목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

배경 정보

가정

구성

네트워크 다이어그램

구성

다음을 확인합니다.

문제 해결

관련 정보

소개

이 문서에서는 동기식 클럭과 PVC(Permanent Virtual Circuit)를 사용하는 비정형 CES(Circuit Emulation Services)의 샘플 컨피그레이션을 제공합니다. 비정형 서비스는 PVC가 전체 T1/E1 대역폭을 활용함을 의미합니다. ATM 스위치는 T1/E1을 조사하지 않고 수신 포트에서 대상 포트로 클럭킹하여 비트 스트림을 재생성합니다. 동기식 서비스는 동기화된 클럭을 각 끝에서 사용할 수 있다고 가정합니다. 따라서 ATM 세포에는 잠금 정보가 전송되지 않습니다. 네트워크 전체에 클록 소스를 전파해야 합니다. CES Services에 대한 자세한 설명은 Introduction to Circuit Emulation Services를 참조하십시오.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서는 특정 소프트웨어 및 하드웨어 버전으로 한정되지 않습니다.

표기 규칙

문서 표기 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

배경 정보

가정

이 문서의 샘플 구성은 다음과 같은 가정을 기반으로 합니다.

- 이 예에서는 동기 클럭킹을 사용합니다.

- PBX1은 ATM 네트워크에 클럭 소스(PRS)를 제공합니다. 아래 다이어그램을 참조하십시오.

- PBX2는 PBX1과 동일한 시계에서 클럭됩니다(통신 사업자의 경우).

참고: 이 클럭은 정확성과 동일해야 하며 위상에 있어야 합니다.

- 두 PBX의 프레이밍은 ESF(Extended Superframe)입니다. LS1010의 기본값이므로 명시적으로 구성할 필요가 없습니다. 그러나 이 예제에서는 데모를 위해 구성합니다.

- 두 PBX의 라인 코드는 바이너리 8-0 대체(B8ZS)입니다. LS1010의 기본값이므로 명시적으로 구성할 필요가 없습니다. 그러나 이 예제에서는 데모를 위해 구성합니다.

- PVC 0/100은 8540-MSR과 LS1010 사이에서 사용됩니다.

- PBX와 ATM 스위치 간의 거리는 CES PAM에서 110피트 미만입니다. 이 길이는 기본 라인 구축(lbo)이므로 명시적으로 구성할 필요가 없습니다. 그러나 이 예제에서는 데모를 위해 구성합니다.

- LS1010에는 FC-PFQ가 장착되어 있으며 8540MSR에는 RP Stratum 3 시계가 장착되어 있습니다. 정상 잠금 복구를 위해서는 그 카드가 필요합니다.

- 회로가 정의될 때 ATM Px/y/z(ATM 의사 인터페이스) 가 생성됩니다. 자세한 내용은 이 관련 문서를 참조하십시오.

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 이 문서에 사용된 명령에 대한 추가 정보를 찾으려면 명령 조회 도구(등록된 고객만 해당)를 사용합니다.

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

구성

이 문서에서는 다음 구성을 사용합니다.

8540-MSR 구성

8540-MSR

8540-MSR#show running-config

Building configuration...

Current configuration:

!

version 12.0

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

service internal

!

hostname 8540-MSR

!

network-clock-select 1 cbr3/1/0

!

boot system flash bootflash:cat8540m-wp-mz.120-1a.W5.7.bin

logging buffered 4096 debugging

!

redundancy

main-cpu

no sync config startup

sync config running

facility-alarm core-temperature major 53

facility-alarm core-temperature minor 45

ip subnet-zero

atm address 47.0091.8100.0000.0090.2144.8401.0090.2144.8401.00

atm router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute atm-static

!

interface ATM3/0/0

no ip address

no ip directed-broadcast

!

interface ATM3/0/1

no ip address

no ip directed-broadcast

!

interface CBR3/1/0

no ip address

no ip directed-broadcast

ces circuit 0 circuit-name example

ces pvc 0 interface atm3/0/0 vpi 0 vci 100

ces dsx1 linecode b8zs

ces dsx1 framing esf

ces dsx1 lbo 0_110

!

interface ATM0

no ip address

no ip directed-broadcast

atm maxvp-number 0

!

interface Ethernet0

no ip directed-broadcast

!

line con 0

transport input none

line aux 0

line vty 0 4

login

!

end

LS1010-A 구성

LS1010-A

ls1010#show running-config

Building configuration...

Current configuration:

!

version 11.3

no service pad

service time

stamps debug date

time msec

service time

stamps log date

time mse

cno service password-encryption

service internal

!

hostname ls1010

!

network-clock-select 1 CBR12/1/0

!

atm address 47.0091.8100.0000.0090.92b8.6401.0090.92b8.6401.00

atm router pnnino aes

a embedded-number left-justified

node 1 level 56 lowestre

distribute atm-static

!

!

no ip address

!

interface CBR12/1/0

no ip address

ces circuit 0 circuit-name example

ces pvc 0 interface atm12/0/0 vpi 0 vci 100

ces dsx1 linecode b8zs

ces dsx1 framing esfces dsx1 lbo 0_110

!

interface CBR12/1/1no ip address

!

interface CBR12/1/2

no ip address

!

interface CBR12/1/3

no ip address

!

interface ATM13/0/0

no ip address

atm maxvp-number 0

!

interface Ethernet13/0/0

ip classless

!

line con 0

line aux 0

line vty 0 4

login

!

end

다음을 확인합니다.

일부 show 명령은 출력 인터프리터 툴 에서 지원되는데(등록된 고객만), 이 툴을 사용하면 show 명령 출력의 분석 결과를 볼 수 있습니다.

CES 회선이 양쪽에서 작동하는지 확인하려면 show ces interface 명령을 사용합니다. 아래의 샘플 출력을 참조하십시오.

ls1010#show ces interface cbr 12/1/0

Interface: CBR12/1/0 Port-type:T1-DCU

IF Status: UP Admin Status: UP

Channels in use on this port: 1-24

LineType: ESF LineCoding: B8ZS LoopConfig: NoLoop

SignalMode: NoSignalling XmtClockSrc: network-derived

DataFormat: UnStructured AAL1 Clocking Mode: Synchronous LineLength: 0_110

LineState: NoAlarm

Errors in the Current Interval:

PCVs 514 LCVs 2 ESs 0 SESs 1 SEFSs 0

UASs 0 CSSs 0 LESs 0 BESs 0 DMs 0

Errors in the last 24Hrs:

PCVs 2057 LCVs 10 ESs 0 SESs 4 SEFSs 0

UASs 19 CSSs 0 LESs 0 BESs 0 DMs 0

Input Counters: 1054405 cells, 49557035 bytes

Output Counters: 1054405 cells, 49557035 bytes

두 ATM 스위치 간에 PVC가 설정되도록 show atm vc 명령을 사용합니다. 아래의 샘플 출력을 참조하십시오.

8540-MSR#show atm vc int ATM-P3/1/3

Interface   VPI   VCI   Type   X-Interface   X-VPI   X-VCI   Encap Status

ATM-P3/1/3    0    16 SoftVC      ATM3/0/0       0     100             UP

LS1010#show atm vc int ATM-P12/1/3

Interface   VPI   VCI   Type   X-Interface   X-VPI   X-VCI   Encap Status

ATM-P12/1/3   0    16 SoftVC     ATM12/0/0       0     100             UP

잠금 전표가 없는지 확인하려면 show ces circuit cbr x/y/z 0 명령을 사용하고 언더플로 또는 오버플로가 증가하고 있는지 확인합니다. 8540-MSR 측에서도 이 명령을 사용해야 합니다. 아래의 샘플 출력을 참조하십시오.

ls1010#show ces circuit cbr 12/1/0 0

Circuit: Name sil, Circuit-state ADMIN_UP / Interface CBR12/1/0,

Circuit_id 0, Port-Type T1, Port-State UP

Port Clocking network-derived, aal1 Clocking Method CESIWF_AAL1_CLOCK_SYNC

Channel in use on this port: 1-24

Channels used by this circuit: 1-24

Cell-Rate: 4107, Bit-Rate 1544000

cas OFF, cell_header 0x100 (vci = 16)

Configured CDV 2000 usecs, Measured CDV 373 usecs

De-jitter: UnderFlow 1, OverFlow 0

ErrTolerance 8, idleCircuitdetect OFF, onHookIdleCode 0x0

state: VcActive, maxQueueDepth 823, startDequeueDepth 435

Partial Fill: 47, Structured Data Transfer 0

Active SoftVC

Src: atm addr 47.0091.8100.0000.0090.92b8.6401.4000.0c86.1030.10 vpi 0, vci 16

Dst: atm addr 47.0091.8100.0000.0090.2144.8401.4000.0c81.9030.10

문제 해결

현재 이 컨피그레이션에 사용할 수 있는 특정 문제 해결 정보가 없습니다.

관련 정보

- 회선 에뮬레이션 서비스 소개

- ATM 스위치 라우터 명령 참조

- ATM 기술 지원 페이지

- 기술 지원 및 문서 − Cisco Systems