목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

구성

네트워크 다이어그램

구성

다음을 확인합니다.

문제 해결

문제 해결 명령

관련 정보

소개

X.25 XOT(Over TCP)를 사용하면 LAB(Link Access Procedure, Balanced) 링크 대신 TCP/IP 네트워크를 통해 X.25 패킷을 전송할 수 있습니다. XOT를 사용하면 IP 네트워크를 통해 X.25 트래픽을 터널링할 수도 있습니다.

Cisco IOS® 소프트웨어는 X.25 링크와 TCP 연결 간에 X.25 패킷을 전환합니다. 각 가상 회로 대상 주소는 별도의 IP 주소에 매핑할 수 있습니다. XOT keepalive를 사용하여 언더레이어 TCP를 탐지할 수 있습니다. TCP는 승인 시퀀스 번호를 확인하여 연결을 탐지할 수 있습니다. 승인 패킷을 수신하지 않으면, 해당 패킷은 Unack 패킷을 보관하며, TCP 연결을 중단하여 해제할 때까지 재전송을 계속 시도합니다. 그러나 이 과정은 시간이 너무 많이 걸린다.

이 문서에서는 TCP 연결이 끊어진 경우 XOT keepalives 기능을 사용하여 이를 탐지하고 신속하게 조치를 취하는 방법에 대해 설명합니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Cisco IOS Software 릴리스 9.21 이상(모든 기능 집합 포함)

- Cisco IOS Software Release 9.21 이상을 사용하는 모든 Cisco 라우터는 이 기능을 지원합니다.

- Cisco IOS Software 릴리스 12.2(13)T13 및 12.2(27)

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참고하십시오.

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 명령 조회 도구(등록된 고객만 해당)를 사용하여 이 문서에 사용된 명령에 대한 자세한 내용을 확인하십시오.

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

구성

이 문서에서는 다음 구성을 사용합니다.

- R1(Cisco 2500 라우터)

- R2(Cisco 2500 라우터)

- R3(Cisco 2600 라우터)

- R4(Cisco 2600 라우터)

R1(Cisco 2500 라우터)

Current configuration:

!

version 12.2

service timestamps debug datetime msec

service timestamps log uptime

!

hostname R1

!

x25 routing

!--- The X.25 local switching.

!

interface Serial0

no ip address

no ip directed-broadcast

encapsulation x25

no ip mroute-cache

x25 address 45678

x25 win 5

!--- For testing purposes, the X.25 flow control !--- is set to something other than !--- the default value. In this configuration, !--- win 5 and wout 5, and ips and ops 256 are used.

x25 wout 5

x25 ips 256

x25 ops 256

x25 idle 1

!

line con 0

transport input none

line aux 0

line vty 0 4

password cisco

login

!

end

R2(Cisco 2500 라우터)

Current configuration

!

version 12.2

service pad to-xot

!--- Enable this command in order to make a packet assembler/disassembler (PAD) !--- over XOT through the router locally. It is useful for troubleshooting XOT problems.

service timestamps debug datetime msec

service timestamps log uptime

!

hostname R2

!

x25 routing

!--- Enables X.25 switching.

!

!

!

interface Loopback0

ip address 10.1.2.2 255.255.255.0

!

interface Ethernet0

ip address 10.64.9.101 255.255.255.0

no ip route-cache

no ip mroute-cache

!

interface Serial0

no ip address

encapsulation x25 dce

no ip mroute-cache

x25 win 5

x25 wout 5

x25 ips 256

x25 ops 256

!--- Set these flow control parameters since the interface you have connected to !--- also has these parameters set. If not matched, you can reset the link !--- while there are larger packets that go over.

x25 idle 1

clockrate 64000

!

router rip

network 10.0.0.0

!

x25 route ^12 xot 10.64.9.100 xot-keepalive-period

10 xot-keepalive-tries 3 xot-source Loopback0

x25 route ^4 interface Serial0 xot-keepalive-period

10 xot-keepalive-tries 3

!--- By default, xot-keepalives is always enabled, uses the default keepalive !--- period of 60 seconds, and retries four times. Use the !--- loopback as the XOT source to enhance the TCP connection reliability. !--- If you have two interfaces configured for X.25 and one of the !--- interfaces goes down, one interface remains up so that the TCP !--- connection is not interrupted. In order to achieve this redundancy !--- connection, the XOT uses the loopback interface since the !--- source and the TCP connection do not fail. !--- If you want to have redundant interfaces in your router, the !--- X.25 route command is configured as - X.25 route ^12 xot 10.64.9.100 10.64.9.200 !--- where 10.64.9.100 and 10.64.9.200 are the remote destination IP addresses.

!

line con 0

line aux 0

line vty 0 4

login

!

end

R3(Cisco 2600 라우터)

Current configuration : 1427 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log uptime

!

hostname R3

!

!

x25 routing

!

!

interface Loopback0

ip address 10.1.3.1 255.255.255.0

!

interface Serial1

bandwidth 384

no ip address

encapsulation x25

no ip route-cache

no ip mroute-cache

x25 win 7

x25 wout 7

x25 ips 1024

x25 ops 1024

x25 idle 1

service-module t1 clock source internal

service-module t1 timeslots 1-6

!

interface Ethernet1/0

ip address 10.64.9.100 255.255.255.0

no ip route-cache

no ip mroute-cache

half-duplex

!

router rip

network 10.0.0.0

!

!

x25 route ^12 interface Serial1 xot-keepalive-period

10 xot-keepalive-tries 3

x25 route ^4 xot 10.64.9.101 xot-keepalive-period

10 xot-keepalive-tries 3 xot-source Loopback0

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

end

R4(Cisco 2600 라우터)

Current configuration

!

!

!

version 12.2

service timestamps debug datetime msec

service timestamps log uptime

no service password-encryption

!

hostname R4

!

!

interface Ethernet0/0

ip address 10.64.9.88 255.255.255.0

half-duplex

!

interface Serial1

bandwidth 384

no ip address

encapsulation x25 dce

x25 address 123456

x25 win 7

x25 wout 7

x25 ips 1024

x25 ops 1024

!--- These parameters are set for testing purposes.

x25 idle 1

service-module t1 timeslots 1-6

!

line con 0

line aux 0

line vty 0 4

password cisco

login

!

end

다음을 확인합니다.

이 섹션을 사용하여 컨피그레이션이 제대로 작동하는지 확인합니다.

Output Interpreter 도구(등록된 고객만 해당)(OIT)는 특정 show 명령을 지원합니다. OIT를 사용하여 show 명령 출력의 분석을 봅니다.

- show x25 pad - 패킷 전송, X.3 매개 변수 설정, 가상 회로의 현재 상태 등 현재 열린 연결에 대한 정보를 표시합니다.

- show x25 xot - 지정된 기준과 일치하는 모든 XOT 가상 회로에 대한 정보를 표시합니다.

- show tcp - TCP 연결의 상태를 표시합니다.

- pad - 이 명령을 사용하여 PAD에 로그온합니다.

이 출력은 PAD 호출이 R1에서 R4로 배치될 때 표시되는 디버그 출력을 보여 줍니다.

R1#pad 123456

User Access Verification

Password:

1w1d: Serial0: X.25 O R1 Call (15) 8 lci 1024

1w1d: From (5): 45678 To (6): 123456

1w1d: Facilities: (0)

1w1d: Call User Data (4): 0x01000000 (pad)

1w1d: Serial0: X.25 I R1 Call Confirm (5) 8 lci 1024

1w1d: From (0): To (0):

1w1d: Facilities: (0)

R4>

이 호출은 R2를 통과합니다. 이 출력은 debug x25 이벤트 및 debug ip tcp 드라이버 명령을 사용하여 캡처되었습니다.

R2#

*Mar 9 07:02:39.982: Serial0: X.25 I R1 Call (15) 8 lci 1024

*Mar 9 07:02:39.986: From (5): 45678 To (6): 123456

*Mar 9 07:02:39.990: Facilities: (0)

*Mar 9 07:02:39.990: Call User Data (4): 0x01000000 (pad)

*Mar 9 07:02:40.006: TCPDRV404EF4: Active async open 10.1.2.2:0

--> 10.64.9.100 :1998 OK, lport 11020

*Mar 9 07:02:40.034: TCPDRV404EF4: disable tcp timeouts

*Mar 9 07:02:40.034: TCPDRV404EF4: enable tcp timeouts

*Mar 9 07:02:40.038: TCPDRV404EF4: keepalive interval set to 10000 ms

!--- The keepalives parameters.

*Mar 9 07:02:40.038: TCPDRV404EF4: keepalive attempts set to 3

*Mar 9 07:02:40.042: TCPDRV404EF4: keepalives turned on

*Mar 9 07:02:40.046: [10.64.9.100,1998/10.1.2.2,11020]: XOT O P2 Call (21) 8 lc i 1

*Mar 9 07:02:40.050: From (5): 45678 To (6): 123456

*Mar 9 07:02:40.054: Facilities: (6)

*Mar 9 07:02:40.054: Packet sizes: 256 256

*Mar 9 07:02:40.058: Window sizes: 5 5

*Mar 9 07:02:40.058: Call User Data (4): 0x01000000 (pad)

*Mar 9 07:02:40.182: [10.64.9.100,1998/10.1.2.2,11020]: XOT I P2 Call Confirm (11) 8 lci 1

*Mar 9 07:02:40.182: From (0): To (0):

*Mar 9 07:02:40.186: Facilities: (6)

*Mar 9 07:02:40.186: Packet sizes: 256 256

*Mar 9 07:02:40.190: Window sizes: 5 5

*Mar 9 07:02:40.194: Serial0: X.25 O R1 Call Confirm (5) 8 lci 1024

*Mar 9 07:02:40.194: From (0): To (0):

*Mar 9 07:02:40.198: Facilities: (0)

R3는 R2에서 XOT를 통해 통화를 수신한 다음 R4로 전달합니다. 이 출력은 debug x25 이벤트 및 debug ip tcp 드라이버 명령을 사용하여 캡처되었습니다.

R3#

*Mar 9 07:00:41.338: TCPDRV27693C: Passive open 10.64.9.100:1998 <-- 10.1.2.2:1 1020

*Mar 9 07:00:41.342: TCPDRV27693C: disable tcp timeouts

*Mar 9 07:00:41.342: TCPDRV27693C: enable tcp timeouts

*Mar 9 07:00:41.370: [10.1.2.2,11020/10.64.9.100,1998]: XOT I P/Inactive Call (21) 8 lci 1

*Mar 9 07:00:41.370: From (5): 45678 To (6): 123456

*Mar 9 07:00:41.374: Facilities: (6)

*Mar 9 07:00:41.378: Packet sizes: 256 256

*Mar 9 07:00:41.378: Window sizes: 5 5

*Mar 9 07:00:41.382: Call User Data (4): 0x01000000 (pad)

*Mar 9 07:00:41.394: TCPDRV27693C: keepalive interval set to 10000 ms

*Mar 9 07:00:41.394: TCPDRV27693C: keepalive attempts set to 3

*Mar 9 07:00:41.398: TCPDRV27693C: keepalives turned on

*Mar 9 07:00:41.402: Serial1: X.25 O R1 Call (21) 8 lci 1024

*Mar 9 07:00:41.402: From (5): 45678 To (6): 123456

*Mar 9 07:00:41.406: Facilities: (6)

*Mar 9 07:00:41.410: Packet sizes: 256 256

*Mar 9 07:00:41.410: Window sizes: 5 5

*Mar 9 07:00:41.414: Call User Data (4): 0x01000000 (pad)

*Mar 9 07:00:41.454: Serial1: X.25 I R1 Call Confirm (5) 8 lci 1024

*Mar 9 07:00:41.454: From (0): To (0):

*Mar 9 07:00:41.458: Facilities: (0)

*Mar 9 07:00:41.462: [10.1.2.2,11020/10.64.9.100,1998]: XOT O P3 Call Confirm (11) 8 lci 1

*Mar 9 07:00:41.462: From (0): To (0):

R4는 통화를 수신하고 vty 포트에 연결합니다.

R4#

*Mar 9 06:57:16.598: Serial1: X.25 I R1 Call (21) 8 lci 1024

*Mar 9 06:57:16.602: From (5): 45678 To (6): 123456

*Mar 9 06:57:16.606: Facilities: (6)

*Mar 9 06:57:16.606: Packet sizes: 256 256

*Mar 9 06:57:16.610: Window sizes: 5 5

*Mar 9 06:57:16.610: Call User Data (4): 0x01000000 (pad)

*Mar 9 06:57:16.622: Serial1: X.25 O R1 Call Confirm (5) 8 lci 1024

*Mar 9 06:57:16.626: From (0): To (0):

*Mar 9 06:57:16.626: Facilities: (0)

R4#show x25 vc

SVC 1024, State: D1, Interface: Serial1

Started 00:02:15, last input 00:02:12, output 00:02:12

Line: 2 vty 0 Location: Host: 45678

45678 connected to 123456 PAD <--> X25

Window size input: 5, output: 5

Packet size input: 256, output: 256

PS: 4 PR: 0 ACK: 0 Remote PR: 4 RCNT: 0 RNR: no

P/D state timeouts: 0 timer (secs): 0

data bytes 47/60 packets 4/8 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

R2#show tcp

Stand-alone TCP connection to host 10.64.9.100

Connection state is ESTAB, I/O status: 1, unread input bytes: 0

Local host: 10.1.2.2, Local port: 11020

Foreign host: 10.64.9.100, Foreign port: 1998

Enqueued packets for retransmit: 0, input: 0 mis-ordered: 0 (0 bytes)

TCP driver queue size 0, flow controlled FALSE

Event Timers (current time is 0x2AB893F0):

Timer Starts Wakeups Next

Retrans 11 0 0x0

TimeWait 0 0 0x0

AckHold 10 0 0x0

SendWnd 0 0 0x0

KeepAlive 50 0 0x2AB8A290

!--- Sends keepalive packets and increments.

GiveUp 0 0 0x0

PmtuAger 0 0 0x0

DeadWait 0 0 0x0

iss: 1072933807 snduna: 1072933977 sndnxt: 1072933977 sndwnd: 8023

irs: 1206945087 rcvnxt: 1206945244 rcvwnd: 8036 delrcvwnd: 156

SRTT: 231 ms, RTTO: 769 ms, RTV: 538 ms, KRTT: 0 ms

minRTT: 8 ms, maxRTT: 300 ms, ACK hold: 200 ms

Flags: higher precedence, retransmission timeout, keepalive running

!--- The keepalive status.

Datagrams (max data segment is 536 bytes):

Rcvd: 40 (out of order: 0), with data: 10, total data bytes: 156

Sent: 41 (retransmit: 0, fastretransmit: 0), with data: 10, total data bytes: 16 9

자세한 내용은 X.25 Route Command XOT Keepalive Options를 참조하십시오.

문제 해결

이 섹션에서는 컨피그레이션 문제를 해결할 수 있습니다.

문제 해결 명령

Output Interpreter 도구(등록된 고객만 해당)(OIT)는 특정 show 명령을 지원합니다. OIT를 사용하여 show 명령 출력의 분석을 봅니다.

참고: debug 명령을 사용하기 전에 디버그 명령에 대한 중요 정보를 참조하십시오.

- debug x25 events - 데이터 및 리소스 레코드 패킷을 제외한 모든 X.25 트래픽에 대한 정보를 표시합니다.

- debug ip tcp driver - TCP 드라이버 이벤트에 대한 정보를 표시합니다.

R2와 R3 간의 연결이 끊어지면 TCP 연결은 keepalive 기간 후에 끊깁니다. 그러면 show tcp 명령의 출력은 R2 및 R3 라우터에서 모두 비어 있습니다.

R2 및 R3의 XOT 인터페이스가 다운된 동안 이 디버그 출력을 관찰할 수 있습니다.

R2#debug x25 events

*Mar 10 05:36:24.685: [10.64.9.100,1998/10.1.2.2,11037]: XOT cx closed

*Mar 10 05:36:24.689: Serial0: X.25 O R1 Clear (5) 8 lci 1024

*Mar 10 05:36:24.693: Cause 9, Diag 0 (Out of order/No additional information)

*Mar 10 05:36:24.709: Serial0: X.25 I R1 Clear Confirm (3) 8 lci 1024

R2#debug ip tcp driver

*Mar 10 05:41:08.800: TCPDRV205B44: 10.1.2.2:11038 --> 10.64.9.100:1998 DoClose

(Cookie 402718) tcp close

R3#debug x25 events

*Mar 10 05:34:27.241: [10.1.2.2,11037/10.64.9.100,1998]: XOT cx closed

*Mar 10 05:34:27.245: Serial1: X.25 O R1 Clear (5) 8 lci 1024

*Mar 10 05:34:27.245: Cause 0, Diag 0 (DTE originated/No additional information)

*Mar 10 05:34:27.261: Serial1: X.25 I R1 Clear Confirm (3) 8 lci 1024

R3#debug ip tcp driver

*Mar 10 05:39:11.321: TCPDRV354BB8: 10.64.9.100:1998 --> 10.1.2.2:11038 DoClose

(Cookie 354B5C) tcp close

관련 정보

- X.25 및 LAB 명령

- X.25 프로토콜 기술 지원

- 기술 지원 및 문서 − Cisco Systems