内容

概要

問題

解決方法

関連情報

概要

このドキュメントでは、ダイヤラインターフェイス上のポイントツーポイント プロトコル（PPP）セッションの状態を追跡する新しい CLI について説明します。

問題

ダイヤラインターフェイスは、デジタル加入者線（DSL）の世界で Point-to-Point Protocol over Ethernet（PPPoE）、Point-to-Point Protocol over Asynchronous Transfer Mode（PPPoA）などのさまざまな接続環境で広く使用されています。ダイヤラインターフェイスは、その上にある PPP セッションが稼働中か停止中かに関係なく、常に稼働しています。この動作に関する既知の問題の 1 つは、インターネット プロトコル サービス レベル契約（IP SLA）などの追加の追跡機能を使用してダイヤラインターフェイス上の到達可能性をチェックしない限り、発信接続が複数ある場合にブラックホールルーティングを引き起こす可能性があることです。

解決方法

新しい CLI の dialer down-with-vInterface が最近の IOS バージョンに導入されました。これにより、PPP セッションが停止するとダイヤラインターフェイスも停止します。

DSL ルータ設定の一部抜粋：

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname cisco@cisco.com

ppp chap password 0 cisco

PPPoE セッションが停止していても、ダイヤラインターフェイスは稼働状態です。

Router#show pppoe session

1 client session

Uniq ID  PPPoE  RemMAC          Port                    VT  VA         State

SID  LocMAC                                      VA-st      Type

N/A     58  00c1.64d5.41d1  Gi0/1                   Di1 N/A        PADISNT

0006.f657.67b1

Router#show interface dialer1

Dialer1 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address will be negotiated using IPCP

MTU 1500 bytes, BW 56 Kbit/sec, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, LCP Closed, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 1 seconds on reset

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:49:48

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

0 packets input, 0 bytes

538 packets output, 7524 bytes

CLIENT(config-if)

次のように、ダイヤラインターフェイスの設定で新しい CLI を追加できます。

Router(config)#int dialer1

Router(config-if)# dialer down-with-vInterface

dialer down-with-vInterface CLI を入力しておくと、例に示すように、PPP セッションがダウン状態になると、ダイヤラインターフェイスもダウン状態になります。

Router#show interface dialer1

Dialer1 is down, line protocol is down (spoofing)

Hardware is Unknown

Internet address will be negotiated using IPCP

MTU 1500 bytes, BW 56 Kbit/sec, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, LCP Closed, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 1 seconds on reset

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:50:36

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

0 packets input, 0 bytes

538 packets output, 7524 bytes

これにより、ダイヤラインターフェイスの使用中にルーティング フェールオーバーが機能するために、IP SLA やトラッキング機能などを追加で設定する必要がなくなります。

関連情報

- PPPoE 設定ガイド