内容

概要

RCMログ収集の手順

概要

このドキュメントでは、Redundancy Configuration Manager(RCM)のログ収集の一般的な手順について説明します。

RCMログ収集の手順

RCMのコンポーネントは次のとおりです。

- コントローラ

- Checkpointmgr

- BFDMGR

- オペレーションセンター

- 構成マネージャ

問題のシナリオに基づいて、ログをキャプチャするための基盤となる可能性のある問題の要素を特定することが不可欠です。

手順は、ここで説明したすべてのコンポーネントで同じです。

- 最近のログ（過去1 ～ 2時間のログなど）を確認する必要がある場合は、その特定のコンポーネントのポッドログを収集するだけです。

kubectl get svc  -o wide -A -n rcm

With this command, you get all the pods with their IPs and name.

kubectl logs <pod name> -n rcm

Just mention the pod name for which logs are required.

- 2時間より古いログを調べる必要がある場合、RCMシステムは生成されたすべてのログを最大4日間保存します。ここで説明する手順を使用して、それらを取得できます。

1.ディレクトリパスに移動します。 /var/log/containers を使用し、  grep  コマンドを使用して、必要な特定のコンポーネントログを検索します。

In this scenario, let's take the controller as an example. If you require logs for configmgr/checkpointmgr, you need to use the 'grep' command, while the rest of the procedure remains unchanged.

root@h10-126-83-128:/var/log/containers# ls -la | grep controller

lrwxrwxrwx  1 root root     107 Mar 29 07:07 rcm-controller-6547b466ff-zsrcd_rcm_rcm-controller-4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671.log -> /var/log/pods/rcm_rcm-controller-6547b466ff-zsrcd_ff74e5fc-9a07-4073-8956-90cd978ac98e/rcm-controller/0.log

2.コントローラディレクトリを見つけます。

From Step 1., you can see the controller directory as mentioned here:

/var/log/pods/rcm_rcm-controller-6547b466ff-zsrcd_ff74e5fc-9a07-4073-8956-90cd978ac98e/rcm-controller/0.log

Get into this path

root@h10-126-83-128:/var/log/containers# ls -la /var/log/pods/rcm_rcm-controller-6547b466ff-zsrcd_ff74e5fc-9a07-4073-8956-90cd978ac98e/rcm-controller/

total 12

drwxr-xr-x 2 root root 4096 Mar 29 07:07 .

drwxr-xr-x 3 root root 4096 Mar 29 07:07 ..

lrwxrwxrwx 1 root root  165 Mar 29 07:07 0.log -> /var/lib/docker/containers/4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671/4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671-json.log

3.すべての .log  ファイル(tar/zip)ファイル。

In Step 2, once you have obtained the path where log files are stored, navigate to that path and collect the .log/.gz files as needed.

root@h10-126-83-128:/var/log/containers# ls -la /var/lib/docker/containers/4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671/

total 6448

drwx------  4 root root    4096 Mar 29 07:07 .

drwx------ 69 root root   12288 Mar 29 07:07 ..

-rw-r-----  1 root root 6548746 Mar 29 10:08 4c149c1e962992a241dd5201aadb07237f52947740724c1df2a01b1b6bfbc671-json.log

drwx------  2 root root    4096 Mar 29 07:07 checkpoints

-rw-------  1 root root   23306 Mar 29 07:07 config.v2.json

-rw-r--r--  1 root root    2469 Mar 29 07:07 hostconfig.json

drwx------  2 root root    4096 Mar 29 07:07 mounts

root@h10-126-83-128:/var/log/containers#