목차

소개

시작하기 전에

표기 규칙

사전 요구 사항

사용되는 구성 요소

구성

네트워크 다이어그램

구성

다음을 확인합니다.

문제 해결

관련 정보

소개

이 샘플 컨피그레이션은 NRP(Node Route Processor) 어댑터가 있는 Cisco 6400 UAC(Universal Access Concentrator)를 보여줍니다.point-to-point 및 multipoint NRP 컨피그레이션의 예가 제공됩니다.PPPoA(Point-to-Point Protocol over Asynchronous transfer mode)(aal5mux ppp)로 구성된 Cisco 827 DSL(digital subscriber line) 라우터 2개가 Cisco 6400에서 종료됩니다.

Cisco 6130 DSLAM(Digital Subscriber Line Access Multiplexer) NI2 및 Cisco 6400 NSP(Node Switch Processor)에 대한 구성도 제공됩니다.

시작하기 전에

표기 규칙

문서 표기 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

사전 요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 아래 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Cisco 827-4V CPE(Customer Premises Equipment) IOS® Software 릴리스 12.1(1)XB

- Cisco 6400 UAC-NRP IOS 소프트웨어 릴리스 12.0(7)DC

- Cisco 6400 UAC-NSP IOS 소프트웨어 릴리스 12.0(4)DB

- Cisco 6130 DSLAM-NI2 IOS Software 릴리스 12.1(1)DA

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다.라이브 네트워크에서 작업하는 경우, 사용하기 전에 모든 명령의 잠재적인 영향을 이해해야 합니다.

구성

이 섹션에서는 이 문서에 설명된 기능을 구성하는 정보를 제공합니다.

참고: 이 문서에 사용된 명령에 대한 추가 정보를 찾으려면 명령 조회 도구(등록된 고객만 해당)를 사용합니다.

네트워크 다이어그램

이 문서에서는 아래 다이어그램에 표시된 네트워크 설정을 사용합니다.

구성

이 문서에서는 아래 표시된 구성을 사용합니다.

- Cisco 827 라우터(R1)

- Cisco 827 라우터(R2)

- Cisco 6130-NI2 DSLAM

- Cisco 6400 NSP

- Point-to-point 인터페이스를 사용하는 Cisco 6400-NRP

- 멀티포인트 인터페이스를 사용하는 Cisco 6400 NRP

Cisco 827 라우터(R1)

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R1

!

ip subnet-zero

!

interface Ethernet0

no ip address

no ip directed-broadcast

!

interface ATM0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

pvc 3/100

encapsulation aal5mux ppp dialer

dialer pool-member 1

!

bundle-enable

hold-queue 224 in

!

interface Dialer0

ip address 172.18.0.1 255.255.0.0

no ip directed-broadcast

encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication chap callin

ppp chap hostname <hostname1>

ppp chap password <password1>

!

ip classless

ip route 0.0.0.0 0.0.0.0 Dialer0

no ip http server

!

dialer-list 1 protocol ip permit

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

Cisco 827 라우터(R2)

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R2

!

ip subnet-zero

!

interface Ethernet0

no ip address

no ip directed-broadcast

!

interface ATM0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

PVC 4/100

encapsulation aal5mux ppp dialer

dialer pool-member 1

!

bundle-enable

hold-queue 224 in

!

interface Dialer0

ip address 172.18.0.2 255.255.0.0

no ip directed-broadcast

encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication chap callin

ppp chap hostname <hostname2>

ppp chap password <password2>

!

ip classless

ip route 0.0.0.0 0.0.0.0 Dialer0

!

dialer-list 1 protocol ip permit

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

Cisco 6130-NI2 DSLAM

ni2#

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname ni2

!

slot 1 ATUC-1-4DMT

slot 2 ATUC-4FLEXIDMT

slot 13 ATUC-4FLEXIDMT

!

dsl-profile default

dmt training-mode quick

ip subnet-zero

!

ATM address 47.0091.8100.0000.0075.2b3f.4d01.0075.2b3f.4d01.00

ATM router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute ATM-static

!

interface ATM0/0

no ip address

ATM cac service-category abr deny

ATM maxvp-number 0

ATM maxvc-number 4096

ATM maxvci-bits 12

!

interface Ethernet0/0

no ip route-cache

!

interface ATM0/1

no ip address

ATM ilmi-keepalive

!

interface ATM0/2

no ip address

no ATM ilmi-keepalive

!

interface ATM1/1

no ip address

no ATM ilmi-keepalive

!

interface ATM1/2

no ip address

no ATM ilmi-keepalive

!

interface ATM1/3

no ip address

no ATM ilmi-keepalive

ATM PVC 3 100  interface  ATM0/1 3 100

!

interface ATM1/4

no ip address

no ATM ilmi-keepalive

ATM PVC 4 100  interface  ATM0/1 4 100

!

ip classless

!

end

Cisco 6400 NSP

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NSP

!

ip subnet-zero

!

atm address 47.0091.8100.0000.0030.8027.7501.0030.8027.7501.00

atm router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute atm-static

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

atm maxvp-number 0

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface ATM1/0/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM2/0/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM8/0/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM8/0/1

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

atm pvc 3 100  interface  ATM1/0/0 3 100

atm pvc 4 100  interface  ATM1/0/0 4 100

!

ip classless

!

end

Point-to-point 인터페이스를 사용하는 Cisco 6400-NRP

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

username <username1> password <password1>

username <username2> password <password2>

!

redundancy

main-cpu

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface Loopback0

ip address 172.18.0.3 255.255.0.0

no ip directed-broadcast

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip route-cache

no atm ilmi-keepalive

!

interface ATM0/0/0.3 point-to-point

no ip directed-broadcast

pvc 3/100

encapsulation aal5mux ppp Virtual-Template1

!

!

interface ATM0/0/0.4 point-to-point

no ip directed-broadcast

pvc 4/100

encapsulation aal5mux ppp Virtual-Template1

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

interface Virtual-Template1

ip unnumbered Loopback0

no ip directed-broadcast

no peer default ip address

ppp authentication chap

!

ip classless

end

멀티포인트 인터페이스를 사용하는 Cisco 6400 NRP

NRP#

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

username <username1> password <password1>

username <username2> password <password2>

!

redundancy

main-cpu

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface Loopback0

ip address 172.18.0.3 255.255.0.0

no ip directed-broadcast

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip route-cache

no atm ilmi-keepalive

!

interface ATM0/0/0.9 multipoint

no ip directed-broadcast

pvc 3/100

encapsulation aal5mux ppp Virtual-Template1

!

pvc 4/100

encapsulation aal5mux ppp Virtual-Template1

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

interface Virtual-Template1

ip unnumbered Loopback0

no ip directed-broadcast

no peer default ip address

ppp authentication chap

!

ip classless

!

end

다음을 확인합니다.

현재 이 구성에 대해 사용 가능한 확인 절차가 없습니다.

문제 해결

현재 이 컨피그레이션에 사용할 수 있는 특정 문제 해결 정보가 없습니다.

관련 정보

- Cisco 827 라우터 구성

- Cisco 6400 소프트웨어 설치 가이드

- Cisco DSL 기술 지원 정보

- 제품 지원 - Cisco Systems

- Technical Support - Cisco Systems