목차

소개

문제

솔루션

관련 Cisco 지원 커뮤니티 토론

소개

이 문서에서는 NME(Network Module Engine)에 대한 인증이 실패한 것으로 보이는 문제를 설명합니다.

라우터에서 NME-WAE-502에 세션을 시도하면 로그인 프롬프트가 표시되지만 WAAS(Wide Area Application Services) 자격 증명으로 로그인하는 작업은 다음과 같이 실패합니다(예: NME-WAE가 슬롯 1에 있음).

router# service-module integrated-Service-Engine 1/0 session

Trying 192.0.2.2, 2066 ... Open

User Access Verification

Username: admin

Password:

% Authentication failed

문제

이미 올바른 WAAS 자격 증명을 입력하는 경우 이 문제는 라우터의 인증 컨피그레이션 때문일 수 있습니다.  로그인 배너에 "Cisco Wide Area Application Services Engine Console"이 없는지 확인하고 라우터에 AAA(Authentication, Authorization, Accounting)가 구성되어 있는지 확인합니다. 아래 샘플 라우터 컨피그레이션을 참조하십시오.

router# show run | inc aaa

aaa new-model

aaa authentication login default group tacacs+ enable

이 경우 먼저 라우터 자격 증명을 사용하여 로그인해야 합니다. <ENTER>를 누르면 WAAS 자격 증명을 사용하여 로그인할 수 있다는 두 번째 로그인 프롬프트가 표시됩니다.

솔루션

표시되는 로그인 프롬프트는 NME-WAE가 아니라 라우터에서 옵니다.먼저 라우터 자격 증명을 제공한 다음 <ENTER>를 누르면 실제 WAAS 로그인 프롬프트가 나타납니다.

router# service-module integrated-Service-Engine 1/0 session

Trying 192.0.2.2, 2066 ... Open

User Access Verification

Username: <-- router-username

Password: <-- router-password

<-- Hit

Cisco Wide Area Application Services Engine Console

Username: <-- waas-username

Password: <-- waas-password

Device is configured with a (well known) default username/password for ease

of initial configuration.This default username/password should be changed in

order to avoid unwanted access to the device.

System Initialization Finished.

WAAS#

Cisco Wide Area Application Services Engine Console 라인 일반 WAAS 자격 증명을 확인한 후 로그인 프롬프트에서 사용할 수 있습니다(기본값:사용자 이름:admin / 비밀번호:기본값).