되어 트래픽을 로드 밸런싱하는 경우 더 높은 대역폭이 필요한 경우 이러한 제한을 극복합니다.

최대 4개 High Availability 터널 쌍을 생성할 수 있습니다.

Cisco Umbrella 포털 정보 보기

SIG 통합을 진행하려면 Umbrella SIG 필수 패키지가 있는 계정이 필요합니다.

키 및 비밀 키 가져오기

키 및 비밀 키는 Umbrella Management API KEY (이 키는 '레거시 키' 아래에 있습니다.) 암호 키를 기억하지 않거나 저장하지 않은 경우 새로 고침 을 클릭합니다.

주의: Refresh(새로 고침) 버튼을 클릭하면 모든 디바이스에서 이 키에 대한 업데이트가 필요하지만, 사용 중인 디바이스가 있는 경우에는 업데이트를 사용하지 않는 것이 좋습니다.

조직 ID 가져오기

에 로그인하면 조직 ID를 쉽게 가져올 수 있습니다. Umbrella 브라우저 주소 표시줄에서 가져옵니다.

활성/백업 시나리오로 Umbrella SIG 터널 생성

참고: ECMP를 사용한 IPsec/GRE 터널 라우팅 및 로드 밸런싱: 이 기능은 vManage 20.4.1 이상에서 사용할 수 있으며, SIG 템플릿을 사용하여 애플리케이션 트래픽을 Cisco로 전달할 수 있습니다 Umbrella 또는 서드파티 SIG 제공자

참고: Zscaler Automatic Provisioning 지원: vManage 20.5.1 이상에서 사용할 수 있는 이 기능은 Zscaler 파트너 API 자격 증명을 사용하여 Cisco SD-WAN 라우터에서 Zscaler로 터널을 자동으로 프로비저닝합니다.

SIG 자동 터널을 구성하려면 몇 가지 템플릿을 생성/업데이트해야 합니다.

- SIG 자격 증명 기능 템플릿을 생성합니다.

- SIG 터널을 연결하기 위해 2개의 루프백 인터페이스를 생성합니다(둘 이상의 경우에만 적용 가능) Active 동시에 터널 - Active/Active 있습니다.

- SIG 기능 템플릿을 생성합니다.

- 서비스 측 VPN 템플릿을 편집하여 Service Route.

참고: 모든 업스트림 디바이스에서 UDP 4500 및 500 포트를 허용해야 합니다.

템플릿 컨피그레이션은 Active/Backup 및 Active/Active 두 시나리오를 개별적으로 설명하고 노출하는 시나리오

1단계. SIG 자격 증명 기능 템플릿을 생성합니다.

기능 템플릿으로 이동하여 Edit.

의 조항 아래에 Additional templates, 클릭 Cisco SIG Credentials. 이 옵션이 이미지에 표시됩니다.

템플릿에 이름과 설명을 지정합니다.

2단계. SIG 기능 템플릿을 생성합니다.

기능 템플릿으로 이동한 다음 섹션 아래에서 Transport & Management VPN Cisco Secure Internet Gateway 기능 템플릿을 선택합니다.

템플릿에 이름과 설명을 지정합니다.

3단계. 기본 터널에 대한 SIG 공급자를 선택합니다.

클릭 Add Tunnel.

기본 세부 정보를 구성하고 유지 Data-Center 다음으로 Primary를 클릭한 다음 Add.

4단계. 보조 터널을 추가합니다.

두 번째 터널 컨피그레이션을 추가합니다. Data-Center 다음으로 Secondary 이번에는 인터페이스 이름을 ipsec2로 지정합니다.

다음과 같이 vManage 컨피그레이션이 나타납니다.

5단계. 하나의 고가용성 쌍을 생성합니다.

내부 High Availability 섹션에서 ipsec1을 Active로 선택하고 ipsec2 터널을 Backup으로 선택합니다.

참고: 최대 4개 High Availability 터널 쌍 및 최대 4개의 활성 터널을 동시에 생성할 수 있습니다.

6단계. 서비스 측 VPN 템플릿을 편집하여 서비스 경로를 삽입합니다.

탐색: Service VPN 섹션 및, Service VPN 템플릿, 섹션으로 이동 Service Route SIG를 사용하여 0.0.0.0을 추가합니다. Service Route. 이 문서에서는 VRF/VPN 10을 사용합니다.

여기에 표시된 것처럼 0.0.0.0 SIG 경로가 표시됩니다.

참고: 서비스 트래픽이 실제로 나가려면 NAT를 WAN 인터페이스에서 구성해야 합니다.

이 템플릿을 디바이스에 연결하고 컨피그레이션을 푸시합니다.

활성/백업 시나리오에 대한 WAN 에지 라우터 컨피그레이션

system

host-name             <HOSTNAME>

system-ip             <SYSTEM-IP>

overlay-id            1

site-id               <SITE-ID>

sp-organization-name  <ORG-NAME>

organization-name     <SP-ORG-NAME>

vbond <VBOND-IP> port 12346

!

secure-internet-gateway

umbrella org-id <UMBRELLA-ORG-ID>

umbrella api-key <UMBRELLA-API-KEY-INFO>

umbrella api-secret <UMBRELLA-SECRET-INFO>

!

sdwan

service sig vrf global

ha-pairs

interface-pair Tunnel100001 active-interface-weight 1 Tunnel100002 backup-interface-weight 1

!

!

interface GigabitEthernet0/0/0

tunnel-interface

encapsulation ipsec weight 1

no border

color biz-internet

no last-resort-circuit

no low-bandwidth-link

no vbond-as-stun-server

vmanage-connection-preference 5

port-hop

carrier                       default

nat-refresh-interval          5

hello-interval                1000

hello-tolerance               12

allow-service all

no allow-service bgp

allow-service dhcp

allow-service dns

allow-service icmp

no allow-service sshd

no allow-service netconf

no allow-service ntp

no allow-service ospf

no allow-service stun

allow-service https

no allow-service snmp

no allow-service bfd

exit

exit

interface Tunnel100001

tunnel-options tunnel-set secure-internet-gateway-umbrella tunnel-dc-preference primary-dc source-interface GigabitEthernet0/0/0

exit

interface Tunnel100002

tunnel-options tunnel-set secure-internet-gateway-umbrella tunnel-dc-preference secondary-dc source-interface GigabitEthernet0/0/0

exit

appqoe

no tcpopt enable

!

security

ipsec

rekey               86400

replay-window       512

authentication-type sha1-hmac ah-sha1-hmac

!

!

service tcp-keepalives-in

service tcp-keepalives-out

no service tcp-small-servers

no service udp-small-servers

hostname <DEVICE-HOSTNAME>

username admin privilege 15 secret 9 <SECRET-PASSWORD>

vrf definition 10

rd 1:10

address-family ipv4

route-target export 1:10

route-target import 1:10

exit-address-family

!

address-family ipv6

exit-address-family

!

!

vrf definition Mgmt-intf

description Transport VPN

rd          1:512

address-family ipv4

route-target export 1:512

route-target import 1:512

exit-address-family

!

address-family ipv6

exit-address-family

!

!

ip sdwan route vrf 10 0.0.0.0/0 service sig

no ip http server

no ip http secure-server

no ip http ctc authentication

ip nat settings central-policy

vlan 10

exit

interface GigabitEthernet0/0/0

no shutdown

arp timeout 1200

ip address dhcp client-id GigabitEthernet0/0/0

no ip redirects

ip dhcp client default-router distance 1

ip mtu    1500

load-interval 30

mtu           1500

exit

interface GigabitEthernet0/1/0

switchport access vlan 10

switchport mode access

no shutdown

exit

interface GigabitEthernet0/1/1

switchport mode access

no shutdown

exit

interface Vlan10

no shutdown

arp timeout 1200

vrf forwarding 10

ip address <VLAN-IP-ADDRESS> <MASK>

ip mtu 1500

ip nbar protocol-discovery

exit

interface Tunnel0

no shutdown

ip unnumbered GigabitEthernet0/0/0

no ip redirects

ipv6 unnumbered GigabitEthernet0/0/0

no ipv6 redirects

tunnel source GigabitEthernet0/0/0

tunnel mode sdwan

exit

interface Tunnel100001

no shutdown

ip unnumbered GigabitEthernet0/0/0

ip mtu     1400

tunnel source GigabitEthernet0/0/0

tunnel destination dynamic

tunnel mode ipsec ipv4

tunnel protection ipsec profile if-ipsec1-ipsec-profile

tunnel vrf multiplexing

exit

interface Tunnel100002

no shutdown

ip unnumbered GigabitEthernet0/0/0

ip mtu     1400

tunnel source GigabitEthernet0/0/0

tunnel destination dynamic

tunnel mode ipsec ipv4

tunnel protection ipsec profile if-ipsec2-ipsec-profile

tunnel vrf multiplexing

exit

clock timezone UTC 0 0

logging persistent size 104857600 filesize 10485760

logging buffered 512000

logging console

no logging rate-limit

aaa authentication log in default local

aaa authorization exec default local

aaa session-id common

mac address-table aging-time 300

no crypto ikev2 diagnose error

crypto ikev2 policy policy1-global

proposal p1-global

!

crypto ikev2 profile if-ipsec1-ikev2-profile

no config-exchange request

dpd 10 3 on-demand

dynamic

lifetime 86400

!

crypto ikev2 profile if-ipsec2-ikev2-profile

no config-exchange request

dpd 10 3 on-demand

dynamic

lifetime 86400

!

crypto ikev2 proposal p1-global

encryption aes-cbc-128 aes-cbc-256

group 14 15 16

integrity sha1 sha256 sha384 sha512

!

crypto ipsec transform-set if-ipsec1-ikev2-transform esp-gcm 256

mode tunnel

!

crypto ipsec transform-set if-ipsec2-ikev2-transform esp-gcm 256

mode tunnel

!

crypto ipsec profile if-ipsec1-ipsec-profile

set ikev2-profile if-ipsec1-ikev2-profile

set transform-set if-ipsec1-ikev2-transform

set security-association lifetime kilobytes disable

set security-association lifetime seconds 3600

set security-association replay window-size 512

!

crypto ipsec profile if-ipsec2-ipsec-profile

set ikev2-profile if-ipsec2-ikev2-profile

set transform-set if-ipsec2-ikev2-transform

set security-association lifetime kilobytes disable

set security-association lifetime seconds 3600

set security-association replay window-size 512

!

no crypto isakmp diagnose error

no network-clock revertive

활성/활성 시나리오로 Umbrella SIG 터널 생성

1단계. SIG 자격 증명 기능 템플릿을 생성합니다.

기능 템플릿으로 이동하여 Edit

의 조항 아래에  Additional templates, 선택 Cisco SIG Credentials. 옵션이 이미지에 표시됩니다.

템플릿에 이름과 설명을 지정합니다.

2단계. 2개의 루프백 인터페이스를 생성하여 SIG 터널을 연결합니다.

참고: 액티브 모드에서 구성된 각 SIG 터널에 대해 루프백 인터페이스를 생성합니다. 각 터널에는 고유한 IKE ID가 필요하므로 이 인터페이스가 필요합니다.

참고: 이 시나리오는 활성/활성이므로 두 개의 루프백이 생성됩니다.

루프백에 대한 인터페이스 이름 및 IPv4 주소를 구성합니다.

참고: 루프백에 대해 구성된 IP 주소는 더미 주소입니다.

두 번째 루프백 템플릿을 생성하여 디바이스 템플릿에 연결합니다. 디바이스 템플릿에는 두 개의 루프백 템플릿이 연결되어 있어야 합니다.

3단계. SIG 기능 템플릿을 생성합니다.

SIG 기능 템플릿으로 이동하고 섹션 아래에서 Transport & Management VPN 선택 Cisco Secure Internet Gateway 기능 템플릿.

4단계. 기본 터널의 SIG Provider(SIG 제공자)를 선택합니다.

클릭 Add Tunnel.

기본 세부 정보를 구성하고 유지 Data-Center 다음으로 Primary.

참고: Tunnel Source Interface 매개변수는 루프백(이 문서에서는 Loopback1)이고 Tunnel Route-via Interface는 물리적 인터페이스(이 문서에서는 GigabitEthernet0/0/0)입니다

5단계. 보조 터널을 추가합니다.

두 번째 터널 컨피그레이션을 추가합니다. Data-Center 다음으로 Primary 인터페이스 이름은 ipsec2입니다.

다음과 같이 vManage 컨피그레이션이 나타납니다.

6단계. 두 개의 고가용성 쌍을 생성합니다.

내부 High Availability 섹션, 2개 생성 High Availability 쌍.

- 첫 번째 HA 쌍에서 ipsec1을 Active(활성)로 선택하고  None  백업.

- 두 번째 HA 쌍에서 ipsec2를 Active(활성) 선택  None  백업을 위한 것입니다

에 대한 vManage 컨피그레이션 High Availability 다음과 같이 나타납니다.

디바이스 템플릿에는 두 개의 루프백 템플릿과 SIG 기능 템플릿도 첨부되어 있습니다.

7단계. 서비스 측 VPN 템플릿을 편집하여 서비스 경로를 삽입합니다.

탐색: Service VPN 섹션 및 서비스 템플릿의 VPN에서 섹션으로 이동합니다 Service Route SIG를 사용하여 0.0.0.0을 추가합니다.Service Route

여기에 표시된 대로 0.0.0.0 SIG 경로가 나타납니다.

참고: 서비스 트래픽이 실제로 나가려면 NAT를 WAN 인터페이스에서 구성해야 합니다.

이 템플릿을 디바이스에 연결하고 컨피그레이션을 푸시합니다.

액티브/액티브 시나리오에 대한 WAN 에지 라우터 컨피그레이션

system

host-name <HOSTNAME>

system-ip <SYSTEM-IP>

overlay-id 1

site-id <SITE-ID>

sp-organization-name <ORG-NAME>

organization-name <SP-ORG-NAME>

vbond <VBOND-IP> port 12346

!

secure-internet-gateway

umbrella org-id <UMBRELLA-ORG-ID>

umbrella api-key <UMBRELLA-API-KEY-INFO>

umbrella api-secret <UMBRELLA-SECRET-INFO>

!

sdwan

service sig vrf global

ha-pairs

interface-pair Tunnel100001 active-interface-weight 1 None backup-interface-weight 1

interface-pair Tunnel100002 active-interface-weight 1 None backup-interface-weight 1

!

interface GigabitEthernet0/0/0

tunnel-interface

encapsulation ipsec weight 1

no border

color biz-internet

no last-resort-circuit

no low-bandwidth-link

no vbond-as-stun-server

vmanage-connection-preference 5

port-hop

carrier default

nat-refresh-interval 5

hello-interval 1000

hello-tolerance 12

allow-service all

no allow-service bgp

allow-service dhcp

allow-service dns

allow-service icmp

no allow-service sshd

no allow-service netconf

no allow-service ntp

no allow-service ospf

no allow-service stun

allow-service https

no allow-service snmp

no allow-service bfd

exit

exit

interface Tunnel100001

tunnel-options tunnel-set secure-internet-gateway-umbrella tunnel-dc-preference primary-dc source-interface Loopback1

exit

interface Tunnel100002

tunnel-options tunnel-set secure-internet-gateway-umbrella tunnel-dc-preference primary-dc source-interface Loopback2

exit

appqoe

no tcpopt enable

!

security

ipsec

rekey 86400

replay-window 512

authentication-type sha1-hmac ah-sha1-hmac

!

!

service tcp-keepalives-in

service tcp-keepalives-out

no service tcp-small-servers

no service udp-small-servers

hostname <DEVICE HOSTNAME>

username admin privilege 15 secret 9 <secret-password>

vrf definition 10

rd 1:10

address-family ipv4

route-target export 1:10

route-target import 1:10

exit-address-family

!

address-family ipv6

exit-address-family

!

!

vrf definition Mgmt-intf

description Transport VPN

rd 1:512

address-family ipv4

route-target export 1:512

route-target import 1:512

exit-address-family

!

address-family ipv6

exit-address-family

!

no ip source-route

ip sdwan route vrf 10 0.0.0.0/0 service sig

ip nat inside source list nat-dia-vpn-hop-access-list interface GigabitEthernet0/0/0 overload

ip nat translation tcp-timeout 3600

ip nat translation udp-timeout 60

ip nat settings central-policy

vlan 10

exit

interface GigabitEthernet0/0/0

no shutdown

arp timeout 1200

ip address dhcp client-id GigabitEthernet0/0/0

no ip redirects

ip dhcp client default-router distance 1

ip mtu 1500

ip nat outside

load-interval 30

mtu 1500

exit

interface GigabitEthernet0/1/0

switchport access vlan 10

switchport mode access

no shutdown

exit

interface Loopback1

no shutdown

arp timeout 1200

ip address 10.20.20.1 255.255.255.255

ip mtu 1500

exit

interface Loopback2

no shutdown

arp timeout 1200

ip address 10.10.10.1 255.255.255.255

ip mtu 1500

exit

interface Vlan10

no shutdown

arp timeout 1200

vrf forwarding 10

ip address 10.1.1.1 255.255.255.252

ip mtu 1500

ip nbar protocol-discovery

exit

interface Tunnel0

no shutdown

ip unnumbered GigabitEthernet0/0/0

no ip redirects

ipv6 unnumbered GigabitEthernet0/0/0

no ipv6 redirects

tunnel source GigabitEthernet0/0/0

tunnel mode sdwan

exit

interface Tunnel100001

no shutdown

ip unnumbered Loopback1

ip mtu 1400

tunnel source Loopback1

tunnel destination dynamic

tunnel mode ipsec ipv4

tunnel protection ipsec profile if-ipsec1-ipsec-profile

tunnel vrf multiplexing

tunnel route-via GigabitEthernet0/0/0 mandatory

exit

interface Tunnel100002

no shutdown

ip unnumbered Loopback2

ip mtu 1400

tunnel source Loopback2

tunnel destination dynamic

tunnel mode ipsec ipv4

tunnel protection ipsec profile if-ipsec2-ipsec-profile

tunnel vrf multiplexing

tunnel route-via GigabitEthernet0/0/0 mandatory

exit

clock timezone UTC 0 0

logging persistent size 104857600 filesize 10485760

logging buffered 512000

logging console

no logging rate-limit

aaa authentication log in default local

aaa authorization exec default local

aaa session-id common

mac address-table aging-time 300

no crypto ikev2 diagnose error

crypto ikev2 policy policy1-global

proposal p1-global

!

crypto ikev2 profile if-ipsec1-ikev2-profile

no config-exchange request

dpd 10 3 on-demand

dynamic

lifetime 86400

!

crypto ikev2 profile if-ipsec2-ikev2-profile

no config-exchange request

dpd 10 3 on-demand

dynamic

lifetime 86400

!

crypto ikev2 proposal p1-global

encryption aes-cbc-128 aes-cbc-256

group 14 15 16

integrity sha1 sha256 sha384 sha512

!

crypto ipsec transform-set if-ipsec1-ikev2-transform esp-gcm 256

mode tunnel

!

crypto ipsec transform-set if-ipsec2-ikev2-transform esp-gcm 256

mode tunnel

!

crypto ipsec profile if-ipsec1-ipsec-profile

set ikev2-profile if-ipsec1-ikev2-profile

set transform-set if-ipsec1-ikev2-transform

set security-association lifetime kilobytes disable

set security-association lifetime seconds 3600

set security-association replay window-size 512

!

crypto ipsec profile if-ipsec2-ipsec-profile

set ikev2-profile if-ipsec2-ikev2-profile

set transform-set if-ipsec2-ikev2-transform

set security-association lifetime kilobytes disable

set security-association lifetime seconds 3600

set security-association replay window-size 512

!

참고: 이 문서는 Umbrella에 중점을 두지만 Azure 및 서드파티 SIG 터널에도 동일한 시나리오가 적용됩니다.

다음을 확인합니다.

활성/백업 시나리오 확인

vManage에서 SIG IPSec 터널의 상태를 모니터링할 수 있습니다. 탐색 Monitor > Network, 원하는 WAN 에지 디바이스를 선택합니다.

다음을 클릭합니다. Interfaces 왼쪽에 탭, 디바이스의 모든 인터페이스 목록이 표시됩니다. 여기에는 ipsec1 및 ipsec2 인터페이스가 포함됩니다.

이 그림에서는 ipsec1 터널이 모든 트래픽을 전달하며 ipsec2가 트래픽을 전달하지 않음을 보여 줍니다.

Cisco에서 터널을 확인할 수도 있습니다 Umbrella 이미지에 포털이 표시됩니다.

이 show sdwan secure-internet-gateway tunnels 명령을 실행하여 터널 정보를 표시합니다.

C1117-4PWE-FGL21499499#show sdwan secure-internet-gateway tunnels

API   LAST

TUNNEL IF                                                                         HTTP  SUCCESSFUL     TUNNEL

NAME          TUNNEL ID  TUNNEL NAME                         FSM STATE            CODE  REQ            STATE

---------------------------------------------------------------------------------------------------------------

Tunnel100001  540798313  SITE10SYS10x10x10x10IFTunnel100001  st-tun-create-notif  200   create-tunnel  -

Tunnel100002  540798314  SITE10SYS10x10x10x10IFTunnel100002  st-tun-create-notif  200   create-tunnel  -

이 show endpoint-tracker 및 show ip sla summary 명령을 실행하여 자동 생성된 추적기 및 SLA에 대한 정보를 표시합니다.

cEdge_Site1_East_01#show endpoint-tracker

Interface              Record Name            Status          RTT in msecs    Probe ID        Next Hop

Tunnel100001           #SIGL7#AUTO#TRACKER    Up              8               14              None

Tunnel100002           #SIGL7#AUTO#TRACKER    Up              2               12              None

cEdge_Site1_East_01#show ip sla summary

IPSLAs Latest Operation Summary

Codes: * active, ^ inactive, ~ pending

All Stats are in milliseconds. Stats with u are in microseconds

ID           Type        Destination       Stats       Return      Last

Code        Run

-----------------------------------------------------------------------

*12          http        10.10.10.10       RTT=6       OK          8 seconds ago

*14          http        10.10.10.10       RTT=17      OK          3 seconds ago

활성/활성 시나리오 확인

vManage에서는 SIG IPSec 터널의 상태를 모니터링할 수 있습니다. 탐색 Monitor > Network, 원하는 WAN 에지 디바이스를 선택합니다.

다음을 클릭합니다. Interfaces 왼쪽에 탭 - 디바이스의 모든 인터페이스 목록이 표시됩니다. 여기에는 ipsec1 및 ipsec2 인터페이스가 포함됩니다.

이 그림에서는 ipsec1 및 ipsec2 터널 모두 트래픽을 전달하는 것을 보여 줍니다.

이 show sdwan secure-internet-gateway tunnels 명령을 실행하여 터널 정보를 표시합니다.

C1117-4PWE-FGL21499499#show sdwan secure-internet-gateway tunnels

API   LAST

TUNNEL IF                                                                         HTTP  SUCCESSFUL     TUNNEL

NAME          TUNNEL ID  TUNNEL NAME                         FSM STATE            CODE  REQ            STATE

---------------------------------------------------------------------------------------------------------------

Tunnel100001  540798313  SITE10SYS10x10x10x10IFTunnel100001  st-tun-create-notif  200   create-tunnel  -

Tunnel100002  540798314  SITE10SYS10x10x10x10IFTunnel100002  st-tun-create-notif  200   create-tunnel  -

이 show endpoint-tracker 및 show ip sla summary 명령을 실행하여 자동 생성된 추적기 및 SLA에 대한 정보를 표시합니다.

cEdge_Site1_East_01#show endpoint-tracker

Interface              Record Name            Status          RTT in msecs    Probe ID        Next Hop

Tunnel100001           #SIGL7#AUTO#TRACKER    Up              8               14              None

Tunnel100002           #SIGL7#AUTO#TRACKER    Up              2               12              None

cEdge_Site1_East_01#show ip sla summary

IPSLAs Latest Operation Summary

Codes: * active, ^ inactive, ~ pending

All Stats are in milliseconds. Stats with u are in microseconds

ID           Type        Destination       Stats       Return      Last

Code        Run

-----------------------------------------------------------------------

*12          http        10.10.10.10       RTT=6       OK          8 seconds ago

*14          http        10.10.10.10       RTT=17      OK          3 seconds ago

관련 정보

- 보안 인터넷 게이트웨이와 장치 통합 - Cisco IOS® XE Release 17.x

- http://Network 터널 컨피그레이션 - Umbrella SIG

- Umbrella 시작하기

- 기술 지원 및 문서 − Cisco Systems