목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

토폴로지

호환성 매트릭스 검사

업그레이드 절차

사례 연구 트러블슈팅

시나리오 1. 교차 VSL 연결이 없을 때 지연 모드에서 업그레이드

Tandem 대 Stagger

시나리오 2. 이전 이미지가 있는 활성 적중

시나리오 3.Post Switchover The Standby가 다가오지 않음

시나리오 4. 업그레이드 후 ICS SUP는 이전 버전으로 유지

소개

이 문서에서는 Quad-SUP 설정에서 듀얼 홈 방식의 Supervisor 6T를 사용하는 VSS 모드의 Cisco Catalyst 6500 Series 스위치에 대한 단계별 ISSU/eFSU 절차에 대해 설명합니다.

사전 요구 사항

요구 사항

다음 주제에 대한 지식을 보유하고 있으면 유용합니다.

- Catalyst 6500의 QUAD-SUP VSS(Virtual Switching System) 설정 및 구성에 대한 기본 지식

- TFTP/USB/WebUI 메서드를 사용하여 이미지 복사

사용되는 구성 요소

이 문서의 정보는 Cisco IOS® 소프트웨어 릴리스 15.5(1)SY12 이상에서 Cisco Catalyst 6500 가상 스위칭 시스템을 기반으로 합니다

소프트웨어 및 하드웨어 버전.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우 모든 명령의 잠재적인 영향을 미리 숙지하시기 바랍니다.

토폴로지

호환성 매트릭스 검사

1단계. 이 Cisco 문서(https://www.cisco.com/c/en/us/support/switches/catalyst-6500-series-switches/products-release-notes-list.html#anchor142)를 참조하십시오.

2단계. 디바이스 CLI에서 다음 명령을 사용하여 확인합니다.

WS-C6504-E-1#show issu comp-matrix stored

Number of Matrices in Table = 1

(1) Matrix for s2t54-ADVENTERPRISEK9-M(10) - s2t54-ADVENTERPRISEK9-M(10)

==========================================

Start Flag (0xDEADBABE)

My Image ver: 15.5(1)SY13

Peer Version Compatibility

------------ -------------

15.1(2)SY Incomp(1)

15.1(2)SY1 Incomp(1)

15.1(2)SY2 Incomp(1)

15.5(1)SY Dynamic(0)

15.5(1)SY1 Dynamic(0)

15.1(2)SY12 Incomp(1)

15.2(1)SY6 Incomp(1)

15.4(1)SY4 Incomp(1)

15.5(1)SY2 Dynamic(0)

15.5(1)SY3 Dynamic(0)

15.5(1)SY4 Dynamic(0)

15.5(1)SY5 Dynamic(0)

15.5(1)SY6 Dynamic(0)

15.5(1)SY7 Dynamic(0)

15.5(1)SY8 Dynamic(0)

15.5(1)SY9 Dynamic(0)

15.5(1)SY10 Dynamic(0)

15.5(1)SY11 Dynamic(0)

15.5(1)SY12 Dynamic(0)

15.5(1)SY13 Comp(3)

업그레이드 절차

1단계. 새 Cisco IOS 이미지(Cisco IOS Software 릴리스 15.5(1)SY13)가에 있는지 bootdisk,slavebootdisk,ics-bootdisk,slave-ics-bootdisk 확인합니다.

WS-C6504-E-1#dir bootdisk: | i SY13

8 -rw- 167430292 Apr 16 2024 22:55:58 +00:00 s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

WS-C6504-E-1#dir slavebootdisk: | i SY13

19 -rw- 167430292 Apr 16 2024 00:37:58 +00:00 s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

WS-C6504-E-1#dir ics-bootdisk: | i SY13

11 -rw- 167430292 Apr 16 2024 23:06:18 +00:00 s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

WS-C6504-E-1#dir slave-ics-bootdisk: | i SY13

5 -rw- 167430292 Apr 16 2024 23:20:18 +00:00 s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

2단계. VSS가 업그레이드 절차를 실행할 준비가 되었는지 확인하려면 다음 명령을 사용합니다.

WS-C6504-E-1#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 1 day, 4 hours, 41 minutes

Switchovers system experienced = 0

Standby failures = 1

Last switchover reason = none

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 1/1

Current Software state = ACTIVE >> Switch 1 Slot 1 is active

Uptime in current state = 1 day, 4 hours, 41 minutes

Image Version = Cisco IOS Software, s2t54 Software (s2t54-ADVENTERPRISEK9-M), Version 15.5(1)SY12, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2023 by Cisco Systems, Inc.

Compiled Tue 05-Sep-23 11:24 by mcpre

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12;

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 2/1

Current Software state = STANDBY HOT >> Switch 2 Slot 1 is standby

Uptime in current state = 19 hours, 43 minutes

Image Version = Cisco IOS Software, s2t54 Software (s2t54-ADVENTERPRISEK9-M), Version 15.5(1)SY12, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2023 by Cisco Systems, Inc.

Compiled Tue 05-Sep-23 11:24 by mcpre

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12;

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

WS-C6504-E-1#show issu state detail

The system is configured to be upgraded in staggered mode.

4 supervisor nodes are found to be online.

Summary: the system will be upgraded in staggered mode.

Slot = 1/1

RP State = Active

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12;

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

Slot = 2/1

RP State = Standby

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12;

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

Slot = 1/2

RP State = Active-ICS

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12;

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

Slot = 2/2

RP State = Standby-ICS

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12;

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

3단계. 업그레이드 프로세스를issu loadversion 시작하려면 명령을 사용합니다.

이 단계에서는 VSS 대기 섀시가 재부팅되고 새 이미지로 다시 로드되며 새 이미지를 실행하는 SSO(Stateful Switchover) 이중화 모드에서 VSS 대기 섀시로 초기화됩니다. 이 단계는 Bulk sync succeeded(대량 동기화 성공) 메시지에 표시된 대로 섀시 컨피그레이션이 동기화될 때 완료됩니다. 새 이미지가 로드되고 VSS 대기 섀시가 SSO 모드로 전환되는 데 몇 초에서 몇 분 정도 걸릴 수 있습니다.

WS-C6504-E-1#issu loadversion 1/1 bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin 2/1 slavebootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

System configuration has been modified. Save? [yes/no]: y

Building configuration...

[OK]

*Apr 17 00:43:14.195: %ISSU_PROCESS-SW1-3-LOADVERSION: Loadversion sequence will begin in 60 seconds. Enter 'issu abortversion' to cancel.

*Apr 17 00:43:44.195: %ISSU_PROCESS-SW1-6-LOADVERSION_INFO: Resetting Standby shortly

*Apr 17 00:43:44.195: %ISSU_PROCESS-SW1-6-LOADVERSION_INFO: Resetting Standby ICS shortly

*Apr 17 00:43:44.199: %ISSU_PROCESS-SW2_STBY-6-SELF_RELOAD: slot 33 countdown to self-reload started, 30 second delay

*Apr 17 00:43:44.199: %ISSU_PROCESS-SW2-2_STBY-6-SELF_RELOAD: slot 34 countdown to self-reload started, 30 second delay

*Apr 17 00:44:29.195: %ISSU_PROCESS-SW1-6-LOADVERSION_INFO: Standby ICS has gone offline

*Apr 17 00:44:29.195: %ISSU_PROCESS-SW1-6-LOADVERSION_INFO: Standby has gone offline

*Apr 17 00:46:59.195: %ISSU_PROCESS-SW1-6-LOADVERSION_INFO: Standby has come online, wait for Standby ICS

*Apr 17 00:47:44.503: %ISSU_PROCESS-SW1-6-LOADVERSION_INFO: Standby ICS has come online

*Apr 17 00:49:15.363: %ISSU_PROCESS-SW1-6-LOADVERSION_INFO: Standby reached terminal state

*Apr 17 00:49:29.199: %ISSU_PROCESS-SW1-6-LOADVERSION_INFO: Standby ICS reached terminal state, wait for system to settle

*Apr 17 00:49:59.195: %ISSU_PROCESS-SW1-3-LOADVERSION: Loadversion has completed. Please issue the 'issu runversion' command after all modules come online.

*Apr 17 00:49:59.195: %ISSU_PROCESS-SW1-3-LOADVERSION: Loadversion has completed. Please issue the 'issu runversion' command after all modules come online.

4단계. 스탠바이 부팅 변수는 출력의 새 이미지를 show issu state detail 가리켜야 합니다.

WS-C6504-E-1#show issu state detail

The system is configured to be upgraded in in-tandem mode.

4 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 1/1

RP State = Active

ISSU State = Load Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12;bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin,12

Operating Mode = sso

ISSU Sub-State = Load Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

Slot = 2/1

RP State = Standby

ISSU State = Load Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin,12;bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12

Operating Mode = sso

ISSU Sub-State = Load Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin  >> Standby Chassis has been upgraded to latest code

Slot = 1/2

RP State = Active-ICS

ISSU State = Load Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12;bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin,12

Operating Mode = sso

ISSU Sub-State = Load Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

Slot = 2/2

RP State = Standby-ICS

ISSU State = Load Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin,12;bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12

Operating Mode = sso

ISSU Sub-State = Load Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin >> Standby Chassis has been upgraded to latest code

5단계. VSS 대기 섀시가 SSO 이중화 상태에서 새 이미지를 성공적으로 실행하고 VSS 대기 섀시의 모든 라인 카드가 작동 및 온라인 상태인 경우 스위치오버를 강제 수행하려면 issu runversion 명령을 입력합니다. 업그레이드된 VSS 대기 섀시가 새 활성 섀시를 대체하여 새 이미지를 실행합니다. 이전의 활성 섀시는 SSO 모드에서 새 VSS 대기 섀시로 다시 로드되고 초기화되어 이전 이미지를 실행합니다(소프트웨어 업그레이드를 중단하고 이전 이미지를 복원해야 하는 경우). 이 단계는 Bulk sync succeeded(대량 동기화 성공) 메시지에 표시된 대로 섀시 컨피그레이션이 동기화될 때 완료됩니다.

WS-C6504-E-1#issu runversion

This command will reload the Active unit.  Proceed ? [confirm]y

%issu runversion initiated successfully

*Apr 17 00:54:42.707: %ISSU_PROCESS-SW1-2_STBY-6-SELF_RELOAD: slot 18 countdown to self-reload started, 3 second delay

*Apr 17 00:54:44.715: %RF-SW1-5-RF_RELOAD: Self reload. Reason: Admin ISSU runversion CLI

*Apr 17 00:54:46.719: %SYS-SW1-5-SWITCHOVER: Switchover requested by Exec. Reason: Admin ISSU runversion CLI.

Initializing as Virtual Switch STANDBY processor

*Apr 17 00:57:14.023: %VSLP-5-VSL_UP:  Ready for control traffic

*Apr 17 00:57:24.919: %PFREDUN-SW1_STBY-6-STANDBY: Initializing for SSO mode in Default Domain

6단계. 전환이 완료되면 상태를 확인합니다.

WS-C6504-E-1#show issu state detail

The system is configured to be upgraded in in-tandem mode.

4 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/1

RP State = Active

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin,12;bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12

Operating Mode = sso

ISSU Sub-State = Run Version after Switchover

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin >> Switch 2 became the active after switchover

Slot = 1/1

RP State = Standby

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12;

Operating Mode = sso

ISSU Sub-State = Run Version in Progress

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

Slot = 2/2

RP State = Active-ICS

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin,12;bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12

Operating Mode = sso

ISSU Sub-State = Run Version in Progress

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

Slot = 1/2

RP State = Standby-ICS

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12;

Operating Mode = sso

ISSU Sub-State = Run Version in Progress

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin

WS-C6504-E-1#sh redundancy

Redundant System Information :

------------------------------

Available system uptime = 44 minutes

Switchovers system experienced = 1

Standby failures = 0

Last switchover reason = user forced

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 2/1

Current Software state = ACTIVE

Uptime in current state = 7 minutes

Image Version = Cisco IOS Software, s2t54 Software (s2t54-ADVENTERPRISEK9-M), Version 15.5(1)SY13, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2024 by Cisco Systems, Inc.

Compiled Tue 19-Mar-24 06:59 by mcpre

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin,12;bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 1/1

Current Software state = STANDBY HOT

Uptime in current state = 2 minutes

Image Version = Cisco IOS Software, s2t54 Software (s2t54-ADVENTERPRISEK9-M), Version 15.5(1)SY12, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2023 by Cisco Systems, Inc.

Compiled Tue 05-Sep-23 11:24 by mcpre

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12;

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

7단계. 롤백 타이머를 중지하려면 issu acceptversion 명령을 사용합니다. 타이머가 만료되면 업그레이드된 섀시가 다시 로드되고 이전 소프트웨어 버전으로 되돌아가기 때문에 이 과정이 필요합니다.

WS-C6504-E-1# show issu rollback-timer

Rollback Process State = In progress

Configured Rollback Time = 00:45:00

Automatic Rollback Time = 00:37:28

WS-C6504-E-1# issu acceptversion

% Rollback timer stopped. Please issue the commitversion command.

View the rollback timer to see that the rollback process has been stopped:

WS-C6504-E-1# show issu rollback-timer

Rollback Process State = Not in progress >> Rollback Process is stopped after the acceptversion

8단계. 설정에서 FEX(Fabric Extender)가 사용되는 경우 FEX(6800IA)에서 이미지 다운로드 및 업그레이드 절차를 시작하려면 issu runversion fex all 명령을 사용합니다. FEX는 Supervisor6T의 새로운 소프트웨어 번들(여기서는 Cisco IOS Software 릴리스 15.5(1)SY13)에서 이미지 다운로드를 트리거합니다. FEX 스택을 사용하는 경우 마스터는 해당 멤버에서 이미지를 추출합니다.

9단계. 계속하려면 issu commitversion 명령을 입력하여 VSS 대기 섀시를 업그레이드하고 ISSU(In-Service Software Upgrade) 시퀀스를 완료합니다. VSS 대기 섀시가 재부팅되고 새 이미지로 다시 로드되며 새 이미지를 실행하는 SSO 이중화 상태의 VSS 대기 섀시로 초기화됩니다. 이 단계는 대량 동기화 성공 메시지에 표시된 대로 섀시 컨피그레이션이 동기화되고 새 VSS-Standby의 모든 라인 카드가 작동 및 온라인 상태일 때 완료됩니다.

WS-C6504-E-1# issu commitversion

%issu commitversion initiated successfully, upgrade sequence will continue shortly

WS-C6504-E-1#

*Apr 17 01:02:57.607: %ISSU_PROCESS-SW2-3-COMMITVERSION: issu commitversion; Commitversion sequence will begin in 60 seconds. Enter 'issu abortversion' to cancel.

*Apr 17 01:03:27.607: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Resetting Standby shortly

*Apr 17 01:03:27.607: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Resetting Standby ICS shortly

*Apr 17 01:03:27.611: %ISSU_PROCESS-SW1-2_STBY-6-SELF_RELOAD: slot 18 countdown to self-reload started, 30 second delay

*Apr 17 01:03:27.611: %ISSU_PROCESS-SW1_STBY-6-SELF_RELOAD: slot 17 countdown to self-reload started, 30 second delay

*Apr 17 01:04:12.607: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Standby ICS has gone offline

*Apr 17 01:04:12.607: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Standby has gone offline

*Apr 17 01:06:42.607: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Standby has come online, wait for Standby ICS

*Apr 17 01:07:28.315: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Standby ICS has come online

*Apr 17 01:08:59.623: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Standby has reached terminal state

*Apr 17 01:09:12.699: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Standby ICS reached terminal state

*Apr 17 01:09:12.751: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Upgrade has completed, updating boot configuration

Building configuration...

[OK]

10단계. 업그레이드가 완료되었는지 확인합니다.

WS-C6504-E-1#sh redundancy

Redundant System Information :

------------------------------

Available system uptime = 55 minutes

Switchovers system experienced = 1

Standby failures = 1

Last switchover reason = user forced

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 2/1

Current Software state = ACTIVE

Uptime in current state = 17 minutes

Image Version = Cisco IOS Software, s2t54 Software (s2t54-ADVENTERPRISEK9-M), Version 15.5(1)SY13, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2024 by Cisco Systems, Inc.

Compiled Tue 19-Mar-24 06:59 by mcpre

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin,12;bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 1/1

Current Software state = STANDBY HOT

Uptime in current state = 3 minutes

Image Version = Cisco IOS Software, s2t54 Software (s2t54-ADVENTERPRISEK9-M), Version 15.5(1)SY13, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2024 by Cisco Systems, Inc.

Compiled Tue 19-Mar-24 06:59 by mcpre

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin,12;bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12 >> Standby has been upgraded

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

WS-C6504-E-1# show module switch all

Switch Number:     1   Role:  Virtual Switch Standby

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

1    5  Supervisor Engine 2T 10GE w/ CTS (Hot) VS-SUP2T-10G       xxxx

2    5  Supervisor Engine 2T 10GE w/ CTS (CSSO VS-SUP2T-10G       xxxx

3   48  CEF720 48 port 10/100/1000mb Ethernet  WS-X6748-GE-TX     xxxx

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

1  xxxx. xxxx. xxxx to xxxx. xxxx. xxxx 1.5   12.2(50r)SYS 15.5(1)SY13  Ok

2  xxxx. xxxx. xxxx to xxxx. xxxx. xxxx 1.3   12.2(50r)SYS 15.5(1)SY13  Ok

3  xxxx. xxxx. xxxx to xxxx. xxxx. xxxx 3.2   12.2(18r)S1  15.5(1)SY13  Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

1  Policy Feature Card 4       VS-F6K-PFC4        xxxx 1.2    Ok

1  CPU Daughterboard           VS-F6K-MSFC5        xxxx 2.0    Ok

2  Policy Feature Card 4       VS-F6K-PFC4         xxxx 1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5        xxxx 1.4    Ok

3  Centralized Forwarding Card WS-F6700-CFC    xxxx 4.1    Ok

Mod  Online Diag Status

---- -------------------

1  Pass

2  Pass

3  Pass

Switch Number:     2   Role:   Virtual Switch Active

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

1    5  Supervisor Engine 2T 10GE w/ CTS (Acti VS-SUP2T-10G       xxxx

2    5  Supervisor Engine 2T 10GE w/ CTS (CSSO VS-SUP2T-10G       xxxx

3   48  CEF720 48 port 10/100/1000mb Ethernet  WS-X6748-GE-TX     xxxx

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

1  xxxx. xxxx. xxxx to xxxx. xxxx. xxxx 1.5   12.2(50r)SYS 15.5(1)SY13  Ok

2  xxxx. xxxx. xxxx to xxxx. xxxx. xxxx 2.1   12.2(50r)SYS 15.5(1)SY13  Ok

3  xxxx. xxxx. xxxx to xxxx. xxxx. xxxx 3.6   12.2(18r)S1  15.5(1)SY13  Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

1  Policy Feature Card 4       VS-F6K-PFC4        xxxx 1.2    Ok

1  CPU Daughterboard           VS-F6K-MSFC5       xxxx 2.0    Ok

2  Policy Feature Card 4       VS-F6K-PFC4        xxxx 3.0    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       xxxx 3.1    Ok

3  Centralized Forwarding Card WS-F6700-CFC   xxxx 4.1    Ok

Mod  Online Diag Status

---- -------------------

1  Pass

2  Pass

3  Pass

WS-C6504-E-1# sh issu state detail

The system is configured to be upgraded in in-tandem mode.

4 supervisor nodes are found to be online.

Summary: the system will be upgraded in in-tandem mode.

Slot = 2/1

RP State = Active

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin,12;bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

Slot = 1/1

RP State = Standby

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin,12;bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

Slot = 2/2

RP State = Active-ICS

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin,12;bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

Slot = 1/2

RP State = Standby-ICS

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin,12;bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY12.bin,12

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

사례 연구 트러블슈팅

시나리오 1. 교차 VSL 연결이 없을 때 지연 모드에서 업그레이드

WS-C6504-E-1#issu loadversion 1/1 bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin 2/1 slavebootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

WS-C6504-E-1#*Apr 16 23:31:12.528: SW1:  Quad-sup ISSU Staggered mode VSL requirement(Parallel/Cross VSL connectivity) is NOT met. Disable Staggered mode using config cli "no issu upgrade staggered" to perform ISSU in default mode which is In-tandem.

진행할 교차 VSL 연결이 없으므로 요구 사항이 충족되지 않았다는 오류 메시지가 표시됩니다.

스태거링된 를 비활성화하여 업그레이드를 수행할 수 있습니다.

WS-C6504-E-1(conf t)# no issu upgrade staggered

WS-C6504-E-1#issu loadversion 1/1 bootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin 2/1 slavebootdisk:s2t54-adventerprisek9-mz.SPA.155-1.SY13.bin

System configuration has been modified. Save? [yes/no]: y

Building configuration...

[OK]

*Apr 17 00:43:14.195: %ISSU_PROCESS-SW1-3-LOADVERSION: Loadversion sequence will begin in 60 seconds. Enter 'issu abortversion' to cancel.

*Apr 17 00:43:44.195: %ISSU_PROCESS-SW1-6-LOADVERSION_INFO: Resetting Standby shortly

*Apr 17 00:43:44.195: %ISSU_PROCESS-SW1-6-LOADVERSION_INFO: Resetting Standby ICS shortly

Tandem 대 Stagger

VSS를 탠덤 또는 듀얼 슈퍼바이저(SUP)용으로 업그레이드할 수도 있지만, 수퍼바이저의 전체 부팅 기간 동안 섀시 하나가 오프라인 상태가 됩니다.

한 번에 하나의 수퍼바이저가 Sup2T 지연 모드의 기본 모드에서 다시 로드됩니다. 즉, 라인카드가 다시 로드될 준비가 되면 해당 버전을 사용하는 수퍼바이저가 존재하게 됩니다. 라인 카드가 수퍼바이저보다 훨씬 빠르게 다시 로드되므로 결과적으로 섀시의 다운타임이 크게 줄어듭니다.

또한 오래된 프로그램을 사용하는 수퍼바이저를 사용할 수 있으므로 필요한 경우 롤백 시간을 훨씬 단축할 수 있습니다. Sup2T의 경우 기본 모드는 스태거링됩니다.

스태거링된 업그레이드 방법은 이 명령을 사용하여 비활성화할 수 있습니다.

시나리오 2. 이전 이미지가 있는 활성 적중

기본적으로 ISSU Run Version에서 공격을 받을 수 있습니다.

ISSU Run Version(ISSU 실행 버전)에 롤백 타이머가 이미 활성화되어 있습니다. 더 이상 진행할 수 없는 경우 타이머가 자동으로 이전 이미지로 롤백합니다.

ISSU 커밋 버전과 관련하여, 수락된 버전을 제공했으므로 롤백 타이머가 비활성화됩니다. 따라서 이전 이미지로 롤백하려면 이 명령을 수행해야 합니다.

WS-C6504-E-1# issu abortversion

시나리오 3. Post Switchover Standby가 작동 중이 아님

VSL(Virtual Switch Link) 링크를 물리적으로 끊고 USB/TFTP 방법을 사용하여 디바이스를 새 이미지로 업그레이드합니다.

업그레이드 후 디바이스의 전원을 끕니다. VSL 링크를 연결하고 디바이스를 VSS로 가져와서 대기 상태를 형성할 수 있도록 합니다.

시나리오 4. 업그레이드 후 ICS SUP가 이전 버전으로 유지됨

액티브 가 정상적으로 작동하므로 영향을 받지 않는 예비 섀시 또는 스탠바이 섀시에 SUP만 연결합니다.

USB/TFTP 방법을 사용하여 디바이스를 새 이미지로 업그레이드합니다.

그런 다음 전원을 끄고 동일한 슬롯으로 가져와서 이미지가 업그레이드되고 최신 이미지로 다시 In-Chassis Standby(ICS)로 돌아옵니다.