목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

배경 정보

NX-OS 장치의 vPC 문제 해결

문제 #1: vPC 멤버 포트가 호환되지 않음

문제 해결

문제 #2: 피어 링크 중단

문제 해결

문제 #3: 피어 킵얼라이브를 통해 피어에 연결할 수 없음

문제 해결

문제 #4: 유형 1 불일치

문제 해결

문제 #5: 유형 2 불일치

문제 해결

문제 #6: 인터페이스 번호 및 vPC ID 불일치

문제 해결

관련 정보

소개

이 문서에서는 일반적으로 나타나는 vPC(가상 포트 채널) 불일치 문제 및 이를 해결하기 위한 단계에 대해 설명합니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서는 특정 소프트웨어 및 하드웨어 버전으로 한정되지 않습니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우 모든 명령의 잠재적인 영향을 미리 숙지하시기 바랍니다.

배경 정보

vPC를 사용하면 서로 다른 두 스위치에 물리적으로 연결된 링크가 세 번째 디바이스에서 단일 포트 채널로 나타날 수 있습니다.

NX-OS 장치의 vPC 문제 해결

의 출력을 확인합니다.  show vpc brief  vPC 멤버 포트 중 하나에서 호환성 문제가 있는지 확인합니다.

나열된 명령을 사용하여 특정 vPC 불일치를 확인합니다.

show vpc consistency-parameters global

show vpc consistency-parameters interface Ethernet x/y

show vpc consistency-parameters vlans

show vpc consistency-parameters vpc vpc-id

문제 #1: vPC 멤버 포트가 호환되지 않음

에서 보고한 대로 vPC 멤버 포트 간에 호환성 문제가 있는지 확인합니다. show vpc `

문제가 있는 경우 이 출력에 표시된 대로 "호환성 검사 실패"로 보고됩니다

`show vpc`

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id : 1

Peer status : peer adjacency formed ok

vPC keep-alive status : peer is alive

Configuration consistency status : success

Per-vlan consistency status : success

Type-2 consistency status : success

vPC role : secondary

Number of vPCs configured : 18

Peer Gateway : Enabled

Dual-active excluded VLANs : -

Graceful Consistency Check : Enabled

Auto-recovery status : Enabled, timer is off.(timeout = 240s)

Delay-restore status : Timer is off.(timeout = 50s)

Delay-restore SVI status : Timer is off.(timeout = 10s)

vPC Peer-link status

---------------------------------------------------------------------

id Port Status Active vlans

-- ---- ------ --------------------------------------------------

1  Po100 up    1,5,10,118,121-132,150,160,253

vPC status

----------------------------------------------------------------------

id Port Status Consistency Reason Active vlans

-- ---- ------ ----------- ------ ------------

1  Po1  up     success     success 1,5,10,118, 121-132,150

2  Po2  down*  failed      Compatibility check failed -      <--- for speed

`show vpc consistency-parameters vpc 2`

Legend:

Type 1 : vPC will be suspended in case of mismatch

Name                        Type  Local Value            Peer Value

-------------               ----  ---------------------- -----------------------

delayed-lacp                1     disabled               disabled

mode                        1     active                 active

Switchport Isolated         1     0                      0

Interface type              1     port-channel           port-channel

LACP Mode                   1     on                     on

Virtual-ethernet-bridge     1     Disabled               Disabled

Speed                       1     10 Gb/s                100 Gb/s     <--- speed mismatch

Duplex                      1     full                   full

MTU                         1     9216                   9216

Port Mode                   1     trunk                  trunk

Native Vlan                 1     20                     20

Admin port mode             1     trunk                  trunk

STP Port Guard              1     Default                Default

STP Port Type               1     Edge Trunk Port        Edge Trunk Port

STP MST Simulate PVST       1     Default                Default

lag-id                      1     [(64, 0-23-4-ee-be-6d, [(0,

806b, 0, 0), (ffff,   50-6b-4b-46-3a-fa, 0,

50-6b-4b-46-39-6a, 1,  0, 0), (64,

0, 0)]                 0-23-4-ee-be-6d, 806b,

0, 0)]

Vlan xlt mapping            1     Disabled               Disabled

vPC card type               1     N9K TOR                N9K TOR

Allowed VLANs               -     1,5,10,118             1,5,10,118

Local suspended VLANs       -     -                      -

문제 해결

- vPC 인터페이스와 원격 측(서버/서드 스위치)이 동일한 속도로 구성되어 있는지 확인합니다. Use show vpc consistency-parameters vpc vpc-id 피어 vPC 인터페이스와의 속도 불일치를 확인합니다.

- 또한 vPC의 모든 멤버 인터페이스가 동일한 속도로 구성되어 있는지 확인합니다.

문제 #2: 피어 링크 중단

Peer status is peer link is down in(피어 상태가 피어 링크가 다운되었는지 확인)  show vpc

피어 링크 상태에 문제가 있는 경우 이 출력에 표시된 대로 "피어 상태"에 대해 "피어 링크가 중단됨"으로 보고해야 합니다.

`show vpc brief`

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 100

Peer status                       : peer link is down      <--- peer-link is down then vPC is down

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : failed

Type-2 inconsistency reason       : SVI type-2 configuration incompatible

vPC role                          : secondary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Disabled

Delay-restore status              : Timer is off.(timeout = 30s)

Delay-restore SVI status          : Timer is off.(timeout = 10s)

Operational Layer3 Peer-router    : Disabled

Virtual-peerlink mode             : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id    Port   Status Active vlans

--    ----   ------ -------------------------------------------------

1     Po1    down   -

vPC status

----------------------------------------------------------------------------

Id    Port          Status Consistency Reason                Active vlans

--    ------------  ------ ----------- ------                ---------------

123   Po123         down   failed      Peer-link is down     -           <--- Reason: Peer-link down

문제 해결

- 피어 링크에 구성된 포트 채널 인터페이스 및 멤버 인터페이스의 상태를 확인합니다. 전원이 꺼져 있고 연결되지 않은 경우 케이블/SFP 등의 물리적 연결을 확인하십시오.

- vPC 피어 링크 포트 채널은 STP(Spanning-Tree Protocol) 포트 유형 네트워크로 구성되어야 하므로 두 vPC 피어 스위치의 모든 vPC 피어 링크에서 브리지 보증이 활성화됩니다.

- vPC 피어 링크가 vPC VLAN만 허용하는 레이어 2 포트 채널 트렁크로 구성되었는지 확인합니다.

- 피어 간의 vPC 피어 링크가 처음 설정될 때까지 모든 vPC 포트 채널은 일시 중단 상태로 유지됩니다. vPC 피어 링크가 일정 시간 동안 온라인으로 한 번 실패하면 보조 링크의 vPC는 피어 링크가 복구될 때까지 일시 중단됩니다.

문제 #3: 피어 킵얼라이브를 통해 피어에 연결할 수 없음

vPC 킵얼라이브 상태가 피어 킵얼라이브를 통해 피어에 연결할 수 없는지 확인  show vpc

출력은 다음과 같이 vPC peer-keepalive가 다운되어 peer-keepalive를 통해 피어에 연결할 수 없는 이유를 보고합니다.

`show vpc brief`

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 100

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is not reachable through peer-keepalive  <--- keep-alive is down

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : failed

Type-2 inconsistency reason       : SVI type-2 configuration incompatible

vPC role                          : secondary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Disabled

Delay-restore status              : Timer is off.(timeout = 30s)

Delay-restore SVI status          : Timer is off.(timeout = 10s)

Operational Layer3 Peer-router    : Disabled

Virtual-peerlink mode             : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id    Port   Status Active vlans

--    ----   ------ -------------------------------------------------

1     Po1    up     1,10

vPC status

----------------------------------------------------------------------------

Id    Port          Status Consistency Reason                Active vlans

--    ------------  ------ ----------- ------                ---------------

123   Po123         up     success     success               1,10               <-- vpc is still up

문제 해결

- 레이어 3 인터페이스가 vPC 피어 스위치 간의 피어 킵얼라이브에 사용되는 올바른 VRF(Virtual Route Forwarding)와 연결되었는지 확인합니다.

- 피어 킵얼라이브에 사용되는 관리 VRF인 경우 관리 스위치가 두 vPC 피어 디바이스의 관리 포트에 연결되어 있는지 확인합니다.

- 피어 킵얼라이브 메시지에 사용된 소스 및 대상 IP 주소가 모두 vPC 피어 킵얼라이브 링크와 연결된 VRF에서 연결할 수 있는지 확인합니다.

- ARP(Address Resolution Protocol)가 확인되었는지 확인하고, 피어 킵얼라이브 주소 간에 ping하여 연결 가능성을 테스트할 수 있습니다.  연결 가능성이 없는 경우 경로에 문제가 있는지 확인합니다(L1, STP 등).

문제 #4: 유형 1 불일치

에서 Type-1 정합성 보장 상태가 실패하는지 확인  show vpc

명령 결과는 다음과 같이 컨피그레이션 일관성 문제가 탐지될 경우 실패 이유를 보고합니다.

`show vpc`

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 1

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : failed      <--- consistency check failed

Per-vlan consistency status       : success

Configuration inconsistency reason: vPC type-1 configuration incompatible - STP Mode inconsistent    <--- reason of inconsistency

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 0

Peer Gateway                      : Enabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled, timer is off.(timeout = 360s)

Delay-restore status              : Timer is on.(timeout = 150s, 30s left)

Delay-restore SVI status          : Timer is off.(timeout = 10s)

Operational Layer3 Peer-router    : Enabled

Virtual-peerlink mode             : Disabled

문제 해결

- 두 피어 스위치가 동일한 스패닝 트리 모드를 제어하는지 확인합니다. 예를 들어 피어 스위치가 MST(Multiple Spanning-Tree) 스패닝 트리 모드를 사용하고 다른 피어 스위치가 Rapid-PVST(Rapid Per VLAN Spanning Tree)를 사용하는 경우 이 오류를 해결하려면 두 스위치에서 스패닝 트리 모드를 동일하게 변경하십시오.

- 다음 명령을 사용하여 스패닝 트리 모드를 변경합니다.

Switch(config)# spanning-tree mode mst

또는

Switch(config)# spanning-tree mode rapid-pvst

다른 유형의 Type-1 VPC 전역 컨피그레이션 실패를 보려면 다음 명령을 사용하여 로컬 및 피어 값뿐만 아니라 범주를 식별합니다.

`show vpc consistency-parameters global`

Legend:

Type 1 : vPC will be suspended in case of mismatch

Name                        Type  Local Value            Peer Value

-------------               ----  ---------------------- -----------------------

STP MST Simulate PVST       1     Enabled                Enabled

STP Port Type, Edge         1     Normal, Disabled,      Normal, Disabled,

BPDUFilter, Edge BPDUGuard        Disabled               Disabled

STP MST Region Name         1     ""                     ""

STP Disabled                1     None                   None

STP Mode                    1     Rapid-PVST             Rapid-PVST

STP Bridge Assurance        1     Enabled                Enabled

STP Loopguard               1     Disabled               Disabled

STP MST Region Instance to  1

VLAN Mapping

STP MST Region Revision     1     0                      0

Interface-vlan admin up     2                            10

Interface-vlan routing      2     1                      1,10

capability

QoS (Cos)                   2     ([0-7], [], [], [],    ([0-7], [], [], [],

[], [])                [], [])

Network QoS (MTU)           2     (1500, 1500, 1500,     (1500, 1500, 1500,

1500, 1500, 1500)      1500, 1500, 1500)

Network Qos (Pause:         2     (F, F, F, F, F, F)     (F, F, F, F, F, F)

T->Enabled, F->Disabled)

Input Queuing (Bandwidth)   2     (0, 0, 0, 0, 0, 0)     (0, 0, 0, 0, 0, 0)

Input Queuing (Absolute     2     (F, F, F, F, F, F)     (F, F, F, F, F, F)

Priority: T->Enabled,

F->Disabled)

Output Queuing (Bandwidth   2     (0, 0, 0, 0, 0, 0)     (0, 0, 0, 0, 0, 0)

Remaining)

Output Queuing (Absolute    2     (T, F, F, F, F, F)     (T, F, F, F, F, F)

Priority: T->Enabled,

F->Disabled)

Allowed VLANs               -     1,10                   1,10

Local suspended VLANs       -     -                      -

다음 예에서는 특정 vPC 포트 채널에 대한 vPC 일관성 매개변수를 표시하는 방법을 보여 줍니다.

`show vpc consistency-parameters interface port-channel 10`

Legend:

Type 1 : vPC will be suspended in case of mismatch

Name                        Type  Local Value            Peer Value

-------------               ----  ---------------------- -----------------------

STP Mode                    1     Rapid-PVST             Rapid-PVST

STP Disabled                1     None                   None

STP MST Region Name         1     ""                     ""

STP MST Region Revision     1     0                      0

STP MST Region Instance to  1

VLAN Mapping

STP Loopguard               1     Disabled               Disabled

STP Bridge Assurance        1     Enabled                Enabled

STP Port Type               1     Normal                 Normal

STP MST Simulate PVST       1     Enabled                Enabled

Allowed VLANs               -     1-10,15-20,30,37,99    1-10,15-20,30,37,9

- 현재 컨피그레이션과 함께 전역 및 포트 채널 vPC 일관성 매개변수를 사용하여 vPC 피어 간의 차이를 식별합니다.

문제 #5: 유형 2 불일치

에서 Type-2 정합성 보장 상태가 실패하는지 확인  show vpc

.

이 명령 결과는 컨피그레이션 불일치가 탐지될 경우 실패 이유를 보고합니다.

`show vpc`

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 1

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : failed      <--- Type-2 inconsistency found

Type-2 inconsistency reason       : SVI type-2 configuration incompatible    <--- Reason for Type-2 inconsistency

vPC role                          : primary

Number of vPCs configured         : 0

Peer Gateway                      : Enabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled, timer is off.(timeout = 360s)

Delay-restore status              : Timer is off.(timeout = 150s)

Delay-restore SVI status          : Timer is off.(timeout = 10s)

Operational Layer3 Peer-router    : Enabled

Virtual-peerlink mode             : Disabled

이 명령을 사용하여 심층적으로 모든 Type-2 불일치를 확인할 수 있으며, 피어 및 로컬 값에 대한 컨피그레이션을 확인하여 컨피그레이션이 일치하지 않는지 확인할 수 있습니다.

`show vpc consistency-parameters global`

Legend:

Type 1 : vPC will be suspended in case of mismatch

Name                        Type  Local Value            Peer Value

-------------               ----  ---------------------- -----------------------

STP MST Simulate PVST       1     Enabled                Enabled

STP Port Type, Edge         1     Normal, Disabled,      Normal, Disabled,

BPDUFilter, Edge BPDUGuard        Disabled               Disabled

STP MST Region Name         1     ""                     ""

STP Disabled                1     None                   None

STP Mode                    1     Rapid-PVST             Rapid-PVST

STP Bridge Assurance        1     Enabled                Enabled

STP Loopguard               1     Disabled               Disabled

STP MST Region Instance to  1

VLAN Mapping

STP MST Region Revision     1     0                      0

Interface-vlan admin up     2                            10    <--- mismatch for SVIs between peers

Interface-vlan routing      2     1                      1,10    <--- mismatch for SVIs between peers

capability

QoS (Cos)                   2     ([0-7], [], [], [],    ([0-7], [], [], [],

[], [])                [], [])

Network QoS (MTU)           2     (1500, 1500, 1500,     (1500, 1500, 1500,

1500, 1500, 1500)      1500, 1500, 1500)

Network Qos (Pause:         2     (F, F, F, F, F, F)     (F, F, F, F, F, F)

T->Enabled, F->Disabled)

Input Queuing (Bandwidth)   2     (0, 0, 0, 0, 0, 0)     (0, 0, 0, 0, 0, 0)

Input Queuing (Absolute     2     (F, F, F, F, F, F)     (F, F, F, F, F, F)

Priority: T->Enabled,

F->Disabled)

Output Queuing (Bandwidth   2     (0, 0, 0, 0, 0, 0)     (0, 0, 0, 0, 0, 0)

Remaining)

Output Queuing (Absolute    2     (T, F, F, F, F, F)     (T, F, F, F, F, F)

Priority: T->Enabled,

F->Disabled)

Allowed VLANs               -     1,10                   1,10

Local suspended VLANs       -     -                      -

문제 해결

- SVI(Switched Virtual Interface) Type-2 컨피그레이션의 불일치는 vPC 피어 스위치 간에 구성된 여러 SVI의 일관성이 없기 때문일 수 있습니다. 예를 들어 특정 VLAN SVI가 하나의 스위치에서 구성되었지만 피어 스위치에는 없는 경우.

- 다음을 사용하여 확인합니다.  show running-config  명령을 실행하여 구성된 SVI 간의 차이를 식별합니다.

- 구성된 SVI의 차이점을 확인하기 위해 추가 지원이 여전히 필요한 경우 TAC 케이스를 여십시오.

문제 #6: 인터페이스 번호 및 vPC ID 불일치

의 vPC 상태에서 일관성 오류가 보고된 멤버 포트가 있는지 확인합니다.  show vpc  명령 결과.

`show vpc`

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 100

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 1

Peer Gateway                      : Disabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Disabled

Delay-restore status              : Timer is off.(timeout = 30s)

Delay-restore SVI status          : Timer is off.(timeout = 10s)

Operational Layer3 Peer-router    : Disabled

Virtual-peerlink mode             : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id    Port   Status Active vlans

--    ----   ------ -------------------------------------------------

1     Po1    up     1

vPC status

----------------------------------------------------------------------------

Id    Port          Status Consistency Reason                Active vlans

--    ------------  ------ ----------- ------                ---------------

123   Po123         down*  failed      vPC type-1            -                        <---  type-1 inconsistency

configuration

incompatible - STP

interface port type

inconsistent

문제 해결

- vPC 인터페이스 간의 정확한 포트 유형 불일치를 확인합니다.  show vpc consistency-parameters vpc vpc-id.

STP 포트 유형이 일치하지 않음을 확인하는 단계:

`show vpc consistency-parameters vpc 123`

Legend:

Type 1 : vPC will be suspended in case of mismatch

Name                        Type  Local Value            Peer Value

-------------               ----  ---------------------- -----------------------

Interface type              1     port-channel           port-channel

LACP Mode                   1     on                     on

STP Port Guard              1     Default                Default

STP Port Type               1     Edge Trunk Port        Default  <--- this VPC port-channel is configured as Edge Trunk port while peer has Default STP port type.

- 두 피어에서 vPC 인터페이스와 일치하도록 STP 포트 유형을 구성합니다. 스패닝 트리 포트는 에지 포트, 네트워크 포트 또는 일반 포트로 구성될 수 있습니다. 포트는 주어진 시간에 이러한 상태 중 하나에만 있을 수 있습니다. 기본 스패닝 트리 포트 유형은 normal입니다.

- STP 포트 유형은 전역적으로 또는 인터페이스 레벨에서 구성할 수 있습니다.

관련 정보

- Cisco 기술 지원 및 다운로드