목차

소개

DM 로그란?

기본 5G 통화 흐름

셀룰러 게이트웨이에 대한 DM 로그 수집

PIM 모듈에 대한 DM 로그 수집

EEM 스크립트를 사용하여 PIM 모듈에서 DM 로깅 비활성화

결론

소개

이 문서에서는 셀룰러 게이트웨이 및 PIM(Pluggable Interfaces Module)에 대한 DM(DM 진단 모니터) 로그 수집 프로세스에 대해 설명합니다.

DM 로그란?

DM - 진단 모니터 - 로그는 RF 인터페이스를 통해 모뎀과 네트워크 간의 데이터 트랜잭션을 캡처하는 데 사용되며, 이는 4G 및 5G 데이터 연결이나 성능 문제를 해결하는 데 도움이 됩니다.

기본 5G 통화 흐름

DM 로그 수집 및 분석을 시작하기 전에 기본 통화 흐름을 이해하는 것이 중요합니다.

기본 5G 통화 흐름

1. 장치 초기화 및 셀 검색

- 5G 디바이스가 켜지고 사용 가능한 5G 셀을 검색하기 시작합니다.

- 이는 주변 기지국들(gNBs)에 의해 브로드캐스팅되는 동기 신호들을 스캔한다.

2. 최초 접속

- 일단 적합한 셀이 발견되면, 디바이스는 gNB 타이밍 및 주파수와 동기화를 시도한다.

- gNB에 연결을 요청하는 메시지(RRC Connection Request)를 전송한다.

3. RRC 연결 설정

- 상기 gNB는 상기 요청을 수신하고, 상기 장치와 RRC(Radio Resource Control) 연결을 설정한다.

- 이러한 연결은 디바이스와 네트워크 간에 안전하고 신뢰할 수 있는 통신을 가능하게 합니다.

4. 등기

- 디바이스가 (SIM 카드 정보를 사용하여) 네트워크에 자신을 인증합니다.

- 네트워크에 프레즌스를 등록하고 서비스에 대한 액세스를 요청합니다.

5. 자료전송

- 등록된 디바이스는 이제 5G 네트워크를 통해 데이터를 주고받을 수 있습니다.

- 여기에는 음성 통화, 데이터 트래픽(브라우징, 스트리밍) 또는 기타 애플리케이션이 포함될 수 있습니다.

6. 접속해제

- 사용자가 통화를 종료하거나 네트워크에서 연결이 끊기면 디바이스는 gNB와의 연결을 해제한다.

요점:

- RRC 연결: 이는 디바이스와 네트워크 간에 안전하고 신뢰할 수 있는 통신을 가능하게 하는 중요한 단계입니다.

- 데이터 플레인: RRC 연결이 설정되면, 장치는 데이터 평면을 사용하여 데이터를 송수신할 수 있다.

- 컨트롤 플레인: 제어 평면은 연결을 설정하고 리소스를 관리하는 등의 신호 및 제어 기능에 사용됩니다.

셀룰러 게이트웨이에 대한 DM 로그 수집

우선, DM 로그를 활성화하기 전에 모뎀을 종료하십시오. AT 명령 AT+CFUN=0을 사용하여 이 작업을 수행할 수 있습니다

CellularGateway# cellular 1 modem-at-commands

Value for '' (<string>): AT+CFUN=0

이 명령은 몇 초 후에 SSH 세션을 고정하고 셀룰러 게이트웨이에 다른 SSH 세션을 엽니다.

AT 명령 AT+CFUN으로 적용되었는지 확인합니다.

CellularGateway# cellular 1 modem-at-commands

Value for '' (<string>): AT+CFUN?

cellular_modem_at_cmd: modem-at-response AT+CFUN?

+CFUN: 0

OK

DM 로그 크기, 순환 및 자동 중지를 설정합니다.

CellularGateway# config terminal

Entering configuration mode terminal

CellularGateway(config)# controller cellular 1

CellularGateway(config-cellular-1)# dm-log rotation

CellularGateway(config-cellular-1)# dm-log max_dm_log_size 60

CellularGateway(config-cellular-1)# dm-log autostop-event MODEM_STATE_DNS_ACQUIRED

CellularGateway(config-cellular-1)# dm-log autostop-timer 2

이러한 설정은 로그 수집 흐름에 따라 조정할 수 있으며, 선택적으로 문제가 셀룰러 성능과 관련된 경우 필터를 적용할 수 있습니다.

DM 로그 활성화

CellularGateway(config-cellular-1)# dm-log enable

CellularGateway(config-cellular-1)# commit

AT+CFUN=1 AT 명령을 사용하여 모뎀을 활성화합니다.

CellularGateway# cellular 1 modem-at-commands

Value for '' (<string>): AT+CFUN=1

cellular_modem_at_cmd: modem-at-response AT+CFUN=1

OK

CellularGateway#

CellularGateway# cellular 1 modem-at-commands

Value for '' (<string>): AT+CFUN?

cellular_modem_at_cmd: modem-at-response AT+CFUN?

+CFUN: 1

OK

생성된 파일을 확인합니다.

CellularGateway# gw-action:request file list

-rw-r--r-- 97272745 Dec 11 09:05 dmlog-slot0-20241211-090453.tar.gz

-rw-r--r-- 10550241 Dec 25 10:58 dmlog-slot0-20241225-105827.tar.gz

drwx------ 16384 Sep 27 18:29 lost+found

drwxr-xr-x 4096 Dec 25 11:03 storage

drwxr-xr-x 4096 Sep 27 18:29 tmp

이러한 파일은 다음 홉에서 복사본을 시작하여 전송할 수 있습니다.

5GSwitch#copy tftp://192.168.1.1/dmlog-slot0-20241211-090453.tar.gz flash:

Destination filename [dmlog-slot0-20241211-090453.tar.gz]?

Accessing tftp://192.168.1.1/dmlog-slot0-20241211-090453.tar.gz...

Loading dmlog-slot0-20241211-090453.tar.gz from 192.168.1.1 (via GigabitEthernet1/0/3): !!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

디버깅이 완료되면 DM 로그를 비활성화합니다.

CellularGateway# config terminal

Entering configuration mode terminal

CellularGateway(config-cellular-1)# no dm-log enable

CellularGateway(config-cellular-1)# commit

PIM 모듈에 대한 DM 로그 수집

먼저 셀룰러 인터페이스와 라디오를 종료합니다.

ISR2#configure terminal

ISR2(config)#interface cellular 0/2/0

ISR2(config-if)#shutdown

ISR2(config-if)#exit

ISR2(config)#controller cellular 0/2/0

ISR2(config-controller)#lte radio off

순환, 파일 크기, 자동 중지 및 필터가 필요한 경우 등의 DM 로깅 매개변수를 설정합니다.

ISR2(config)#controller cellular 0/2/0

ISR2(config-controller)#lte modem dm-log rotation

ISR2(config-controller)#lte modem dm-log filesize 20

ISR2(config-controller)#lte modem dm-log autostop timer 20

DM 로그 활성화

ISR2(config-controller)#lte modem dm-log enable

무선 및 셀룰러 인터페이스를 활성화합니다.

ISR2(config)#controller cellular 0/2/0

ISR2(config-controller)#no lte radio off

ISR2(config)#interface cellular 0/2/0

ISR2(config-if)#no shutdown

DM 로그 통계 및 파일을 확인합니다.

ISR2#show cellular 0/2/0 logs dm-log

Integrated DM logging is on

Output path = bootflash:

Filter Type = MC73xx generic

Filter Name = Telit Default log mask.bin

Maximum log size = 64 MB

Maximum file size = 20 MB

Log rotation = Enabled

ISR2#dir bootflash: | inc dm

24 -rw- 4236574 Jan 3 2025 11:39:33 +00:00 dmlog-slot2-20250103-113930.tar.gz

디버깅이 완료되면 DM 로그를 비활성화합니다.

ISR2(config)#controller cellular 0/2/0

ISR2(config-controller)#no lte modem dm-log enable

EEM 스크립트를 사용하여 PIM 모듈에서 DM 로깅 비활성화

EEM 스크립트를 사용하여 특정 로그 메시지 또는 이벤트를 기반으로 DM 로깅을 비활성화할 수 있습니다. 가장 일반적인 사용 사례는 셀룰러 인터페이스 또는 터널 인터페이스 플랩입니다.

event manager applet Cellular-Capture authorization bypass

event syslog pattern "Syslog Messege Needed to stop logging" maxrun 600

action 100 cli command "enable"

action 101 cli command "terminal length 0"

action 102 cli command "term exec prompt timestamp"

action 103 cli command "show cellular 0/2/0 all | append flash:Out_info"

action 104 cli command "show controller cellular 0/2/0 | append flash:Out_info"

action 105 cli command "show dialer | append flash:Out_info"

action 106 cli command "show int cellular 0/2/0 | append flash:Out_info"

action 112 syslog msg "Information loaded"

action"113"wait"180

action 114 cli command "show log | append flash:Out_info"

action 115 cli command "enable"

action 116 cli command "conf t"

action 117 cli command "controller cellular 0 1"

action 118 cli command "no lte modem dm-log enable"

action 119 syslog msg "DM-logs disabled"

action 120 cli command "en

결론

수집된 파일에 대한 디코딩이 필요하므로 DM 로그 분석에는 TAC 지원이 필요합니다. DM 로깅이 필요한 문제가 발생할 경우 TAC 케이스를 여십시오.