内容

概要

問題

解決方法

概要

このドキュメントでは、 Unable to connect to the server: x509: certificate has expired or is not yet valid エラー。

問題

Ultra Cloud Core Subscriber Microservices Infrastructure(SMI)Kubectlへの接続でエラーがスローされます。

Unable to connect to the server: x509: certificate has expired or is not yet valid

Kubernetesコントロールプレーンノード通信は、SSLトンネルを介して行われます。SSLトンネルは通常、証明書の信頼性を確立するために、一連の信頼されたサードパーティ認証局に依存します。

証明書が期限切れになると、コントロールプレーンノードの通信が停止します。

証明書の有効期限を確認するには： kubectl get secrets --all-namespaces | grep 'kubernetes.io/tls' | awk '{print $2, $1}' | xargs -n2 sh -c 'echo container $0 namespace $1;kubectl -n $1 get secret $0 -o jsonpath="{.data.tls\.crt}" | base64 -d | openssl x509 -noout -enddate; echo ----------------------'

cloud-user@k8-rcdn-primary-1:~$ kubectl get secrets --all-namespaces | grep 'kubernetes.io/tls' | awk '{print $2, $1}' | xar

gs -n2 sh -c 'echo container $0 namespace $1;kubectl -n $1 get secret $0 -o jsonpath="{.data.tls\.crt}" | base64 -d | open

ssl x509 -noout -enddate; echo ----------------------'

container cert-cli-cee-k8-rcdn-ops-center-ingress namespace cee-k8-rcdn

notAfter=May 1 16:54:39 2023 GMT

----------------------

container cert-docs-cee-k8-rcdn-product-documentation-ingress namespace cee-k8-rcdn

notAfter=May 1 16:56:04 2023 GMT

----------------------

container cert-grafana-ingress namespace cee-k8-rcdn

notAfter=May 1 16:56:06 2023 GMT

----------------------

container cert-restconf-cee-k8-rcdn-ops-center-ingress namespace cee-k8-rcdn

notAfter=May 1 16:54:40 2023 GMT

----------------------

container cert-show-tac-cee-k8-rcdn-ops-center-ingress namespace cee-k8-rcdn

notAfter=May 1 16:54:40 2023 GMT

----------------------

container cert-show-tac-cee-k8-rcdn-smi-show-tac-ingress namespace cee-k8-rcdn

notAfter=May 1 16:56:07 2023 GMT

----------------------

container cert-cli-smf-rcdn-ops-center-ingress namespace smf-rcdn

notAfter=May 1 16:54:56 2023 GMT

----------------------

container cert-restconf-smf-rcdn-ops-center-ingress namespace smf-rcdn

notAfter=May 1 16:54:57 2023 GMT

----------------------

container cert-show-tac-smf-rcdn-ops-center-ingress namespace smf-rcdn

notAfter=May 1 16:54:57 2023 GMT

----------------------

container cert-cli-smf-rcdn1-ops-center-ingress namespace smf-rcdn1

notAfter=May 1 16:55:07 2023 GMT

----------------------

container cert-restconf-smf-rcdn1-ops-center-ingress namespace smf-rcdn1

notAfter=May 1 16:55:08 2023 GMT

----------------------

container cert-show-tac-smf-rcdn1-ops-center-ingress namespace smf-rcdn1

notAfter=May 1 16:55:08 2023 GMT

----------------------

container cert-cli-smf-rcdn2-ops-center-ingress namespace smf-rcdn2

notAfter=May 3 18:11:26 2023 GMT

----------------------

container cert-restconf-smf-rcdn2-ops-center-ingress namespace smf-rcdn2

notAfter=May 3 18:11:28 2023 GMT

----------------------

container cert-show-tac-smf-rcdn2-ops-center-ingress namespace smf-rcdn2

notAfter=May 3 18:11:27 2023 GMT

----------------------

container cert-cli-smf-rcdn3-ops-center-ingress namespace smf-rcdn3

notAfter=May 3 18:11:41 2023 GMT

----------------------

container cert-restconf-smf-rcdn3-ops-center-ingress namespace smf-rcdn3

notAfter=May 3 18:11:43 2023 GMT

----------------------

container cert-show-tac-smf-rcdn3-ops-center-ingress namespace smf-rcdn3

notAfter=May 3 18:11:42 2023 GMT

----------------------

解決方法

1. apiserver.crtに正しい終了日が表示されていることを確認します。

ubuntu@labnode-cnat-cnat-core-primary1:~$ cd /data/kubernetes/pki

ubuntu@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki$ sudo su

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# sudo cat /data/kubernetes/pki/apiserver.crt | openssl x509 -enddate -noout

notAfter=Feb 17 08:22:04 2022 GMT

2. SSLで終了日を確認します。

ubuntu@labnode-cnat-cnat-core-primary1:~$ echo | openssl s_client -showcerts -servername gnupg.org -connect localhost:6443 2>/dev/null | openssl x509 -inform pem -noout -text

Certificate:

Data:

Version: 3 (0x2)

Serial Number: 44335566778899aabba (0xabcdef0123456789)

Signature Algorithm: sha256WithRSAEncryption

Issuer: CN = kubernetes

Validity

Not Before: Mar 17 11:59:23 2020 GMT

Not After : Mar 19 10:37:35 2021 GMT

3. Dockerコンテナの状態をチェックします。

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# docker ps -f "name=k8s_kube-apiserver"

CONTAINER ID IMAGE COMMAND CREATED STATUS PORTS NAMES

f988867819ed c2c9a0406787 "kube-apiserver --ad…" 12 months ago Up 12 months k8s_kube-apiserver_kube-apiserver-labnode-cnat-cnat-core-primary1_kube-system_00112233445566778899aabbccddeeff_0

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki#

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# docker ps -f "name=k8s_kube-controller"

CONTAINER ID IMAGE COMMAND CREATED STATUS PORTS NAMES

929a8f1ef716 6e4bffa46d70 "kube-controller-man…" 3 days ago Up 3 days k8s_kube-controller-manager_kube-controller-manager-labnode-cnat-cnat-core-primary1_kube-system_112233445566778899aabbccddeeff00_2

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# docker ps -f "name=k8s_kube-scheduler"

CONTAINER ID IMAGE COMMAND CREATED STATUS PORTS NAMES

32783a2c3a71 ebac1ae204a2 "kube-scheduler --au…" 12 months ago Up 12 months k8s_kube-scheduler_kube-scheduler-labnode-cnat-cnat-core-primary1_kube-system_2233445566778899aabbccddeeff0011_1

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki#

4. 3つすべてのコントロールプレーンノードでkube-apiserverおよびkube-schedulerのdockerコンテナを再起動します。

docker ps -f "name=k8s_kube-apiserver" -q | xargs docker restart

docker ps -f "name=k8s_kube-scheduler" -q | xargs docker restart

5. apiserver.crtに正しい終了日が表示されていることを確認します。

root@labnode-cnat-cnat-core-primary1:/data/kubernetes/pki# sudo cat /data/kubernetes/pki/apiserver.crt | openssl x509 -enddate -noout

notAfter=Feb 17 08:22:04 2022 GMT

6.終了日がSSLで更新され、正しい終了日であることを確認します。

echo | openssl s_client -showcerts -servername gnupg.org -connect localhost:6443 2>/dev/null | openssl x509 -inform pem -noout -text

7.クラスタが正常であることを確認します

運用の詳細については、『Cisco Ultra Cloud Core - Subscriber Microservices Infrastructureガイド』を参照してください。