목차

소개

배경 정보

예 1. duplicate-subnets-within-ctx

예 2. dhcp-policy-not-present

소개

이 문서에서는 ACI 결함 F0469의 교정 단계에 대해 설명합니다.

배경 정보

결함:

F0469: fltFvBDConfigIssuesConfig-failed

설명:

이 결함은 Ctx와 연결된 BD(Bridge Domain) 또는/및 AEpG에 대해 정의된 하나 이상의 중복 서브넷이 있을 때 발생합니다.

권장 조치:

이 결함이 표시되면, 다음 작업을 수행합니다.

- Duplicate-subnets-within-ctx 문제: 이 BD가 연결된 Ctx를 찾고 Ctx와 연결된 다른 BD를 모두 찾고, 이전 단계에서 찾은 BD와 연결된 모든 AEpG를 찾고, AEpG 및 Ctx와 연결된 BD에 대해 구성된 단일 서브넷이 없는지 확인합니다.

- dhcp-policy-not-present 문제: 컨피그레이션을 확인하고 BD에서 사용하는 DHCP Pelay 프로파일이 테넌트에 정의되어 있는지 확인합니다.

이 조치로 문제가 해결되지 않으면 기술 지원 파일을 만들고 Cisco TAC에 문의하십시오.

예 1. duplicate-subnets-within-ctx

moquery -c faultInst -f 'fault.Inst.code=="F0469"'

# fault.Inst

code : F0469

ack : no

annotation :

cause : configuration-failed

changeSet : configQual:duplicate-subnets-within-ctx, configSt:failed-to-apply, debugMessage:uni/tn-prj_e34f5d661fdc40829879720415a3dab5/BD-net_7eef8519-0731-43bd-9e3b-849c266dc83b ,uni/tn-prj_e34f5d661fdc40829879720415a3dab5/BD-net_950fc40b-be9a-4663-abdd-79e279aaca26

childAction :

created : 2021-02-26T08:17:51.577+00:00

delegated : yes

descr : BD Configuration failed for uni/tn-prj_e34f5d661fdc40829879720415a3dab5/BD-net_7eef8519-0731-43bd-9e3b-849c266dc83b due to duplicate-subnets-within-ctx: uni/tn-prj_e34f5d661fdc40829879720415a3dab5/BD-net_7eef8519-0731-43bd-9e3b-849c266dc83b ,uni/tn-prj_e34f5d661fdc40829879720415a3dab5/BD-net_950fc40b-be9a-4663-abdd-79e279aaca26

dn : topology/pod-1/node-112/local/svc-policyelem-id-0/uni/bd-[uni/tn-prj_e34f5d661fdc40829879720415a3dab5/BD-net_7eef8519-0731-43bd-9e3b-849c266dc83b]-isSvc-no/bdcfgissues/fault-F0469

domain : tenant

extMngdBy : undefined

highestSeverity : minor

lastTransition : 2021-02-26T08:20:11.597+00:00

lc : raised

modTs : never

occur : 1

origSeverity : minor

prevSeverity : minor

rn : fault-F0469

rule : fv-bdconfig-issues-config-failed

severity : minor

status :

subject : management

type : config

uid :

BD 정보 및 관련 서브넷을 가져옵니다.

apic# moquery -c fvSubnet

apic# moquery -c fvBD

다른 BD에 대해 동일한 VRF(Virtual Routing and Forwarding)(Ctx) 내의 중복을 추적하려면 구축된 서브넷을 확인합니다.

moquery -c fvSubnet | grep ^dn

수정:

서브넷 중복을 수정합니다.

예 2. dhcp-policy-not-present

Site1-apic1# moquery -c faultInst -f 'fault.Inst.code=="F0469"'

Total Objects shown: 2

# fault.Inst

code : F0469

ack : no

alert : no

annotation :

cause : configuration-failed

changeSet : configQual (New: dhcp-policy-not-present), configSt (New: failed-to-apply)

childAction :

created : 2024-01-23T13:43:08.484-05:00

delegated : yes

descr : BD Configuration failed for uni/tn-abc3/BD-BD1 due to dhcp-policy-not-present:

dn : topology/pod-1/node-101/local/svc-policyelem-id-0/uni/bd-[uni/tn-abc3/BD-BD1]-isSvc-no/bdcfgissues/fault-F0469

domain : tenant

extMngdBy : undefined

highestSeverity : minor

lastTransition : 2024-01-23T13:45:53.575-05:00

lc : raised

modTs : never

occur : 1

origSeverity : minor

prevSeverity : minor

rn : fault-F0469

rule : fv-bdconfig-issues-config-failed

severity : minor

status :

subject : management

title :

type : config

uid :

userdom : all

문제의 BD에 대해 구축된 DHCP 레이블을 확인합니다.

Site1-apic1# moquery -c dhcpLbl

# dhcp.Lbl

name : test1

annotation :

childAction :

descr :

dn : uni/tn-abc3/BD-BD1/dhcplbl-test1

extMngdBy :

lcOwn : local

modTs : 2024-01-23T13:46:03.163-05:00

monPolDn : uni/tn-common/monepg-default

nameAlias :

owner : tenant

ownerKey :

ownerTag :

rn : dhcplbl-test1

status :

tag : yellow-green

uid : 15374

userdom : :all:

릴레이 정책이 존재하는지 확인합니다. 이 경우 릴레이 정책이test1 dhcp relay policy입니다. 다음 출력에서는 가 존재하지 않으므로 오류가test1 dhcp relay policy나타나는 것을 볼 수 있습니다.

Site1-apic1# moquery -c dhcpRelayP | grep dn

dn : uni/tn-pk/relayp-PK-Global-DHCP-Relay-Policy

dn : uni/infra/relayp-default

수정:

연결된 해당 정책이 없는 DHCP 레이블을 제거합니다.