内容

概要

前提条件

要件

使用するコンポーネント

関連製品

表記法

設定

ネットワーク図

設定

確認

Windows 2000 Server ホストの場合

トラブルシュート

トラブルシューティングのためのコマンド

関連情報

概要

このドキュメントでは、外部モデムを使ったポイントツーポイント プロトコル（PPP）ダイヤルイン設定を説明します。

前提条件

要件

Terminal Access Controller Access Controller System（TACACS+）または Remote Authentication Dial-in User Service（RADIUS）サーバがないユーザに対して、ダイヤルインを可能にするために、ユーザ名およびパスワードを設定する必要があります。すべての IP アドレスは、プールからクライアントに渡されます。

この設定には、以下が必要です。

- クライアントに使用させるユーザ名およびパスワード（後で TACACS+ または RADIUS を追加する予定であっても、回線をテストするためにルータに名前をいくつか追加します）

- プール作成用、およびスタティック ルーティング用の IP アドレッシング方式

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づくものです。

- ラボ環境にあり、設定項目に変更のない（デフォルト設定の）Cisco 2511。

- ルータ上のCisco IOS®バージョン12.2(10b)。

- 4 つの外部非同期モデム。

このマニュアルの情報は、特定のラボ環境に置かれたデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドでも、使用する前にその潜在的な影響について確実に理解しておく必要があります。

関連製品

ここで説明する設定は、次のバージョンのハードウェアおよびソフトウェアにも適用できます。

- 非同期インターフェイスを設定できる、非同期インターフェイスおよびシリアル インターフェイスを持つルータ。

- WIC-2A/S、8 または 16 の非同期ポート シリアル インターフェイスを使用できます。

表記法

ドキュメント表記の詳細は、「シスコ テクニカル ティップスの表記法」を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：この文書で使用されているコマンドの詳細を調べるには、「Command Lookup ツール」を使用してください（登録ユーザのみ）。

ネットワーク図

このドキュメントでは、次の図で示されるネットワーク設定を使用しています。

設定

このドキュメントでは、次に示す設定を使用しています。

この設定は、2511 シリーズのルータで Cisco IOS ソフトウェア リリース 12.2(10b) を使用してテストされています。この設定概念は、この例と同様のルータ トポロジや Cisco IOS の 11.0(3) 以降のその他のリリースにも適用されます。

Cisco 2511

Current configuration:

!

version 12.2

service timestamps debug datetime msec

no service password-encryption

no service udp-small-servers

no service tcp-small-servers

!

hostname router1

!

enable secret <deleted>

!

username jason password foo

username laura password letmein

username russ password opensesame

username syed password bar

username tito password knockknock

!--- Usernames and passwords for clients making incoming calls.

modemcap entry default

!--- Modemcap named "default" is applied to the line 2 and line 3 !--- of Serial interfaces. Refer to the Modem-Router Connection Guide !--- and modemcap entry for more information.

!

interface Ethernet0

ip address 192.168.39.1 255.255.255.0

!

interface Serial0

no ip address

!

interface Serial1

no ip address

!

interface Group-Async1

!--- Async configuration for the external modems.

ip unnumbered ethernet0

encapsulation ppp

async mode interactive

peer default ip address pool dialup

!--- Assigns ip address for incoming calls !--- from the "dialup" pool.

no cdp enable

ppp authentication chap

group-range 1 16

!--- Includes lines 1 through 16 in the group-async1 interface.

!

ip local pool dialup 192.168.39.239 192.168.39.254

!--- Defines the range of ip addresses available !--- to the "dialup" pool.

!

line con 0

login

line 1 16

!--- Line configuration for the external modems.

login local

!--- Authenticate incoming calls locally with username and password !--- configured on the router.

autoselect during-login

autoselect ppp

!--- Launch PPP when PPP packets are received from the client.

modem InOut

!--- Allow incoming and outgoing calls.

transport input all

modem autoconfigure type default

!--- Apply the modemcap "default" (configured previously) to initalize !--- the modem. Refer to the link Modem-Router Connection Guide !--- for more information.

stopbits 1 flowcontrol hardware

line aux 0

line vty 0 4

exec-timeout 20 0

password letmein

login

!

end

セントラル オフィスをランダムな間隔で短時間だけ接続したいリモート ユーザにとって、このタイプのダイヤルアップ接続はより安価な解決策となります。上記の設定では、モデムを介してデスクトップからダイヤルアップし、PSTN ネットワークを通じてセントラル オフィスへの PPP 接続を確立します。

この設定を行うには、以下を設定することが必要です。

- 非同期インターフェイス。

- 非同期ライン。

- グローバル コンフィギュレーション モードの IP アドレスのプール。

- モデム パラメータ - modemcap エントリーおよびモデムルーター接続ガイド。

- ダイヤルアップ ネットワーキングは、ホスト内に設定する必要があります。

確認

ここでは、設定が正しく機能していることを確認するために使用する情報を示します。

一部の show コマンドはアウトプット インタープリタ ツールによってサポートされています（登録ユーザ専用）。このツールを使用することによって、show コマンド出力の分析結果を表示できます。

- show users

- show interface

- show line

- show ip route

router1#show users

Line       User       Host(s)              Idle       Location

*  0 con 0                idle                 00:00:00

1 tty 1     jason      Async interface      00:00:34   PPP: 192.168.39.240

3 tty 3                Modem Autoconfigure  00:00:00

4 tty 4                Modem Autoconfigure  00:00:00

5 tty 5                Modem Autoconfigure  00:00:00

6 tty 6                Modem Autoconfigure  00:00:01

7 tty 7                Modem Autoconfigure  00:00:01

8 tty 8                Modem Autoconfigure  00:00:01

9 tty 9                Modem Autoconfigure  00:00:01

10 tty 10               Modem Autoconfigure  00:00:01

11 tty 11               Modem Autoconfigure  00:00:01

12 tty 12               Modem Autoconfigure  00:00:00

13 tty 13               Modem Autoconfigure  00:00:00

14 tty 14               Modem Autoconfigure  00:00:01

15 tty 15               Modem Autoconfigure  00:00:01

16 tty 16               Modem Autoconfigure  00:00:00

Interface  User  Mode  Idle  Peer  Address

router1#show interface asynchronous 1

Async1 is up, line protocol is up

Hardware is Async Serial

Interface is unnumbered. Using address of Ethernet0 (192.168.39.1)

MTU 1500 bytes, BW 115 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set  Keepalive not set

DTR is pulsed for 5 seconds on reset

LCP Open

Open: IPCP

Last input 00:00:28, output 00:00:43, output hang never

Last clearing of "show interface" counters 00:29:49

Input queue: 1/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/16 (active/max active/max total )

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 86 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

34 packets input, 3147 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

2 input errors, 2 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

16 packets output, 383 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

router1#show line

Tty Typ     Tx/Rx    A Modem  Roty AccO AccI   Uses   Noise  Overruns   Int

*    0 CTY              -    -      -    -    -      0       0     0/0       -

A    1 TTY 115200/115200- inout     -    -    -      1       1     0/0       -

*    2 TTY  38400/38400 - inout     -    -    -      0       0     0/0       -

*    3 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    4 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    5 TTY   1200/1200  - inout     -    -    -      0       0     0/0       -

*    6 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    7 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    8 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*    9 TTY   1200/1200  - inout     -    -    -      0       0     0/0       -

*   10 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   11 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   12 TTY 115200/115200- inout     -    -    -      0       0     0/0       -

*   13 TTY 115200/115200- inout     -    -    -      0       0     0/0       -

*   14 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   15 TTY    300/300   - inout     -    -    -      0       0     0/0       -

*   16 TTY    300/300   - inout     -    -    -      0       0     0/0       -

17 AUX   9600/9600  -    -      -    -    -      0       0     0/0       -

18 VTY              -    -      -    -    -      0       0     0/0       -

19 VTY              -    -      -    -    -      0       0     0/0       -

20 VTY              -    -      -    -    -      0       0     0/0       -

21 VTY              -    -      -    -    -      0       0     0/0       -

router1#show line 1

Tty Typ     Tx/Rx    A Modem  Roty AccO AccI   Uses   Noise  Overruns   Int

A    1 TTY 115200/115200- inout     -    -    -      1       1     0/0       -

Line 1, Location: "PPP: 192.168.39.240", Type: ""

Length: 24 lines, Width: 80 columns

Baud rate (TX/RX) is 115200/115200, no parity, 1 stopbits, 8 databits

Status: Ready, Active, No Exit Banner, Async Interface Active

Modem Detected, CTS Raised

Capabilities: Hardware Flowcontrol In, Hardware Flowcontrol Out

Modem Callout, Modem RI is CD, Line usable as async interface

Modem Autoconfigure

Modem state: Ready

Group codes: 0

Line is running PPP for address 192.168.39.240.

0 output packets queued, 1 input packets.

Async Escape map is 00000000000000000000000000000000

Modem hardware state: CTS DSR DTR RTS, Modem Configured

Special Chars: Escape Hold Stop Start Disconnect Activation

^^x none - - none

Timeouts: Idle EXEC Idle Session Modem Answer Session Dispatch

00:10:00 never none not set

Idle Session Disconnect Warning

never

router1#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is not set

C 192.168.39.0/24 is directly connected, Ethernet0

Windows 2000 Server ホストの場合

Windows 2000 ホストのダイヤルアップ接続を設定します。ユーザ名、パスワード、および電話番号を設定し、ダイヤルアップ接続します。

ダイヤルアップ接続が確立されると、ルータで設定されたダイヤル プールから IP アドレスが割り当てられます。ホストで ipconfig コマンドを発行すると、これを検証できます。ホストの PPP アダプタとして表示されます。

C:\Documents and Settings\Administrator>ipconfig

Windows 2000 IP Configuration

Ethernet adapter Local Area Connection:

Media State . . . . . . . . . . . : Cable Disconnected

PPP adapter Dial-up Connection:

Connection-specific DNS Suffix . :

IP Address. . . . . . . . . . . . : 192.168.39.240

Subnet Mask . . . . . . . . . . . : 255.255.255.255

Default Gateway . . . . . . . . . : 192.168.39.240

Windows 2000 Server ホストから Cisco 2511 ルータへの接続を検証するには、ホストからルータのイーサネット ポートに ping を実行して接続が確立されていることを検証します。ここで、192.168.39.1 はルータのイーサネット ポートの IP アドレスです。

C:\Documents and Settings\Administrator>ping 192.168.39.1

Pinging 192.168.39.1 with 32 bytes of data:

Reply from 192.168.39.1: bytes=32 time=170ms TTL=255

Reply from 192.168.39.1: bytes=32 time=111ms TTL=255

Reply from 192.168.39.1: bytes=32 time=110ms TTL=255

Reply from 192.168.39.1: bytes=32 time=100ms TTL=255

Ping statistics for 192.168.39.1:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 100ms, Maximum = 170ms, Average = 122ms

トラブルシュート

ここでは、設定のトラブルシューティングに使用できる情報を示します。

トラブルシューティングのためのコマンド

一部の show コマンドはアウトプット インタープリタ ツールによってサポートされています（登録ユーザ専用）。このツールを使用することによって、show コマンド出力の分析結果を表示できます。

注：debug コマンドを使用する前に、「debug コマンドに関する重要な情報」を参照してください。

- debug ppp negotiation - クライアントが PPP ネゴシエーションを渡しているどうかを確認するためのものです。これは、アドレス ネゴシエーションをチェックするときに行います。

- debug ppp authentication - クライアントが認証を渡しているかどうかを確認するためのものです。

- debug ppp error - PPP の接続ネゴシエーションや動作に関連するプロトコル エラーおよびエラーの統計を表示します。

- debug modem - ルータがモデムから正しい信号を受信しているかどうかを確認するためのものです。

- show line [# tty line] - モデムのハードウェア状態を探すためのものです。

次の出力は Cisco 2511 ルータから取得したものです。この出力は、Cisco 2511 の PSTN リンクにダイヤル アウトし、PPP 接続を確立する Windows 2000 サーバを示します。

router1#debug ppp negotiation

PPP protocol negotiation debugging is on

router1#debug vtemplate

Virtual Template debugging is on

router1#show debug

PPP:

PPP protocol negotiation debugging is on

Dec 10 18:43:59.079: As1 LCP: I CONFREQ [Closed] id 1 len 50

Dec 10 18:43:59.083: As1 LCP:    ACCM 0x00000000 (0x020600000000)

Dec 10 18:43:59.087: As1 LCP:    MagicNumber 0x59F402A1 (0x050659F402A1)

Dec 10 18:43:59.087: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.091: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.091: As1 LCP:    Callback 6  (0x0D0306)

Dec 10 18:43:59.095: As1 LCP:    MRRU 1614 (0x1104064E)

Dec 10 18:43:59.099: As1 LCP:    EndpointDisc 1 Local

Dec 10 18:43:59.099: As1 LCP:     (0x131701714C44F0EC8F45BABDC596D14B)

Dec 10 18:43:59.103: As1 LCP:     (0x79DB5300000000)

Dec 10 18:43:59.107: As1 LCP: Lower layer not up, Fast Starting

Dec 10 18:43:59.107: As1 PPP: Treating connection as a dedicated line

Dec 10 18:43:59.111: As1 PPP: Phase is ESTABLISHING,

Active Open [0 sess, 0 load]

Dec 10 18:43:59.115: As1 LCP: O CONFREQ [Closed] id 3 len 25

Dec 10 18:43:59.119: As1 LCP:    ACCM 0x000A0000 (0x0206000A0000)

Dec 10 18:43:59.123: As1 LCP:    AuthProto CHAP (0x0305C22305)

Dec 10 18:43:59.127: As1 LCP:    MagicNumber 0x002AF05C (0x0506002AF05C)

Dec 10 18:43:59.127: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.131: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.135: As1 LCP: O CONFREJ [REQsent] id 1 len 11

Dec 10 18:43:59.139: As1 LCP:    Callback 6  (0x0D0306)

Dec 10 18:43:59.139: As1 LCP:    MRRU 1614 (0x1104064E)

Dec 10 18:43:59.155: %LINK-3-UPDOWN: Interface Async1,

changed state to up

Dec 10 18:43:59.263: As1 LCP: I CONFACK [REQsent] id 3 len 25

Dec 10 18:43:59.267: As1 LCP:    ACCM 0x000A0000 (0x0206000A0000)

Dec 10 18:43:59.267: As1 LCP:    AuthProto CHAP (0x0305C22305)

Dec 10 18:43:59.271: As1 LCP:    MagicNumber 0x002AF05C (0x0506002AF05C)

Dec 10 18:43:59.275: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.275: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.279: As1 LCP: I CONFREQ [ACKrcvd] id 2 len 43

Dec 10 18:43:59.283: As1 LCP:    ACCM 0x00000000 (0x020600000000)

Dec 10 18:43:59.287: As1 LCP:    MagicNumber 0x59F402A1 (0x050659F402A1)

Dec 10 18:43:59.287: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.291: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.291: As1 LCP:    EndpointDisc 1 Local

Dec 10 18:43:59.295: As1 LCP:     (0x131701714C44F0EC8F45BABDC596D14B)

Dec 10 18:43:59.299: As1 LCP:     (0x79DB5300000000)

Dec 10 18:43:59.303: As1 LCP: O CONFACK [ACKrcvd] id 2 len 43

Dec 10 18:43:59.307: As1 LCP:    ACCM 0x00000000 (0x020600000000)

Dec 10 18:43:59.311: As1 LCP:    MagicNumber 0x59F402A1 (0x050659F402A1)

Dec 10 18:43:59.311: As1 LCP:    PFC (0x0702)

Dec 10 18:43:59.315: As1 LCP:    ACFC (0x0802)

Dec 10 18:43:59.315: As1 LCP:    EndpointDisc 1 Local

Dec 10 18:43:59.319: As1 LCP:     (0x131701714C44F0EC8F45BABDC596D14B)

Dec 10 18:43:59.323: As1 LCP:     (0x79DB5300000000)

Dec 10 18:43:59.327: As1 LCP: State is Open

Dec 10 18:43:59.327: As1 PPP: Phase is AUTHENTICATING,

by this end [0 sess, 1 load]

Dec 10 18:43:59.331: As1 CHAP: O CHALLENGE id 2 len 25 from "router1"

Dec 10 18:43:59.459: As1 LCP: I IDENTIFY [Open] id 3 len 18 magic

0x59F402A1 MSRASV5.00

Dec 10 18:43:59.463: As1 LCP: I IDENTIFY [Open] id 4 len 28 magic

0x59F402A1

MSRAS-1-LAB-WIN2K-PC

Dec 10 18:43:59.467: As1 CHAP: I RESPONSE id 2 len 26 from "jason"

Dec 10 18:43:59.479: As1 CHAP: O SUCCESS id 2 len 4

Dec 10 18:43:59.483: As1 PPP: Phase is UP [0 sess, 1 load]

Dec 10 18:43:59.487: As1 IPCP: O CONFREQ [Closed] id 1 len 10

Dec 10 18:43:59.491: As1 IPCP:    Address 192.168.39.1

(0x0306C0A82701)

Dec 10 18:43:59.567: As1 CCP: I CONFREQ [Not negotiated] id 5 len 10

Dec 10 18:43:59.571: As1 CCP:    MS-PPC supported bits 0x00000001

(0x120600000001)

Dec 10 18:43:59.575: As1 LCP: O PROTREJ [Open] id 4 len 16 protocol CCP

(0x80FD0105000A120600000001)

Dec 10 18:43:59.599: As1 IPCP: I CONFREQ [REQsent] id 6 len 40

Dec 10 18:43:59.603: As1 IPCP:    CompressType VJ 15 slots CompressSlotID

(0x0206002D0F01)

Dec 10 18:43:59.607: As1 IPCP:    Address 0.0.0.0 (0x030600000000)

Dec 10 18:43:59.611: As1 IPCP:    PrimaryDNS 0.0.0.0 (0x810600000000)

Dec 10 18:43:59.615: As1 IPCP:    PrimaryWINS 0.0.0.0 (0x820600000000)

Dec 10 18:43:59.615: As1 IPCP:    SecondaryDNS 0.0.0.0 (0x830600000000)

Dec 10 18:43:59.619: As1 IPCP:    SecondaryWINS 0.0.0.0 (0x840600000000)

Dec 10 18:43:59.623: As1 IPCP: O CONFREJ [REQsent] id 6 len 34

Dec 10 18:43:59.627: As1 IPCP:    CompressType VJ 15 slots CompressSlotID

(0x0206002D0F01)

Dec 10 18:43:59.631: As1 IPCP:    PrimaryDNS 0.0.0.0 (0x810600000000)

Dec 10 18:43:59.635: As1 IPCP:    PrimaryWINS 0.0.0.0 (0x820600000000)

Dec 10 18:43:59.639: As1 IPCP:    SecondaryDNS 0.0.0.0 (0x830600000000)

Dec 10 18:43:59.643: As1 IPCP:    SecondaryWINS 0.0.0.0 (0x840600000000)

Dec 10 18:43:59.647: As1 IPCP: I CONFACK [REQsent] id 1 len 10

Dec 10 18:43:59.651: As1 IPCP:    Address 192.168.39.1 (0x0306C0A82701)

Dec 10 18:43:59.735: As1 IPCP: I CONFREQ [ACKrcvd] id 7 len 10

Dec 10 18:43:59.739: As1 IPCP:    Address 0.0.0.0 (0x030600000000)

Dec 10 18:43:59.743: As1 IPCP: O CONFNAK [ACKrcvd] id 7 len 10

Dec 10 18:43:59.747: As1 IPCP:    Address 192.168.39.240

(0x0306C0A827F0)

Dec 10 18:43:59.835: As1 IPCP: I CONFREQ [ACKrcvd] id 8 len 10

Dec 10 18:43:59.839: As1 IPCP:    Address 192.168.39.240 (0x0306C0A827F0)

Dec 10 18:43:59.843: As1 IPCP: O CONFACK [ACKrcvd] id 8 len 10

Dec 10 18:43:59.847: As1 IPCP:    Address 192.168.39.240 (0x0306C0A827F0)

Dec 10 18:43:59.851: As1 IPCP: State is Open

Dec 10 18:43:59.863: As1 IPCP: Install route to 192.168.39.240

Dec 10 18:44:00.483: %LINEPROTO-5-UPDOWN:

Line protocol on Interface Async1, changed state to up

関連情報

- アクセスダイヤル テクノロジーのサポート

- modemcap エントリー

- モデムルーター接続ガイド

- テクニカルサポート - Cisco Systems