목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

구성

네트워크 다이어그램

구성

R1

R2

R3

방법 1. 기본 경로 및 재배포 사용

다음을 확인합니다.

방법 2. 요약 주소 사용

다음을 확인합니다.

문제 해결

소개

이 문서에서는 EIGRP(Enhanced Interior Gateway Routing Protocol)에서 기본 경로를 구성하는 방법에 대해 설명합니다.

사전 요구 사항

요구 사항

Cisco에서는 EIGRP에 대해 알고 있는 것이 좋습니다.

사용되는 구성 요소

이 문서는 특정 소프트웨어 및 하드웨어 버전으로 한정되지 않습니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다.네트워크가 작동 중인 경우 모든 명령의 잠재적인 영향을 이해해야 합니다.

구성

이 문서에 설명된 EIGRP에서 기본 경로를 광고하기 위해 다음 방법을 사용할 수 있습니다.

1. 기본 경로 및 재배포 사용

2. 요약 주소 사용

네트워크 다이어그램

구성

여기서 라우터 R1, R2 및 R3은 EIGRP로 구성되며 R3과 R4 사이에서 EIGRP가 실행되지 않습니다.

R1

!

router eigrp 1

network 192.168.12.0

!

R1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

C 192.168.12.0/24 is directly connected, FastEthernet0/0

D 192.168.23.0/24 [90/30720] via 192.168.12.2, 00:10:27, FastEthernet0/0

R2

!

router eigrp 1

network 192.168.12.0

network 192.168.23.0

!

R2#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

C 192.168.12.0/24 is directly connected, FastEthernet0/0

C 192.168.23.0/24 is directly connected, FastEthernet0/1

R3

!

router eigrp 1

network 192.168.23.0

!

R3#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is not set

D 192.168.12.0/24

[90/28416] via 192.168.23.2, 00:05:16, GigabitEthernet0/0/1

192.168.23.0/24 is variably subnetted, 2 subnets, 2 masks

C 192.168.23.0/24 is directly connected, GigabitEthernet0/0/1

L 192.168.23.3/32 is directly connected, GigabitEthernet0/0/1

192.168.34.0/24 is variably subnetted, 2 subnets, 2 masks

C 192.168.34.0/24 is directly connected, Serial0/2/0

L 192.168.34.3/32 is directly connected, Serial0/2/0

방법 1. 기본 경로 및 재배포 사용

이 방법은 고정 기본 경로를 사용하여 EIGRP에서 기본 경로를 광고하는 방법을 설명합니다.

R3(config)#ip route 0.0.0.0 0.0.0.0 192.168.34.4

R3#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is 192.168.34.4 to network 0.0.0.0

S*    0.0.0.0/0 [1/0] via 192.168.34.4

D     192.168.12.0/24

[90/28416] via 192.168.23.2, 00:59:18, GigabitEthernet0/0/1

192.168.23.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.23.0/24 is directly connected, GigabitEthernet0/0/1

L        192.168.23.3/32 is directly connected, GigabitEthernet0/0/1

192.168.34.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.34.0/24 is directly connected, Serial0/2/0

L        192.168.34.3/32 is directly connected, Serial0/2/0

참고:이 경우 네트워크 문은 직접 연결되지 않았으므로 EIGRP 내에서 0.0.0.0을 광고하기 위해 사용할 수 없습니다.

고정 경로의 재배포는 EIGRP에서 수행됩니다.

R3(config)#router eigrp 1

R3(config-router)#redistribute static metric 100000 1000 255 1 1500

다음을 확인합니다.

이 섹션을 사용하여 컨피그레이션이 제대로 작동하는지 확인합니다.

R1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is 192.168.12.2 to network 0.0.0.0

C    192.168.12.0/24 is directly connected, FastEthernet0/0

D    192.168.23.0/24 [90/30720] via 192.168.12.2, 00:14:01, FastEthernet0/0

D*EX 0.0.0.0/0 [170/286720] via 192.168.12.2, 00:00:39, FastEthernet0/0

R2#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is 192.168.23.3 to network 0.0.0.0

C    192.168.12.0/24 is directly connected, FastEthernet0/0

C    192.168.23.0/24 is directly connected, FastEthernet0/1

D*EX 0.0.0.0/0 [170/284160] via 192.168.23.3, 00:04:44, FastEthernet0/1

방법 2. 요약 주소 사용

이 메서드는 이미지에 표시된 대로 EIGRP의 요약 규칙을 사용합니다.

!

R3(config)#interface gigabitEthernet 0/0/1

R3(config-if)#ip summary-address eigrp 1 0.0.0.0 0.0.0.0

!

다음을 확인합니다.

이 섹션을 사용하여 컨피그레이션이 제대로 작동하는지 확인합니다.

R3#show ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is 0.0.0.0 to network 0.0.0.0

D*    0.0.0.0/0 is a summary, 00:00:06, Null0

D     192.168.12.0/24

[90/28416] via 192.168.23.2, 00:15:54, GigabitEthernet0/0/1

192.168.23.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.23.0/24 is directly connected, GigabitEthernet0/0/1

L        192.168.23.3/32 is directly connected, GigabitEthernet0/0/1

192.168.34.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.34.0/24 is directly connected, Serial0/2/0

L        192.168.34.3/32 is directly connected, Serial0/2/0

이제 R1 및 R2 라우팅 테이블에 EIGRP에서 학습된 기본 경로가 표시됩니다.

R1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is 192.168.12.2 to network 0.0.0.0

C    192.168.12.0/24 is directly connected, FastEthernet0/0

D    192.168.23.0/24 [90/30720] via 192.168.12.2, 00:17:50, FastEthernet0/0

D*   0.0.0.0/0 [90/30976] via 192.168.12.2, 00:01:30, FastEthernet0/0

R2#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is 192.168.23.3 to network 0.0.0.0

C    192.168.12.0/24 is directly connected, FastEthernet0/0

C    192.168.23.0/24 is directly connected, FastEthernet0/1

D*   0.0.0.0/0 [90/28416] via 192.168.23.3, 00:03:50, FastEthernet0/1

문제 해결

현재 이 컨피그레이션에 사용할 수 있는 특정 문제 해결 정보가 없습니다.