목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

명령 출력

netstat 풀 크기

netstat 디바이스 링크

netstat 게이트

모두 netstat

netstat conn

netstat 홈

관련 정보

소개

이 문서에서는 netstat 명령에 대한 샘플 명령 출력을 제공합니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서는 특정 소프트웨어 및 하드웨어 버전으로 한정되지 않습니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다.현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

명령 출력

netstat 풀 크기

netstat poolsize

MVS TCP/IP Netstat V2R2.1

TCPIP Free pool status:

Object       # alloc     # free      Lo-water    Permit size

======       =======     ======      ========    ===========

ACB            1000         997         993         100

CCB             150         129         129          10

Dat buf         160         157         157          32

Sm dat buf        0           0           0           1

Tiny dat buf      0           0           0           0

Env             750         750         730          75

Lrg env          50          49          49          10

RCB              50          50          50           3

SCB             256         237         236          17

SKCB            256         256         256          17

TCB             256         254         254          17

UCB             100         100          99           6

netstat 디바이스 링크

netstat devlinks

MVS TCP/IP Netstat V2R2.1

Device CIP1              Type: CLAW        Status: Ready

Queue size: 0            Address: 0580

Link CHIP1            Type: IP          Net number: 1

netstat 게이트

netstat gate

MVS TCP/IP Netstat V2R2.1

Known gateways:

NetAddress      FirstHop        Link     Pkt Sz  Subnet Mask     Subnet Value

----------      --------        ------   ------  -----------     ------------

Default         128.207.161.1   CHIP1    1500    {none}

128.207.0.0     {direct}        CHIP1    1500    0.0.255.0       0.0.161.0

모두 netstat

netstat all

MVS TCP/IP Netstat V2R2.1

Client: FTPSRVCE                       Last Touched:   1:52:31

Local Socket: *..FTP-C                 Foreign Socket: *..*

BackoffCount: 0

ClientRcvNxt: 0

ClientSndNxt: 526598377

CongestionWindow: 65535

Local connection name: 1001

Sender frustration level: Contented

Incoming window number: 0

Initial receive sequence number: 0

Initial send sequence number: 526598376

Maximum segment size: 536

Outgoing window number: 0

Precedence: Routine

RcvNxt: 0

Round-trip information:

Smooth trip time:   0.000

Smooth trip variance:   1.500

SlowStartThreshold: 65535

SndNxt: 526598376

SndUna: 526598376

SndWl1: 0

SndWl2: 0

SndWnd: 0

MaxSndWnd: 0

State: Listen

No pending TCP-receive

----

Client: INTCLIEN                       Last Touched:   1:52:39

Local Socket: *..TELNET                Foreign Socket: *..*

BackoffCount: 0

ClientRcvNxt: 0

ClientSndNxt: 524397177

CongestionWindow: 65535

Local connection name: 1000

Sender frustration level: Contented

Incoming window number: 0

Initial receive sequence number: 0

Initial send sequence number: 524397176

Maximum segment size: 536

Outgoing window number: 0

Precedence: Routine

RcvNxt: 0

Round-trip information:

Smooth trip time:   0.000

Smooth trip variance:   1.500

SlowStartThreshold: 65535

SndNxt: 524397176

SndUna: 524397176

SndWl1: 0

SndWl2: 0

SndWnd: 0

MaxSndWnd: 0

State: Listen

No pending TCP-receive

----

netstat conn

netstat conn

MVS TCP/IP Netstat V2R2.1

Active Transmission Blocks

User Id  Conn  Local Socket            Foreign Socket            State

---- --  ----  ----- ------            ------- ------            -----

FTPSRVCE 1001  *..FTP-C                *..*                      Listen

INTCLIEN 1000  *..TELNET               *..*                      Listen

netstat 홈

netstat home

MVS TCP/IP Netstat V2R2.1

Home address list:

Address            Link

-------            ------

128.207.161.2      CHIP1

관련 정보

- IBM/SNA 및 토큰 링 기술 지원

- 기술 지원 및 문서 − Cisco Systems