목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

구성

네트워크 다이어그램

구성

다음을 확인합니다.

문제 해결

관련 정보

소개

이 문서에서는 Windows 시스템과 Cisco 라우터 간에 L2TP(Layer 2 Tunneling Protocol) 터널을 구성하는 방법에 대해 설명합니다.

사전 요구 사항

요구 사항

Windows 시스템이 라우터에서 물리적 인터페이스 IP 주소를 ping할 수 있다는 사실을 알고 있는 것이 좋습니다.

사용되는 구성 요소

이 문서는 특정 소프트웨어 및 하드웨어 버전으로 한정되지 않습니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다.현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

구성

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

구성

집계 구성:

Aggregator의 컨피그레이션 예는 다음과 같습니다.

interface GigabitEthernet0/0/1

ip address 192.168.1.1 255.255.255.0

negotiation auto

end

interface Loopback100

ip address 172.16.1.1 255.255.255.255

end

vpdn enable

vpdn-group 1

! Default L2TP VPDN group

accept-dialin

protocol l2tp

virtual-template 1

no l2tp tunnel authentication

interface Virtual-Template1

ip unnumbered Loopback100

peer default ip address pool test

ppp authentication chap callout

ppp ipcp dns 4.2.2.1 4.2.2.2

end

ip local pool test 10.1.1.2 10.1.1.100

Windows 컴퓨터 구성 및 설정

다음 단계를 완료하십시오.

1단계. 네트워크 및 공유 센터를 열고 이 이미지에 표시된 대로 새 연결 또는 네트워크 설정을 클릭합니다.

2단계. Connect to a Workplace(작업 공간에 연결)를 선택하고 Next(다음)를 클릭합니다.

3단계. Use my Internet Connection (VPN)(내 인터넷 연결 사용(VPN))을 선택합니다.

4단계. Aggregator의 IP 주소(이 경우 192.168.1.1)을 입력하고 연결에 이름을 지정하고(이 경우 VPDN으로 이름을 지정) Next(다음)를 클릭합니다.

5단계. 사용자 이름과 비밀번호를 입력하고 Connect(연결)를 클릭합니다.

6단계. 사용자 이름과 비밀번호를 확인합니다.

7단계. 이 이미지에 표시된 대로 처음으로 실패할 수 있습니다.

8단계. Set up the connection anyway(연결 설정)를 클릭하고 Networks 탭을 엽니다.

9단계. 연결(VPDN 위치)을 마우스 오른쪽 버튼으로 클릭하고 속성을 클릭합니다.어그리게이터의 IP 주소 확인(192.168.1.1 참조)

10단계. 옵션>PPP 설정으로 이동하여 이 이미지에 표시된 대로 설정을 확인합니다.

11단계. 이 이미지에 표시된 대로 Security(보안) > Type of VPN(VPN 유형) > Layer 2 Tunneling Protocol with IPsec(IPsec을 사용하는 레이어 2 터널링 프로토콜)으로 이동합니다.

12단계. Data encryption(데이터 암호화) 드롭다운 메뉴 아래에서 No encryption allowed(암호화 허용 안 함) 옵션을 선택합니다.

13단계. Microsoft CHAP 버전 2의 선택을 취소하고 확인을 클릭합니다.

14단계. 네트워크(여기 VPDN)를 열고 연결을 클릭합니다.

15단계. 사용자 이름과 비밀번호를 입력하고 연결을 클릭합니다.

다음을 확인합니다.

1단계. Networks 탭을 다시 열고 네트워크(이 예에서는 VPDN이라는 이름)를 선택하고 상태가 Connected인지 확인합니다.

2단계. 명령 프롬프트를 열고 ipconfig /all 명령을 실행합니다.

IPv4 주소 및 DNS(Domain Name Server)는 PPP IPCP(Internet Protocol Control Protocol) 단계를 완료한 후 Aggregator에서 할당됩니다.

3단계. debug ppp negotiation 명령과 aggregator에서 다른 show 명령을 실행합니다.

Aggregator#

*Apr 12 06:17:38.148: PPP: Alloc Context [38726D0C]

*Apr 12 06:17:38.148: ppp11 PPP: Phase is ESTABLISHING

*Apr 12 06:17:38.148: ppp11 PPP: Using vpn set call direction

*Apr 12 06:17:38.148: ppp11 PPP: Treating connection as a callin

*Apr 12 06:17:38.148: ppp11 PPP: Session handle[A600000B] Session id[11]

*Apr 12 06:17:38.148: ppp11 LCP: Event[OPEN] State[Initial to Starting]

*Apr 12 06:17:38.148: ppp11 PPP: No remote authentication for call-in

*Apr 12 06:17:38.148: ppp11 PPP LCP: Enter passive mode, state[Stopped]

*Apr 12 06:17:38.607: ppp11 LCP: I CONFREQ [Stopped] id 0 len 21

*Apr 12 06:17:38.607: ppp11 LCP:    MRU 1400 (0x01040578)

*Apr 12 06:17:38.607: ppp11 LCP:    MagicNumber 0x795C7CD1 (0x0506795C7CD1)

*Apr 12 06:17:38.607: ppp11 LCP:    PFC (0x0702)

*Apr 12 06:17:38.607: ppp11 LCP:    ACFC (0x0802)

*Apr 12 06:17:38.607: ppp11 LCP:    Callback 6 (0x0D0306)

*Apr 12 06:17:38.608: ppp11 LCP: O CONFREQ [Stopped] id 1 len 10

*Apr 12 06:17:38.608: ppp11 LCP:    MagicNumber 0xF7C3D2B9 (0x0506F7C3D2B9)

*Apr 12 06:17:38.608: ppp11 LCP: O CONFREJ [Stopped] id 0 len 7

*Apr 12 06:17:38.608: ppp11 LCP:    Callback 6 (0x0D0306)

*Apr 12 06:17:38.608: ppp11 LCP: Event[Receive ConfReq-] State[Stopped to REQsent]

*Apr 12 06:17:38.615: ppp11 LCP: I CONFACK [REQsent] id 1 len 10

*Apr 12 06:17:38.615: ppp11 LCP:    MagicNumber 0xF7C3D2B9 (0x0506F7C3D2B9)

*Apr 12 06:17:38.615: ppp11 LCP: Event[Receive ConfAck] State[REQsent to ACKrcvd]

*Apr 12 06:17:38.615: ppp11 LCP: I CONFREQ [ACKrcvd] id 1 len 18

*Apr 12 06:17:38.615: ppp11 LCP:    MRU 1400 (0x01040578)

*Apr 12 06:17:38.615: ppp11 LCP:    MagicNumber 0x795C7CD1 (0x0506795C7CD1)

*Apr 12 06:17:38.616: ppp11 LCP:    PFC (0x0702)

*Apr 12 06:17:38.616: ppp11 LCP:    ACFC (0x0802)

*Apr 12 06:17:38.616: ppp11 LCP: O CONFNAK [ACKrcvd] id 1 len 8

*Apr 12 06:17:38.616: ppp11 LCP:    MRU 1500 (0x010405DC)

*Apr 12 06:17:38.616: ppp11 LCP: Event[Receive ConfReq-] State[ACKrcvd to ACKrcvd]

*Apr 12 06:17:38.617: ppp11 LCP: I CONFREQ [ACKrcvd] id 2 len 18

*Apr 12 06:17:38.617: ppp11 LCP:    MRU 1400 (0x01040578)

*Apr 12 06:17:38.617: ppp11 LCP:    MagicNumber 0x795C7CD1 (0x0506795C7CD1)

*Apr 12 06:17:38.617: ppp11 LCP:    PFC (0x0702)

*Apr 12 06:17:38.617: ppp11 LCP:    ACFC (0x0802)

*Apr 12 06:17:38.617: ppp11 LCP: O CONFNAK [ACKrcvd] id 2 len 8

*Apr 12 06:17:38.617: ppp11 LCP:    MRU 1500 (0x010405DC)

*Apr 12 06:17:38.617: ppp11 LCP: Event[Receive ConfReq-] State[ACKrcvd to ACKrcvd]

*Apr 12 06:17:38.618: ppp11 LCP: I CONFREQ [ACKrcvd] id 3 len 18

*Apr 12 06:17:38.618: ppp11 LCP:    MRU 1500 (0x010405DC)

*Apr 12 06:17:38.618: ppp11 LCP:    MagicNumber 0x795C7CD1 (0x0506795C7CD1)

*Apr 12 06:17:38.618: ppp11 LCP:    PFC (0x0702)

*Apr 12 06:17:38.618: ppp11 LCP:    ACFC (0x0802)

*Apr 12 06:17:38.618: ppp11 LCP: O CONFACK [ACKrcvd] id 3 len 18

*Apr 12 06:17:38.618: ppp11 LCP:    MRU 1500 (0x010405DC)

*Apr 12 06:17:38.618: ppp11 LCP:    MagicNumber 0x795C7CD1 (0x0506795C7CD1)

*Apr 12 06:17:38.618: ppp11 LCP:    PFC (0x0702)

*Apr 12 06:17:38.619: ppp11 LCP:    ACFC (0x0802)

*Apr 12 06:17:38.619: ppp11 LCP: Event[Receive ConfReq+] State[ACKrcvd to Open]

*Apr 12 06:17:38.621: ppp11 LCP: I IDENTIFY [Open] id 4 len 18 magic 0x795C7CD1MSRASV5.20

*Apr 12 06:17:38.621: ppp11 LCP: I IDENTIFY [Open] id 5 len 24 magic 0x795C7CD1MSRAS-0-ADMIN-PC

*Apr 12 06:17:38.621: ppp11 LCP: I IDENTIFY [Open] id 6 len 24 magic 0x795C7CD1Z8Of(U3G.cIwR<#!

*Apr 12 06:17:38.626: ppp11 PPP: Queue IPV6CP code[1] id[7]

*Apr 12 06:17:38.626: ppp11 PPP: Queue IPCP code[1] id[8]

*Apr 12 06:17:38.640: ppp11 PPP: Phase is FORWARDING, Attempting Forward

*Apr 12 06:17:38.640: ppp11 LCP: State is Open

*Apr 12 06:17:38.657: Vi3.1 PPP: Phase is ESTABLISHING, Finish LCP

*Apr 12 06:17:38.657: Vi3.1 PPP: Phase is UP

*Apr 12 06:17:38.657: Vi3.1 IPCP: Protocol configured, start CP. state[Initial]

*Apr 12 06:17:38.657: Vi3.1 IPCP: Event[OPEN] State[Initial to Starting]

*Apr 12 06:17:38.657: Vi3.1 IPCP: O CONFREQ [Starting] id 1 len 10

*Apr 12 06:17:38.657: Vi3.1 IPCP:    Address 172.16.1.1 (0x0306AC100101)

*Apr 12 06:17:38.657: Vi3.1 IPCP: Event[UP] State[Starting to REQsent]

*Apr 12 06:17:38.657: Vi3.1 PPP: Process pending ncp packets

*Apr 12 06:17:38.657: Vi3.1 IPCP: Redirect packet to Vi3.1

*Apr 12 06:17:38.657: Vi3.1 IPCP: I CONFREQ [REQsent] id 8 len 34

*Apr 12 06:17:38.657: Vi3.1 IPCP:    Address 0.0.0.0 (0x030600000000)

*Apr 12 06:17:38.657: Vi3.1 IPCP:    PrimaryDNS 0.0.0.0 (0x810600000000)

*Apr 12 06:17:38.657: Vi3.1 IPCP:    PrimaryWINS 0.0.0.0 (0x820600000000)

*Apr 12 06:17:38.657: Vi3.1 IPCP:    SecondaryDNS 0.0.0.0 (0x830600000000)

*Apr 12 06:17:38.657: Vi3.1 IPCP:    SecondaryWINS 0.0.0.0 (0x840600000000)

*Apr 12 06:17:38.657: Vi3.1 IPCP AUTHOR: Done. Her address 0.0.0.0, we want 0.0.0.0

*Apr 12 06:17:38.657: Vi3.1 IPCP: Pool returned 10.1.1.9

*Apr 12 06:17:38.657: Vi3.1 IPCP: O CONFREJ [REQsent] id 8 len 16

*Apr 12 06:17:38.658: Vi3.1 IPCP:    PrimaryWINS 0.0.0.0 (0x820600000000)

*Apr 12 06:17:38.658: Vi3.1 IPCP:    SecondaryWINS 0.0.0.0 (0x840600000000)

*Apr 12 06:17:38.658: Vi3.1 IPCP: Event[Receive ConfReq-] State[REQsent to REQsent]

*Apr 12 06:17:38.658: Vi3.1 IPV6CP: Redirect packet to Vi3.1

*Apr 12 06:17:38.658: Vi3.1 IPV6CP: I CONFREQ [UNKNOWN] id 7 len 14

*Apr 12 06:17:38.658: Vi3.1 IPV6CP:    Interface-Id F0AA:D7A4:5750:D93E (0x010AF0AAD7A45750D93E)

*Apr 12 06:17:38.658: Vi3.1 LCP: O PROTREJ [Open] id 2 len 20 protocol IPV6CP (0x0107000E010AF0AAD7A45750D93E)

*Apr 12 06:17:38.672: Vi3.1 IPCP: I CONFACK [REQsent] id 1 len 10

*Apr 12 06:17:38.672: Vi3.1 IPCP:    Address 172.16.1.1 (0x0306AC100101)

*Apr 12 06:17:38.672: Vi3.1 IPCP: Event[Receive ConfAck] State[REQsent to ACKrcvd]

*Apr 12 06:17:38.672: Vi3.1 IPCP: I CONFREQ [ACKrcvd] id 9 len 22

*Apr 12 06:17:38.672: Vi3.1 IPCP:    Address 0.0.0.0 (0x030600000000)

*Apr 12 06:17:38.672: Vi3.1 IPCP:    PrimaryDNS 0.0.0.0 (0x810600000000)

*Apr 12 06:17:38.672: Vi3.1 IPCP:    SecondaryDNS 0.0.0.0 (0x830600000000)

*Apr 12 06:17:38.672: Vi3.1 IPCP: O CONFNAK [ACKrcvd] id 9 len 22

*Apr 12 06:17:38.672: Vi3.1 IPCP:    Address 10.1.1.9 (0x03060A010109)

*Apr 12 06:17:38.672: Vi3.1 IPCP:    PrimaryDNS 4.2.2.1 (0x810604020201)

*Apr 12 06:17:38.672: Vi3.1 IPCP:    SecondaryDNS 4.2.2.2 (0x830604020202)

*Apr 12 06:17:38.672: Vi3.1 IPCP: Event[Receive ConfReq-] State[ACKrcvd to ACKrcvd]

*Apr 12 06:17:38.747: Vi3.1 IPCP: I CONFREQ [ACKrcvd] id 10 len 22

*Apr 12 06:17:38.747: Vi3.1 IPCP:    Address 10.1.1.9 (0x03060A010109)

*Apr 12 06:17:38.747: Vi3.1 IPCP:    PrimaryDNS 4.2.2.1 (0x810604020201)

*Apr 12 06:17:38.747: Vi3.1 IPCP:    SecondaryDNS 4.2.2.2 (0x830604020202)

*Apr 12 06:17:38.747: Vi3.1 IPCP: O CONFACK [ACKrcvd] id 10 len 22

*Apr 12 06:17:38.748: Vi3.1 IPCP:    Address 10.1.1.9 (0x03060A010109)

*Apr 12 06:17:38.748: Vi3.1 IPCP:    PrimaryDNS 4.2.2.1 (0x810604020201)

*Apr 12 06:17:38.748: Vi3.1 IPCP:    SecondaryDNS 4.2.2.2 (0x830604020202)

*Apr 12 06:17:38.748: Vi3.1 IPCP: Event[Receive ConfReq+] State[ACKrcvd to Open]

*Apr 12 06:17:38.768: Vi3.1 IPCP: State is Open

*Apr 12 06:17:38.769: Vi3.1 Added to neighbor route AVL tree: topoid 0, address 10.1.1.9

*Apr 12 06:17:38.769: Vi3.1 IPCP: Install route to 10.1.1.9

Aggregator#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi3.1          -          10.1.1.9       -               -               in

Aggregator#show ip interface brief | exclude un

Interface              IP-Address      OK? Method Status                Protocol

GigabitEthernet0/0/1   192.168.1.1   YES manual up                    up

Loopback100            172.16.1.1      YES manual up                    up

4단계. Windows 컴퓨터가 Aggregator 뒤의 원격 네트워크에 연결할 수 있는지 확인합니다(이 경우 Loopback 100 인터페이스).

문제 해결

현재 이 컨피그레이션에 사용할 수 있는 특정 문제 해결 정보가 없습니다.

관련 정보

- VPDN 이해

- T기술 지원 및 문서 - Cisco Systems