목차

소개

시작하기 전에

표기 규칙

사전 요구 사항

사용되는 구성 요소

배경 이론

구성

네트워크 다이어그램

구성

다음을 확인합니다.

문제 해결

관련 정보

소개

이 문서에는 케이블 환경에서 GRE(Generic Routing Encapsulation)에 대한 설명, 구성 및 검증이 포함되어 있습니다.GRE는 IP 터널 내에 다양한 프로토콜 패킷 유형을 캡슐화하는 Cisco에서 개발한 터널링 프로토콜입니다.

시작하기 전에

표기 규칙

문서 표기 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

사전 요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 아래 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Cisco IOS® 소프트웨어 릴리스 12.1(5)T4를 실행하는 케이블 모뎀 uBR924

참고: 다른 Cisco IOS 버전을 사용하는 uBR904와 같은 다른 Cisco 케이블 모뎀 플랫폼에서 GRE 터널을 구성할 수 있지만, 이 기능에 대한 공식 지원은 uBR920용 Cisco IOS 12.1(5)T4 및 uBR910용 Cisco IOS 12.1(3)에서 제공됩니다.

케이블 모뎀 플랫폼

Cisco IOS 소프트웨어 릴리스

uBR920

12.1(5)T4

uBR910

12.1(3) 이상에서

이 컨피그레이션을 실행하려면 두 케이블 모뎀 사이에 IP 연결이 있어야 합니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다.라이브 네트워크에서 작업하는 경우, 사용하기 전에 모든 명령의 잠재적인 영향을 이해해야 합니다.

배경 이론

터널링은 전송 프로토콜 내에서 외부 프로토콜의 패킷을 캡슐화하는 방법을 제공합니다.터널링은 컨피그레이션을 위한 간단한 인터페이스를 제공하기 위해 가상 인터페이스로 구현됩니다.터널 인터페이스는 특정 승객 또는 전송 프로토콜과 연결되지 않지만 표준 포인트 투 포인트 캡슐화 체계를 구현하는 데 필요한 서비스를 제공하도록 설계된 아키텍처입니다.터널은 포인트 투 포인트 링크이며 각 링크에 대해 별도의 터널을 구성해야 합니다.

GRE는 IP 인터네트워크를 통해 원격 지점에서 Cisco 라우터에 대한 가상 포인트 투 포인트 링크를 생성합니다.단일 프로토콜 백본 환경에서 다중 프로토콜 하위 네트워크를 연결함으로써 GRE를 사용하는 IP 터널링을 통해 단일 프로토콜 백본 환경 전체에서 네트워크를 확장할 수 있습니다.CMTS(Cable Modem Termination System)는 Cisco uBR7246, uBR7223 또는 uBR7246VXR와 같은 DOCSIS(Data-over-Cable Service Interface Specifications) 호환 헤드엔드 케이블 라우터입니다.

구성

이 섹션에서는 이 문서에 설명된 기능을 구성하는 정보를 제공합니다.

네트워크 다이어그램

이 문서에서는 아래 다이어그램에 표시된 네트워크 설정을 사용합니다.

이 설정은 두 케이블 모뎀 uBR924-ddd5 및 uBR924-b5db 간에 터널을 생성합니다.아래 예에서는 2개의 uBR924s 및 uBR7246VXR를 사용합니다.이 설정을 위해 케이블 모뎀의 이름은 ubr924-ddd5 및 ubr924-b5db이며 Cisco IOS 버전 12.1(5)T4를 사용합니다. 터널 인터페이스는 명령 인터페이스 터널 0을 실행하여 전역 컨피그레이션 모드에서 동적으로 생성됩니다.

참고: 두 케이블 모뎀 사이에 IP 연결이 있는 한 uBR900 케이블 모뎀은 동일한 uBR7200 CMTS 또는 동일한 통신 사업자의 네트워크에 연결할 필요가 없습니다.

구성

이 문서에서는 아래 표시된 구성을 사용합니다.

참고: 굵은 텍스트는 GRE 관련 명령을 참조합니다.설명은 파란색으로 표시되며 위의 줄을 참조하십시오.

ubr924-ddd5

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ubr924-ddd5

!

logging rate-limit console 10 except errors

!

clock timezone - -80

ip subnet-zero

no ip finger

!

call rsvp-sync

!

!

!

!

!

!

!

!

!

!

interface Tunnel0

!--- Tunnel interface 0.

ip address 192.168.20.1 255.255.255.0

!--- IP address of the GRE tunnel interface 0.

tunnel source Ethernet0

!--- IP source of the tunnel. It is best to make this an !--- interface with a public, routable IP address so that !--- it is reachable from the other endpoint of the tunnel.

tunnel destination 11.11.11.11

!--- IP destination of the tunnel. Make sure this is !--- reachable via the ping command !--- Otherwise, the tunnel will not be created properly.

!

interface Ethernet0

ip address 9.9.9.9 255.255.255.0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

!

interface cable-modem0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

cable-modem downstream saved channel 525000000 40 1

cable-modem mac-timer t2 40000

no cable-modem compliant bridge

!

router rip

version 2

passive-interface Tunnel0

!--- This command is used to avoid recursive routing.

network 10.0.0.0

network 9.0.0.0

no auto-summary

!

ip default-gateway 10.1.4.1

ip classless

no ip http server

no ip http cable-monitor

!

snmp-server packetsize 4096

snmp-server manager

!

voice-port 0

input gain -2

!

voice-port 1

input gain -2

!

!

line con 0

transport input none

line vty 0 4

login

!

end

ubr924-ddd5#

ubr924-b5db

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ubr924-b5db

!

logging rate-limit console 10 except errors

enable password ww

!

clock timezone - -80

ip subnet-zero

no ip finger

!

mgcp

call rsvp-sync

!

!

!

!

!

!

!

!

!

!

interface Tunnel0

!--- Tunnel interface 0

ip address 192.168.20.2 255.255.255.0

!--- IP address of the gre tunnel interface 0

tunnel source Ethernet0

!--- IP source of the tunnel. It is best to make this an !--- interface with a public, routable IP address so that !--- it is reachable from the other endpoint of the tunnel.

tunnel destination 9.9.9.9

!--- IP destination of the tunnel. Make sure this is !--- reachable via the ping command !--- Otherwise, the tunnel will not be created properly.

!

interface Ethernet0

ip address 11.11.11.11 255.255.255.0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

!

no ip route-cache

no ip mroute-cache

!

interface cable-modem0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

no ip route-cache

no ip mroute-cache

no cable-modem compliant bridge

!

router rip

version 2

passive-interface Tunnel0

!--- This command is used to avoid recursive routing.

network 10.0.0.0

network 11.0.0.0

no auto-summary

!

ip default-gateway 10.1.4.1

ip classless

no ip http server

no ip http cable-monitor

!

snmp-server packetsize 4096

snmp-server manager

!

voice-port 0

input gain -2

!

voice-port 1

input gain -2

!

!

line con 0

exec-timeout 0 0

transport input none

line vty 0 4

password ww

login

!

end

ubr924-b5db#

다음을 확인합니다.

이 섹션에서는 컨피그레이션이 제대로 작동하는지 확인하는 데 사용할 수 있는 정보를 제공합니다.

특정 show 명령은 show 명령 출력의 분석을 볼 수 있는 출력 인터프리터 도구에서 지원됩니다.

CMTS(7246VXR) 컨피그레이션이 올바르고 케이블 모뎀이 온라인 상태인지 확인합니다.CMTS의 컨피그레이션은 아래와 같습니다.

7246VXR#show run

Building configuration...

Current configuration : 4579 bytes

!

! Last configuration change at 13:22:17 PDT Mon Feb 26 2001

! NVRAM config last updated at 13:22:46 PDT Mon Feb 26 2001

!

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug datetime msec localtime

service timestamps log datetime localtime

no service password-encryption

service linenumber

service udp-small-servers max-servers no-limit

!

hostname 7246VXR

!

logging buffered 1000000 debugging

logging rate-limit console 10 except errors

enable password cable

!

cable qos profile 8

cable qos profile 10

cable qos profile 10 grant-size 1500

cable qos profile 12 guaranteed-upstream 100000

no cable qos permission create

no cable qos permission update

cable qos permission modems

cable time-server

clock timezone PDT -8

clock summer-time PDT recurring

clock calendar-valid

ip subnet-zero

no ip finger

!

interface Ethernet2/0

ip address 172.16.30.4 255.255.255.192

no ip mroute-cache

half-duplex

!

interface Cable4/0

ip address 172.16.29.1 255.255.255.224 secondary

ip address 10.1.4.1 255.255.255.0

no keepalive

cable downstream rate-limit token-bucket shaping

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 555000000

cable upstream 0 frequency 40000000

cable upstream 0 power-level 0

no cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

cable helper-address 172.16.30.2

!

interface Cable5/0

ip address 172.16.29.225 255.255.255.224 secondary

ip address 10.1.5.1 255.255.255.0

load-interval 30

no keepalive

cable downstream rate-limit token-bucket shaping

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 620000000

cable upstream 0 frequency 25008000

cable upstream 0 power-level 0

no cable upstream 0 shutdown

no cable upstream 1 shutdown

cable dhcp-giaddr policy

!

router eigrp 202

redistribute connected

redistribute static

network 10.0.0.0

network 172.16.0.0

no auto-summary

no eigrp log-neighbor-changes

!

router rip

version 2

redistribute connected

redistribute static

network 10.0.0.0

network 172.16.0.0

no auto-summary

!

ip default-gateway 172.16.30.1

ip classless

ip route 0.0.0.0 0.0.0.0 172.16.30.1

ip route 172.16.30.0 255.255.255.0 Ethernet2/0

ip http server

ip http authentication local

!

access-list 188 permit tcp any any eq www log

access-list 188 permit ip any any

route-map docsis permit 10

!

snmp-server engineID local 00000009020000E01ED77E40

snmp-server community public RO

snmp-server community private RW

line con 0

exec-timeout 0 0

transport input none

line aux 0

speed 19200

line vty 0 4

session-timeout 60

exec-timeout 0 0

!

ntp clock-period 17179973

end

7246VXR#show cable modem

Interface   Prim Online     Timing Rec    QoS CPE IP address      MAC address

Sid  State      Offset Power

Cable4/0/U0 69   online     2812    0.25  5   0   10.1.4.3        0002.1685.b5db

Cable4/0/U0 70   online     2288    0.00  5   0   10.1.4.6        0010.7bed.9b23

Cable4/0/U0 71   online     2289    0.50  5   0   10.1.4.2        0010.7bed.9b45

Cable4/0/U0 72   online     2812    0.00  5   0   10.1.4.4        0002.fdfa.0a63

Cable4/0/U0 73   online     2812   -0.75  5   0   10.1.4.5        0004.2752.ddd5

Cable4/0/U0 74   online     2813    0.25  5   0   10.1.4.7        0001.64ff.e47d

케이블 모뎀 온라인 상태가 온라인으로 표시되지 않으면 Troubleshooting uBR Cable Modem Not Coming Online 문서를 참조하십시오.

7246VXR#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

FastEthernet0/0            192.168.7.253   YES NVRAM  up                    down

Ethernet2/0                172.16.30.4     YES manual up                    up

Ethernet2/1                unassigned      YES NVRAM  administratively down down

Ethernet2/2                unassigned      YES NVRAM  administratively down down

Ethernet2/3                unassigned      YES NVRAM  administratively down down

Cable3/0                   10.1.3.1        YES manual up                    up

Cable4/0                   10.1.4.1        YES manual up                    up

Cable5/0                   10.1.5.1        YES manual up                    up

7246VXR#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.16.30.1 to network 0.0.0.0

172.16.0.0/16 is variably subnetted, 4 subnets, 3 masks

C       172.16.29.224/27 is directly connected, Cable5/0

C       172.16.29.0/27 is directly connected, Cable4/0

S       172.16.30.0/24 is directly connected, Ethernet2/0

C       172.16.30.0/26 is directly connected, Ethernet2/0

9.0.0.0/24 is subnetted, 1 subnets

R       9.9.9.0 [120/1] via 10.1.4.5, 00:00:09, Cable4/0

R    192.168.20.0/24 [120/1] via 10.1.4.5, 00:00:09, Cable4/0

10.0.0.0/8 is variably subnetted, 5 subnets, 2 masks

C       10.1.3.0/24 is directly connected, Cable3/0

R       10.5.5.0/24 [120/1] via 10.1.4.4, 00:00:01, Cable4/0

R       10.0.0.0/8 [120/1] via 172.16.30.10, 00:00:24, Ethernet2/0

C       10.1.5.0/24 is directly connected, Cable5/0

C       10.1.4.0/24 is directly connected, Cable4/0

11.0.0.0/24 is subnetted, 1 subnets

R       11.11.11.0 [120/1] via 10.1.4.3, 00:00:15, Cable4/0

S*   0.0.0.0/0 is directly connected

케이블 모뎀 측에서 아래와 같이 두 디바이스의 sh 버전을 확인합니다.

ubr924-ddd5#sh ver

Cisco Internetwork Operating System Software

IOS (tm) 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/pcgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Fri 02-Feb-01 10:55 by ccai

Image text-base: 0x800100A0, data-base: 0x806DB770

ROM: System Bootstrap, Version 12.0(6r)T3, RELEASE SOFTWARE (fc1)

ROM: 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

ubr924-ddd5 uptime is 2 hours, 1 minute

System returned to ROM by reload at 12:45:25 - Fri Feb 23 2001

System restarted at 12:46:07 - Fri Feb 23 2001

System image file is "flash:ubr920-k1v4y556i-mz.121-5.T4"

cisco uBR920 CM (MPC850) processor (revision 4.d) with 15872K/1024K bytes of memory.

Processor board ID FAA0444Q14Z

Bridging software.

1 Ethernet/IEEE 802.3 interface(s)

1 Cable Modem network interface(s)

3968K bytes of processor board System flash (Read/Write)

1536K bytes of processor board Boot flash (Read/Write)

Configuration register is 0x2102

ubr924-b5db#show ver

Cisco Internetwork Operating System Software

IOS (tm) 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/pcgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Fri 02-Feb-01 10:55 by ccai

Image text-base: 0x800100A0, data-base: 0x806DB770

ROM: System Bootstrap, Version 12.0(6r)T3, RELEASE SOFTWARE (fc1)

ROM: 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

ubr924-b5db uptime is 1 hour, 53 minutes

System returned to ROM by reload at 12:55:34 - Fri Feb 23 2001

System restarted at 12:56:15 - Fri Feb 23 2001

System image file is "flash:ubr920-k1v4y556i-mz.121-5.T4"

cisco uBR920 CM (MPC850) processor (revision 3.e) with 15872K/1024K bytes of memory.

Processor board ID FAA0422Q04F

Bridging software.

1 Ethernet/IEEE 802.3 interface(s)

1 Cable Modem network interface(s)

3968K bytes of processor board System flash (Read/Write)

1536K bytes of processor board Boot flash (Read/Write)

Configuration register is 0x2102

다음 조건이 있는 한 터널이 up/up으로 표시됩니다.

- 유효한 IP 주소로 구성됩니다.

- 터널 목적지 IP 주소에 대한 라우팅 테이블에는 터널의 먼 끝에 할당된 IP 주소가 아닌 경로가 있습니다.

대상 주소를 ping할 수 있는지 여부와 상관없이 이 내용은 true여야 합니다.잘못된 고정 경로 또는 잘못된 방향을 가리키는 기본 경로가 터널을 발생하지만 터널이 작동하지 않습니다.

터널이 작동하는지 확인하는 첫 번째 단계는 터널이 작동 중인지 확인하는 것입니다.두 케이블 모뎀에서 show ip interface brief 및 show interface tunnel 0 명령을 실행합니다.샘플 명령 출력은 아래와 같습니다.

ubr924-ddd5#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Ethernet0                  9.9.9.9         YES manual up                    up

Tunnel0                    192.168.20.1    YES manual up                    up

cable-modem0               10.1.4.5        YES unset  up                    up

ubr924-ddd5#show interface tunnel 0

Tunnel0 is up, line protocol is up

Hardware is Tunnel

Internet address is 192.168.20.1/24

MTU 1514 bytes, BW 9 Kbit, DLY 500000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation TUNNEL, loopback not set

Keepalive set (10 sec)

Tunnel source 9.9.9.9 (Ethernet0), destination 11.11.11.11

Tunnel protocol/transport GRE/IP, key disabled, sequencing disabled

Checksumming of packets disabled

Last input 00:15:25, output 00:14:27, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/0, 2 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

146 packets input, 21024 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

172 packets output, 57392 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

ubr924-b5db#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Ethernet0                  11.11.11.11     YES manual up                    up

Tunnel0                    192.168.20.2    YES manual up                    up

cable-modem0               10.1.4.3        YES NVRAM  up                    up

ubr924-b5db#show interface tunnel 0

Tunnel0 is up, line protocol is up

Hardware is Tunnel

Internet address is 192.168.20.2/24

MTU 1514 bytes, BW 9 Kbit, DLY 500000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation TUNNEL, loopback not set

Keepalive set (10 sec)

Tunnel source 11.11.11.11 (Ethernet0), destination 9.9.9.9

Tunnel protocol/transport GRE/IP, key disabled, sequencing disabled

Checksumming of packets disabled

Last input 00:16:42, output 00:17:40, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/0, 5 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

118 packets input, 19144 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

164 packets output, 49624 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

터널이 작동하는 경우 터널 대상 IP 주소를 ping하는지 확인합니다.이렇게 하면 터널의 실제 작동 방식이 아니라 IP 연결만 확인됩니다.

From ubr924-ddd5 we ping 11.11.11.11

ubr924-ddd5#ping 11.11.11.11

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 11.11.11.11, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/14/17 ms

ubr924-ddd5#

ubr924-b5db에서 대상 주소 9.9.9.9을 ping합니다.

ubr924-b5db#ping 9.9.9.9

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 9.9.9.9, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/14/16 ms

ubr924-b5db#

터널이 작동하는지 확인하려면 show ip route x.x.x 명령을 실행합니다. 여기서 x.x.x.x는 터널의 맨 끝에 할당된 IP 주소입니다.이 경우 원거리 라우터의 루프 백 주소가 됩니다.표시되는 유일한 경로가 터널 인터페이스에 대한 것이면 해당 주소에 대한 ping은 터널이 작동함을 증명합니다.

네트워크를 통해 터널 세그먼트로 경로를 광고하는 IP 주소 지정 체계가 있는 경우 터널 인터페이스의 맨 끝까지 경로가 두 개 이상 있습니다.그렇다면 터널이 작동 중인지 확인하는 것은 매우 어렵습니다.일반적으로 이 경우 터널 네트워크에 대한 중복 경로를 원하지 않습니다.네트워크 전체의 라우팅 프로토콜에 의한 경로 광고를 방지하기 위한 단계를 수행해야 합니다.IP와 다른 프로토콜의 트래픽을 전송하는 데 터널이 사용되는 경우 동일한 기본 확인 방법이 적용됩니다.

From ubr924-ddd5 we get

ubr924-ddd5#show ip route 192.168.20.2

Routing entry for 192.168.20.0/24

Known via "connected", distance 0, metric 0 (connected, via interface)

Routing Descriptor Blocks:

* directly connected, via Tunnel0

Route metric is 0, traffic share count is 1

From ubr924-b5db we get

ubr924-b5db#show ip route 192.168.20.1

Routing entry for 192.168.20.0/24

Known via "connected", distance 0, metric 0 (connected, via interface)

Routing Descriptor Blocks:

* directly connected, via Tunnel0

Route metric is 0, traffic share count is 1

PC1이 PC2에 액세스할 수 있는지 또는 PC에서 PC2에 액세스할 수 있는지 확인하려면 케이블 모뎀에서 확장된 ping을 수행하고 PC에서 ping을 수행합니다.

ubr924-b5db에서 이더넷 인터페이스(11.11.11.11)에서 ubr924-ddd5의 이더넷 인터페이스(9.9.9.9)으로 확장된 ping을 수행합니다.

ubr924-b5db#ping ip

Target IP address: 9.9.9.9

!--- ubr924-ddd5 Ethernet's IP address.

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Extended commands [n]: y

Source address or interface: 11.11.11.11

!--- ubr924-b5db Ethernet's IP address.

Type of service [0]:

Set DF bit in IP header? [no]:

Validate reply data? [no]:

Data pattern [0xABCD]:

Loose, Strict, Record, Timestamp, Verbose[none]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 9.9.9.9, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/16/28 ms

ubr924-b5db#

반대쪽 연결을 테스트하려면 반대쪽 연결을 수행합니다.

ubr924-ddd5#ping ip

Target IP address: 11.11.11.11

!--- ubr924-b5db Ethernet's IP address.

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Extended commands [n]: y

Source address or interface: 9.9.9.9

!--- ubr924-ddd5 Ethernet's IP address.

Type of service [0]:

Set DF bit in IP header? [no]:

Validate reply data? [no]:

Data pattern [0xABCD]:

Loose, Strict, Record, Timestamp, Verbose[none]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 11.11.11.11, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/14/16 ms

ubr924-ddd5#

마지막 테스트는 PC1에서 PC2로, PC2에서 PC1으로 ping하는 것입니다.

PC1의 IP 주소는 9.9.9.1입니다.

PC2에는 IP 주소가 11.11.11.1입니다.

PC1에서 PC2로 ping합니다.

PC2에서 PC1로 ping합니다.

문제 해결

현재 이 컨피그레이션에 사용할 수 있는 특정 문제 해결 정보가 없습니다.

관련 정보

- uBR 케이블 모뎀이 온라인으로 제공되지 않는 문제 해결

- Technical Support - Cisco Systems