목차

소개

배경 정보

사전 요구 사항

요구 사항

사용되는 구성 요소

네트워크 다이어그램

NBMA 컨피그레이션(Network Type Broadcast 사용)

확인 팁

NBMA 컨피그레이션(Use Neighbor Statement)

확인 팁

Point-to-Multipoint 구성

확인 팁

관련 정보

소개

이 문서에서는 비브로드캐스트 링크를 통한 OSPF(Open Shortest Path First)의 초기 컨피그레이션에 대해 설명합니다.

배경 정보

Frame Relay, X.25, ATM, SMDS(Switched Multimegabit Data Service) 등의 비브로드캐스트 미디어에서는 OSPF를 두 가지 모드로 실행할 수 있습니다.

- NBMA(Nonbroadcast Multiaccess): DR(Designated Router) 및 BDR(Backup Designated Router)을 선택하여 브로드캐스트 모델을 시뮬레이션합니다. NBMA 네트워크에서 브로드캐스트 모델을 시뮬레이션하는 방법에는 두 가지가 있습니다. ip ospf network broadcast interface 하위 명령으로 네트워크 유형을 브로드캐스트로 정의하거나 router ospf 명령을 사용하는 네이버 명령문을 구성합니다.

- Point-to-multipoint: ip ospf network point-to-multipoint 명령의 컨피그레이션을 통해 비 브로드캐스트 네트워크를 포인트-투-포인트 링크의 모음으로 처리합니다.

인접 디바이스 명령문의 컨피그레이션을 방지하려면 비 브로드캐스트 네트워크에서 네트워크 유형을 정의해야 합니다. 이 문서에서는 OSPF over non-broadcast 링크에 대한 샘플 컨피그레이션을 제공합니다. OSPF를 실행하는 인터페이스의 네트워크 유형을 확인하려면 show ip ospf interface 명령을 사용하고, 인접 라우터의 상태를 아는 데 show ip ospf neighbor 명령이 사용됩니다.

사전 요구 사항

요구 사항

Cisco에서는 OSPF 라우팅 프로토콜의 기본 컨피그레이션을 이해할 것을 권장합니다.

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Cisco 2500 라우터

- 라우터에서 실행되는 Cisco IOS® Software 릴리스 12.2(24a)

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우 모든 명령의 잠재적인 영향을 미리 숙지하시기 바랍니다.

네트워크 다이어그램

이 문서의 컨피그레이션 예에 사용된 네트워크 다이어그램입니다.

NBMA 컨피그레이션(Network Type Broadcast 사용)

라우터1

interface Loopback0

ip address 192.0.2.3 255.255.255.255

!

!

interface Serial2

ip address 192.0.2.1 255.255.255.0

encapsulation frame-relay

ip ospf network broadcast

no keepalive

frame-relay map ip 192.0.2.1 16 broadcast

!

!

router ospf 1

network 192.0.2.0 0.0.0.255 area 0

라우터2

interface Loopback0

ip address 192.0.2.2 255.255.255.255

!

interface Serial1/0

ip address 192.0.2.1 255.255.255.0

encapsulation frame-relay

ip ospf network broadcast

no keepalive

clockrate 2000000

frame-relay map ip 192.0.2.1 16 broadcast

!

router ospf 1

network 192.0.2.0 0.0.0.255 area 0

!

확인 팁

Router1에 대한 show 명령 출력입니다.

Router1# show ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.0.2.2           1   FULL/BDR        00:00:37    192.0.2.1         Serial2

Router1# show ip ospf interface s2

Serial2 is up, line protocol is up

Internet Address 192.0.2.1/24, Area 0

Process ID 1, Router ID 192.0.2.3, Network Type BROADCAST, Cost: 64

Transmit Delay is 1 sec, State DR, Priority 1

Designated Router (ID) 192.0.2.3, Interface address 192.0.2.1

Backup Designated router (ID) 192.0.2.2, Interface address 192.0.2.1

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 00:00:00

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 1, maximum is 2

Last flood scan time is 0 msec, maximum is 4 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 192.0.2.2  (Backup Designated Router)

Suppress hello for 0 neighbor(s)

그리고 Router2의 출력은 다음과 같습니다.

Router2# show ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.0.2.3           1   FULL/DR         00:00:38     192.0.2.1         Serial1/0

Router2# show ip ospf interface s1/0

Serial1/0 is up, line protocol is up

Internet Address 192.0.2.1/24, Area 0

Process ID 1, Router ID 192.0.2.2, Network Type BROADCAST, Cost: 64

Transmit Delay is 1 sec, State BDR, Priority 1

Designated Router (ID) 192.0.2.3, Interface address 192.0.2.1

Backup Designated router (ID) 192.0.2.2, Interface address 192.0.2.1

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 00:00:03

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 1, maximum is 2

Last flood scan time is 0 msec, maximum is 4 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 192.0.2.3  (Designated Router)

Suppress hello for 0 neighbor(s)

NBMA 컨피그레이션(Use Neighbor Statement)

라우터1

interface Loopback0

ip address 192.0.2.3 255.255.255.255

!

interface Serial2

ip address 192.0.2.1 255.255.255.0

encapsulation frame-relay

ip ospf priority 2

no keepalive

frame-relay map ip 192.0.2.1 16

!

router ospf 1

network 192.0.2.0 0.0.0.255 area 0

neighbor 192.0.2.1

!

라우터2

interface Loopback0

ip address 192.0.2.2 255.255.255.255

!

interface Serial1/0

ip address 192.0.2.1 255.255.255.0

encapsulation frame-relay

no keepalive

clockrate 2000000

frame-relay map ip 192.0.2.1 16

!

router ospf 1

network 192.0.2.0 0.0.0.255 area 0

neighbor 192.0.2.1

!

참고: 방금 표시된 컨피그레이션에서 Router1의 ip ospf priority 2 명령은 기본 우선순위 값 1보다 높은 인터페이스 우선순위를 설정하므로 DR이 되고 Router2가 NBMA 네트워크의 BDR이 됩니다. 필요한 경우 라우터가 DR/BDR이 되지 않도록 구성하려면 우선 순위 값을 0으로 설정할 수 있습니다. 이는 허브가 DR이 되도록 구성해야 하는 허브 및 스포크 네트워크에서 필요합니다. 여기서 스포크는 DR도 아니고 BDR도 아니어야 합니다. 한 쪽에서 neighbor 문을 구성하면 인접성을 충분히 형성할 수 있지만 그림과 같이 양쪽 끝에서 구성하는 것이 좋습니다. 또한 OSPF 패킷은 neighbor 문과 유니캐스트되므로 frame-relay map 명령에는 broadcast 매개변수가 필요하지 않습니다.

확인 팁

Router1에 대한 show 명령 출력입니다.

Router1# show ip ospf neighbors

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.0.2.2           1   FULL/BDR        00:01:39    192.0.2.1         Serial2

Router1# show ip ospf interface s2

Serial2 is up, line protocol is up

Internet Address 192.0.2.1/24, Area 0

Process ID 1, Router ID 192.0.2.3, Network Type NON_BROADCAST, Cost: 64

Transmit Delay is 1 sec, State DR, Priority 1

Designated Router (ID) 192.0.2.3, Interface address 192.0.2.1

Backup Designated router (ID) 192.0.2.2, Interface address 192.0.2.1

Timer intervals configured, Hello 30, Dead 120, Wait 120, Retransmit 5

Hello due in 00:00:19

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 2, maximum is 2

Last flood scan time is 0 msec, maximum is 0 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 192.0.2.2  (Backup Designated Router)

Suppress hello for 0 neighbor(s)

그리고 Router2의 출력은 다음과 같습니다.

Router2# show ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.0.2.3           1   FULL/DR         00:01:49     192.0.2.1         Serial1/0

Router2# show ip ospf interface s1/0

Serial1/0 is up, line protocol is up

Internet Address 192.0.2.1/24, Area 0

Process ID 1, Router ID 192.0.2.2, Network Type NON_BROADCAST, Cost: 64

Transmit Delay is 1 sec, State BDR, Priority 1

Designated Router (ID) 192.0.2.3, Interface address 192.0.2.1

Backup Designated router (ID) 192.0.2.2, Interface address 192.0.2.1

Timer intervals configured, Hello 30, Dead 120, Wait 120, Retransmit 5

Hello due in 00:00:01

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 2, maximum is 2

Last flood scan time is 0 msec, maximum is 0 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 192.0.2.3  (Designated Router)

Suppress hello for 0 neighbor(s)

Point-to-Multipoint 구성

라우터1

interface Loopback0

ip address 192.0.2.3 255.255.255.255

!

interface Serial2

ip address 192.0.2.1 255.255.255.0

encapsulation frame-relay

ip ospf network point-to-multipoint

no keepalive

frame-relay map ip 192.0.2.1 16 broadcast

!

router ospf 1

network 192.0.2.0 0.0.0.255 area 0

!

라우터2

interface Loopback0

ip address 192.0.2.2 255.255.255.255

!

interface Serial1/0

ip address 192.0.2.1 255.255.255.0

encapsulation frame-relay

ip ospf network point-to-multipoint

no keepalive

clockrate 2000000

frame-relay map ip 192.0.2.1 16 broadcast

!

router ospf 1

network 192.0.2.0 0.0.0.255 area 0

확인 팁

Router1에 대한 show 명령 출력입니다.

Router1# show ip ospf neighbors

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.0.2.2           1   FULL/  -        00:01:53    192.0.2.1         Serial2

Router1# show ip ospf interface s2

Serial2 is up, line protocol is up

Internet Address 192.0.2.1/24, Area 0

Process ID 1, Router ID 192.0.2.3, Network Type POINT_TO_MULTIPOINT, Cost: 64

Transmit Delay is 1 sec, State POINT_TO_MULTIPOINT,

Timer intervals configured, Hello 30, Dead 120, Wait 120, Retransmit 5

Hello due in 00:00:18

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 1, maximum is 1

Last flood scan time is 0 msec, maximum is 0 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 192.0.2.2

Suppress hello for 0 neighbor(s)

그리고 Router2의 출력은 다음과 같습니다.

Router2# show ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address         Interface

192.0.2.3           1   FULL/  -        00:01:58     192.0.2.1         Serial1/0

Router2# show ip ospf interface s1/0

Serial1/0 is up, line protocol is up

Internet Address 192.0.2.1/24, Area 0

Process ID 1, Router ID 192.0.2.2, Network Type POINT_TO_MULTIPOINT, Cost: 64

Transmit Delay is 1 sec, State POINT_TO_MULTIPOINT,

Timer intervals configured, Hello 30, Dead 120, Wait 120, Retransmit 5

Hello due in 00:00:18

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 1, maximum is 1

Last flood scan time is 0 msec, maximum is 0 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 192.0.2.3

Suppress hello for 0 neighbor(s)

참고: NBMA 네트워크가 Point-to-Point 링크의 컬렉션으로 처리되므로 출력에 표시된 대로 Point-to-Multipoint로 구성된 경우 DR 및 BDR은 선택되지 않습니다.

자세한 내용은 OSPF 구성을 참조하십시오.

관련 정보

- OSPF 지원 페이지

- IP 라우팅 프로토콜 지원 페이지

- 기술 지원 및 문서 − Cisco Systems