목차

소개

사용

ASR9K - 클래식

ASR9K - eXR

NCSxxxx 플랫폼 및 화이트박스

CRS

Cisco 8xxx

소개

이 문서에서는 TAC 케이스의 문제 발생 시/후 Cisco IOS®-XR 라우터에서 수집할 일반적인 명령 집합에 대해 설명합니다.

사용

명령 목록을 변경 없이 라우터 CLI에 정확히 나열된 대로 붙여넣을 수 있습니다. 특정 명령은 해당 기능이 구현되지 않은 경우 오류가 발생할 수 있습니다. 이는 예상되는 결과이며 어떤 문제도 발생하지 않습니다.

이 전체 목록을 라우터에 복사/붙여넣을 수 있습니다. ssh/telnet 클라이언트에서 로깅을 활성화하기만 하면 캡처할 수 있습니다.

ASR9K - 클래식

term length 0

show platform

admin show platform

show install active summary

show version

show hw-module fpd location all

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show pfm location all

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show controllers np counters all

show drops

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

show virtual-service list

ASR9K - eXR

term length 0

show platform

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show pfm location all

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show controllers np counters all

show drops

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

NCSxxxx 플랫폼 및 화이트박스

이는 모든 NCS 플랫폼(예: NCS6K, NCS5K, NCS55xx, NCS540, NCS560)에 해당되며 이에 국한되지 않습니다.

term length 0

show platform

admin show platform

show inventory

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

show environment

admin show environment

show led

admin show led

show alarms brief system active

show asic-errors all detail location 0/RP0/CPU0

show asic-errors all detail location 0/0/CPU0

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

CRS

term length 0

show platform

admin show platform

show install active summary

show version

show hw-module fpd location all

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

Cisco 8xxx

term length 0

show platform

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

show environment

show led

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show reboot history

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session