목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

배경 이론

관련 제품

표기 규칙

구성

네트워크 다이어그램

구성

다음을 확인합니다.

문제 해결

문제 해결 리소스

문제 해결 명령

관련 정보

소개

이 문서에서는 동일한 T1 PRI에서 수신 및 발신 통화에 대해 액세스 서버를 구성하는 방법에 대해 설명합니다. 수신 및 발신 통화는 모두 트래픽 기반이며 DDR(Dial-on-Demand Routing)을 사용하지만 다른 라우터에는 백업을 제공하지 않습니다. 다이얼인 호출에만 대한 액세스 서버를 구성하려면 수신 비동기 및 ISDN 통화에 대해 PRI를 사용하여 액세스 서버 구성 문서를 참조하십시오. 이 컨피그레이션에 백업을 포함하려면 DDR 백업 구성 및 문제 해결 문서를 참조하십시오.

사전 요구 사항

요구 사항

1단계 - 전화 걸기 및 전화 걸기 클라이언트가 올바르게 설정되었는지 구성 및 확인합니다. 이 컨피그레이션은 중앙 사이트 NAS 컨피그레이션에 중점을 두므로 클라이언트에 대한 샘플 컨피그레이션은 포함되지 않습니다. 일부 클라이언트 샘플 컨피그레이션은 다음과 같습니다.

Dialin Client - NAS로 전화를 거는 디바이스:

- 다이얼러 프로필을 포함한 BRI: 수신 비동기 및 ISDN 통화에 대해 PRI를 사용하여 액세스 서버 구성 - 문서에 제공된 클라이언트 1600 Series 라우터(호스트 이름/소호-01) 구성을 사용합니다.

- 다이얼러 맵을 포함한 BRI: DDR 다이얼러 맵을 사용하여 BRI-BRI 다이얼업 구성 - 문서에 제공된 클라이언트 1600 시리즈 라우터(호스트 이름 maui-soho-01) 구성을 사용합니다.

- PRI: AS5300 ISDN/Async(아웃바운드 DDR)를 사용하여 전화 걸기 - 중앙 사이트 AS5300(호스트 이름 as5300) 구성을 사용합니다. 이 문서에서는 이 문서의 다이얼인 클라이언트로 적합한 액세스 서버의 아웃바운드 DDR을 보여 줍니다.

전화 걸기 클라이언트 - 이 NAS가 다이얼아웃하는 장치:

- 다이얼러 프로필을 포함한 BRI: 다이얼러 프로필을 사용하여 ISDN DDR 구성 - 문서에 제공된 중앙 사이트 3640 시리즈 라우터(호스트 이름 maui-nas-04) 구성을 사용합니다.

- 다이얼러 맵을 포함한 BRI: DDR 다이얼러 맵을 사용하여 BRI-BRI 다이얼업 구성 - 문서에 제공된 중앙 사이트 3640 시리즈 라우터(호스트 이름 maui-nas-05) 구성을 사용합니다.

- PRI: 수신 비동기 및 ISDN 통화에 대해 PRI를 사용하여 액세스 서버 구성 - 문서에 제공된 중앙 사이트 AS5300 시리즈 라우터(호스트 이름 maui-nas-02) 구성을 사용합니다. NAS에서 다이얼하는 디바이스가 T1/E1 PRI 회로가 있는 다른 Access Server인 경우 해당 디바이스를 다이얼인 통화를 수락하는 일반 액세스 서버처럼 구성합니다.

2단계 - Telco 회로가 제대로 작동하는지 확인합니다. show isdn status 명령을 사용하여 BRI 또는 PRI 회로가 올바르게 작동하는지 확인할 수 있습니다. 자세한 내용은 BRI 문제 해결을 위해 show isdn status 명령 사용 문서를 참조하십시오. 또한 아웃바운드 통화에 대해 T1/E1 PRI 회로를 활성화해야 합니다. 이 정보를 확인하려면 Telco에 문의하십시오.

사용되는 구성 요소

이 구성은 아래의 소프트웨어 및 하드웨어 버전을 사용하여 개발 및 테스트되었습니다.

- NAS: Cisco AS5300 - T1 PRI 회로 1개 이 AS5300은 Cisco IOS Software 릴리스 12.2(5)를 실행하고 있습니다.

- 클라이언트: Cisco AS5300 - T1 PRI 회로 1개 이 컨피그레이션은 포함되지 않습니다.

- 클라이언트: Cisco 1600(BRI 회로 1개 포함) 이 컨피그레이션은 포함되지 않습니다.

- 클라이언트: Cisco 804(BRI 회로 1개 포함) 이 컨피그레이션은 포함되지 않습니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 라이브 네트워크에서 작업하는 경우, 사용하기 전에 모든 명령의 잠재적인 영향을 이해해야 합니다.

배경 이론

대부분의 경우 다이얼인 및 다이얼아웃 연결에 동일한 T1/E1 PRI 회로를 사용해야 할 수 있습니다. NAS(Network Access Server)는 여러 ISDN 사용자의 수신 통화를 지원하며 동일한 PRI에서 다른 디바이스로 아웃바운드 통화를 할 수도 있습니다. 아웃바운드 다이얼은 백업 시나리오에서도 사용할 수 있습니다. 백업 시나리오에서는 NAS가 기본 WAN 링크를 손실하는 피어에 다이얼하고 연결할 수 있습니다.

관련 제품

이 컨피그레이션은 T1 또는 PRI 카드가 있는 모든 라우터와 함께 사용할 수 있습니다. 따라서 T1 또는 PRI 카드가 있는 AS5xxx 시리즈 라우터는 이 컨피그레이션을 사용할 수 있습니다. Cisco 2600 및 3600 Series 라우터는 T1/PRI WAN WIC(Interface Card) 또는 Network Module을 사용하여 ISDN 호출을 허용하도록 구성할 수도 있습니다.

이 컨피그레이션은 E1 또는 PRI 포트와 함께 사용하도록 수정할 수도 있습니다. Telco에서 제공하는 라인 인코딩, 프레이밍 및 기타 물리적 특성으로 E1 컨트롤러를 구성합니다. D-channel 컨피그레이션(E1의 경우 Serial x:15 인터페이스)은 여기에 표시된 것과 유사합니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 이 문서에서 사용되는 명령에 대한 추가 정보를 찾으려면 IOS 명령 조회 도구를 사용하십시오.

네트워크 다이어그램

이 문서에서는 아래 다이어그램에 표시된 네트워크 설정을 사용합니다.

구성

동일한 T1/E1 PRI에서 발신 전화를 걸고 수신 통화를 수락하도록 액세스 서버를 구성하는 두 가지 기본 방법이 있습니다. 다이얼러 프로파일 및 다이얼러 로터리 그룹입니다. 각각의 장점과 단점은 다음과 같습니다.

- 다이얼러 로터리 그룹은 구성 및 관리가 더 간단합니다.

- 다이얼러 프로필에는 수신 및 발신 통화마다 별도의 다이얼러 인터페이스가 필요합니다. 많은 수신 및 발신 피어가 있는 경우 컨피그레이션을 생성하고 유지 관리하기가 복잡합니다.

- 다이얼러 프로파일은 클라이언트별 컨피그레이션을 허용합니다. 예를 들어, 특정 클라이언트에 주소 풀 A의 IP 주소가 할당되고 다른 클라이언트는 풀 B의 주소가 할당되도록 지정할 수 있습니다.

- 다이얼러 로터리 그룹에서는 모든 사용자에게 동일한 매개 변수만 적용할 수 있습니다. 사용자별 사용자 지정은 불가능합니다.

- 다이얼러 로터리 그룹에서는 수신 및 발신 통화에 대해 흥미로운 단일 트래픽 정의만 허용합니다. 따라서 수신 통화에 대해 흥미로운 트래픽 정의 하나와 발신 통화에 대해 다른 트래픽 정의를 사용하도록 라우터를 구성할 수 없습니다.

- 다이얼러 프로필은 각 피어에 대해 관심 있는 트래픽 정의를 별도로 허용합니다.

이 문서에서는 NAS의 다이얼러 프로파일 및 다이얼러 로터리 그룹을 사용하는 샘플을 제공합니다. 상황에 적합한 방법을 선택합니다.

다이얼러 프로파일을 사용하는 중앙 액세스 서버(AS5300)

maui-nas-03#show running-config

Building configuration...

Current configuration : 3351 bytes

!

! Last configuration change at 07:25:39 CDT Wed Oct 24 2001

! NVRAM config last updated at 16:37:00 CDT Tue Oct 23 2001

!

version 12.2

service timestamps debug datetime msec show-timezone

service timestamps log datetime msec show-timezone

service password-encryption

!

hostname maui-nas-03

!

aaa new-model

aaa authentication login default local

aaa authentication login NO_AUTHEN none

aaa authentication ppp default local

aaa authorization network default local

enable secret 5 <deleted>

!

username admin password 7 <deleted>

username 800-isdn-client password 7 <deleted>

username 1600-isdn-client password 7 <deleted>

username 5300-client password 7 <deleted>

username lanai-nas-01 password 7 <deleted>

! -- Usernames for local authentication of the call. ! -- The client presents the username/password ! -- and the NAS authenticates the peer.

spe 2/0 2/7

firmware location mica-modem-pw.2.7.3.0.bin

!

resource-pool disable

!

clock timezone CST -6

clock summer-time CDT recurring

ip subnet-zero

!

isdn switch-type primary-ni

! -- Switch-type for this NAS. Obtain this information from the Telco.

isdn voice-call-failure 0

!

controller T1 0

! -- T1 PRI physical controller configuration.

framing esf

! -- Framing for this T1 is Extended Super Frame (ESF). ! -- Obtain this information from the telco.

clock source line primary

! -- T1 0 is the primary clock source for this NAS. ! -- Clock source must be specified for the timing ! -- and synchronization of the T1 carrier.

linecode b8zs

! -- Linecoding for this T1. Obtain this information from the telco.

pri-group timeslots 1-24

! -- For T1 PRI scenarios, all 24 T1 timeslots are assigned ! -- as ISDN PRI channels. The router will now automatically create the ! -- corresponding D-channel: interface Serial 0:23 ! ! -- The configurations for unused T1 controllers are omitted to save space. ! -- Unused T1s can be shutdown.

!

interface Ethernet0

ip address 172.22.53.150 255.255.255.0

!

interface Serial0:23

! -- D-channel configuration for T1 0.

no ip address

encapsulation ppp

dialer pool-member 10

! -- Assign this D-channel as member of dialer pool 10. ! -- Dialer pool 10 is used by interface Dialer 1 and Dialer 2. ! -- All Dialer Interfaces for incoming calls should be configured ! -- to use this pool.

dialer pool-member 50 max-link 10

! -- The D-channel is also a member of dialer pool 50. ! -- Dialer pool 50 is used by interface Dialer 100. ! -- The pool can use a maximum of 10 links and will be used for outgoing calls.

isdn switch-type primary-ni

isdn bchan-number-order ascending

! -- B Channel Outgoing Call Order is ascending. ! -- Contact the Telco to determine whether the ISDN outbound trunk ! -- call selection is configured for ascending or descending on the switch.

no cdp enable

ppp authentication chap

ppp multilink

! -- Allow multlink ppp on this interface.

!

interface FastEthernet0

no ip address

shutdown

duplex auto

speed auto

!

interface Dialer1

description For Dialin ISDN Client - austin-soho-01

ip unnumbered Ethernet0

! -- The interface is unnumbered to conserve IP addresses.

encapsulation ppp

dialer pool 10

! -- Defines the pool of physical resources from which the Dialer ! -- interface may draw B channels as needed. Interface Dialer 2 also ! -- uses this pool. Serial 0:23 is a member of this pool.

dialer remote-name 1600-isdn-client

! -- Specifies remote router authenticated name and must match that used by ! -- the remote router to authenticate itself (which can be different from ! -- the router hostname). The router uses this remote-name to bind the ! -- incoming call to this dialer. without this command calls from ! -- 1600-isdn-client will fail after authentication.

dialer idle-timeout 0

! -- Set an idle-timeout of infinity. ! -- The "zero" option for dialer idle-timeout was introduced in 12.1(3)T.

dialer-group 1

! -- Apply interesting traffic definition from dialer-list 1.

peer default ip address pool DIALIN

! -- Clients are assigned addresses from the ip address pool named "DIALIN".

no fair-queue

ppp authentication chap callin

ppp multilink

!

interface Dialer2

description For Dialin ISDN Client - travis-soho-01

ip unnumbered Ethernet0

encapsulation ppp

dialer pool 10

! -- Defines the pool of physical resources from which the Dialer ! -- interface may draw B channels as needed. Interface Dialer 1 ! -- also uses this pool. Serial 0:23 is a member of this pool.

dialer remote-name 800-isdn-client

! -- Binds incoming calls from user "800-isdn-client" to this dialer.

dialer-group 1

! -- Apply interesting traffic definition from dialer-list 1.

peer default ip address pool DIALIN

pulse-time 0

ppp authentication chap callin

ppp multilink

!

interface Dialer100

description For Dialout Client - lanai-nas-01

ip unnumbered Ethernet0

encapsulation ppp

dialer pool 50

! -- This dialer will draw resources from dialer pool 50 ! -- in which int serial 0:23 is the sole member. ! -- Since this dialer is used for dialout, ! -- the outgoing call will be sent to interface se 0:23.

dialer remote-name lanai-nas-01

! -- Specifies remote router authenticated name and must match that used by ! -- the remote router to authenticate itself ! -- (which can be different from the router hostname).

dialer idle-timeout 900

! -- Idle timeout for incoming calls is 900 seconds (15 mins). ! -- Users that are idle for more than 900 seconds will be dropped.

dialer string 81690 class 56k

!--- Dial 81690 and use the map-class named "56k" (defined below).

dialer load-threshold 1 outbound

! -- This sets the outbound load level for traffic at which ! -- additional connections will be added to the MP bundle load level. ! -- Values range from 1 (unloaded) to 255 (fully loaded). ! -- With a threshold of 1, additional links will be immediately ! -- brought up and added to the bundle.

dialer-group 3

! -- Apply interesting traffic definition from dialer-list 3. ! -- Note: the interesting traffic definition for outbound ! -- calls is different than for incoming calls.

ppp authentication chap

ppp multilink

! -- Allow multlink ppp.

!

router eigrp 69

network 172.22.0.0

auto-summary

no eigrp log-neighbor-changes

!

ip local pool DIALIN 172.22.53.151 172.22.53.159

! -- IP address pools for dialin clients.

ip classless

ip route 172.16.0.0 255.255.0.0 Dialer100

! -- Static route for the 172.16.0.0/16 network. ! -- Interesting Traffic for that network ! -- will be sent to interface Dialer100 and the router ! -- will initiate the outbound call.

no ip http server

ip pim bidir-enable

!

!

map-class dialer 56k

!-- map-class named "56k" that was used with the dialer string in int Dialer100.

dialer isdn speed 56

! -- Set the speed of the call to be 56k (default is 64k). ! -- This may not be neccessary for your connection. Consult your telco ! -- to find out if you need to configure the dial speed to 56k.

access-list 101 remark Interesting traffic definition for dialin clients

access-list 101 deny   eigrp any any

access-list 101 deny   udp any any eq ntp

access-list 101 permit ip any any

! -- EIGRP and NTP traffic are tagged uninteresting for dialin clients.

access-list 103 remark Interesting traffic for link lanai-nas-01

access-list 103 deny   eigrp any any

access-list 103 deny   udp any any eq ntp

access-list 103 permit ip any any

! -- EIGRP and NTP traffic are tagged uninteresting for the outbound dial. ! -- Eventhough the two interesting traffic definitions here are identical, ! -- they can be changed depending on your traffic patterns.

dialer-list 1 protocol ip list 101

!--- Interesting traffic is defined by access-list 101. !--- This is applied to interface Dialer 1 & 2 using the command dialer-group 1. !--- Note: The specified dialer-list number must be the same !--- as the dialer-group number; in this example, defined to be "1".

dialer-list 3 protocol ip list 103

!

line con 0

exec-timeout 0 0

login authentication NO_AUTHEN

line 1 48

line aux 0

line vty 0 4

!

ntp clock-period 17180029

ntp server 172.22.53.1

end

위의 다이얼러 프로파일 컨피그레이션에는 수신 및 발신 통화마다 별도의 다이얼러 인터페이스가 있습니다. 수신 통화에 대한 다이얼러 인터페이스는 다이얼러 1과 다이얼러 2이고 발신 통화에 대한 다이얼러 인터페이스는 다이얼러100입니다. 수신 통화가 인증된 후 라우터는 다이얼러 원격 이름을 기반으로 적절한 다이얼러 인터페이스에 통화를 바인딩합니다. 발신 통화에 대한 다이얼러 인터페이스(다이얼러100)에만 전화를 걸 번호가 있는 다이얼러 문자열이 있습니다. Dialer100에만 다이얼러 load-threshold 명령이 포함되어 있습니다. 이는 인바운드 또는 아웃바운드 로드에 따라 추가 링크를 다이얼할 수 있기 때문입니다(기본값은 아웃바운드).

다음 컨피그레이션에서는 이 시나리오에 다이얼러 로터리 그룹을 사용합니다.

중앙 액세스 서버(로터리 그룹 포함)

maui-nas-03#show running-config

Building configuration...

Current configuration : 2436 bytes

!

! Last configuration change at 08:20:11 CDT Thu Oct 25 2001

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

service password-encryption

!

hostname maui-nas-03

!

aaa new-model

aaa authentication login default local

aaa authentication login NO_AUTHEN none

aaa authentication ppp default local

aaa authorization network default local

enable secret 5 <deleted>

!

username admin password 7 <deleted>

username lanai-nas-01 password 7 <deleted>

username 800-isdn-client password 7 <deleted>

username 1600-isdn-client password 7 <deleted>

spe 2/0 2/7

firmware location mica-modem-pw.2.7.3.0.bin

!

resource-pool disable

!

clock timezone CST -6

clock summer-time CDT recurring

ip subnet-zero

!

isdn switch-type primary-ni

!

controller T1 0

framing esf

clock source line primary

linecode b8zs

pri-group timeslots 1-24

!

! -- The configuration for unused T1 controllers are omitted to save space. ! -- Unused T1s can be shutdown.

!

interface Ethernet0

ip address 172.22.53.150 255.255.255.0

!

interface Serial0:23

! -- D-channel configuration for T1 0.

no ip address

encapsulation ppp

dialer rotary-group 1

! -- T1 0 is a member of rotary group 1. ! -- The rotary group configuration is in interface Dialer 1. ! -- Note: this command was not included in the dialer profile configuration.

isdn switch-type primary-ni

isdn bchan-number-order ascending

no peer default ip address

no cdp enable

ppp authentication chap

ppp multilink

!

interface FastEthernet0

no ip address

shutdown

duplex auto

speed auto

!

interface Dialer1

!--- Configuration for rotary group 1. !--- The Dialer interface number (1) must exactly match rotary group number !--- configured on the physical interfaces(interface Serial 0:23).

ip unnumbered Ethernet0

! -- This dialer is unnumbered to ethernet 0.

encapsulation ppp

dialer in-band

! -- Enable this dialer interface to be a DDR interface.

dialer idle-timeout 900

! -- Idle timeout for incoming calls is 900 seconds (15 mins). ! -- Users that are idle for more than 900 seconds will be dropped. ! -- If dialer in-band is used and a dialer idle-timeout is not defined, then ! -- the default idle-timeout of 120 seconds (2min) will be applied.

dialer map ip 172.16.1.1 name lanai-nas-01 speed 56 broadcast 81690

! -- Dialer map for the outbound dial. Add a dialer map for every router ! -- that needs to be dialed. Inbound calls do not need dialer maps. ! -- They will be dynmamically created.

dialer load-threshold 1 outbound

! -- This sets the outbound load level for Multlink PPP at 1/255.

dialer-group 1

!--- Apply interesting traffic definition from dialer-list 1. ! -- Note: The specified dialer-group number must be the same as ! -- the dialer-list number; in this example, defined to be "1".

peer default ip address pool DIALIN

! -- clients are assigned addresses from the ip address pool named "DIALIN".

no cdp enable

ppp authentication chap

ppp multilink

multilink max-links 5

!

router eigrp 69

network 172.22.0.0

auto-summary

no eigrp log-neighbor-changes

!

ip local pool DIALIN 172.22.53.151 172.22.53.159

ip classless

ip route 172.16.0.0 255.255.0.0 172.16.1.1

ip route 172.16.1.1 255.255.255.255 Dialer1

no ip http server

ip pim bidir-enable

!

!

access-list 101 remark Interesting traffic definition

access-list 101 deny   eigrp any any

access-list 101 deny   udp any any eq ntp

access-list 101 permit ip any any

dialer-list 1 protocol ip list 101

! -- Interesting traffic is defined by dialer-list 1. ! -- This is applied to interface Dialer 1 using dialer-group 1. ! -- The interesting traffic definition for inbound and outbound calls ! -- is the same. If you want different interesting traffic definition ! -- for inbound and outbound calls use dialer profiles.

!

line con 0

login authentication NO_AUTHEN

line 1 48

line aux 0

line vty 0 4

!

ntp clock-period 17179882

ntp server 172.22.53.1

end

위의 다이얼러 로터리 그룹 컨피그레이션에서는 다이얼러 인터페이스에 다이얼아웃에 사용되는 단일 다이얼러 맵이 있습니다. 전화를 걸어야 하는 모든 피어에 대해 다이얼러 맵을 구성합니다.

참고: 걸려오는 전화에는 다이얼러 맵이 동적으로 생성되므로 필요하지 않습니다. 이는 show dialer map 명령을 사용하여 확인할 수 있습니다. 다음은 예입니다.

maui-nas-03#show dialer map

Dynamic dialer map ip 172.22.53.152 name 1600-isdn-client () on Di1

! -- Dynamic dialer map for 1600-isdn-cliet created from Dialer1 ! -- (the rotary group interface).

Dynamic dialer map ip 172.22.53.151 name 800-isdn-client () on Di1

! -- Dynamic dialer map for 800-isdn-cliet created from Dialer1 ! -- (the rotary group interface).

Static dialer map ip 172.16.1.1 name lanai-nas-01 (81690) on Di1

! -- Static map configured on Dialer 1 was applied to this link ! -- connected to lanai-nas-01.

다음을 확인합니다.

이 섹션에서는 컨피그레이션이 제대로 작동하는지 확인하는 데 사용할 수 있는 정보를 제공합니다.

특정 show 명령은 show 명령 출력의 분석을 볼 수 있는 출력 인터프리터 도구에서 지원됩니다.

- show isdn status - 라우터가 ISDN 스위치와 제대로 통신하는지 확인합니다. 출력에서 Layer 1 Status가 ACTIVE이고 Layer 2 Status 상태 = MULTIPLE_FRAME_ESTABLISHED가 나타나는지 확인합니다. 이 명령은 활성 통화 수도 표시합니다.

- show ppp multilink - 활성 상태인 멀티링크 번들에 대한 정보를 표시합니다. 이 명령을 사용하여 멀티링크 연결을 확인해야 합니다.

- show dialer [interface type number] - DDR용으로 구성된 인터페이스에 대한 일반 진단 정보를 표시합니다. 다이얼러가 제대로 작동하면 다이얼러 상태가 데이터 링크 계층 위로 메시지입니다. 물리적 레이어가 나타나면 라인 프로토콜이 나타나지만 NCP(Network Control Protocol)는 나타나지 않습니다. 다이얼링을 시작한 패킷의 소스 및 대상 주소가 다이얼 이유 줄에 표시됩니다. 이 show 명령은 타이머의 컨피그레이션 및 연결이 시간 초과되기 전의 시간도 표시합니다.

- show caller user username detail - 지정된 IP 주소, PPP 및 PPP 번들 매개변수 등 특정 사용자에 대한 매개변수를 표시합니다. 사용 중인 버전의 Cisco IOS 소프트웨어가 이 명령을 지원하지 않는 경우 show user 명령을 사용합니다.

- show dialer map - 구성된 동적 및 정적 다이얼러 맵을 표시합니다. 이 명령을 사용하여 동적 다이얼러 맵이 생성되었는지 확인할 수 있습니다. 다이얼러 맵이 없으면 패킷을 라우팅할 수 없습니다.

다음은 성공한 통화에 대한 show 명령 출력입니다. 굵게 표시된 섹션과 출력에 제공된 코멘트를 확인합니다. 가져온 출력을 아래 표시된 결과와 비교합니다.

maui-nas-03#show isdn status

Global ISDN Switchtype = primary-ni

ISDN Serial0:23 interface

dsl 0, interface ISDN Switchtype = primary-ni

Layer 1 Status:

ACTIVE

Layer 2 Status:

TEI = 0, Ces = 1, SAPI = 0, State = MULTIPLE_FRAME_ESTABLISHED

! -- Layer 1 is ACTIVE and Layer 2 is MULTIPLE FRAME ESTABLISHED.

Layer 3 Status:

0 Active Layer 3 Call(s)

Active dsl 0 CCBs = 0

The Free Channel Mask:  0x807FFFFF

Number of L2 Discards = 0, L2 Session ID = 0

Total Allocated ISDN CCBs = 0

maui-nas-03#show isdn service

PRI Channel Statistics:

ISDN Se0:23, Channel [1-24]

Configured Isdn Interface (dsl) 0

Channel State (0=Idle 1=Proposed 2=Busy 3=Reserved 4=Restart 5=Maint_Pend)

Channel :  1 2 3 4 5 6 7 8 9 0 1 2 3 4 5 6 7 8 9 0 1 2 3 4

State   :  0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 3

Service State (0=Inservice 1=Maint 2=Outofservice)

Channel :  1 2 3 4 5 6 7 8 9 0 1 2 3 4 5 6 7 8 9 0 1 2 3 4

State   :  0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 0 2

! -- All channels are Inservice.

maui-nas-03#show user

Line       User       Host(s)              Idle       Location

*  0 con 0                idle                 00:00:00

Interface      User        Mode                     Idle     Peer Address

Di100        lanai-nas- PPP   Bundle        00:00:35 172.16.1.1

! -- Connection to lanai-nas-01 uses int Dialer 100.

Di2          800-isdn-c PPP   Bundle        00:00:22 172.22.53.154

! -- Connection to 800-isdn-client uses int Dialer 2.

Di1          1600-isdn- PPP   Bundle        00:01:29 172.22.53.153

! -- Connection to 1600-isdn-client uses int Dialer 1.

Se0:0        lanai-nas- Sync PPP                    -   Bundle: Di100

Se0:1        lanai-nas- Sync PPP                    -   Bundle: Di100

Se0:2        1600-isdn- Sync PPP                    -   Bundle: Di1

Se0:3        1600-isdn- Sync PPP                    -   Bundle: Di1

Se0:4        lanai-nas- Sync PPP                    -   Bundle: Di100

Se0:5        lanai-nas- Sync PPP                    -   Bundle: Di100

Se0:6        lanai-nas- Sync PPP                    -   Bundle: Di100

Se0:7        800-isdn-c Sync PPP                    -   Bundle: Di2

Se0:8        800-isdn-c Sync PPP                    -   Bundle: Di2

! -- Two B-channels are connected to 800-isdn-client (Se0:7-Se0:8) and ! -- 1600-isdn-client (Se0:2-Se0:3). Five other B-channels ! -- (Se0:0-Se0:1 and Se0:4-Se0:6) are connected to lanai-nas-01.

maui-nas-03#show ppp multilink

Dialer2, bundle name is 800-isdn-client

! -- int Dialer 2 controls multilink bundle to 800-isdn-client.

Bundle up for never

0 lost fragments, 0 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0x8 received sequence, 0xC sent sequence

Member links: 2 (max not set, min not set)

Serial0:7, since 00:00:16, last rcvd seq 000006

Serial0:8, since 00:00:15, last rcvd seq 000007

! -- B-channels Se0:7 and Se0:8 are connected.

Dialer100, bundle name is lanai-nas-01

! -- int Dialer 100 controls multilink bundle to lanai-nas-01.

Bundle up for never

0 lost fragments, 0 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0x33 received sequence, 0x33 sent sequence

Member links: 5 (max not set, min not set)

Serial0:0, since 00:02:08, last rcvd seq 000032

Serial0:1, since 00:02:05, last rcvd seq 00002E

Serial0:4, since 00:01:35, last rcvd seq 00002F

Serial0:5, since 00:01:05, last rcvd seq 000030

Serial0:6, since 00:00:35, last rcvd seq 000031

! -- B-channels Se0:0-Se0:1 and Se0:4-Se0:6 are connected.

Dialer1, bundle name is 1600-isdn-client

! -- int Dialer 100 controls multilink bundle to 1600-isdn-client.

Bundle up for never

0 lost fragments, 1 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0x28 received sequence, 0x7B sent sequence

Member links: 2 (max not set, min not set)

Serial0:2, since 00:06:24, last rcvd seq 000026

Serial0:3, since 00:06:22, last rcvd seq 000027

! -- B-channels Se0:2 and Se0:3 are connected.

문제 해결

이 섹션에서는 컨피그레이션 문제를 해결하는 데 사용할 수 있는 정보를 제공합니다.

문제 해결 리소스

필요에 따라 다음 문제 해결 리소스를 사용합니다.

- 수신 ISDN 통화 문제 해결 - ISDN 통화 실패 문제 해결

- PRI ISDN Call - ISDN 통화 실패 문제 해결에 대한 추가 정보입니다.

- T1 문제 해결 순서도 - T1 회로가 제대로 작동하지 않는다고 생각되면 이 순서도를 사용합니다.

- T1 PRI 문제 해결 - ISDN PRI 회로에 대한 문제 해결 절차

- T1/56K 회선에 대한 루프백 테스트 - 라우터의 T1 포트가 올바르게 작동하는지 확인합니다.

- BRI 문제 해결을 위해 show isdn status 명령 사용 - BRI 문제 해결을 위해 이 문서를 사용합니다.

- debug isdn q931 명령을 사용하여 ISDN BRI Layer 3 문제 해결 - 이 문서 ISDN Layer 3 문제 해결을 사용합니다.

문제 해결 명령

특정 show 명령은 show 명령 출력의 분석을 볼 수 있는 출력 인터프리터 도구에서 지원됩니다.

참고: debug 명령을 실행하기 전에 디버그 명령에 대한 중요 정보를 참조하십시오.

- debug dialer - 다이얼러 인터페이스에서 수신된 패킷에 대한 DDR 디버깅 정보를 표시합니다. 이 정보는 다이얼러 인터페이스를 사용할 수 있는 흥미로운 트래픽이 있는지 확인하는 데 도움이 될 수 있습니다.

- debug isdn q931 - ISDN 네트워크 연결의 통화 설정 및 해제(레이어 3)를 표시합니다.

- debug ppp negotiation - LCP(Link Control Protocol), Authentication 및 NCP(Network Control Protocol)를 협상하는 동안 PPP 트래픽 및 교환에 대한 정보를 표시합니다. 성공적인 PPP 협상이 먼저 LCP 상태를 열고 Authenticate(인증)를 선택한 다음 NCP를 협상합니다. LCP 협상 중에 MRRU(Maximum Receive Reguided Unit)와 같은 멀티링크 매개변수가 설정됩니다.

- debug ppp authentication - CHAP 패킷 교환 및 PAP(Password Authentication Protocol) 교환을 비롯한 PPP 인증 프로토콜 메시지를 표시합니다.

- debug ppp error - PPP 연결 협상 및 작업과 관련된 프로토콜 오류 및 오류 통계를 표시합니다.

다음은 성공적인 발신 통화에 대한 디버그 출력입니다. 굵게 표시된 섹션과 출력에 제공된 코멘트를 확인합니다. 가져온 출력을 아래 표시된 결과와 비교합니다.

maui-nas-03#debug dialer

Dial on demand events debugging is on

maui-nas-03#debug ppp negotiation

PPP protocol negotiation debugging is on

maui-nas-03#debug ppp authentication

PPP authentication debugging is on

maui-nas-03#debug isdn q931

ISDN Q931 packets debugging is on

maui-nas-03#ping 172.16.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.16.1.1, timeout is 2 seconds:

Oct 24 12:56:16.205 UTC: Se0:23 DDR: rotor dialout [priority]

Oct 24 12:56:16.205 UTC: Se0:23 DDR: Dialing cause ip

(s=172.22.53.150, d=172.16.1.1)

! -- The dialing cause is a ping for 172.16.1.1. ! -- ICMP is tagged as interesting.

Oct 24 12:56:16.205 UTC: Se0:23 DDR: Attempting to dial 81690

Oct 24 12:56:16.205 UTC: ISDN Se0:23: TX -> SETUP pd = 8  callref = 0x0063

! -- Outgoing ISDN Q.931 SETUP message.

Oct 24 12:56:16.205 UTC:         Bearer Capability i = 0x8890218F

Oct 24 12:56:16.205 UTC:         Channel ID i = 0xA98381

Oct 24 12:56:16.209 UTC:         Called Party Number i = 0x80, '81690',

Plan:Unknown, Type:Unknown

Oct 24 12:56:16.241 UTC: ISDN Se0:23: RX <- CALL_PROC pd = 8  callref = 0x8063

Oct 24 12:56:16.241 UTC:         Channel ID i = 0xA98381

Oct 24 12:56:16.285 UTC: ISDN Se0:23: RX <- CONNECT pd = 8  callref = 0x8063

! -- Received Q.931 CONNECT message.

Oct 24 12:56:16.297 UTC: %LINK-3-UPDOWN: Interface Serial0:0, changed state to up

Oct 24 12:56:16.297 UTC: Se0:0: interface must be fifo queue, force fifo

Oct 24 12:56:16.297 UTC: %DIALER-6-BIND: Interface Se0:0 bound to profile Di100

Oct 24 12:56:16.297 UTC: Se0:0 PPP: Treating connection as a callout

Oct 24 12:56:16.297 UTC: Se0:0 PPP: Phase is ESTABLISHING,

Active Open [0 sess, 1 load]

Oct 24 12:56:16.301 UTC: Se0:0 LCP: O CONFREQ [Closed] id 12 len 33

Oct 24 12:56:16.301 UTC: Se0:0 LCP:    AuthProto CHAP (0x0305C22305)

Oct 24 12:56:16.301 UTC: Se0:0 LCP:    MagicNumber 0xE384A4CD (0x0506E384A4CD)

Oct 24 12:56:16.301 UTC: Se0:0 LCP:    MRRU 1524 (0x110405F4)

Oct 24 12:56:16.301 UTC: Se0:0 LCP:    EndpointDisc 1 maui-nas-03

(0x130E016D6175692D6E61732D3033)

Oct 24 12:56:16.301 UTC: ISDN Se0:23: TX -> CONNECT_ACK pd = 8  callref = 0x0063

Oct 24 12:56:16.317 UTC: Se0:0 LCP: I CONFREQ [REQsent] id 10 len 34

Oct 24 12:56:16.317 UTC: Se0:0 LCP:    AuthProto CHAP (0x0305C22305)

Oct 24 12:56:16.317 UTC: Se0:0 LCP:    MagicNumber 0x54F49B93 (0x050654F49B93)

Oct 24 12:56:16.321 UTC: Se0:0 LCP:    MRRU 1524 (0x110405F4)

Oct 24 12:56:16.321 UTC: Se0:0 LCP:    EndpointDisc 1 lanai-nas-01

(0x130F016C616E61692D6E61732D3031)

Oct 24 12:56:16.321 UTC: Se0:0 LCP: O CONFACK [REQsent] id 10 len 34

Oct 24 12:56:16.321 UTC: Se0:0 LCP:    AuthProto CHAP (0x0305C22305)

Oct 24 12:56:16.321 UTC: Se0:0 LCP:    MagicNumber 0x54F49B93 (0x050654F49B93)

Oct 24 12:56:16.321 UTC: Se0:0 LCP:    MRRU 1524 (0x110405F4)

Oct 24 12:56:16.321 UTC: Se0:0 LCP:    EndpointDisc 1 lanai-nas-01

(0x130F016C616E61692D6E61732D3031)

Oct 24 12:56:16.325 UTC: Se0:0 LCP: I CONFACK [ACKsent] id 12 len 33

Oct 24 12:56:16.325 UTC: Se0:0 LCP:    AuthProto CHAP (0x0305C22305)

Oct 24 12:56:16.325 UTC: Se0:0 LCP:    MagicNumber 0xE384A4CD (0x0506E384A4CD)

Oct 24 12:56:16.325 UTC: Se0:0 LCP:    MRRU 1524 (0x110405F4)

Oct 24 12:56:16.325 UTC: Se0:0 LCP:    EndpointDisc 1 maui-nas-03

(0x130E016D6175692D6E61732D3033)

Oct 24 12:56:16.325 UTC: Se0:0 LCP: State is Open

! -- LCP negotation is complete.

Oct 24 12:56:16.325 UTC: Se0:0 PPP: Phase is AUTHENTICATING,

by both [0 sess, 1 load]

Oct 24 12:56:16.325 UTC: Se0:0 CHAP: O CHALLENGE id 8 len 32 from "maui-nas-03"

Oct 24 12:56:16.337 UTC: Se0:0 CHAP: I CHALLENGE id 10 len 33 from "lanai-nas-01"

Oct 24 12:56:16.341 UTC: Se0:0 CHAP: O RESPONSE id 10 len 32 from "maui-nas-03"

Oct 24 12:56:16.353 UTC: Se0:0 CHAP: I SUCCESS id 10 len 4

Oct 24 12:56:16.357 UTC: Se0:0 CHAP: I RESPONSE id 8 len 33 from "lanai-nas-01"

Oct 24 12:56:16.361 UTC: Se0:0 CHAP: O SUCCESS id 8 len 4

! -- Two-way CHAP authentication is successful.

Oct 24 12:56:16.361 UTC: Se0:0 PPP: Phase is VIRTUALIZED [0 sess, 1 load]

Oct 24 12:56:16.361 UTC: Di100 DDR: Authenticated host lanai-nas-01

with no matching dialer map

Oct 24 12:56:16.361 UTC: Di100 PPP: Phase is UP [0 sess, 1 load]

Oct 24 12:56:16.361 UTC: Di100 IPCP: O CONFREQ [Closed] id 6 len 10

Oct 24 12:56:16.361 UTC: Di100 IPCP:    Address 172.22.53.150 (0x0306AC163596)

Oct 24 12:56:16.361 UTC: Di100 CDPCP: O CONFREQ [Closed] id 6 len 4

Oct 24 12:56:16.365 UTC: Di100 MLP: Added first link Se0:0 to bundle lanai-nas-01

Oct 24 12:56:16.365 UTC: Di100 PPP: Treating connection as a callout

Oct 24 12:56:16.377 UTC: Di100 IPCP: I CONFREQ [REQsent] id 1 len 10

Oct 24 12:56:16.377 UTC: Di100 IPCP:    Address 172.16.1.1 (0x0306AC100101)

Oct 24 12:56:16.377 UTC: Di100 IPCP: O CONFACK [REQsent] id 1 len 10

Oct 24 12:56:16.377 UTC: Di100 IPCP:    Address 172.16.1.1 (0x0306AC100101)

Oct 24 12:56:16.381 UTC: Di100 IPCP: I CONFACK [ACKsent] id 6 len 10

Oct 24 12:56:16.381 UTC: Di100 IPCP:    Address 172.22.53.150 (0x0306AC163596)

Oct 24 12:56:16.381 UTC: Di100 IPCP: State is Open

Oct 24 12:56:16.381 UTC: Di100 DDR: dialer protocol up

Oct 24 12:56:16.381 UTC: Di100 IPCP: Install route to 172.16.1.1

! -- A route to the peer is installed.

Oct 24 12:56:17.361 UTC: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0:0,

changed state to up

Oct 24 12:56:19.113 UTC: Se0:23 DDR: rotor dialout [priority]

! -- Second call is being dialed.

Oct 24 12:56:19.113 UTC: Se0:23 DDR: Attempting to dial 81690

Oct 24 12:56:19.113 UTC: ISDN Se0:23: TX -> SETUP pd = 8  callref = 0x0064

Oct 24 12:56:19.113 UTC:         Bearer Capability i = 0x8890218F

Oct 24 12:56:19.113 UTC:         Channel ID i = 0xA98382

Oct 24 12:56:19.113 UTC:         Called Party Number i = 0x80, '81690',

Plan:Unknown, Type:Unknown

Oct 24 12:56:19.141 UTC: ISDN Se0:23: RX <- CALL_PROC pd = 8  callref = 0x8064

Oct 24 12:56:19.141 UTC:         Channel ID i = 0xA98382

Oct 24 12:56:19.205 UTC: ISDN Se0:23: RX <- CONNECT pd = 8  callref = 0x8064

Oct 24 12:56:19.217 UTC: %LINK-3-UPDOWN: Interface Serial0:1,

changed state to up

Oct 24 12:56:19.217 UTC: Se0:1: interface must be fifo queue, force fifo

Oct 24 12:56:19.217 UTC: %DIALER-6-BIND: Interface Se0:1 bound to profile Di100

Oct 24 12:56:19.217 UTC: %ISDN-6-CONNECT:

Interface Serial0:0 is now connected to 81690 lanai-nas-01

Oct 24 12:56:19.221 UTC: Se0:1 PPP: Treating connection as a callout

Oct 24 12:56:19.221 UTC: Se0:1 PPP: Phase is ESTABLISHING, Active Open

[0 sess, 1 load]

Oct 24 12:56:19.221 UTC: Se0:1 LCP: O CONFREQ [Closed] id 14 len 33

Oct 24 12:56:19.221 UTC: Se0:1 LCP:    AuthProto CHAP (0x0305C22305)

Oct 24 12:56:19.221 UTC: Se0:1 LCP:    MagicNumber 0xE384B037

(0x0506E384B037)

Oct 24 12:56:19.221 UTC: Se0:1 LCP:    MRRU 1524 (0x110405F4)

Oct 24 12:56:19.221 UTC: Se0:1 LCP:    EndpointDisc 1 maui-nas-03

(0x130E016D6175692D6E61732D3033)

Oct 24 12:56:19.221 UTC: ISDN Se0:23: TX -> CONNECT_ACK pd = 8

callref = 0x0064

Oct 24 12:56:19.241 UTC: Se0:1 LCP: I CONFREQ [REQsent] id 11 len 34

Oct 24 12:56:19.241 UTC: Se0:1 LCP:    AuthProto CHAP (0x0305C22305)

Oct 24 12:56:19.241 UTC: Se0:1 LCP:    MagicNumber 0x54F4A700

(0x050654F4A700)

Oct 24 12:56:19.241 UTC: Se0:1 LCP:    MRRU 1524 (0x110405F4)

Oct 24 12:56:19.241 UTC: Se0:1 LCP:    EndpointDisc 1 lanai-nas-01

(0x130F016C616E61692D6E61732D3031)

Oct 24 12:56:19.241 UTC: Se0:1 LCP: O CONFACK [REQsent] id 11 len 34

Oct 24 12:56:19.241 UTC: Se0:1 LCP:    AuthProto CHAP (0x0305C22305)

Oct 24 12:56:19.241 UTC: Se0:1 LCP:    MagicNumber 0x54F4A700

(0x050654F4A700)

Oct 24 12:56:19.241 UTC: Se0:1 LCP:    MRRU 1524 (0x110405F4)

Oct 24 12:56:19.241 UTC: Se0:1 LCP:    EndpointDisc 1 lanai-nas-01

(0x130F016C616E61692D6E61732D3031)

Oct 24 12:56:19.245 UTC: Se0:1 LCP: I CONFACK [ACKsent] id 14 len 33

Oct 24 12:56:19.245 UTC: Se0:1 LCP:    AuthProto CHAP (0x0305C22305)

Oct 24 12:56:19.245 UTC: Se0:1 LCP:    MagicNumber 0xE384B037 (0x0506E384B037)

Oct 24 12:56:19.245 UTC: Se0:1 LCP:    MRRU 1524 (0x110405F4)

Oct 24 12:56:19.245 UTC: Se0:1 LCP:    EndpointDisc 1 maui-nas-03

(0x130E016D6175692D6E61732D3033)

Oct 24 12:56:19.245 UTC: Se0:1 LCP: State is Open

Oct 24 12:56:19.245 UTC: Se0:1 PPP: Phase is AUTHENTICATING, by both

[0 sess, 1 load]

Oct 24 12:56:19.245 UTC: Se0:1 CHAP: O CHALLENGE id 8 len 32 from "maui-nas-03"

Oct 24 12:56:19.257 UTC: Se0:1 CHAP: I CHALLENGE id 11 len 33 from "lanai-nas-01"

Oct 24 12:56:19.261 UTC: Se0:1 CHAP: O RESPONSE id 11 len 32 from "maui-nas-03"

Oct 24 12:56:19.273 UTC: Se0:1 CHAP: I SUCCESS id 11 len 4

Oct 24 12:56:19.281 UTC: Se0:1 CHAP: I RESPONSE id 8 len 33 from "lanai-nas-01"

Oct 24 12:56:19.281 UTC: Se0:1 CHAP: O SUCCESS id 8 len 4

! -- Authentication is successful.

Oct 24 12:56:19.281 UTC: Se0:1 PPP: Phase is VIRTUALIZED [0 sess, 1 load]

Oct 24 12:56:19.281 UTC: Di100 MLP: Added link Se0:1 to bundle lanai-nas-01

! -- The link is added to the Multilink bundle.

Oct 24 12:56:20.281 UTC: %LINEPROTO-5-UPDOWN: Line protocol on

Interface Serial0:1, changed state to up

Oct 24 12:56:25.221 UTC: %ISDN-6-CONNECT: Interface Serial0:1

is now connected to 81690 lanai-nas-01

Oct 24 12:56:49.117 UTC: Se0:23 DDR: rotor dialout [priority]

! -- Third call is being dialed.

Oct 24 12:56:49.117 UTC: Se0:23 DDR: Attempting to dial 81690

Oct 24 12:56:49.117 UTC: ISDN Se0:23: TX -> SETUP pd = 8  callref = 0x0065

Oct 24 12:56:49.117 UTC:         Bearer Capability i = 0x8890218F

Oct 24 12:56:49.117 UTC:         Channel ID i = 0xA98385

Oct 24 12:56:49.117 UTC:         Called Party Number i = 0x80, '81690',

Plan:Unknown, Type:Unknown

...

...

! -- Output Omitted.

...

Oct 24 12:56:49.261 UTC: Se0:4 PPP: Phase is VIRTUALIZED [0 sess, 1 load]

Oct 24 12:56:49.261 UTC: Di100 MLP: Added link Se0:4 to bundle lanai-nas-01

! -- The 3rd link is added to the bundle.

Oct 24 12:56:50.261 UTC: %LINEPROTO-5-UPDOWN: Line protocol on

Interface Serial0:4, changed state to up

Oct 24 12:56:55.198 UTC: %ISDN-6-CONNECT: Interface Serial0:4

is now connected to 81690 lanai-nas-01

...

...

...

관련 정보

- AS5300 ISDN/Async(아웃바운드 DDR)를 사용하여 전화 걸기

- Technical Support - Cisco Systems