목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

배경 정보

토폴로지

초기 확인

인터페이스 및 고정 경로 컨피그레이션

설정

최종 확인

소개

이 문서에서는 Cisco IOS® XR 소프트웨어를 사용하여 VRF로의 GRT(Global Routing Table) 간 경로 누수를 구성하는 프로세스에 대해 설명합니다.

사전 요구 사항

요구 사항

다음 주제에 대한 지식을 보유하고 있으면 유용합니다.

- 기본 IP 라우팅에 대한 지식

- Cisco IOS 및 Cisco IOS XR 명령행에 대한 지식

사용되는 구성 요소

이 절차는 Cisco IOS XR의 소프트웨어 릴리스로 제한되지 않으므로 모든 릴리스를 사용하여 다음 단계를 완료할 수 있습니다.

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Cisco IOS XR 소프트웨어가 포함된 라우터

- Cisco IOS 소프트웨어가 포함된 라우터

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우 모든 명령의 잠재적인 영향을 미리 숙지하시기 바랍니다.

배경 정보

이 데모의 목적은 전역 경로 테이블과 vrf  route table on Cisco IOS XR(Cisco IOS XR 경로 테이블)

토폴로지

초기 확인

인터페이스 및 고정 경로 컨피그레이션

ASR9901-1

RP/0/RSP0/CPU0:ASR9901-1#show run interface gi0/0/0/0 Wed Oct 19 15:21:21.122 UTC interface GigabitEthernet0/0/0/0 cdp vrf ORANGE ipv4 address 192.168.10.1 255.255.255.0 !

RP/0/RSP0/CPU0:ASR9901-1#show run router static Tue Feb 7 19:24:42.730 UTC router static vrf ORANGE address-family ipv4 unicast 172.16.20.0/24 192.168.10.2

ASR9901-2

RP/0/RSP0/CPU0:ASR9901-2#show run int gi0/0/0/0

Wed Oct 19 15:40:18.599 UTC

interface GigabitEthernet0/0/0/0

cdp

vrf ORANGE

ipv4 address 192.168.10.2 255.255.255.0

!

RP/0/RSP0/CPU0:ASR9901-2#show run int gi0/0/0/6

Wed Oct 19 15:41:08.593 UTC

interface GigabitEthernet0/0/0/6

cdp

ipv4 address 172.16.20.1 255.255.255.0

!

CISCO 2911-3

CISCO2911-3#show run interface gigabitEthernet0/1

Building configuration...

Current configuration : 100 bytes

!

interface GigabitEthernet0/0

ip address 172.16.20.2 255.255.255.0

duplex auto

speed auto

end

CISCO2911-3#show run | section ip route

ip route 192.168.10.0 255.255.255.0 172.16.20.1

Ping을 사용한 연결 테스트(예: ASR9901-1은 VRF ORANGE에서 ASR9901-2를 ping할 수 있음)

RP/0/RSP0/CPU0:ASR9901-1#ping vrf ORANGE 192.168.10.2

Wed Oct 19 15:57:50.548 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.10.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 2/2/3 ms

ASR9901-2는 GRT(default vrf)에서 CISCO2911-3에 ping할 수 있습니다.

RP/0/RSP0/CPU0:ASR9901-2#ping 172.16.20.2

Wed Oct 19 15:58:05.961 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.16.20.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/2 ms

ASR9K-1(VRF ORANGE)의 서브넷 192.168.10.0/24에서 라우터 2911에 있는 서브넷 172.16.20.0/24으로의 연결성을 테스트하려는 경우, VRF ORANGE와 GRT 간의 연결을 완료하기 위해 ASR9K-2에 구현된 컨피그레이션이 없으므로 이 테스트는 실패해야 합니다.

RP/0/RSP0/CPU0:ASR9901-1#ping 172.16.20.2 vrf ORANGE

Wed Oct 19 19:45:11.801 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.16.20.2, timeout is 2 seconds:

.....

Success rate is 0 percent (0/5)

설정

1단계. ASR9K-2에서 BGP 프로세스를 구성합니다. 이 라우터는 경로 누출을 수행하며 컨피그레이션을 적용해야 하는 곳입니다. BGP 프로세스를 생성하는 것 외에도 일부 네트워크 명령문을 사용하여 유출하려는 접두사가 해당 BGP 테이블에 설치되도록 해야 합니다.

RP/0/RSP0/CPU0:ASR9901-2#show run router bgp

Wed Oct 19 20:21:55.118 UTC

router bgp 100

bgp router-id 10.10.10.10

address-family ipv4 unicast

network 172.16.20.0/24

!

address-family vpnv4 unicast

!

vrf ORANGE

rd 100:100

address-family ipv4 unicast

network 192.168.10.0/24

!

!

!

RP/0/RSP0/CPU0:ASR9901-2#

보시다시피 BGP 인접 디바이스를 생성할 필요가 없습니다. BGP 테이블에 접두사를 배치하려면 BGP가 필요합니다.

2단계. 경로 정책을 구성하십시오. 이러한 정책은 어떤 접두사를 유출할 수 있는지 필터링하는 데 도움이 됩니다. 이 예에서는 route-policy GLOBAL-2-VRF 및 route-policy VRF-2-GLOBAL이 사용됩니다.

RP/0/RSP0/CPU0:ASR9901-2#show run route-policy GLOBAL-2-VRF

Wed Oct 19 20:37:56.548 UTC

route-policy GLOBAL-2-VRF

if destination in (172.16.20.0/24) then

pass

endif

end-policy

!

RP/0/RSP0/CPU0:ASR9901-2#show run route-policy VRF-2-GLOBAL

Wed Oct 19 20:38:10.538 UTC

route-policy VRF-2-GLOBAL

if destination in (192.168.10.0/24 le 32) then

pass

endif

end-policy

!

RP/0/RSP0/CPU0:ASR9901-2#

3단계. 다음 출력에 표시된 대로 VRF를 구성하고 default-vrf route-policy <policy name>에서 import 및 export를 사용하여 이전 단계에서 생성된 route-policy를 적용합니다.

RP/0/RSP0/CPU0:ASR9901-2#show run vrf ORANGE

Wed Oct 19 20:40:38.851 UTC

vrf ORANGE

address-family ipv4 unicast

import from default-vrf route-policy GLOBAL-2-VRF

import route-target

100:100

!

export to default-vrf route-policy VRF-2-GLOBAL

export route-target

100:100

!

!

!

RP/0/RSP0/CPU0:ASR9901-2#

최종 확인

이전 컨피그레이션이 커밋되면 ASR9K-1(VRF ORANGE)의 서브넷 192.168.10.0/24에서 초기에 실패한 라우터 2911에 있는 서브넷 172.16.20.0/24으로의 연결성을 확인할 수 있습니다. 그러나 적절한 컨피그레이션을 통해 이제 이 ping 테스트가 성공했습니다.

RP/0/RSP0/CPU0:ASR9901-1#ping 172.16.20.2 vrf ORANGE

Wed Oct 19 22:07:47.897 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.16.20.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 2/2/3 ms

RP/0/RSP0/CPU0:ASR9901-1#

A debug ip icmp 라우터(2911)에 구성된 경우 라우터가 에코 응답을 ASR9K-1로 다시 전송하는지 확인하는 데 도움이 될 수도 있습니다.

CISCO2911-3#debug ip icmp

ICMP packet debugging is on

CISCO2911-3#

CISCO2911-3#

*Oct 19 21:34:20.069: ICMP: echo reply sent, src 172.16.20.2, dst 192.168.10.1, topology BASE, dscp 0 topoid 0

*Oct 19 21:34:20.073: ICMP: echo reply sent, src 172.16.20.2, dst 192.168.10.1, topology BASE, dscp 0 topoid 0

*Oct 19 21:34:20.077: ICMP: echo reply sent, src 172.16.20.2, dst 192.168.10.1, topology BASE, dscp 0 topoid 0

*Oct 19 21:34:20.077: ICMP: echo reply sent, src 172.16.20.2, dst 192.168.10.1, topology BASE, dscp 0 topoid 0

*Oct 19 21:34:20.081: ICMP: echo reply sent, src 172.16.20.2, dst 192.168.10.1, topology BASE, dscp 0 topoid 0

CISCO2911-3#

또 다른 확인은 접두사가 RIB 및 BGP 테이블에 나타나는지 확인하는 것입니다. 예를 들어 GRT 또는 default-vrf는 다음 정보를 표시합니다.

RP/0/RSP0/CPU0:ASR9901-2#show route

Wed Oct 19 22:15:03.930 UTC

Codes: C - connected, S - static, R - RIP, B - BGP, (>) - Diversion path

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - ISIS, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, su - IS-IS summary null, * - candidate default

U - per-user static route, o - ODR, L - local, G  - DAGR, l - LISP

A - access/subscriber, a - Application route

M - mobile route, r - RPL, t - Traffic Engineering, (!) - FRR Backup path

Gateway of last resort is not set

C    10.88.174.0/24 is directly connected, 1d20h, MgmtEth0/RSP0/CPU0/0

L    10.88.174.223/32 is directly connected, 1d20h, MgmtEth0/RSP0/CPU0/0

L    10.10.10.10/32 is directly connected, 04:33:44, Loopback100

C 172.16.20.0/24 is directly connected, 07:03:18, GigabitEthernet0/0/0/6

L    172.16.20.1/32 is directly connected, 07:03:18, GigabitEthernet0/0/0/6

B 192.168.10.0/24 is directly connected, 03:02:21, GigabitEthernet0/0/0/0 (nexthop in vrf ORANGE)

RP/0/RSP0/CPU0:ASR9901-2#

RP/0/RSP0/CPU0:ASR9901-2#show ip bgp

Wed Oct 19 22:15:13.069 UTC

BGP router identifier 10.10.10.10, local AS number 100

BGP generic scan interval 60 secs

Non-stop routing is enabled

BGP table state: Active

Table ID: 0xe0000000   RD version: 5

BGP main routing table version 5

BGP NSR Initial initsync version 3 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

BGP scan interval 60 secs

Status codes: s suppressed, d damped, h history, * valid, > best

i - internal, r RIB-failure, S stale, N Nexthop-discard

Origin codes: i - IGP, e - EGP, ? - incomplete

Network            Next Hop            Metric LocPrf Weight Path

*> 172.16.20.0/24 0.0.0.0 0 32768 i *> 192.168.10.0/24 0.0.0.0 0 32768 i

Processed 2 prefixes, 2 paths

RP/0/RSP0/CPU0:ASR9901-2#

이제 다음 출력에서는 VRF ORANGE에 대해 표시되는 정보를 보여줍니다.

RP/0/RSP0/CPU0:ASR9901-2#show route vrf ORANGE

Wed Oct 19 22:21:24.559 UTC

Codes: C - connected, S - static, R - RIP, B - BGP, (>) - Diversion path

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - ISIS, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, su - IS-IS summary null, * - candidate default

U - per-user static route, o - ODR, L - local, G  - DAGR, l - LISP

A - access/subscriber, a - Application route

M - mobile route, r - RPL, t - Traffic Engineering, (!) - FRR Backup path

Gateway of last resort is not set

B 172.16.20.0/24 is directly connected, 01:43:49, GigabitEthernet0/0/0/6 (nexthop in vrf default) C 192.168.10.0/24 is directly connected, 07:06:38, GigabitEthernet0/0/0/0

L    192.168.10.2/32 is directly connected, 07:06:38, GigabitEthernet0/0/0/0

RP/0/RSP0/CPU0:ASR9901-2#

RP/0/RSP0/CPU0:ASR9901-2#

RP/0/RSP0/CPU0:ASR9901-2#show bgp vrf ORANGE

Wed Oct 19 22:21:34.887 UTC

BGP VRF ORANGE, state: Active

BGP Route Distinguisher: 100:100

VRF ID: 0x60000003

BGP router identifier 10.10.10.10, local AS number 100

Non-stop routing is enabled

BGP table state: Active

Table ID: 0xe0000012   RD version: 9

BGP main routing table version 9

BGP NSR Initial initsync version 4 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

Status codes: s suppressed, d damped, h history, * valid, > best

i - internal, r RIB-failure, S stale, N Nexthop-discard

Origin codes: i - IGP, e - EGP, ? - incomplete

Network            Next Hop            Metric LocPrf Weight Path

Route Distinguisher: 100:100 (default for vrf ORANGE)

*> 172.16.20.0/24 0.0.0.0 0 32768 i *> 192.168.10.0/24 0.0.0.0 0 32768 i

Processed 2 prefixes, 2 paths