목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

배경 이론

구성

네트워크 다이어그램

구성 1: 풀 범위의 여러 모뎀

구성 2: 풀에 있는 하나의 모뎀

구성 3: 풀 범위 없는 모뎀 풀링

다음을 확인합니다.

문제 해결

관련 정보

소개

이 문서의 샘플 컨피그레이션에서는 PRI(Primary Rate Interface)에 대한 DNIS(Digital Number Identification Service) 지원을 구성하는 방법과 모뎀 풀링을 설정하는 방법을 설명합니다. 3가지 컨피그레이션이 제공됩니다.

1. 풀 범위에 정의된 여러 모뎀이 있는 모뎀 풀링

2. 풀 범위에 있는 하나의 모뎀으로 모뎀 풀링

3. 풀 범위 없는 모뎀 풀링

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 아래 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Cisco IOS® Software 릴리스 11.3(1.1)T 이상

- Telco에서 DNIS 지원을 위해 프로비저닝한 PRI.

- Cisco AS5x00 Series 라우터

참고: Cisco 3600 Series 라우터에서는 모뎀 풀링을 사용할 수 없습니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 라이브 네트워크에서 작업하는 경우, 사용하기 전에 모든 명령의 잠재적인 영향을 이해해야 합니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

배경 이론

인증 프로토콜로 RADIUS(Remote Dial-In User Service)를 사용하는 경우 RADIUS(IETF) 계정 관리 특성 30(Station-ID)을 알아야 합니다.

Station-ID를 사용하면 NAS(Network Access Server)에서 사용자가 Access-Request 패킷의 일부로(DNIS 또는 유사한 기술 사용) 호출한 번호를 보낼 수 있습니다. Station-ID는 PRI와 함께 사용되는 경우 Cisco AS5x00의 ISDN 및 모뎀 통화에서만 지원됩니다.

구성

이 문서에서는 아래 표시된 구성을 사용합니다.

- 풀 범위의 여러 모뎀

- 풀에 있는 하나의 모뎀

- 풀 범위 없는 모뎀 풀링

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 이 문서에서 사용되는 명령에 대한 추가 정보를 찾으려면 명령 조회 도구를 사용하십시오.

네트워크 다이어그램

이 문서에서는 아래 다이어그램에 표시된 네트워크 설정을 사용합니다.

구성 1: 풀 범위의 여러 모뎀

구성 메모

고객이 5557528에 전화를 걸어 풀 범위 3~5의 모뎀에 연결합니다. 회선 3~5는 라우터 프롬프트(>)에 로그인 사용자 ID와 비밀번호를 입력한 후 사용자를 특정 IP 주소로 자동 텔넷하도록 구성되었습니다.

주의: called-number 기능을 구성하고 max-conn 번호를 입력하지 않으면 Cisco 라우터가 기본적으로 풀의 모뎀 수로 설정됩니다. 이 샘플 컨피그레이션에서는 모뎀 3~5가 구성되어 Cisco IOS Software가 called-number 명령의 끝에 max-conn 3을 넣습니다.

풀의 모뎀 수를 변경하는 경우 max-conn 번호를 수동으로 변경해야 합니다.

이 샘플 컨피그레이션에서는 로컬 인증을 사용합니다.

풀 범위의 여러 모뎀

Current configuration:

!

version 11.3

service timestamps debug datetime msec

service password-encryption

service udp-small-servers

service tcp-small-servers

!

hostname isdn2-2

!

aaa new-model

!

username cisco password 7 xxxxxxxxx

!

modem-pool tito

pool-range 3-5

called-number 5557528 max-conn 3

ip domain-name cisco.com

isdn switch-type primary-5ess

clock timezone PST -8

clock summer-time PDT recurring

!

!

controller T1 0

framing esf

clock source line primary

linecode b8zs

pri-group timeslots 1-24

description 5557528 pri

!

controller T1 1

framing esf

clock source line secondary

linecode b8zs

!

interface Loopback0

ip address 10.1.1.1 255.0.0.0

!

interface Ethernet0

ip address 172.16.25.52 255.255.255.240

!

interface Serial0

no ip address

shutdown

!

interface Serial1

no ip address

shutdown

!

interface Serial0:23

no ip address

no ip mroute-cache

isdn incoming-voice modem

no cdp enable

!

interface Group-Async1

no ip address

group-range 1 24

!

router eigrp 202

network 172.16.0.0

distance 90 172.16.25.49 0.0.0.0

distance 255 0.0.0.0 255.255.255.255

no auto-summary

!

ip default-gateway 172.16.25.49

ip classless

ip route 0.0.0.0 0.0.0.0 172.16.25.49

!

line con 0

exec-timeout 0 0

line 1 2

modem InOut

line 3 5

modem InOut

autocommand telnet 10.1.1.1

line 6 24

modem InOut

line aux 0

line vty 0 4

password 7 xxxxx

!

end

isdn2-2#

디버그 및 확인 팁

컨피그레이션이 제대로 작동하는지 확인하려면 show 및 debug 명령을 사용합니다. 이러한 명령의 출력은 다음 출력과 유사해야 합니다.

isdn2-2#show version

Cisco Internetwork Operating System Software

IOS (tm) 5200 Software (C5200-D-L), Version 11.3(1.1)T,

MAINTENANCE INTERIM SOFTWARE

Copyright (c) 1986-1998 by cisco Systems, Inc.

Compiled Sun 11-Jan-98 07:12 by ccai

Image text-base: 0x03034CD4, data-base: 0x00005000

ROM: System Bootstrap, Version 11.1(473), SOFTWARE

isdn2-2 uptime is 18 hours, 41 minutes

System restarted by reload

System image file is "bootflash:c5200-d-l.113-1.1.T", booted via flash

cisco AS5200 (68030) processor (revision 0x00) with 16384K/8192K

bytes of memory.

Processor board ID 03676053

Bridging software.

X.25 software, Version 3.0.0.

Primary Rate ISDN software, Version 1.0.

Mother board without terminator card.

1 Ethernet/IEEE 802.3 interface(s)

26 Serial network interface(s)

24 terminal line(s)

2 Channelized T1/PRI port(s)

128K bytes of non-volatile configuration memory.

8192K bytes of processor board System flash (Read/Write)

8192K bytes of processor board Boot flash (Read ONLY)

Configuration register is 0x2101

isdn2-2#

- 연결된 사용자가 없을 때 모뎀 풀 표시

모뎀 3, 4 및 5가 "tito"라는 모뎀 풀에 대해 구성되었으며 아직 전화를 건 모뎀이 없습니다. 기본 풀은 정의된 모뎀 풀에 대해 구성되지 않은 번호로 전화를 거는 사용자를 위한 것입니다.

isdn2-2#show modem-pool

modem-pool: System-def-Mpool

!--- default pool

modems in pool: 21 active conn: 0

3 no free modems in pool

modem-pool: tito

!--- modem-pool named 'tito'

modems in pool: 3 active conn: 0

0 no free modems in pool

called_party_number: 5557528

max conn allowed: 3, active conn: 0

0 max-conn exceeded, 0 no free modems in pool

- 한 명의 사용자가 연결된 모뎀 풀 표시

한 사용자가 전화를 걸어 모뎀 5에 연결되었습니다. show modem-pool 명령은 풀에 사용된 모뎀을 표시하지 않습니다.

show modem-pool

-------------

modem-pool: tito

modems in pool: 3 active conn: 1

0 no free modems in pool

called_party_number: 5557528

max conn allowed: 3, active conn: 1

0 max-conn exceeded, 0 no free modems in pool

show line 명령은 모뎀 5가 사용되었음을 보여줍니다.

isdn2-2#show line

Tty Typ   Tx/Rx   A Modem Roty AccO AccI Uses  Noise  Overruns

* 0 CTY        -  -   -  -  -   0    0    0/0

1 TTY 115200/115200 - inout   -  -  -   0    0    0/0

2 TTY 115200/115200 - inout   -  -  -   0    0    0/0

3 TTY 115200/115200 - inout   -  -  -   0    0    0/0

4 TTY 115200/115200 - inout   -  -  -   1    0    0/0

* 5 TTY 115200/115200 - inout   -  -  -   1    0    0/0

6 TTY 115200/115200 - inout   -  -  -   0    0    0/0

7 TTY 115200/115200 - inout   -  -  -   0    0    0/0

8 TTY 115200/115200 - inout   -  -  -   0    0    0/0

9 TTY 115200/115200 - inout   -  -  -   0    0    0/0

10 TTY 115200/115200 - inout   -  -  -   0    0    0/0

11 TTY 115200/115200 - inout   -  -  -   0    0    0/0

12 TTY 115200/115200 - inout   -  -  -   0    0    0/0

[remaining output omitted]

- debug isdn q931 명령 사용

원격 사용자가 전화를 건 번호를 확인합니다. 이 번호는 modem-pool에 구성된 번호와 일치해야 합니다. 이 시나리오에서는 사용자의 전화 번호가 중요하지 않습니다.

*Mar 1 18:54:31.951:     Called Party Number i = 0xC1, '4085557528'

참고: 다음 디버그 출력 줄 중 일부는 인쇄 목적으로 여러 행으로 구분됩니다.

isdn2-2#

*Mar 1 18:54:31.935: ISDN Se0:23: RX <- SETUP pd = 8 callref = 0x2B

*Mar 1 18:54:31.939:     Bearer Capability i = 0x9090A2

*Mar 1 18:54:31.939:     Channel ID i = 0xA98393

*Mar 1 18:54:31.943:     Progress Ind i = 0x8381 - Call not end-to-end ISDN,

may have in-band info

*Mar 1 18:54:31.947:     Calling Party Number i = '!', 0x83, '4085559486'

*Mar 1 18:54:31.951:     Called Party Number i = 0xC1, '4085557528'

*Mar 1 18:54:31.963: ISDN Se0:23: Incoming call id = 0xA

*Mar 1 18:54:31.987: ISDN Se0:23: TX -> CALL_PROC pd = 8 callref = 0x802B

*Mar 1 18:54:31.991:     Channel ID i = 0xA98393

*Mar 1 18:54:32.023: ISDN Se0:23: TX -> ALERTING pd = 8 callref = 0x802B

*Mar 1 18:54:33.067: ISDN Se0:23: TX -> CONNECT pd = 8 callref = 0x802B

*Mar 1 18:54:33.143: ISDN Se0:23: RX <- CONNECT_ACK pd = 8 callref = 0x2B

isdn2-2#

- 디버그 isdn Q931 및 디버그 모뎀 csm 출력

사용자가 회선 5 또는 모뎀 5 모뎀(슬롯/포트)=0/4에 연결되어 있습니다. 통화 처리는 라운드 로빈입니다. 첫 번째 모뎀은 3, 두 번째 모뎀은 4, 마지막 모뎀은 5 입니다. 첫 번째 모뎀이 사용 가능한지 여부는 중요하지 않습니다.

isdn2-2# show line 5

TTY Typ   TX/Rx   A Modem Roty AccO AccI Uses  Noise  Overruns

* 5 TTY 115200/115200 - inout   -  -  -   1    0    0/0

Line 5, Location: "", Type: ""

Length: 24 lines, Width: 80 columns

Baud rate (TX/RX) is 115200/115200, no parity, 1 stopbits, 8 databits

Status: Ready, Active, No Exit Banner

Capabilities: Hardware Flowcontrol In, Hardware Flowcontrol Out

Modem Callout, Modem RI is CD

Modem state: Ready

modem(slot/port)=0/4, state=CONNECTED

dsx1(slot/unit/channel)=2/0/18, status=VDEV_STATUS_ACTIVE_CALL.

Modem hardware state: CTS DSR DTR RTS

Special Chars: Escape Hold Stop Start Disconnect Activation

^^x  none  -   -    none

Timeouts:   Idle EXEC  Idle Session  Modem Answer Session  Dispatch

00:10:00    never            none   not set

Idle Session Disconnect Warning

never

Modem type is unknown.

Session limit is not set.

Time since activation: 00:01:35

Editing is enabled.

History is enabled, history size is 10.

DNS resolution in show commands is enabled

Full user help is disabled

Allowed transports are pad telnet rlogin mop. Preferred is telnet.

Automatically execute command "telnet 10.1.1.1"

No output characters are padded

No special data dispatching characters

isdn2-2#

- 디버그 출력

isdn2-2#

%SYS-5-CONFIG_I: Configured from console by console

*Mar 1 19:00:07.227: ISDN Se0:23: RX <- SETUP pd = 8 callref = 0x2D

*Mar 1 19:00:07.227:     Bearer Capability i = 0x9090A2

*Mar 1 19:00:07.231:     Channel ID i = 0xA98393

*Mar 1 19:00:07.235:     Progress Ind i = 0x8381 - Call not end-to-end ISDN,

may have in-band info

*Mar 1 19:00:07.239:     Calling Party Number i = '!', 0x83, '4085559444'

*Mar 1 19:00:07.243:     Called Party Number i = 0xC1, '4085557528'

*Mar 1 19:00:07.255: ISDN Se0:23: Incoming call id = 0xC

*Mar 1 19:00:07.259: EVENT_FROM_ISDN::dchan_idb=0x25B660, call_id=0xC, ces=0x1

bchan=0x12, event=0x1, cause=0x0

*Mar 1 19:00:07.263: VDEV_ALLOCATE: slot 0 and port 4 is allocated.

*Mar 1 19:00:07.263: EVENT_FROM_ISDN:(000C): DEV_INCALL at slot 0 and port 4

*Mar 1 19:00:07.267: CSM_PROC_IDLE: CSM_EVENT_ISDN_CALL at slot 0, port 4

*Mar 1 19:00:07.267: Fast Ringing On at modem slot 0, port 4

*Mar 1 19:00:07.291: ISDN Se0:23: TX -> CALL_PROC pd = 8 callref = 0x802D

*Mar 1 19:00:07.291:     Channel ID i = 0xA98393

*Mar 1 19:00:07.343: ISDN Se0:23: TX -> ALERTING pd = 8 callref = 0x802D

*Mar 1 19:00:08.367: Fast Ringing Off at modem slot 0, port 4

*Mar 1 19:00:08.367: CSM_PROC_IC1_RING: CSM_EVENT_MODEM_OFFHOOK at slot 0, port 4

*Mar 1 19:00:08.379: ISDN Se0:23: TX -> CONNECT pd = 8 callref = 0x802D

*Mar 1 19:00:08.451: ISDN Se0:23: RX <- CONNECT_ACK pd = 8 callref = 0x2D

*Mar 1 19:00:08.463: EVENT_FROM_ISDN::dchan_idb=0x25B660, call_id=0xC, ces=0x1

bchan=0x12, event=0x4, cause=0x0

*Mar 1 19:00:08.467: EVENT_FROM_ISDN:(000C): DEV_CONNECTED at slot 0 and port 4

*Mar 1 19:00:08.471: CSM_PROC_IC4_WAIT_FOR_CARRIER: CSM_EVENT_ISDN_CONNECTED at

slot 0, port 4

*Mar 1 19:00:20.939: TTY5: DSR came up

*Mar 1 19:00:20.947: tty5: Modem: IDLE->READY

*Mar 1 19:00:20.951: TTY5: EXEC creation

- 모뎀 없는 모뎀 풀 표시

다음 출력은 모든 모뎀이 사용 중이고 ISDN 통화 설정에서 거부한 통화를 보여줍니다.

modem-pool: System-def-Mpool

modems in pool: 21 active conn: 0

3 no free modems in pool

modem-pool: tito

modems in pool: 3 active conn: 0

3 no free modems in pool

!--- This number is the number of times it has failed to allocate a modem !--- from the pool. It is not the number of modems in the pool.)

called_party_number: 5557528

max conn allowed: 3, active conn: 0

!--- 3 is the number of modems configured in the pool tito. !--- None are active.

0 max-conn exceeded, 3 no free modems in pool

!--- failed 3 times to allocate a modem from the pool

isdn2-2#debug isdn events

ISDN events debugging is on

isdn2-2#

*Mar 1 19:11:26.471: ISDN Se0:23: RX <- SETUP pd = 8 callref = 0x2F

*Mar 1 19:11:26.475:     Bearer Capability i = 0x9090A2

*Mar 1 19:11:26.479:     Channel ID i = 0xA98393

*Mar 1 19:11:26.479:     Progress Ind i = 0x8381

- Call not end-to-end ISDN, may have in-band info

*Mar 1 19:11:26.483:     Calling Party Number i = '!', 0x83, '4085559445'

*Mar 1 19:11:26.487:     Called Party Number i = 0xC1, '4085557528'

*Mar 1 19:11:26.499: ISDN Se0:23: Incoming call id = 0xE

*Mar 1 19:11:26.503: CCPRI, state = 0, serv = 0, int_id = 0,

lo_chan = 19, type = 3, Dsl_Id = 0, callid = E

*Mar 1 19:11:26.507: CCPRI in a Glare situation state 0 serv 0

*Mar 1 19:11:26.511: ISDN Se0:23: received CALL_INCOMING

*Mar 1 19:11:26.511:  extracted channel ie[0-8]= 18 3 A9 83 93 38 34 33 32

*Mar 1 19:11:26.515:

*Mar 1 19:11:26.519: ISDN Se0:23: Event:

Received a Voice call from 4085559445 on B19 at 64 Kb/s

*Mar 1 19:11:26.519: ISDN Se0:23:

CALL_INCOMING: MODEM ERROR 2C: bchan 18, call id E

*Mar 1 19:11:26.535: in CCPRI_ReleaseCall bchan is 13 dsl is 0

*Mar 1 19:11:26.539: leaving CCPRI_ReleaseCall, Allocated CCBs = 0

*Mar 1 19:11:26.543: ISDN Se0:23: entering process_rxstate, CALL_CLEARED

*Mar 1 19:11:26.615: ISDN Se0:23: TX -> RELEASE_COMP pd = 8 callref = 0x802F

*Mar 1 19:11:26.615:     Cause i = 0x80AC - Requested channel not available

isdn2-2#

구성 2: 풀에 있는 하나의 모뎀

풀에 있는 하나의 모뎀

enable password 7 XXXXXXXXXX

!

username cisco password 7 xxxxxxxxxxxx

!

modem-pool tito

pool-range 3

! -- only modem #3 is configured

called-number 5557528 max-conn 1

ip domain-name cisco.com

isdn switch-type primary-5ess

clock timezone PST -8

clock summertime PDT recurring

!

!

디버그 및 확인 팁

컨피그레이션이 제대로 작동하는지 확인하려면 show 명령을 사용합니다. 이 명령의 출력은 다음 출력과 유사해야 합니다.

- 모뎀이 하나 있는 모뎀 풀 표시

다음 출력은 하나의 모뎀으로 구성된 모뎀 풀을 보여줍니다. 두 명의 사용자가 동시에 전화를 걸어 한 명의 사용자가 연결됩니다.

isdn2-2# show modem-pool

modem-pool: System-def-Mpool

modems in pool: 23 active conn: 0

3 no free modems in pool

modem-pool: tito

modems in pool: 1 active conn: 1

4 no free modems in pool

called_party_number: 5557528

max conn allowed: 1, active conn: 1

0 max-conn exceeded, 1 no free modems in pool

isdn2-2# show modem-pool

modem-pool: System-def-Mpool

modems in pool: 23 active conn: 0

3 no free modems in pool

modem-pool: tito

modems in pool: 1 active conn: 1

4 no free modems in pool

called_party_number: 5557528

max conn allowed: 1, active conn: 1

0 max-conn exceeded, 1 no free modems in pool

isdn2-2#

다음 출력에서는 첫 번째 사용자가 연결된 상태로 유지되고 두 번째 사용자가 한 번에 전화를 걸면 통화가 실패합니다.

isdn2-2#

isdn2-2#

*Mar 1 19:38:57.103: ISDN Se0:23: RX <- SETUP pd = 8 callref = 0x33

*Mar 1 19:38:57.107:     Bearer Capability i = 0x9090A2

*Mar 1 19:38:57.111:     Channel ID i = 0xA98394

*Mar 1 19:38:57.111:     Progress Ind i = 0x8381

- Call not end-to-end ISDN, may have in-band info

*Mar 1 19:38:57.115:     Calling Party Number i = '!', 0x83, '4085559474'

*Mar 1 19:38:57.119:     Called Party Number i = 0xC1, '4085557528'

*Mar 1 19:38:57.135: ISDN Se0:23: Incoming call id = 0x12

*Mar 1 19:38:57.139: ISDN Se0:23: CALL_INCOMING: MODEM ERROR 2C: bchan 19,

call id 12

*Mar 1 19:38:57.235: ISDN Se0:23: TX -> RELEASE_COMP pd = 8 callref = 0x8033

*Mar 1 19:38:57.239:     Cause i = 0x80AC - Requested channel not available

isdn2-2#

isdn2-2#show modem-pool

modem-pool: System-def-Mpool

modems in pool: 23 active conn: 0

3 no free modems in pool

modem-pool: tito

modems in pool: 1 active conn: 1

4 no free modems in pool

called_party_number: 5557528

max conn allowed: 1, active conn: 1

1 max-conn exceeded, 1 no free modems in pool

isdn2-2#

두 번째 사용자가 다시 전화를 걸려고 시도하여 실패합니다. max-conn 2개가 초과된 명령문을 확인합니다.

isdn2-2#

*Mar 1 19:40:34.143: ISDN Se0:23: RX <- SETUP pd = 8 callref = 0x34

*Mar 1 19:40:34.147:     Bearer Capability i = 0x9090A2

*Mar 1 19:40:34.147:     Channel ID i = 0xA98394

*Mar 1 19:40:34.151:     Progress Ind i = 0x8381 - Call not end-to-end ISDN,

may have in-band info

*Mar 1 19:40:34.155:     Calling Party Number i = '!', 0x83, '4085559486'

*Mar 1 19:40:34.159:     Called Party Number i = 0xC1, '4085557528'

*Mar 1 19:40:34.171: ISDN Se0:23: Incoming call id = 0x13

*Mar 1 19:40:34.179: ISDN Se0:23: CALL_INCOMING: MODEM ERROR 2C: bchan 19,

call id 13

*Mar 1 19:40:34.267: ISDN Se0:23: TX -> RELEASE_COMP pd = 8 callref = 0x8034

*Mar 1 19:40:34.271:     Cause i = 0x80AC - Requested channel not available

isdn2-2#

isdn2-2#show modem-pool

modem-pool: System-def-Mpool

modems in pool: 23 active conn: 0

3 no free modems in pool

modem-pool: tito

modems in pool: 1 active conn: 1

4 no free modems in pool

called_party_number: 5557528

max conn allowed: 1, active conn: 1

2 max-conn exceeded, 1 no free modems in pool

isdn2-2#

- 비활성화로 인해 첫 번째 사용자가 시간 초과되었을 때 show modem-pool

isdn2-2#show modem-pool

modem-pool: System-def-Mpool

modems in pool: 23 active conn: 0

3 no free modems in pool

modem-pool: tito

modems in pool: 1 active conn: 0

4 no free modems in pool

called_party_number: 5557528

max conn allowed: 1, active conn: 0

2 max-conn exceeded, 1 no free modems in pool

modem-pool: System-def-Mpool

!--- This is the default modem pool

modems in pool: 23 active conn: 0

!--- There are 24 modems installed on this access server, !--- 23 are available to the default pool, the other !--- modem is available only to modem-pool tito

3 no free modems in pool

!--- Three failures to allocate a modem from a pool for a user dialing in

modem-pool: tito

!--- Pool named tito

modems in pool: 1 active conn: 0

!--- One modem configured in this pool, 0 active connections to !--- modems in this pool

4 no free modems in pool

!--- Four failed attempts to allocate a modem to a user that dialed in.

called_party_number: 5557528

!--- This is the number of the Cisco access-server that the remote user dialed.

max conn allowed: 1, active conn: 0

!--- Max connection allowed per pool, 0 active

2 max-conn exceeded, 1 no free modems in pool

!--- Failed twice to allocate a modem to the user because the !--- number of connections was exceeded for that pool)

isdn2-2#

구성 3: 풀 범위 없는 모뎀 풀링

pool-range 3-5 명령 및 max-conn 인수를 제외하고 이 컨피그레이션은 풀 범위 컨피그레이션의 다중 모뎀과 동일합니다.

풀 범위 없는 모뎀 풀링

!

modem-pool tito

called-number 5557528 max-conn 0

ip domain-name cisco.com

isdn switch-type primary-5ess

!

디버그 및 확인 팁

컨피그레이션이 제대로 작동하는지 확인하려면 show 명령을 사용합니다. 이 명령의 출력은 다음 출력과 유사해야 합니다.

- 첫 번째 다이얼 전 모뎀 풀 표시

isdn2-2#show modem-pool

modem-pool: System-def-Mpool

modems in pool: 24 active conn: 1

3 no free modems in pool

modem-pool: tito

modems in pool: 0 active conn: 0

4 no free modems in pool

called_party_number: 5557528

max conn allowed: 0, active conn: 0

0 max-conn exceeded, 0 no free modems in pool

- 사용자 다이얼 후에 연결 실패 후 모뎀 풀 및 디버그 표시

isdn2-2#debug isdn q931

ISDN Q931 packets debugging is on

isdn2-2#debug modem

Modem control/process activation debugging is on

isdn2-2#

*Mar 1 19:56:50.827: ISDN Se0:23: RX <- SETUP pd = 8 callref = 0x38

*Mar 1 19:56:50.827:     Bearer Capability i = 0x9090A2

*Mar 1 19:56:50.831:     Channel ID i = 0xA98393

*Mar 1 19:56:50.835:     Progress Ind i = 0x8381 - Call not end-to-end

ISDN, may have in-band info

*Mar 1 19:56:50.839:     Calling Party Number i = '!', 0x83, '4085559474'

*Mar 1 19:56:50.843:     Called Party Number i = 0xC1, '4085557528'

*Mar 1 19:56:50.851: ISDN Se0:23: Incoming call id = 0x17

*Mar 1 19:56:50.859: ISDN Se0:23: CALL_INCOMING: MODEM ERROR 2C: bchan 18,

call id 17

*Mar 1 19:56:50.947: ISDN Se0:23: TX -> RELEASE_COMP pd = 8 callref = 0x8038

*Mar 1 19:56:50.951:     Cause i = 0x80AC - Requested channel not available

isdn2-2#

isdn2-2#show modem-pool

modem-pool: System-def-Mpool

modems in pool: 24 active conn: 0

3 no free modems in pool

modem-pool: tito

modems in pool: 0 active conn: 0

4 no free modems in pool

called_party_number: 5557528

max conn allowed: 0, active conn: 0

1 max-conn exceeded, 0 no free modems in pool

다음을 확인합니다.

특정 확인 정보는 위의 구성 예를 참조하십시오.

문제 해결

특정 확인 정보는 위의 구성 예를 참조하십시오.

관련 정보

- Technical Support - Cisco Systems