목차

소개

사전 요구 사항

요구 사항

구성 요소

표기 규칙

배경

MIB 변수의 세부 정보 - OID(개체 식별자) 포함

SNMP를 사용하여 Cisco Catalyst 스위치에 VLAN 추가

단계별 지침

SNMP를 사용하여 Cisco Catalyst 스위치에 VLAN 추가

한 단계 지침

SNMP를 사용하는 Cisco Catalyst 스위치에서 VLAN 삭제

단계별 지침

SNMP를 사용하여 Cisco Catalyst 스위치의 VLAN에 포트 추가

한 VLAN에서 다른 VLAN으로 포트를 변경하는 방법

관련 정보

소개

이 문서에서는 SNMP(Simple Network Management Protocol)를 사용하는 Cisco Catalyst 스위치에서 VLAN을 생성하고 삭제하는 방법에 대해 설명합니다. 또한 SNMP를 사용하여 VLAN에 포트를 추가하는 방법에 대해 설명합니다.

사전 요구 사항

요구 사항

이 문서의 정보를 사용하기 전에 다음 내용을 숙지하십시오.

- ifTable 및 ifIndexes 작동 방법

- Cisco Catalyst 스위치에서 VLAN이 작동하는 방식

- Cisco Catalyst 스위치에 대한 VLAN 정보를 보는 방법

- SNMP get, set 및 walk 명령의 일반적인 사용

구성 요소

이 문서는 IF-MIB, CISCO-VTP-MIB 및 CISCO-VLAN-MEMBERSHIP-MIB를 지원하는 일반 Catalyst OS 또는 Catalyst IOS를 실행하는 Catalyst 스위치를 위한 것입니다.이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Catalyst 3524XL 실행 CatIOS 12.0(5)WC5a

- NET-SNMP 버전 5.0.6(http://www.net-snmp.org/에서 제공)

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다.라이브 네트워크에서 작업하는 경우 명령을 사용하기 전에 모든 명령의 잠재적인 영향을 이해해야 합니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

배경

MIB 변수의 세부 정보 - OID(개체 식별자) 포함

1.3.6.1.4.1.9.9.46.1.3.1.1.2 (CISCO-VTP-MIB)

vtpVlanState  OBJECT-TYPE

SYNTAX     INTEGER { operational(1),

suspended(2),

mtuTooBigForDevice(3),

mtuTooBigForTrunk(4) }

MAX-ACCESS read-only

STATUS     current

DESCRIPTION            "The state of this VLAN.

The state 'mtuTooBigForDevice' indicates that this device

cannot participate in this VLAN because the VLAN's MTU is

larger than the device can support.

The state 'mtuTooBigForTrunk' indicates that while this

VLAN's MTU is supported by this device, it is too large for

one or more of the device's trunk ports."

::= { vtpVlanEntry 2 }

1.3.6.1.4.1.9.9.46.1.4.1.1.1 (CISCO-VTP-MIB)

vtpVlanEditOperation OBJECT-TYPE

SYNTAX     INTEGER { none(1),

copy(2),

apply(3),

release(4),

restartTimer(5)

}

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "This object always has the value 'none' when read.  When

written, each value causes the appropriate action:

'copy' - causes the creation of rows in the

vtpVlanEditTable exactly corresponding to the current global

VLAN information for this management domain.  If the Edit

Buffer (for this management domain) is not currently empty,

a copy operation fails.  A successful copy operation starts

the deadman-timer.

'apply' - first performs a consistent check on the the

modified information contained in the Edit Buffer, and if

consistent, then tries to instanciate the modified

information as the new global VLAN information.  Note that

an empty Edit Buffer (for the management domain) would

always result in an inconsistency since the default VLANs

are required to be present.

'release' - flushes the Edit Buffer (for this management

domain), clears the Owner information, and aborts the

deadman-timer.  A release is generated automatically if the

deadman-timer ever expires.

'restartTimer' - restarts the deadman-timer.

'none' - no operation is performed."

::= { vtpEditControlEntry 1 }

1.3.6.1.4.1.9.9.46.1.4.1.1.3 (CISCO-VTP-MIB)

vtpVlanEditBufferOwner OBJECT-TYPE

SYNTAX     OwnerString

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The management station which is currently using the Edit

Buffer for this management domain.  When the Edit Buffer for

a management domain is not currently in use, the value of

this object is the zero-length string.  Note that it is also

the zero-length string if a manager fails to set this object

when invoking a copy operation."

::= { vtpEditControlEntry 3 }

1.3.6.1.4.1.9.9.46.1.4.2.1.11 (CISCO-VTP-MIB)

vtpVlanEditRowStatus OBJECT-TYPE

SYNTAX     RowStatus

1:active

2:notInService

3:notReady

4:createAndGo

5:createAndWait

6:destroy

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The status of this row.  Any and all columnar objects in an

existing row can be modified irrespective of the status of

the row.

A row is not qualified for activation until instances of at

least its vtpVlanEditType, vtpVlanEditName and

vtpVlanEditDot10Said columns have appropriate values.

The management station should endeavor to make all rows

consistent in the table before 'apply'ing the buffer.  An

inconsistent entry in the table will cause the entire

buffer to be rejected with the vtpVlanApplyStatus object

set to the appropriate error value."

::= { vtpVlanEditEntry 11 }

1.3.6.1.4.1.9.9.46.1.4.2.1.3.1.48 (CISCO-VTP-MIB)

vtpVlanEditType OBJECT-TYPE

SYNTAX     VlanType

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The type which this VLAN would have.

An implementation may restrict access to this object."

DEFVAL     { ethernet }

::= { vtpVlanEditEntry 3 }

1.3.6.1.4.1.9.9.46.1.4.2.1.4.1.48 (CISCO-VTP-MIB)

vtpVlanEditName OBJECT-TYPE

SYNTAX     DisplayString (SIZE (1..32))

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The name which this VLAN would have.  This name would be

used as the ELAN-name for an ATM LAN-Emulation segment of

this VLAN.

An implementation may restrict access to this object."

::= { vtpVlanEditEntry 4 }

1.3.6.1.4.1.9.9.46.1.4.2.1.6.1.48 (CISCO-VTP-MIB)

vtpVlanEditDot10Said OBJECT-TYPE

SYNTAX     OCTET STRING (SIZE (4))

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The value of the 802.10 SAID field which would be used for

this VLAN.

An implementation may restrict access to this object."

::= { vtpVlanEditEntry 6 }

1.3.6.1.4.1.9.9.46.1.4.1.1.2.1 (CISCO-VTP-MIB)

vtpVlanApplyStatus OBJECT-TYPE

SYNTAX     INTEGER { inProgress(1),

succeeded(2),

configNumberError(3),

inconsistentEdit(4),

tooBig(5),

localNVStoreFail(6),

remoteNVStoreFail(7),

editBufferEmpty(8),

someOtherError(9)

}

MAX-ACCESS read-only

STATUS     current

DESCRIPTION            "The current status of an 'apply' operation to instanciate

the Edit Buffer as the new global VLAN information (for this

management domain).  If no apply is currently active, the

status represented is that of the most recently completed

apply.  The possible values are:

inProgress - 'apply' operation in progress;

succeeded - the 'apply' was successful (this value is

also used when no apply has been invoked since the

last time the local system restarted);

configNumberError - the apply failed because the value of

vtpVlanEditConfigRevNumber was less or equal to

the value of current value of

managementDomainConfigRevNumber;

inconsistentEdit - the apply failed because the modified

information was not self-consistent;

tooBig - the apply failed because the modified

information was too large to fit in this VTP

Server's non-volatile storage location;

localNVStoreFail - the apply failed in trying to store

the new information in a local non-volatile

storage location;

remoteNVStoreFail - the apply failed in trying to store

the new information in a remote non-volatile

storage location;

editBufferEmpty - the apply failed because the Edit

Buffer was empty (for this management domain).

someOtherError - the apply failed for some other reason

(e.g., insufficient memory)."

::= { vtpEditControlEntry 2 }

1.3.6.1.4.1.9.9.68.1.2.2.1.2 (CISCO-VLAN-MEMBERSHIP-MIB)

vmVlan  OBJECT-TYPE

SYNTAX     INTEGER(0..4095)

MAX-ACCESS read-write

STATUS     current

DESCRIPTION                "The VLAN id of the VLAN the port is assigned to

when vmVlanType is set to static or dynamic.

This object is not instantiated if not applicable.

The value may be 0 if the port is not assigned

to a VLAN.

If vmVlanType is static, the port is always

assigned to a VLAN and the object may not be

set to 0.

If vmVlanType is dynamic the object's value is

0 if the port is currently not assigned to a VLAN.

In addition, the object may be set to 0 only."

::= { vmMembershipEntry 2 }

SNMP를 사용하여 Cisco Catalyst 스위치에 VLAN 추가

단계별 지침

아래 예에서 VLAN 11은 스위치에 추가됩니다.

1. 스위치에 현재 구성된 VLAN을 확인하려면 vtpVlanState OID에서 snmpwalk를 실행합니다.

참고: OID의 마지막 숫자는 VLAN 번호입니다.

snmpwalk -c public crumpy vtpVlanState

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.48 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1002 : INTEGER: operational

2. 버전이 다른 NMS 스테이션 또는 디바이스에서 사용 중인지 확인합니다.다음 메시지가 표시되면 버전이 사용되지 않습니다.하위 트리에 포함된 MIB 개체 없음:

snmpwalk -c public crumpy vtpVlanEditTable

no MIB objects contained under subtree.

3. 에디션이 사용 중이 아니므로 편집을 시작하는 것이 안전합니다.vtpVlanEditOperation을 복사 상태(정수 2)로 설정합니다. 이렇게 하면 VLAN을 생성할 수 있습니다.

snmpset -c private crumpy vtpVlanEditOperation.1 integer 2

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditOperation.1 : INTEGER: copy

4. 편집 권한의 현재 소유자를 표시하려면 vtpVlanEditBufferOwner 명령을 실행할 때 소유자를 설정할 수 있습니다.

snmpset -c private crumpy vtpVlanEditBufferOwner.1 octetstring "Gerald"

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditBufferOwner.1 : OCTET STRING- (ascii):    Gerald

5. 다음 예에서는 테이블이 있는지 확인하는 방법을 보여 줍니다.

snmpwalk -c public crumpy vtpVlanEditTable

vtpVlanEditState.1.1 : INTEGER: operational

vtpVlanEditState.1.2 : INTEGER: operational

vtpVlanEditState.1.3 : INTEGER: operational

..

6. 이 예는 VLAN 11이며 행을 생성하고 유형과 이름을 설정하는 방법을 보여줍니다.

snmpset -c private crumpy vtpVlanEditRowStatus.1.11 integer 4

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditRowStatus.1.11 : INTEGER: createAndGo

snmpset -c private crumpy vtpVlanEditType.1.11 integer 1

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditType.1.11 : INTEGER: ethernet

snmpset -c private crumpy vtpVlanEditName.1.11 octetstring "test_11_gerald"

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditName.1.11 : DISPLAY STRING- (ascii):  test_11_gerald

7. vtpVlanEditDot10Said를 설정합니다.16진수로 변환된 VLAN 번호 + 10000입니다.이 예에서는 VLAN 11을 생성하므로 vtpVlanEditDot10Said는 다음과 같아야 합니다.11 + 100000 = 100011 -> 16진수:00186AB

snmpset -c private crumpy vtpVlanEditDot10Said.1.11 octetstringhex 000186AB

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEdi

ntry.vtpVlanEditDot10Said.1.11 : OCTET STRING-   (hex): length = 4

0:  00 01 86 ab -- -- -- -- -- -- -- -- -- -- -- --     ................

8. VLAN 11을 생성한 경우 수정 사항을 적용해야 합니다.vtpVlanEditOperation OID를 다시 사용합니다.이번에는 적용을 사용하여 설정을 확인합니다.

snmpset -c private crumpy vtpVlanEditOperation.1 integer 3

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditOperation.1 : INTEGER: apply

9. VLAN이 성공적으로 생성되었는지 확인합니다.OID vtpVlanApplyStatus를 사용합니다.상태가 다음과 같이 표시될 때까지 프로세스를 확인합니다.성공:

snmpget –c public crumpy vtpVlanApplyStatus.1

vtpVlanApplyStatus.1 : INTEGER: inProgress

snmpget –c public crumpy vtpVlanApplyStatus.1

vtpVlanApplyStatus.1 : INTEGER: inProgress

snmpget –c public crumpy vtpVlanApplyStatus.1

vtpVlanApplyStatus.1 : INTEGER: succeeded

10. 마지막 작업은 수정 사항을 커밋하고 권한을 해제하여 다른 사용자가 NMS에서 VLAN을 추가, 수정 또는 삭제할 수 있도록 하는 것입니다.

snmpset  -c private crumpy vtpVlanEditOperation.1 integer 4

vtpVlanEditOperation.1 : INTEGER: release

11. 버퍼가 비어 있는지 확인합니다.

snmpwalk –c public crumpy vtpVlanEditTable

no MIB objects contained under subtree.

12. VLAN 11이 CLI 명령 show vlan을 사용하여 스위치에서 생성되었는지 또는 snmpwalk를 사용하여 생성되었는지 확인합니다.

snmpwalk -c public crumpy vtpVlanState

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.11 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.48 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1002 : INTEGER: operational

…

SNMP를 사용하여 Cisco Catalyst 스위치에 VLAN 추가

한 단계 지침

한 단계 프로세스에서는 이전 단계별 프로세스와 같은 OID 이름 대신 OID 번호를 사용합니다.변환에 대한 MIB 세부 정보를 참조하십시오.이 예에서는 VLAN 6을 생성합니다.

snmpset -c private crumpy 1.3.6.1.4.1.9.9.46.1.4.1.1.1.1 integer 2 1.3.6.1.4.1.9.9.46.1.4.1.1.3.1 octetstring "gcober"

snmpset -c private gooroo 1.3.6.1.4.1.9.9.46.1.4.2.1.11.1.6 integer 4 1.3.6.1.4.1.9.9.46.1.4.2.1.3.1.6 integer 1 1.3.6.1.4.1.9.9.46.1.4.2.1.4.1.6 octetstring "vlan6" 1.3.6.1.4.1.9.9.46.1.4.2.1.6.1.6 octetstringhex 000186A6 1.3.6.1.4.1.9.9.46.1.4.1.1.1.1 integer 3

snmpset -c private gooroo 1.3.6.1.4.1.9.9.46.1.4.1.1.1.1 integer 4

snmpwalk -c public crumpy 1.3.6.1.4.1.9.9.46.1.3.1.1.2

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.6 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.11 : INTEGER: operational

참고: 특정 SNMP 버전은 SNMP SET 명령에서 OID를 사용하기 전에 (.)를 사용해야 합니다.

SNMP를 사용하는 Cisco Catalyst 스위치에서 VLAN 삭제

단계별 지침

이 예에서 VLAN 48은 스위치에서 삭제됩니다.자세한 내용은 SNMP를 사용하여 Cisco Catalyst에 VLAN 추가를 참조하십시오.VLAN을 삭제하는 섹션과 VLAN을 추가하는 섹션의 차이점은 vtpVlanEditRowStatus에 대해 CreateAndGo 명령 대신 destroy 명령을 사용한다는 것입니다.

1. VLAN 48을 삭제하려면 명령을 실행합니다.

snmpset -c private crumpy vtpVlanEditOperation.1 integer 2

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditOperation.1 : INTEGER: copy

snmpset -c private crumpy vtpVlanEditRowStatus.1.48 integer 6

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditRowStatus.1.48 : INTEGER: destroy

2. VLAN 48이 삭제되었는지 확인하려면 CLI에서 vtpVlanState 또는 show vlan을 사용합니다.

snmpwalk -c public crumpy vtpVlanState

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1002 : INTEGER: operational

…

SNMP를 사용하여 Cisco Catalyst 스위치의 VLAN에 포트 추가

이 예에서는 포트 Fast Ethernet 0/5를 VLAN 48에 추가하는 방법을 보여줍니다.

1. ifIndex Fast Eth 0/5가 있는지 확인하려면 ifDescr의 snmpwalk를 실행합니다.

snmpwalk -c public crumpy ifDescr

…

interfaces.ifTable.ifEntry.ifDescr.6 : DISPLAY STRING- (ascii):  FastEthernet0/5

…

2. 포트 Fast Eth 0/5에 ifIndex가 6인 것을 알고 있으므로 포트를 VLAN 48에 추가합니다.

snmpset -c private crumpy vmVlan.6 integer 48

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.6 : INTEGER: 48

3. 동일한 OID를 다시 쿼리하여 포트가 올바르게 추가되었는지 확인합니다.

snmpget -c public crumpy vmVlan.6

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.6 : INTEGER: 48

스위치에서 이를 확인할 수도 있습니다.

crumpy#sh vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/1, Fa0/2, Fa0/3, Fa0/4,

Fa0/6, Fa0/7, Fa0/8, Fa0/9,

Fa0/10, Fa0/11, Fa0/12, Fa0/13,

Fa0/14, Fa0/15, Fa0/16, Fa0/17,

Fa0/18, Fa0/19, Fa0/20, Fa0/21,

Fa0/22, Fa0/23, Fa0/24, Gi0/1,

Gi0/2

48   VLAN0048                         active    Fa0/5

한 VLAN에서 다른 VLAN으로 포트를 변경하는 방법

이 예에서는 포트 Fast Eth 0/3이 VLAN 48에 속하는 방법과 VLAN 1(기본 VLAN)로 이동하는 방법을 보여 줍니다.

1. ifIndex Fast Eth 0/3이 있는지 확인하려면 ifDescr의 snmpwalk를 실행합니다.

snmpwalk -c public crumpy ifDescr

…

interfaces.ifTable.ifEntry.ifDescr.4 : DISPLAY STRING- (ascii):  FastEthernet0/3

…

2. 포트 Fast Eth 0/3에 ifIndex가 4인 것을 알고 있으므로 포트가 현재 속한 VLAN을 확인할 수 있습니다.

snmpget -c public crumpy vmVlan.4

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.4 : INTEGER: 48

3. 포트는 VLAN 48에 속합니다.

snmpset -c private crumpy vmVlan.4 integer 1

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.4 : INTEGER: 1

4. 포트를 VLAN 48에서 VLAN 1로 이동하려면 vmVlan의 snmpset를 실행합니다.

5. 포트가 다른 VLAN으로 변경되었는지 확인하려면 vmVlan을 다시 쿼리합니다.

snmpget -c public crumpy vmVlan.4

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.4 : INTEGER: 1

스위치 자체에서도 이를 확인할 수 있습니다.

변경 전:

crumpy#sh vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/1, Fa0/2, Fa0/4, Fa0/5,

Fa0/6, Fa0/7, Fa0/8, Fa0/9,

Fa0/10, Fa0/11, Fa0/12, Fa0/13,

Fa0/14, Fa0/15, Fa0/16, Fa0/17,

Fa0/18, Fa0/19, Fa0/20, Fa0/21,

Fa0/22, Fa0/23, Fa0/24, Gi0/1,

Gi0/2

48   VLAN0048                         active    Fa0/3

변경 후:

crumpy#sh vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/1, Fa0/2, Fa0/3, Fa0/4,

Fa0/5, Fa0/6, Fa0/7, Fa0/8,

Fa0/9, Fa0/10, Fa0/11, Fa0/12,

Fa0/13, Fa0/14, Fa0/15, Fa0/16,

Fa0/17, Fa0/18, Fa0/19, Fa0/20,

Fa0/21, Fa0/22, Fa0/23, Fa0/24,

Gi0/1, Gi0/2

48   VLAN0048                         active

참고: VLAN 이름, 소유자 등의 다른 변경 사항을 적용할 수 있습니다.OID에 대한 자세한 내용은 전체 MIB를 참조하십시오.

관련 정보

- Technical Support - Cisco Systems