목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

구성

네트워크 다이어그램

설정

다음을 확인합니다.

명령 표시

관련 정보

소개

이 문서에서는 EIGRP와 BGP 간의 상호 재배포를 구성하는 방법에 대해 설명합니다.

사전 요구 사항

요구 사항

다음 주제에 대한 지식을 보유하고 있으면 유용합니다.

- EIGRP(Enhanced Interior Gateway Routing Protocol)

- BGP(Border Gateway Protocol)

사용되는 구성 요소

이 문서의 정보는 Cisco 7200 Series Router with Cisco IOS® Software 릴리스 15.0(1)을 기반으로 합니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우 모든 명령의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참고하십시오.

구성

이 예에서 라우터 R1과 R2는 EIGRP를 사용하여 서로 통신합니다. 라우터 R2 및 R3는 eBGP를 사용합니다. EIGRP로 eBGP 경로를 상호 재배포하려면 EIGRP 메트릭과 redistribute bgp함께 명령을 사용합니다. 마찬가지로 EIGRP 경로를 BGP로 재배포하려면 명령을 redistribute eigrp AS number  사용합니다.

네트워크 다이어그램

이 문서에서는 이 네트워크 설정을 사용합니다.

네트워크 다이어그램

설정

이 문서에서는 다음 설정을 사용합니다.

- 라우터 R1

- 라우터 R2

- 라우터 R3

라우터 R1

!

hostname R1

!

ip cef

!

!

interface Loopback0

ip address 10.30.30.30 255.255.255.255

!

interface FastEthernet0/0

ip address 192.168.1.101 255.255.255.0

duplex auto

speed auto

!

router eigrp 100

network 10.30.0.0

network 192.168.1.0

no auto-summary

!

end

라우터 R2

!

hostname R2

!

ip cef

!

!

interface Loopback0

ip address 10.10.10.10 255.255.255.255

!

interface Loopback1

ip address 10.20.20.20 255.255.255.255

!

interface FastEthernet0/0

ip address 192.168.1.100 255.255.255.0

duplex auto

speed auto

!

interface Serial0/0

ip address 172.16.100.50 255.255.255.0

serial restart-delay 0

clock rate 2000000

!

router eigrp 100

redistribute static

redistribute bgp 1000 metric 100 1 255 1 1500

network 10.0.0.0

network 192.168.1.0

no auto-summary

!

router bgp 1000

no synchronization

bgp log-neighbor-changes

network 10.20.20.20 mask 255.255.255.255

redistribute connected

redistribute static

redistribute eigrp 100

neighbor 172.16.100.51 remote-as 2000

neighbor 172.16.100.51 next-hop-self

no auto-summary

!

end

라우터 R3

!

hostname R3

!

ip cef

!

interface Loopback0

ip address 10.22.22.22 255.255.255.255

!

interface Serial0/0

ip address 172.16.100.51 255.255.255.0

serial restart-delay 0

clock rate 2000000

!

router bgp 2000

no synchronization

bgp log-neighbor-changes

network 10.22.22.22 mask 255.255.255.255

network 172.16.100.0 mask 255.255.255.0

neighbor 172.16.100.50 remote-as 1000

neighbor 172.16.100.50 default-originate

default-information originate

!--- Default route is configured!

no auto-summary

!

end

다음을 확인합니다.

구성이 올바르게 작동하는지 확인하려면 이 섹션을 활용하십시오.

CLI 분석기는 show 명령 출력의 분석을 보기 위해 사용됩니다.

참고: 등록된 Cisco 사용자만 내부 Cisco 툴 및 정보에 액세스할 수 있습니다.

명령 표시

EIGRP가 재배포된 경로를 수신하는지 확인하려면 명령을 show ip route eigrp  사용합니다.

show ip route eigrp

라우터 R1

R1#show ip route eigrp

10.20.0.0/32 is subnetted, 1 subnets

D EX    10.20.20.20

[170/25625856] via 192.168.1.100, 01:00:33, FastEthernet0/0

10.22.0.0/32 is subnetted, 1 subnets

D EX    10.22.22.22

[170/25625856] via 192.168.1.100, 00:59:49, FastEthernet0/0

10.0.0.0/32 is subnetted, 1 subnets

D       10.10.10.10 [90/409600] via 192.168.1.100, 00:55:17, FastEthernet0/0

D*EX 0.0.0.0/0 [170/25625856] via 192.168.1.100, 00:46:24, FastEthernet0/0

!--- Shows the default route from router R3.

!--- EX indicates that the routes are EIGRP external routes.

EIGRP 경로가 BGP에서 제대로 재배포되는지 확인하려면 라우터 R3show ip route bgp에서 명령을 사용합니다.

show ip route bgp

라우터 R3

R3#show ip route bgp

show ip route bgp

10.20.0.0/32 is subnetted, 1 subnets

B       10.20.20.20 [20/0] via 172.16.100.50, 01:03:02

10.0.0.0/32 is subnetted, 1 subnets

B       10.10.10.10 [20/0] via 172.16.100.50, 01:03:02

B    192.168.1.0/24 [20/0] via 172.16.100.50, 01:03:02

10.30.0.0/32 is subnetted, 1 subnets

B       10.30.30.30 [20/409600] via 172.16.100.50, 00:59:06

!--- The output indicates that the EIGRP routes are

!--- redistributed in BGP.

관련 정보

- BGP 지원 페이지

- BGP 사례 연구

- EIGRP 지원 페이지

- Cisco 기술 지원 및 다운로드