内容

概要

ルータCLIログの例

ルータフラッシュの内容

APフラッシュの再フォーマット

AP802への接続

AP IOSをルータのフラッシュにコピー

AP IOSの抽出

新しいIOSイメージをブートするようにAPを設定する

ルータのフラッシュをクリーンアップし、自律型に設定する

ISRにAP801またはAP802があるかどうかを確認する方法

概要

このドキュメントでは、組み込みAP802を搭載したISR（サービス統合型ルータ）でアクセスポイント(AP)イメージのリカバリを実行する方法について説明します。  ここで説明する方法は、AP802のフラッシュパーティションがホストルータから直接アクセス可能であるという事実に基づいています。  この技術は、AP801が組み込まれたルータからは使用できません。このようなプラットフォームでは、AP801コンソール（ブートローダ）からAP（アクセスポイント）イメージのリカバリを実行する必要があります(AP801またはAP802があるかどうかを確認する方法)。

ルータCLIログの例

次に示す例は、IOS(Internetwork Operating System)15.2(4)M5が稼働する819HWDで実行されたものです。

ルータフラッシュの内容

819HWD#dir all-filesystems

[ ... ]

Directory of flash:1:/

2 -rw- 100041 Aug 1 2014 19:37:46 +00:00 event.log

25 -rw- 215 Sep 15 2014 17:17:38 +00:00 env_vars

4 -rw- 125729 Aug 1 2014 12:29:16 +00:00 event.capwap

5 -rw- 281 Jun 9 2014 23:28:12 +00:00 info

6 -rw- 8216 Sep 15 2014 17:17:50 +00:00 private-multiple-fs

7 drw- 0 Dec 26 2013 19:52:46 +00:00 ap802-rcvk9w8-mx

17 -rw- 3072 Dec 26 2013 20:02:30 +00:00 cpconfig-ap802.cfg

3 -rw- 0 Sep 15 2014 17:18:02 +00:00 config.txt

18 -rw- 5 Jun 25 2014 21:06:00 +00:00 private-config

19 -rw- 64 Jun 24 2014 23:12:10 +00:00 sensord_CSPRNG1

20 -rw- 64 Jun 24 2014 23:21:44 +00:00 sensord_CSPRNG0

21 drw- 0 Jul 31 2014 18:29:32 +00:00 configs

APフラッシュの再フォーマット

flash:1:filesystemは、AP802で使用されるパーティションです。  このテストでは、このファイルシステムをフォーマットしてクリーンにワイプし、AP802をリブートしてAPブートローダでブートします。(注：必要な場合を除き、APフラッシュを再フォーマットしないでください。これは説明用に行います)。

819HWD#format flash:1:/

Format operation may take a while. Continue? [confirm]y

Format operation will destroy all data in "flash:1:". Continue? [confirm]y

Format: All system sectors written. OK...

Format: Total sectors in formatted partition: 80801

Format: Total bytes in formatted partition: 41370112

Format: Operation completed successfully.

Format of flash:1: complete

819HWD#service-module wlan-ap 0 reset

Use reset only to recover from shutdown or failed state

AP config will not be saved

Do you want to reset?[confirm]y

Trying to reload Service Module wlan-ap0.

Pause - wait for open files to finish...

819HWD#

*Sep 15 17:28:30.232: %SECONDCORE-5-BOOTSTAGE: ROMMON on 2nd core UP

*Sep 15 17:28:30.248: %SECONDCORE-5-BOOTSTAGE: AP-BOOTLOADER on 2nd core UP

AP802への接続

AP802のコンソールに接続して、フラッシュが空になったことを確認します。

819HWD#service-module wlan-ap 0 session

Trying 192.168.148.8, 2002 ... Open

Connecting to AP console, enter Ctrl-^ followed by x,

then "disconnect" to return to router prompt

ap: dir flash:

Directory of flash:/

41168896 bytes available (139264 bytes used)

ap:

Ctrl-^x

819HWD#disco

Closing connection to 192.168.148.8 [confirm]y

AP IOSをルータのフラッシュにコピー

TFTP(Trivial File Transfer Protocol)サーバからルータのメインフラッシュパーティションに目的のAP IOS tarballをコピーします。  この場合、ap802-k9w7-tar.152-4.JB5.tarを使用します。これは自律型IOS 15.2(4)JB5です。  (記事「アクセスポイントIOSイメージについて」を参照してください)。

819HWD#copy tftp flash:

Address or name of remote host [192.168.148.1]?

Source filename [/192.168.148.1/ap802-k9w7-tar.152-4.JB5.tar]? ap802-k9w7-tar.152-4.JB5.tar

Destination filename [ap802-k9w7-tar.152-4.JB5.tar]?

Accessing tftp://192.168.148.1/ap802-k9w7-tar.152-4.JB5.tar...

Loading ap802-k9w7-tar.152-4.JB5.tar from 192.168.148.1 (via GigabitEthernet0): !!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

[OK - 13834240 bytes]

13834240 bytes copied in 46.368 secs (298357 bytes/sec)

AP IOSの抽出

archive tar /xtractコマンドを使用して、tarballをAPフラッシュ(flash:1:)にアンバルします。

819HWD#archive tar /xtract ap802-k9w7-tar.152-4.JB5.tar flash:1:

extracting info (282 bytes)

ap802-k9w7-mx.152-4.JB5/ (directory)

ap802-k9w7-mx.152-4.JB5/html/ (directory)

[ ... ]

extracting info.ver (282 bytes)

819HWD#dir flash:1:

Directory of flash:1:/

4 -rw- 282 Sep 15 2014 17:31:40 +00:00 info

5 drw- 0 Sep 15 2014 17:31:42 +00:00 ap802-k9w7-mx.152-4.JB5

199 -rw- 282 Sep 15 2014 17:33:38 +00:00 info.ver

41308160 bytes total (26963968 bytes free)

新しいIOSイメージをブートするようにAPを設定する

AP802のブートローダにコンソール接続し、IOSイメージをブートするように設定します。  APのIOSイメージは通常、flash:/platform-featureset-mx.version/platform-featureset-mx-versionと呼ばれます。  次に、AP IOSをブートします。

819HWD#service-module wlan-ap 0 session

Trying 192.168.148.8, 2002 ... Open

ap: dir flash:

Directory of flash:/

4 -rw- 282

info

5 drw- 0

ap802-k9w7-mx.152-4.JB5

199 -rw- 282

info.ver

26963968 bytes available (14344192 bytes used)

ap:

set BOOT flash:/ap802-k9w7-mx.152-4.JB5/ap802-k9w7-mx.152-4.JB5

ap: reset

Are you sure you want to reset the system (y/n)?y

System resetting...

*Sep 15 17:35:12.758: %SECONDCORE-5-BOOTSTAGE: AP-IOS on 2nd core SAFE FOR RESET

IOS Bootloader - Starting system.

[ ... ]

*Sep 15 17:35:25.329: %SECONDCORE-5-BOOTSTAGE: ROMMON on 2nd core UP

*Sep 15 17:35:25.345: %SECONDCORE-5-BOOTSTAGE: AP-BOOTLOADER on 2nd core UPLoading "flash:/ap802-k9w7-mx.152-4.JB5/ap802-k9w7-mx.152-4.JB5"...###############################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################

File "flash:/ap802-k9w7-mx.152-4.JB5/ap802-k9w7-mx.152-4.JB5" uncompressed and installed, entry point: 0x18003000

[ ... ]

Cisco IOS Software, AP802 Software (AP802-K9W7-M), Version 15.2(4)JB5, RELEASE SOFTWARE (fc1)

[ ... ]

*Sep 15 17:37:29.371: %SECONDCORE-5-BOOTSTAGE: AP-IOS on 2nd core UP

*Sep 15 17:37:37.435: %WLAN_AP_SM-6-UNIFIED_IMAGE: Embedded AP will change boot image to mini-IOS also called LWAPP recovery

Please check router config to ensure connectivity between WLC and AP

Use service-module wlan-ap 0 reload to boot up mini-IOS image on AP

Save the autonomous configuration file with a file name other than

flash:[config.txt] as it will be erased upon AP reload

Press RETURN to get started!

ap>

Ctrl-^x 819HWD#disco

Closing connection to 192.168.148.8 [confirm]y

819HWD#

ルータのフラッシュをクリーンアップし、自律型に設定する

ここで、ルータフラッシュからtarballを削除します。これは、不要になったためです。  また、「WLAN_AP_SM-6-UNIFIED_IMAGE」メッセージに注意してください。これは、ルータがLightweight IOSを実行している必要があるとルータが判断することを示しています。そのため、service-module-wlan n bootimageコマンドを使用して、APが自律（またはLightweight）を実行していることをルータ通知します。

819HWD#del flash:/ap802-k9w7-tar.152-4.JB5.tar

Delete filename [ap802-k9w7-tar.152-4.JB5.tar]?

Delete flash:/ap802-k9w7-tar.152-4.JB5.tar? [confirm]

819HWD#conf t

Enter configuration commands, one per line. End with CNTL/Z.

819HWD(config)#service-module wlan-ap 0 bootimage autonomous

819HWD(config)#end

819HWD#wri

Building configuration...[OK]

ISRにAP801またはAP802があるかどうかを確認する方法

Q：ISRにAP801またはAP802が搭載されているかどうかは、どのようにして確認できますか。

A1. APでshow versionを実行します。

A2. http://www.cisco.com/c/en/us/products/routers/800-series-routers/brochure-listing.html > Cisco 800シリーズISRの比較表