목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

배경 정보

구성

네트워크 다이어그램

서부-DC

동부-DC

MS/MR

사이트-3

운영 순서

다음을 확인합니다.

문제 해결

소개

이 문서에서는 LISP(Locator Identity Separation Protocol) 지원 네트워크에서 로케이터 IP 주소를 변경할 필요 없이 데이터 센터(DC) 간에 이동하는 IP 디바이스의 컨피그레이션 및 확인에 대해 설명합니다.

사전 요구 사항

요구 사항

Cisco에서는 LISP에 대한 기본적인 지식을 보유하고 있는 것이 좋습니다.

사용되는 구성 요소

이 문서는 특정 소프트웨어 및 하드웨어 버전으로 한정되지 않습니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다.현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

배경 정보

LISP 환경에서 이 장치를 EID(Dynamic Endpoint Identifier)라고 합니다.LISP 멀티홉은 서브넷 확장 모드를 지원합니다. 그러면 서로 다른 DC에서 동일한 서브넷을 가질 수 있으므로 가상 머신(VM)이 다른 DC로 마이그레이션할 때 할당된 IP 주소를 유지할 수 있습니다.

FHR(First Hop Router)은 동적 EID가 있음을 감지하고 EID 알림 메시지를 통해 xTR 측 게이트웨이에 이를 알립니다.xTR은 서버를 매핑하기 위해 동적 EID를 등록하고 LISP 도메인을 통과하는 트래픽에 대해 LISP 캡슐화 및 역캡슐화 기능을 수행합니다.

서로 다른 DC에 구축된 xTR은 OTV(Overlay Transport Virtualization)와 같은 DCI(Data Center Interconnect) 기술을 통해 연결해야 합니다. Nexus에서 OTV 멀티캐스트 모드가 지원됩니다.

구성

네트워크 다이어그램

이 이미지는 문서의 나머지 부분에 대한 샘플 토폴로지로 사용됩니다.

- xTR:LISP 라우터는 트래픽 흐름 방향에 따라 달라지는 ITR 또는 ETR일 수 있습니다.트래픽이 LISP 라우터에서 나가는 경우 해당 플로우의 ITR이 되고 수신 엔드 LISP 라우터는 해당 라우터의 ETR이 됩니다.

- ITR:인그레스 터널 라우터

- ETR:이그레스 터널 라우터

- MR(Map Resolver): Map-Resolver는 EID-to-RLOC 매핑을 해결할 때 LISP 사이트 ITR이 LISP 맵 요청 쿼리를 보내는 LISP 인프라 장치입니다.

- 맵 서버(MS):맵 서버는 LISP 사이트 ETR이 EID 접두사를 사용하여 등록하는 LISP 인프라 디바이스입니다.맵 서버는 등록된 EID 접두사에 대한 집계를 LISP 매핑 시스템에 알립니다.모든 LISP 사이트는 EID-RLOC 매핑을 확인하기 위해 LISP 매핑 시스템을 사용합니다.

- EID 주소:EID 주소는 엔드포인트를 식별하는 IP 주소 및 접두사로 구성됩니다.EID-to-RLOC 매핑을 확인하여 LISP 사이트 전체에서 EID 연결성을 달성할 수 있습니다.

- RLOC(Route Locator) 주소:RLOC 주소는 IP 네트워크에서 다른 라우터를 식별하는 IP 주소 및 접두사로 구성됩니다.RLOC 공간 내의 연결성은 기존 라우팅 방법으로 달성할 수 있습니다.

- SMR:간청-맵 요청;캐시된 매핑을 업데이트하기 위해 원격 xTR에 알리는 데 사용되는 컨트롤 플레인 메시지입니다.

- ASM:전체 서브넷 모드;레이어 2 확장이 없는 LISP 사이트 간의 EID 이동성을 허용합니다.

- 맵 알림:해당 검색에 대해 동일한 LISP 사이트에서 다른 xTR을 업데이트하기 위해 EID를 탐지한 xTR에서 사용하는 LISP 메시지입니다.맵 서버에서 맵 레지스터가 수신 및 처리되었음을 확인하는 데에도 사용됩니다.

- 맵 등록:맵 서버에 EID를 등록하기 위해 xTR에서 사용하는 LISP 메시지입니다.

이 문서에서 설명한 예에서 트래픽은 VM(172.16.54.200)에서 Site-3(172.16.20.1)으로 계속 이동합니다.

서부-DC

First Hop Router(FHR-1):

!

feature lisp

!

ip lisp etr

!

lisp dynamic-eid VM

database-mapping 172.16.54.0/24 10.1.1.1 priority 10 weight 50

database-mapping 172.16.54.0/24 10.2.2.2 priority 10 weight 50

eid-notify 10.10.10.10 key 3 9125d59c18a9b015

map-notify-group 225.1.1.1

!

interface loopback0

ip address 10.1.1.1/32

ip router ospf 1 area 0.0.0.0

!

interface Vlan2

no shutdown

lisp mobility VM

lisp extended-subnet-mode

ip address 172.16.54.3/24

ip ospf passive-interface

ip router ospf 1 area 0.0.0.0

ip pim sparse-mode

no ip arp gratuitous request

hsrp 1

preempt

priority 120

ip 172.16.54.1

!

FHR-2:

!

feature lisp

!

ip lisp etr

!

lisp dynamic-eid VM

database-mapping 172.16.54.0/24 10.1.1.1 priority 10 weight 50

database-mapping 172.16.54.0/24 10.2.2.2 priority 10 weight 50

eid-notify 10.10.10.10 key 3 9125d59c18a9b015

map-notify-group 225.1.1.1

!

interface Vlan2

no shutdown

lisp mobility VM

lisp extended-subnet-mode

ip address 172.16.54.2/24

ip ospf passive-interface

ip pim sparse-mode

no ip arp gratuitous request

hsrp 1

preempt

priority 90

ip 172.16.54.1

!

interface loopback0

ip address 10.2.2.2/32

ip router ospf 1 area 0.0.0.0

xTR:

!

feature lisp

!

ip lisp itr-etr

ip lisp database-mapping 172.16.54.0/24 10.10.10.10 priority 10 weight 50

ip lisp itr map-resolver 192.168.1.1

ip lisp etr map-server 192.168.1.1 key 3 9125d59c18a9b015

!

lisp dynamic-eid VM

database-mapping 172.16.54.0/24 10.10.10.10 priority 10 weight 50

eid-notify authentication-key 3 9125d59c18a9b015

!

interface loopback0

ip address 10.10.10.10/32

ip router ospf 1 area 0.0.0.0

!

동부-DC

FHR-3:

!

feature lisp

!

ip lisp etr

!

lisp dynamic-eid VM

database-mapping 172.16.54.0/24 10.3.3.3 priority 10 weight 50

database-mapping 172.16.54.0/24 10.4.4.4 priority 10 weight 50

eid-notify 10.11.11.11 key 3 9125d59c18a9b015

map-notify-group 225.1.1.1

!

interface Vlan2

no shutdown

lisp mobility VM

lisp extended-subnet-mode

ip address 172.16.54.4/24

ip ospf passive-interface

ip router ospf 1 area 0.0.0.0

ip pim sparse-mode

no ip arp gratuitous request

hsrp 1

preempt

priority 110

ip 172.16.54.1

!

interface loopback0

ip address 10.3.3.3/32

ip router ospf 1 area 0.0.0.0

FHR-4:

!

feature lisp

!

ip lisp etr

!

lisp dynamic-eid VM

database-mapping 172.16.54.0/24 10.3.3.3 priority 10 weight 50

database-mapping 172.16.54.0/24 10.4.4.4 priority 10 weight 50

eid-notify 10.11.11.11 key 3 9125d59c18a9b015

map-notify-group 225.1.1.1

!

interface Vlan2

no shutdown

lisp mobility VM

lisp extended-subnet-mode

ip pim sparse-mode

ip ospf passive-interface

ip address 172.16.54.5/24

hsrp 1

preempt

priority 90

ip 172.16.54.1

!

interface loopback0

ip address 10.4.4.4/32

ip router ospf 1 area 0.0.0.0

xTR:

!

interface loopback0

ip address 10.11.11.11/32

ip router ospf 1 area 0.0.0.0

!

feature lisp

!

ip lisp itr-etr

ip lisp database-mapping 172.16.54.0/24 10.11.11.11 priority 10 weight 50

ip lisp itr map-resolver 192.168.1.1

ip lisp etr map-server 192.168.1.1 key 3 9125d59c18a9b015

!

lisp dynamic-eid VM

database-mapping 172.16.54.0/24 10.11.11.11 priority 9 weight 50

eid-notify authentication-key 3 9125d59c18a9b015

!

MS/MR

!

router lisp

locator-table default

site 1

authentication-key cisco

eid-prefix 172.16.54.0/24 accept-more-specifics

exit

!

site 2

authentication-key cisco

eid-prefix 172.16.20.0/24 accept-more-specifics

exit

!

ipv4 map-server

ipv4 map-resolver

사이트-3

!

router lisp

database-mapping 172.16.20.0/24 10.20.20.20 priority 10 weight 50

ipv4 itr map-resolver 192.168.1.1

ipv4 itr

ipv4 etr map-server 192.168.1.1 key cisco

ipv4 etr

exit

!

interface Loopback1

ip address 10.20.20.20 255.255.255.255

!

interface Loopback2

ip address 172.16.20.1 255.255.255.0

!

운영 순서

1단계. VM이 부팅됩니다.

VM의 전원이 켜지고 원격 사이트(예: Site-3)로 트래픽을 보내기 시작했습니다. FHR-1은 이 스트림을 수신하고 Dynamic-EID를 생성합니다.

N7K-358-West-FHR1# show lisp dynamic-eid summary

LISP Dynamic EID Summary for VRF "default"

* = Dyn-EID learned by site-based Map-Notify

! = Dyn-EID learned by routing protocol

^ = Dyn-EID learned by EID-Notify

Dyn-EID Name   Dynamic-EID      Interface     Uptime    Last      Pending

Packet    Ping Count

VM             172.16.54.200    Vlan2         06:50:21  00:12:12  0

N7K-358-West-FHR1# show lisp dynamic-eid detail

LISP Dynamic EID Information for VRF "default"

Dynamic-EID name: VM

Database-mapping [0] EID-prefix: 172.16.54.0/24, LSBs: 0x00000003

Locator: 10.1.1.1, priority: 10, weight: 50

Uptime: 06:51:34, state: up, local

Locator: 10.2.2.2, priority: 10, weight: 50

Uptime: 06:50:10, state: up

Registering more-specific dynamic-EIDs

Registering routes: disabled

Map-Server(s): none configured, use global Map-Server

Site-based multicast Map-Notify group: 225.1.1.1

Extended Subnet Mode configured on 1 interfaces

Number of roaming dynamic-EIDs discovered: 3

Last dynamic-EID discovered: 172.16.54.1, 00:00:04 ago

Roaming dynamic-EIDs:

172.16.54.200, Vlan2, uptime: 06:50:31, last activity: 00:12:22

Discovered by: packet reception

2단계. FHR에서 LISP 경로를 설치합니다.

1단계에서 볼 수 있듯이 FHR은 VM에서 패킷을 수신할 때 동적 EID 항목을 생성합니다.그런 다음 RIB(Routing Information Base)에 a/32 경로를 설치합니다.

N7K-358-FHR1-West-DC# show ip route 172.16.54.200

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

172.16.54.200/32, ubest/mbest: 1/0, attached

*via 172.16.54.200, Vlan2, [240/0], 06:58:08, lisp, dyn-eid

via 172.16.54.200, Vlan2, [250/0], 06:58:45, am

3단계. FHR은 이 동적 EID에 대해 다른 모든 FHR에게 알립니다.

이 FHR은 로컬 사이트 및 모든 원격 사이트에 있는 메시지를 포함하는 다른 모든 FHR에 맵 알림 메시지를 전송합니다.이 예에서는 FHR-1이 로컬 DC의 172.16.54.200과 관련하여 Map-Notify를, 동부 DC의 FHR-3 및 FHR-4에 전송합니다.

그러나 로컬 사이트 FHR만 다음과 같이 RIB에 해당 EID에 대한 경로를 설치할 수 있습니다.

N7K-358-FHR2-West-DC# show lisp dynamic-eid detail

LISP Dynamic EID Information for VRF "default"

Dynamic-EID name: VM

Database-mapping [0] EID-prefix: 172.16.54.0/24, LSBs: 0x00000003

Locator: 10.1.1.1, priority: 10, weight: 50

Uptime: 00:01:04, state: up

Locator: 10.2.2.2, priority: 10, weight: 50

Uptime: 00:01:53, state: up, local

Registering more-specific dynamic-EIDs

Registering routes: disabled

Map-Server(s): none configured, use global Map-Server

Site-based multicast Map-Notify group: 225.1.1.1

Extended Subnet Mode configured on 1 interfaces

Number of roaming dynamic-EIDs discovered: 1

Last dynamic-EID discovered: 172.16.54.200, 00:01:04 ago

Roaming dynamic-EIDs:

172.16.54.200, Vlan2, uptime: 00:01:04, last activity: 00:00:42

Discovered by: site-based Map-Notify

Secure-handoff pending for sources: none

N7K-358-FHR2-West-DC#sh ip route 172.16.54.200

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

172.16.54.200/32, ubest/mbest: 1/0, attached

*via 172.16.54.200, Vlan2, [240/0], 00:00:08, lisp, dyn-eid

via 172.16.54.200, Vlan2, [250/0], 00:01:53, am

4단계. FHR에서 이 EID를 로컬 xTR로 업데이트합니다.

FHR의 두 사이트가 모두 EID를 알고 있을 경우, EID-Notify 메시지를 사용하는 이 EID에 대해 해당 지역의 xTR에 알립니다.

East DC xTR 라우터는 이 접두사에 대해 null 0 경로를 설치하는 반면, West DC xTR은 이 접두사를 RIB에 추가합니다.

N7K-FA8-East_xTR#show ip route 172.16.54.200

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

172.16.54.200/32, ubest/mbest: 1/0, attached

*via 172.16.54.200, Null0, [241/0], 00:00:32, lisp, dyn-eid

N7K-358-West_xTR#show lisp dynamic-eid detail

LISP Dynamic EID Information for VRF "default"

Dynamic-EID name: VM

Database-mapping [0] EID-prefix: 172.16.54.0/24, LSBs: 0x00000001

Locator: 10.10.10.10, priority: 10, weight: 50

Uptime: 00:02:37, state: up, local

Registering more-specific dynamic-EIDs

Registering routes: disabled

Map-Server(s): none configured, use global Map-Server

Site-based multicast Map-Notify group: none configured

Number of roaming dynamic-EIDs discovered: 1

Last dynamic-EID discovered: 172.16.54.1, 00:00:06 ago

Roaming dynamic-EIDs:

172.16.54.200, (null), uptime: 00:00:28, last activity: 00:00:06

Discovered by: EID-Notify

EID-Notify Locators:

10.1.1.1

10.2.2.2

N7K-358-West_xTR#sh ip route 172.16.54.200

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

172.16.54.0/24, ubest/mbest: 1/0

via 10.10.13.3, Eth3/2, [110/44], 00:01:00, ospf-1, intra

로컬 xTR은 MR/MS에 EID를 등록합니다.

또한 East DC xTR은 MR/MS에 Map-Register 메시지를 전송하고 새로 검색된 EID를 MR/MS에 등록합니다.Site-3 라우터에서도 마찬가지입니다.

MS_MR#show lisp site 172.16.54.200/32

LISP Site Registration Information

Site name: 1

Allowed configured locators: any

Requested EID-prefix:

EID-prefix: 172.16.54.200/32

First registered:     07:11:28

Routing table tag:    0

Origin:               Dynamic, more specific of 172.16.54.0/24

Merge active:         No

Proxy reply:          No

TTL:                  00:03:00

State:                complete

Registration errors:

Authentication failures:   0

Allowed locators mismatch: 0

ETR 10.10.90.1, last registered 00:00:07, no proxy-reply, map-notify

TTL 00:03:00, no merge, hash-function sha1, nonce 0x00000000-0x00000000

state complete, no security-capability

xTR-ID N/A

site-ID N/A

Locator      Local  State      Pri/Wgt  Scope

10.10.10.10  yes    up          10/50   IPv4 none

MS_MR#sh lisp site 172.16.20.0/24

LISP Site Registration Information

Site name: 2

Allowed configured locators: any

Requested EID-prefix:

EID-prefix: 172.16.20.0/24

First registered: 06:30:48

Routing table tag: 0

Origin: Configuration, accepting more specifics

Merge active: No

Proxy reply: No

TTL: 1d00h

State: complete

Registration errors:

Authentication failures: 0

Allowed locators mismatch: 0

ETR 10.10.67.7, last registered 00:00:23, no proxy-reply, map-notify

TTL 1d00h, no merge, hash-function sha1, nonce 0xEE339164-0xC3199AF1

state complete, no security-capability

xTR-ID 0x7C6C7CF6-0x2AE64A0C-0xDCBC62DA-0x79762795

site-ID unspecified

Locator Local State Pri/Wgt Scope

10.20.20.20 yes up 10/50 IPv4 none

5단계. 사이트 1 및 사이트 3 xTR 모두에서 트래픽 흐름을 확인합니다.

N7K-358-West_xTR# show ip lisp map-cache

LISP IP Mapping Cache for VRF "default" (iid 0), 3 entries

* = Locator data counters are cumulative across all EID-prefixes

0.0.0.0/1, uptime: 00:13:28, expires: 00:01:31, via map-reply

Negative cache entry, action: forward-native

128.0.0.0/3, uptime: 00:13:28, expires: 00:01:31, via map-reply

Negative cache entry, action: forward-native

172.16.20.0/24, uptime: 00:00:26, expires: 23:59:33, via map-reply, auth

Locator      Uptime    State       Priority/  Data      Control       MTU

Weight     in/out    in/out

10.20.20.20  00:00:26  up          10/50      0/0*      0/0          1500

사이트 3 LISP 맵 캐시 항목:

Site-3#show ip lisp map-cache

LISP IPv4 Mapping Cache for EID-table default (IID 0), 2 entries

0.0.0.0/0, uptime: 01:53:04, expires: never, via static send map-request

Negative cache entry, action: send-map-request

172.16.54.200/32, uptime: 01:50:02, expires: 22:09:57, via map-reply, complete

Locator      Uptime    State      Pri/Wgt

10.10.10.10  01:50:02  up          10/50

6단계. VM이 West DC에서 East DC로 이동합니다.

이러한 단계는 DC 간 VM 마이그레이션이 발생하기 전에 수행됩니다.이제 VM은 IP 주소를 변경할 필요 없이 West DC에서 East DC로 이동합니다.VM이 West DC에서 East DC로 이동하자마자 East DC의 FHR-3은 VM에서 패킷을 수신하고 동적 EID 테이블에 해당 IP 주소를 추가합니다.그런 다음 West DC를 포함하는 모든 FHR에 map-notify 요청을 전송하고, West DC가 map-notify 요청을 받으면 VM이 West DC에 있을 때 생성된 dynamic-EID 테이블에서 VM 항목을 제거합니다. West DC의 xTR은 이제 VM의 IP에 null 0 경로를 설치합니다.

다음은 동부 DC의 FHR-3에서 Dynamic-EID의 상태입니다.

N7K-FA8-East_FHR3# sh lisp dynamic-eid detail

LISP Dynamic EID Information for VRF "default"

Dynamic-EID name: VM

Database-mapping [0] EID-prefix: 172.16.54.0/24, LSBs: 0x00000003

Locator: 10.3.3.3, priority: 10, weight: 50

Uptime: 02:04:48, state: up, local

Locator: 10.4.4.4, priority: 10, weight: 50

Uptime: 02:03:27, state: up

Registering more-specific dynamic-EIDs

Registering routes: disabled

Map-Server(s): none configured, use global Map-Server

Site-based multicast Map-Notify group: 225.1.1.1

Extended Subnet Mode configured on 1 interfaces

Number of roaming dynamic-EIDs discovered: 1

Last dynamic-EID discovered: 172.16.54.1, 00:00:14 ago

Roaming dynamic-EIDs:

172.16.54.200, Vlan2, uptime: 00:04:28, last activity: 00:03:11

Discovered by: packet reception

N7K-FA8-East_FHR3# sh ip route 172.16.54.200

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

172.16.54.200/32, ubest/mbest: 1/0, attached

*via 172.16.54.200, Vlan2, [240/0], 00:05:00, lisp, dyn-eid

via 172.16.54.200, Vlan2, [250/0], 00:05:10, am

따라서 West FHR에는 VM에 대한 Dynamic EID(예: 172.16.54.200)이 없습니다.

N7K-358-West-FHR1(config)# sh lisp dynamic-eid summary

LISP Dynamic EID Summary for VRF "default"

* = Dyn-EID learned by site-based Map-Notify

! = Dyn-EID learned by routing protocol

^ = Dyn-EID learned by EID-Notify

Dyn-EID Name   Dynamic-EID      Interface     Uptime    Last      Pending

Packet    Ping Count

VM             172.16.54.2      Vlan2         00:33:30  00:00:07  0

West DC의 7단계 xTR은 라우팅 테이블에 null 0 항목을 추가합니다.

N7K-358-West_xTR# sh ip route 172.16.54.200

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

172.16.54.200/32, ubest/mbest: 1/0, attached

*via 172.16.54.200, Null0, [241/0], 00:00:05, lisp, dyn-eid

8단계. 동부 xTR은 EID 알림을 통해 FHR-3에 의해 업데이트되고 East xTR은 마이그레이션된 VM의 접두사를 사용하여 맵 레지스터를 MS에 전송합니다.

N7K-FA8-East_xTR(config)# show lisp dynamic-eid Detail

LISP Dynamic EID Information for VRF "default"

Dynamic-EID name: VM

Database-mapping [0] EID-prefix: 172.16.54.0/24, LSBs: 0x00000001

Locator: 10.11.11.11, priority: 9, weight: 50

Uptime: 02:19:51, state: up, local

Registering more-specific dynamic-EIDs

Registering routes: disabled

Map-Server(s): none configured, use global Map-Server

Site-based multicast Map-Notify group: none configured

Number of roaming dynamic-EIDs discovered: 1

Last dynamic-EID discovered: 172.16.54.1, 00:00:58 ago

Roaming dynamic-EIDs:

172.16.54.200, (null), uptime: 00:17:50, last activity: 00:00:25

Discovered by: EID-Notify

EID-Notify Locators:

10.3.3.3

10.4.4.4

MS_MR#sh lisp site 172.16.54.200

LISP Site Registration Information

Site name: 1

Allowed configured locators: any

Requested EID-prefix:

EID-prefix: 172.16.54.200/32

First registered:     02:02:24

Routing table tag:    0

Origin:               Dynamic, more specific of 172.16.54.0/24

Merge active:         No

Proxy reply:          No

TTL:                  00:03:00

State:                complete

Registration errors:

Authentication failures:   0

Allowed locators mismatch: 0

ETR 10.11.17.1, last registered 00:00:32, no proxy-reply, map-notify

TTL 00:03:00, no merge, hash-function sha1, nonce 0x00000000-0x00000000

state complete, no security-capability

xTR-ID N/A

site-ID N/A

Locator      Local  State      Pri/Wgt  Scope

10.11.11.11  yes    up           9/50   IPv4 none

9단계. 두 xTR 모두 map-cache 항목을 업데이트할 수 있습니다.

VM 마이그레이션 전에 사이트-3의 경우 VM의 IP에 대한 RLOC는 West xTR(10.10.10.10)입니다. VM을 동부 DC로 마이그레이션 후 West xTR이 Site-3에서 트래픽을 수신하면 다음과 같이 East xTR(10.11.11.11)의 새 RLOC 주소를 업데이트하기 위해 Site-3 라우터로 SMR 메시지를 보냅니다.

Site-3#sh ip lisp map-cache

LISP IPv4 Mapping Cache for EID-table default (IID 0), 2 entries

0.0.0.0/0, uptime: 02:03:23, expires: never, via static send map-request

Negative cache entry, action: send-map-request

172.16.54.200/32, uptime: 02:00:22, expires: 23:57:56, via map-reply, complete

Locator      Uptime    State      Pri/Wgt

10.11.11.11  00:02:03  up           9/50

N7K-FA8-East_xTR(config)# show ip lisp map-cache

LISP IP Mapping Cache for VRF "default" (iid 0), 1 entries

* = Locator data counters are cumulative across all EID-prefixes

172.16.20.0/24, uptime: 00:25:24, expires: 23:34:35, via map-reply, auth

Locator      Uptime    State       Priority/  Data      Control       MTU

Weight     in/out    in/out

10.20.20.20  00:25:24  up          10/50      0/0*      0/0          1500

다음을 확인합니다.

이 섹션을 사용하여 컨피그레이션이 제대로 작동하는지 확인합니다.

검증은 5단계.(공정 순서) 섹션의 내용을 다룹니다.

문제 해결

이 섹션에서는 컨피그레이션 문제를 해결하는 데 사용할 수 있는 정보를 제공합니다.

이러한 디버그를 사용하여 제어 환경에서 LISP의 문제를 해결할 수 있습니다.

debug ip lisp mapping control

debug lisp mapping register

debug lisp smr

debug lisp ha

debug lisp loc-reach-algorithm receive-probe

debug lisp loc-reach-algorithm send-probe

debug ip mroute map_notify_addr 32 detail

debug ip lisp mapping data