목차

질문

응답

CLI 출력

질문

ASR-9901에서는 두 번째 관리 인터페이스가 표시되지 않습니다.

Intf Intf LineP Encap MTU BW

이름 상태 유형(바이트)(Kbps)

—

Nu0 up Null 1500 0

Mg0/RSP0/CPU0/0 up ARPA 1514 100000

Gi0/0/0/0 ARPA 1514 1000000 가동

응답

eXR에서 하나의 MgmtEth를 XR VM에 사용하고 다른 MgmtEth 인터페이스는 관리 VM에 사용할 수 있습니다.

CLI 출력

P/0/RSP1/CPU0:ASR-9904-eXR#show interfaces brief | iMg

10월 10일 목요일 08:07:37.708 HKT

Mg0/RSP0/CPU0/0 up ARPA 1514 10000

Mg0/RSP1/CPU0/0 다운 ARPA 1514 100000

RP/0/RSP1/CPU0:ASR-9904-eXR#admin

10월 10일 목요일 08:07:42.689 HKT

sysadmin-vm:0_RSP0의 콘솔을 사용하여 127.0.0.1에서 synedifier가 연결됨

sysadmin-vm:0_RSP0# show interface ?

설명:관리 인터페이스

가능한 완료:

MgmtEth0/RSP0/0/0

MgmtEth0/RSP1/0/0

| 출력 한정자

<cr>

sysadmin-vm:0_RSP0# show interface

FAQ:

1) 관리 VM에서 관리 인터페이스를 구성할 수 있습니까?

예. 다음과 같이 ip 주소로 구성할 수 있습니다.

sysadmin-vm:0_RSP0(config)# int MgmtEth 0/RSP0/0/0 ?

Possible completions:

arp          Configure static ARP entry

default-gw   Default Gateway address: A.B.C.D

ipv4         IPv4 parameters

mtu          MTU for interface

shutdown     Shut the interface down

sysadmin-vm:0_RSP0(config)#

2) 텔넷/ssh 또는 대역 외 액세스에 이 관리 IP를 사용할 수 있습니까?

아니요. 이 인터페이스는 외부 세계에 노출되지 않습니다.

3) 관리 VM에서 관리 인터페이스의 목적은 무엇입니까?

이 인터페이스는 mgmt를 사용하여 라우터에서 외부 loc로 파일을 복사하는 데 사용할 수 있습니다.인터페이스.

4) 사용자가 관리 VM에서 관리 인터페이스를 종료할 경우 관리자 VM에 대한 액세스 권한을 잃게 됩니까?

아니요, 인터페이스를 종료해도 관리 VM에 대한 액세스가 차단되지 않습니다. 아래에서 확인하십시오.

sysadmin-vm:0_RSP0(config)# interface MgmtEth 0/RSP0/0/0

Wed Mar  31 19:20:15.547 UTC+00:00

sysadmin-vm:0_RSP0(config-MgmtEth-0/RSP0/0/0)# shut

Wed Mar  31 19:20:19.472 UTC+00:00

sysadmin-vm:0_RSP0(config-MgmtEth-0/RSP0/0/0)# commit

Wed Mar  31 19:20:22.438 UTC+00:00

Commit complete.

sysadmin-vm:0_RSP0(config-MgmtEth-0/RSP0/0/0)#

sysadmin-vm:0_RSP0(config-MgmtEth-0/RSP0/0/0)#

sysadmin-vm:0_RSP0(config-MgmtEth-0/RSP0/0/0)# exit

Wed Mar  31 19:20:25.529 UTC+00:00

sysadmin-vm:0_RSP0(config)# exit

Wed Mar  31 19:20:27.353 UTC+00:00

sysadmin-vm:0_RSP0#

sysadmin-vm:0_RSP0#

sysadmin-vm:0_RSP0# sh int

Wed Mar  31 19:20:29.235 UTC+00:00

MgmtEth0/RSP0/0/0  Link encap: Ethernet  HWaddr 02:b3:90:92:72:98

inet  addr: 0.0.0.0

DOWN BROADCAST MULTICAST   MTU:1500  Metric:1    <<< port is down.

RX packets:          0 errors:0 dropped:0 overruns:0   frame:0

TX packets:          5 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:                     0  TX bytes:                   398

sysadmin-vm:0_RSP0# exit

Wed Mar  31 19:20:34.518 UTC+00:00

RP/0/RSP0/CPU0:ASR-9904-E-eXR_NPE1#

RP/0/RSP0/CPU0:ASR-9904-E-eXR_NPE1#

RP/0/RSP0/CPU0:ASR-9904-E-eXR_NPE1#

RP/0/RSP0/CPU0:ASR-9904-E-eXR_NPE1#admin

Wed Mar 31 19:20:36.732 UTC

saavadha connected from 127.0.0.1 using console on sysadmin-vm:0_RSP0

sysadmin-vm:0_RSP0# exit  <<< we are still able to connect to the admin VM.

Wed Mar  31 19:20:41.461 UTC+00:00

RP/0/RSP0/CPU0:ASR-9904-E-eXR_NPE1#

RP/0/RSP0/CPU0:ASR-9904-E-eXR_NPE1#

RP/0/RSP0/CPU0:ASR-9904-E-eXR_NPE1#conf t

Wed Mar 31 19:20:44.587 UTC

RP/0/RSP0/CPU0:ASR-9904-E-eXR_NPE1(config)#exit

RP/0/RSP0/CPU0:ASR-9904-E-eXR_NPE1#

RP/0/RSP0/CPU0:ASR-9904-E-eXR_NPE1#admin conf

Wed Mar 31 19:21:03.263 UTC

Mar 31 19:21:03 : ADMIN-CLI: ERROR: ABORT: Please run this command from admin prompt

RP/0/RSP0/CPU0:ASR-9904-E-eXR_NPE1#admin

Wed Mar 31 19:21:05.319 UTC

saavadha connected from 127.0.0.1 using console on sysadmin-vm:0_RSP0

sysadmin-vm:0_RSP0# con

Possible completions:

config       Manipulate software configuration information

controller   Access to hardware controller data

sysadmin-vm:0_RSP0# config

Wed Mar  31 19:21:09.125 UTC+00:00

Entering configuration mode terminal

sysadmin-vm:0_RSP0(config)# interface MgmtEth 0/RSP0/0/0

Wed Mar  31 19:21:19.887 UTC+00:00

sysadmin-vm:0_RSP0(config-MgmtEth-0/RSP0/0/0)# no shut

Wed Mar  31 19:21:21.662 UTC+00:00

sysadmin-vm:0_RSP0(config-MgmtEth-0/RSP0/0/0)# commit

Wed Mar  31 19:21:23.798 UTC+00:00

Commit complete.

sysadmin-vm:0_RSP0(config-MgmtEth-0/RSP0/0/0)# exit

Wed Mar  31 19:21:25.293 UTC+00:00

sysadmin-vm:0_RSP0(config)# exit

Wed Mar  31 19:21:26.162 UTC+00:00

sysadmin-vm:0_RSP0#

sysadmin-vm:0_RSP0#

sysadmin-vm:0_RSP0# sh int

Wed Mar  31 19:21:27.967 UTC+00:00

MgmtEth0/RSP0/0/0  Link encap: Ethernet  HWaddr 02:b3:90:92:72:98

inet  addr: 0.0.0.0

UP RUNNING BROADCAST MULTICAST   MTU:1500  Metric:1

RX packets:          0 errors:0 dropped:0 overruns:0   frame:0

TX packets:         11 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:                     0  TX bytes:                   906

sysadmin-vm:0_RSP0#