목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

구성

네트워크 다이어그램

구성

다음을 확인합니다.

라우터 R2에서

관련 정보

소개

이 문서에서는 Cisco 라우터의 경로 선택에 영향을 주기 위해 라우팅 프로토콜의 관리 거리 값을 변경하는 방법에 대해 설명합니다.

관리 거리는 두 개의 서로 다른 라우팅 프로토콜에서 동일한 대상에 대한 경로가 둘 이상 있을 때 라우터가 최적의 경로를 선택하기 위해 사용하는 기능입니다. 관리 거리는 라우팅 프로토콜의 안정성을 정의합니다. 관리 거리 값이 작을수록 프로토콜의 신뢰성이 높아집니다.

참고: 기본 거리를 변경하면 네트워크에서 라우팅 루프로 이어질 수 있습니다. 원하는 것을 숙지하고 나서야 관리 거리를 신중하게 변경합니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 컨피그레이션은 Cisco IOS Software 릴리스 12.4(15)T 13의 Cisco 3700 Series 라우터를 기반으로 합니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참고하십시오.

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 명령 조회 도구(등록된 고객만 해당)를 사용하여 이 문서에 사용된 명령에 대한 자세한 내용을 확인하십시오.

네트워크 다이어그램

여기서는 라우터 R1과 R2가 병렬 직렬 회선을 통해 연결됩니다. 라우터 R1 및 R2는 BGP 및 OSPF로 구성됩니다. OSPF의 기본 관리 영역은 110이고 eBGP의 관리 영역은 20입니다. 명령 거리를 사용하여 BGP의 AD 값을 190으로 변경했습니다. 이 명령 이전에 라우터 R2는 기본 AD 값이 구성되어 있으므로 OSPF를 통한 BGP 경로를 선호했습니다. BGP의 AD 값이 변경되면 OSPF 경로가 우선합니다.

구성

이 문서에서는 이러한 구성을 사용합니다.

- 라우터 R1 컨피그레이션

- 라우터 R2 컨피그레이션

R1 구성

interface Loopback0

ip address 1.1.1.1 255.255.255.255

!

!

interface Loopback10

ip address 10.10.10.10 255.255.255.255

!

!

interface Loopback20

ip address 20.20.20.20 255.255.255.255

!

!

interface Loopback30

ip address 30.30.30.30 255.255.255.255

!

!

interface Serial1/0

ip address 100.100.100.1 255.255.255.0

serial restart-delay 0

clock rate 64000

!

!

interface Serial1/1

ip address 192.168.12.1 255.255.255.0

serial restart-delay 0

clock rate 64000

!

!

router ospf 10

router-id 1.1.1.1

log-adjacency-changes

network 1.1.1.1 0.0.0.0 area 0

network 10.10.10.10 0.0.0.0 area 0

network 20.20.20.20 0.0.0.0 area 0

network 100.100.100.1 0.0.0.0 area 0

!

router bgp 123

no synchronization

bgp router-id 1.1.1.1

bgp log-neighbor-changes

network 10.10.10.10 mask 255.255.255.255

network 20.20.20.20 mask 255.255.255.255

network 30.30.30.30 mask 255.255.255.255

neighbor 2.2.2.2 remote-as 100

neighbor 2.2.2.2 ebgp-multihop 5

neighbor 2.2.2.2 update-source Loopback0

no auto-summary

!

R2 구성

interface Loopback0

ip address 2.2.2.2 255.255.255.255

!

!

interface Serial1/0

ip address 100.100.100.2 255.255.255.0

serial restart-delay 0

clock rate 64000

!

!

interface Serial1/1

ip address 192.168.12.2 255.255.255.0

serial restart-delay 0

clock rate 64000

!

!

router ospf 10

router-id 2.2.2.2

log-adjacency-changes

network 2.2.2.2 0.0.0.0 area 0

network 100.100.100.2 0.0.0.0 area 0

!

router bgp 100

no synchronization

bgp router-id 2.2.2.2

bgp log-neighbor-changes

neighbor 1.1.1.1 remote-as 123

neighbor 1.1.1.1 ebgp-multihop 5

neighbor 1.1.1.1 update-source Loopback0

distance 190 1.1.1.1 0.0.0.0

Changed the AD value of BGP as 190!

no auto-summary

!

다음을 확인합니다.

컨피그레이션을 확인하려면 이 섹션에 설명된 명령을 사용합니다.

Output Interpreter 도구(등록된 고객만 해당)(OIT)는 특정 show 명령을 지원합니다. OIT를 사용하여 show 명령 출력의 분석을 봅니다.

라우터 R2에서

distance 명령이 라우터 R2에 적용되지 않은 경우

IP 경로 표시

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

I - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

Gateway of last resort is not set

1.0.0.0/32 is subnetted, 1 subnets

O        1.1.1.1 [110/65] via 100.100.100.1, 00:00:03, Serial1/0

2.0.0.0/32 is subnetted, 1 subnets

C        2.2.2.2 is directly connected, Loopback0

10.0.0.0/32 is subnetted, 1 subnets

B        10.10.10.10 [20/0] via 1.1.1.1, 00:00:03

BGP Router Preffered Over OSPF

20.0.0.0/32 is subnetted, 1 subnets

B        20.20.20.20 [20/0] via 1.1.1.1, 00:00:03

BGP Router Preffered Over OSPF

30.0.0.0/32 is subnetted, 1 subnets

B        30.30.30.30 [20/0] via 1.1.1.1, 00:00:03

100.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C        100.100.100.0/24 is directly connected, Serial1/0

L        100.100.100.2/32 is directly connected, Serial1/0

192.168.12.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.12.0/24 is directly connected, Serial1/1

L        192.168.12.2/32 is directly connected, Serial1/1

distance 명령이 라우터 R2에 적용되는 경우

IP 경로 표시

R2#sh ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

I - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

Gateway of last resort is not set

1.0.0.0/32 is subnetted, 1 subnets

O        1.1.1.1 [110/65] via 100.100.100.1, 00:00:03, Serial1/0

2.0.0.0/32 is subnetted, 1 subnets

C        2.2.2.2 is directly connected, Loopback0

10.0.0.0/32 is subnetted, 1 subnets

O        10.10.10.10 [110/65] via 100.100.100.1, 00:00:03, Serial1/0

By increasing the AD of External BGP, OSPF takes precedence

20.0.0.0/32 is subnetted, 1 subnets

O        20.20.20.20 [110/65] via 100.100.100.1, 00:00:03, Serial1/0

By increasing the AD of External BGP, OSPF takes precedence

30.0.0.0/32 is subnetted, 1 subnets

B        30.30.30.30 [190/0] via 1.1.1.1, 00:00:03

100.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C        100.100.100.0/24 is directly connected, Serial1/0

L        100.100.100.2/32 is directly connected, Serial1/0

192.168.12.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.12.0/24 is directly connected, Serial1/1

L        192.168.12.2/32 is directly connected, Serial1/1

관련 정보

- Cisco 라우터의 경로 선택

- OSPF 지원 페이지

- BGP 지원 페이지

- 기술 지원 및 문서 − Cisco Systems