内容

概要

前提条件

要件

使用するコンポーネント

表記法

背景説明

設定

ネットワーク図

コール プロセス

設定

確認

Raleigh 5300A ルータの検証

Raleigh 3640A ルータの検証

San Jose 5300A ルータの検証

San Jose 3640A ルータの検証

ゲートキーパー コールの説明

トラブルシュート

トラブルシューティングのためのコマンド

関連情報

概要

このドキュメントでは、ゲートキーパーのある VoIP ネットワークの設定方法および検証方法について説明します。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- Cisco IOS® Software リリース 12.1（1）

- Cisco AS5300 および Cisco 3640 ルータ

注：すべてのシスコプラットフォームでゲートキーパー機能を使用するには、Cisco IOSフィーチャセット – x – をロードする必要があります。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細は、「シスコ テクニカル ティップスの表記法」を参照してください。

背景説明

ゲートキーパーは、H.323 端末とゲートウェイのアドレス変換および LAN へのアクセス制御を提供する LAN 上の H.323 エンティティです。ゲートキーパーは、H.323 端末とゲートウェイに、帯域幅管理やゲートウェイの配置などのその他のサービスも提供できます。ゲートキーパーは、マルチメディア ネットワークにあるデバイスのレジストリを管理します。これらのデバイスは起動時にゲートキーパーに登録され、コールのアドミッション（受け付け）をゲートキーパーに要求します。

このドキュメントに記載するゲートキーパーの設定は以下の目的で使用できます。

- 複数のゲートウェイおよびエンド デバイスを設置した VoIP 実装を拡張する

この設定では、中央ポイントであるゲートキーパーで変更を適用できます。

- ネットワーク上のコールの数を制限するためにコール アドミッション制御（CAC）を行う

- ネットワークでプロキシの使用を実装し、VoIP コールをデータ トラフィックと分けて処理する

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：この文書で使用されているコマンドの詳細を調べるには、「Command Lookup ツール」を使用してください（登録ユーザのみ）。

ネットワーク図

このネットワークは、2 つの Cisco AS5300 ゲートウェイを持つ単純なトポロジです。1 つのゲートウェイは San Jose、もう 1 つは Raleigh にあります。各サイトには、Cisco 3640 で実行されているゲートキーパー設定があります。この項で説明するトポロジでは、実際にはゲートキーパーを使用して 2 つのゲートウェイ間で単純な VoIP コールを確立する必要はありません。図にゲートキーパーを含めているのは、全体の設定内容を示すためです。

このトポロジの Cisco ゲートキーパー設定は、次の点で通常の VoIP 実装と異なります。

- ゲートウェイ設定用の各ゲートウェイは、h323-gateway voip interfaceコマンドを使用してローカルゲートキーパーに登録されます。この場合のゲートウェイは AS5300、ゲートキーパーは 3640 です。

- dial-peer voice 2 voipコマンドのsession targetは、適切なipv4:IPアドレスの代わりに、登録、アドミッション、およびステータス(RAS)を指定します。RAS は次のタスクを実行します。

- ゲートキーパーに登録するゲートウェイの場所を定義する

- 各コールのアドミッション要求を送信する

- コールのステータス情報のポーリングを行う

H.323 ネットワークでは、ゾーンごとにプライマリ ゲートキーパーを 1 つ配置します。ゲートキーパーは、そのゾーン内にある複数のゲートウェイやエンド H.323 デバイスを制御できます。この項で例証する設定では、コールが適切なゾーンとゲートキーパーにルーティングされます。次に、ゲートキーパーは、着信番号に一致するテクノロジープレフィクス(tech-prefix)を持つ登録済みゲートウェイのIPアドレスを使用して、コール要求に応答します。

コール プロセス

次の各ステップでは、ゲートキーパー プロセスの機能方法について説明します。Raleigh 側の電話機が San Jose 側の電話機に発信します。

1. Raleigh 5300A が PBX から 4085556400（San Jose PBX に接続された電話）へのコールを受信する。

この番号はdial-peer voice 2 voipの下の番号と一致して、テクノロジープレフィクスも408#です。

2. Raleigh 側ゲートキーパー Raleigh 3640A に対するアドミッション要求には、テクノロジー プレフィックスおよび着信者番号が 408#4085556400 の形式で含まれています。

408556400は408のzone prefixコマンドと一致します。...

3. Raleigh 側ゲートキーパーがロケーション要求を San Jose 側ゲートキーパー San Jose 3640A に送信します。

4. San Jose 側ゲートキーパーの設定には、テクノロジー プレフィックス 408# で登録された San Jose 5300A が含まれているため、San Jose 側ゲートキーパーは San Jose 5300 の IP アドレス で Raleigh 側ゲートキーパーに応答する。

5. この IP アドレスがアドミッション確認（ACF）で Raleigh 5300A に転送される。

6. Raleigh 5300A が San Jose 5300A との通常の H.323 コールをオープンする。

設定

このドキュメントでは、次の構成を使用します。

- Raleigh 5300A

- Raleigh 3640A

- San Jose 5300A

- San Jose 3640A

Raleigh 5300A

Raleigh5300A# show run

Building configuration...

Current configuration:

!

! Last configuration change at 00:15:38 UTC Tue Mar 28 2000

! NVRAM config last updated at 00:15:39 UTC Tue Mar 28 2000

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

no service password–encryption

!

hostname Raleigh5300A

!

logging buffered 50000 debugging

enable secret < password > [Choose a strong password with at least one capital letter, one number, and one special character.]

!

!

!

resource–pool disable

!

!

!

!

!

clock calendar–valid

ip subnet–zero

!

isdn switch–type primary–5ess

isdn voice–call–failure 0

mta receive maximum–recipients 0

!

!

controller T1 0

framing esf

clock source line primary

linecode b8zs

pri–group timeslots 1–24

!

controller T1 1

clock source line secondary 1

!

controller T1 2

!

controller T1 3

!

!

voice–port 0:D

!

!

dial–peer voice 1 pots

answer–address 9195552001

destination–pattern 919#9195552...

direct–inward–dial

port 0:D

prefix 919

!

dial–peer voice 2 voip

destination–pattern 4085556400

tech–prefix 408#

session target ras

!

num–exp 6... 4085556...

gateway

!

interface Ethernet0

no ip address

shutdown

!

interface Serial0:23

no ip address

ip mroute–cache

isdn switch–type primary–5ess

isdn incoming–voice modem

fair–queue 64 256 0

no cdp enable

!

interface FastEthernet0

ip address 172.16.120.2 255.255.255.0

duplex auto

speed auto

h323–gateway voip interface

h323–gateway voip id RALgk1 ipaddr 172.16.120.1 1718

h323–gateway voip h323–id RAL5300A@cisco.com

h323–gateway voip tech–prefix 919#

!

ip classless

ip route 172.16.110.0 255.255.255.0 172.16.120.10

no ip http server

!

line con 0

transport input none

line 1 48

transport output lat pad telnet rlogin udptn v120 lapb–ta

line aux 0

line vty 0 4

password cisco

login

!

ntp clock–period 17179850

ntp server 172.16.110.10

end

Raleigh 3640A

Raleigh3640A# show run

Building configuration...

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

no service password–encryption

!

hostname Raleigh3640A

!

logging buffered 50000 debugging

enable secret < password > [Choose a strong password with at least one capital letter, one number, and one special character.]

!

!

!

!

!

ip subnet–zero

!

ip dvmrp route–limit 20000

!

!

!

!

!

interface Ethernet1/0

ip address 172.16.120.1 255.255.255.0

!

interface Serial1/0

no ip address

no ip mroute–cache

no fair–queue

!

interface TokenRing1/0

no ip address

shutdown

ring–speed 16

!

ip classless

ip route 172.16.110.0 255.255.255.0 172.16.120.10

no ip http server

!

!

gatekeeper

zone local RALgk1 cisco.com

zone remote SJgk1 cisco.com 172.16.110.1 1719

zone prefix SJgk1 408.......

gw–type–prefix 408#*

no shutdown

!

!

line con 0

transport input none

line aux 0

line vty 0 4

password cisco

login

!

ntp clock–period 17179864

ntp server 172.16.110.10

end

San Jose 5300A

SanJose5300A# show run

Building configuration...

Current configuration:

!

! Last configuration change at 00:15:49 UTC Tue Mar 28 2000

! NVRAM config last updated at 00:15:50 UTC Tue Mar 28 2000

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

no service password–encryption

!

hostname SanJose5300A

!

logging buffered 50000 debugging

enable secret < password > [Choose a strong password with at least one capital letter, one number, and one special character.]

!

!

!

resource–pool disable

!

!

!

!

!

ip subnet–zero

!

isdn voice–call–failure 0

mta receive maximum–recipients 0

!

!

controller T1 0

framing esf

clock source line primary

linecode b8zs

ds0–group 1 timeslots 1–4 type e&m–immediate–start

!

controller T1 1

clock source line secondary 1

!

controller T1 2

!

controller T1 3

!

!

voice–port 0:1

!

!

dial–peer voice 1 pots

answer–address 4085556001

destination–pattern 408#4085556...

direct–inward–dial

port 0:1

prefix 6

!

dial–peer voice 2 voip

destination–pattern 9195552...

tech–prefix 919#

session target ras

!

num–exp 2... 9195552...

gateway

!

interface Ethernet0

no ip address

!

interface FastEthernet0

ip address 172.16.110.2 255.255.255.0

duplex auto

speed auto

h323–gateway voip interface

h323–gateway voip id SJgk1 ipaddr 172.16.110.1 1718

h323–gateway voip h323–id SJ5300A@cisco.com

h323–gateway voip tech–prefix 408#

!

ip classless

ip route 172.16.120.0 255.255.255.0 172.16.110.10

no ip http server

!

!

!

line con 0

transport input none

line aux 0

line vty 0 4

password cisco

login

!

ntp clock–period 17179892

ntp server 172.16.110.10

end

San Jose 3640A

SanJose3640A# show run

Building configuration...

Current configuration:

!

! NVRAM config last updated at 00:05:33 UTC Tue Mar 28 2000

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

no service password–encryption

!

hostname SanJose3640A

!

boot system flash c3640–ix–mz.120–7.T

logging buffered 50000 debugging

enable secret < password > [Choose a strong password with at least one capital letter, one number, and one special character.]

!

!

!

!

!

ip subnet–zero

!

ip dvmrp route–limit 20000

!

!

interface Ethernet1/0

ip address 172.16.110.1 255.255.255.0

!

interface Serial1/0

no ip address

no ip mroute–cache

shutdown

no fair–queue

!

interface Ethernet1/1

no ip address

shutdown

!

ip classless

ip route 172.16.120.0 255.255.255.0 172.16.110.10

no ip http server

!

tftp–server flash:c3640–ix–mz.121–1.bin

!

gatekeeper

zone local SJgk1 cisco.com

zone remote RALgk1 cisco.com 172.16.120.1 1719

zone prefix RALgk1 919.......

gw–type–prefix 919#*

no shutdown

!

!

line con 0

transport input none

line aux 0

line vty 0 4

password cisco

login

!

ntp server 172.16.110.10

end

確認

このセクションでは、設定が正しく動作していることを確認するために使用できる情報を示します。

一部の show コマンドはアウトプット インタープリタ ツールによってサポートされています（登録ユーザ専用）。このツールを使用することによって、show コマンド出力の分析結果を表示できます。

- show debug：使用可能な debug コマンドを表示する

- undebug all：すべてのデバッグをオフにする

- show gatekeeper：ゲートキーパーの状況を表示する

- show log：ログ ファイル出力を表示する

- show call active voice brief： アクティブ コール テーブルの内容を簡易版で表示する

ディスプレイには、現在の接続をルータ経由で使用するすべてのコールが表示されます。

- show call active voice：アクティブ コール テーブルの内容を表示する

ディスプレイには、現在の接続をルータ経由で使用するすべてのコールが表示されます。

- show gatekeeper endpoints：ゲートキーパーへのエンドポイントの登録状況を表示する

- show gatekeeper call：ゲートキーパーが処理したアクティブ コールを表示する

- show gatekeeper gw：テクノロジー プレフィックスのエンドポイント登録状況を表示する

Raleigh 5300A ルータの検証

Raleigh5300A# show debug

ISDN:

ISDN Q931 packets debugging is on

ISDN Q931 packets debug DSLs. (On/Off/No DSL:1/0/–)

DSL  0 ––>  7

1 – – – – – – –

H.323 RAS:

H.323 RAS Messages debugging is on

voip:

voip ccAPI function enter/exit debugging is on

Raleigh5300A# undebug all

All possible debugging has been turned off

Raleigh5300A# show gatekeeper

Gateway  RAL5300A@cisco.com  is registered to Gatekeeper RALgk1

Alias list (CLI configured)

H323–ID RAL5300A@cisco.com

Alias list (last RCF)

H323–ID RAL5300A@cisco.com

H323 resource thresholding is Disabled

Raleigh5300A# show log

Syslog logging: enabled (0 messages dropped, 0 flushes, 0 overruns)

Console logging: level debugging, 1048 messages logged

Monitor logging: level debugging, 0 messages logged

Buffer logging: level debugging, 1048 messages logged

Trap logging: level informational, 106 message lines logged

Log Buffer (50000 bytes):

Mar 28 00:22:47.624: ISDN Se0:23: RX <–  SETUP pd = 8  callref = 0x30

Mar 28 00:22:47.624:         Bearer Capability i = 0x8090A2

Mar 28 00:22:47.624:         Channel ID i = 0xA98393

Mar 28 00:22:47.624:  Calling Party Number i = 0x2180, '9195552010', Plan:ISDN,

Type:National

Mar 28 00:22:47.624:  Called Party Number i = 0xA1, '4085556400', Plan:ISDN,

Type:National

Mar 28 00:22:47.628: ISDN Se0:23: TX –>  CALL_PROC pd = 8  callref = 0x8030

Mar 28 00:22:47.628:         Channel ID i = 0xA98393

Mar 28 00:22:47.628: ISDN Se0:23: TX –>  ALERTING pd = 8  callref = 0x8030

Mar 28 00:22:48.016: cc_api_call_setup_ind (vdbPtr=0x61B9ADAC,

callInfo={called=4085556400,

calling=9195552010, fdest=1 peer_tag=1}, callID=0x61A088C4)

Mar 28 00:22:48.020: cc_process_call_setup_ind (event=0x61BB71B8)

handed call to app "SESSION"

Mar 28 00:22:48.020: sess_appl: ev(23=CC_EV_CALL_SETUP_IND), cid(32), disp(0)

Mar 28 00:22:48.020: ccCallSetContext (callID=0x20, context=0x61A2C368)

Mar 28 00:22:48.020: ssaCallSetupInd finalDest cllng(9195552010),

clled(4085556400)

Mar 28 00:22:48.020: ssaSetupPeer cid(32) peer list:  tag(2)

called number (4085556400)

Mar 28 00:22:48.020: ssaSetupPeer cid(32), destPat(4085556400),

matched(10), prefix(),

peer(61C088AC)

Mar 28 00:22:48.020: ccCallProceeding (callID=0x20, prog_ind=0x0)

Mar 28 00:22:48.020: ccCallSetupRequest (Inbound call = 0x20, outbound

peer =2, dest=,

params=0x61A2C37C mode=0, *callID=0x61BBE868)

Mar 28 00:22:48.020: callingNumber=9195552010, calledNumber=4085556400,

redirectNumber=

Mar 28 00:22:48.020: accountNumber=, finalDestFlag=1,

guid=1acb.27d8.98f4.0043.0000.0000.205d.0abc

Mar 28 00:22:48.020: peer_tag=2

Mar 28 00:22:48.020: ccIFCallSetupRequest: (vdbPtr=0x6174EC64, dest=, callParams=

{called=4085556400, calling=9195552010, fdest=1, voice_peer_tag=2}, mode=0x0)

Mar 28 00:22:48.020: ccCallSetContext (callID=0x21, context=0x61A8FD88)

Mar 28 00:22:48.024: RASlib::ras_sendto: msg length 115 from 172.16.120.2:51726 to

172.16.120.1:1719

Mar 28 00:22:48.024: RASLib::RASSendARQ: ARQ (seq# 12119) sent to 172.16.120.1

Mar 28 00:22:48.028: RASLib::RASRecvData: successfully

rcvd message of length 7 from 172.16.120.1:1719

Mar 28 00:22:48.028: RASLib::RASRecvData: RIP (seq# 12119) rcvd

from [172.16.120.1:1719] on sock[61A18664]

Mar 28 00:22:48.044: RASLib::RASRecvData: successfully rcvd message

of length 24 from 172.16.120.1:1719

Mar 28 00:22:48.044: RASLib::RASRecvData: ACF (seq# 12119)

rcvd from [172.16.120.1:1719] on sock [0x61A18664]

Mar 28 00:22:49.232: cc_api_call_alert(vdbPtr=0x6174EC64,

callID=0x21, prog_ind=0x8, sig_ind=0x1)

Mar 28 00:22:49.232: sess_appl: ev(7=CC_EV_CALL_ALERT), cid(33), disp(0)

Mar 28 00:22:49.232: ssaTraceSct: cid(33)st(1)oldst(0)cfid(–1)

csize(0)in(0)fDest(0)–cid2(32)st2(1)oldst2(0)

Mar 28 00:22:49.232: ccCallAlert (callID=0x20, prog_ind=0x8, sig_ind=0x1)

Mar 28 00:22:49.232: ccConferenceCreate (confID=0x61BBE8B0,

callID1=0x20, callID2=0x21, tag=0x0)

Mar 28 00:22:49.232: cc_api_bridge_done (confID=0xD, srcIF=0x6174EC64,

srcCallID=0x21,

dstCallID=0x20, disposition=0, tag=0x0)

Mar 28 00:22:49.232: cc_api_bridge_done (confID=0xD,

srcIF=0x61B9ADAC, srcCallID=0x20,

dstCallID=0x21, disposition=0, tag=0x0)

Mar 28 00:22:49.232: cc_api_caps_ind (dstVdbPtr=0x6174EC64,

dstCallId=0x21, srcCallId=0x20,

caps={codec=0xEBF7, fax_rate=0xFF, vad=0x3, modem=0x3

codec_bytes=1638535964, signal_type=2})

Mar 28 00:22:49.236: sess_appl: ev(28=CC_EV_CONF_CREATE_DONE), cid(32), disp(0)

Mar 28 00:22:49.236: ssaTraceSct: cid(32)st(3)oldst(0)cfid(13)

csize(0)in(1)fDest(1)–cid2(33)st2(3)oldst2(1)

Mar 28 00:22:49.844: cc_api_caps_ind (dstVdbPtr=0x61B9ADAC,

dstCallId=0x20, srcCallId=0x21,

caps={codec=0x4, fax_rate=0x2, vad=0x2, modem=0x1

codec_bytes=20, signal_type=0})

Mar 28 00:22:49.844: cc_api_caps_ack (dstVdbPtr=0x61B9ADAC,

dstCallId=0x20, srcCallId=0x21,

caps={codec=0x4, fax_rate=0x2, vad=0x2, modem=0x1

codec_bytes=20, signal_type=0})

Mar 28 00:22:49.848: cc_api_caps_ack (dstVdbPtr=0x6174EC64,

dstCallId=0x21, srcCallId=0x20,

caps={codec=0x4, fax_rate=0x2, vad=0x2, modem=0x1

codec_bytes=20, signal_type=0})

Mar 28 00:22:51.504: cc_api_call_connected(vdbPtr=0x6174EC64, callID=0x21)

Mar 28 00:22:51.508: sess_appl: ev(8=CC_EV_CALL_CONNECTED), cid(33), disp(0)

Mar 28 00:22:51.508: ssaTraceSct: cid(33)st(4)oldst(1)cfid(13)

csize(0)in(0)fDest(0)–cid2(32)st2(4)oldst2(3)

Mar 28 00:22:51.508: ccCallConnect (callID=0x20)

Mar 28 00:22:51.508: ssaFlushPeerTagQueue cid(32) peer list: (empty)

Mar 28 00:22:51.508: ISDN Se0:23: TX –>  CONNECT pd = 8  callref = 0x8030

Mar 28 00:22:51.564: ISDN Se0:23: RX <–  CONNECT_ACK pd = 8  callref = 0x30

Mar 28 00:22:51.564: ISDN Se0:23: CALL_PROGRESS:

CALL_CONNECTED call id 0x11, bchan –1, dsl 0

Mar 28 00:22:54.620: cc_api_call_digit_begin

(vdbPtr=0x61B9ADAC, callID=0x20, digit=1, flags=0x1,

timestamp=0xCAAF06B, expiration=0x0)

Mar 28 00:22:54.620: sess_appl: ev(10=CC_EV_CALL_DIGIT_BEGIN),

cid(32), disp(0)

Mar 28 00:22:54.620: ssaTraceSct: cid(32)st(5)oldst(3)cfid(13)

csize(0)in(1)fDest(1)–cid2(33)st2(5)

oldst2(4)

Mar 28 00:22:54.620: ccCallDigitBegin (callID=0x21, db=0x61BBE8EC)

Mar 28 00:22:54.700: cc_api_call_digit (vdbPtr=0x61B9ADAC,

callID=0x20, digit=1, duration=130)

Mar 28 00:22:54.700: sess_appl: ev(9=CC_EV_CALL_DIGIT), cid(32), disp(0)

Mar 28 00:22:54.700: ssaTraceSct: cid(32)st(5)oldst(5)cfid(13)

csize(0)in(1)fDest(1)–cid2(33)st2(5)

oldst2(4)

Mar 28 00:22:54.700: ccCallDigitEnd (callID=0x21, de=0x61BBE8EC)

Mar 28 00:22:55.120: ISDN Se0:23: RX <–  DISCONNECT pd = 8  callref = 0x30

Mar 28 00:22:55.120:         Cause i = 0x8090 – Normal call clearing

Mar 28 00:22:55.120: %ISDN–6–DISCONNECT: Interface Serial0:18

disconnected from 9195552010 , call lasted 3 seconds

Mar 28 00:22:55.124: ISDN Se0:23: TX –>  RELEASE pd = 8  callref = 0x8030

Mar 28 00:22:55.124: cc_api_call_disconnected(vdbPtr=0x61B9ADAC,

callID=0x20, cause=0x10)

Mar 28 00:22:55.124: sess_appl: ev(12=CC_EV_CALL_DISCONNECTED),

cid(32), disp(0)

Mar 28 00:22:55.124: ssaTraceSct: cid(32)st(5)oldst(5)cfid(13)

csize(0)in(1)fDest(1)–cid2(33)st2(5)oldst2(4)

Mar 28 00:22:55.124: ssa: Disconnected cid(32) state(5) cause(0x10)

Mar 28 00:22:55.124: ccConferenceDestroy (confID=0xD, tag=0x0)

Mar 28 00:22:55.124: cc_api_bridge_drop_done (confID=0xD,

srcIF=0x6174EC64, srcCallID=0x21,

dstCallID=0x20, disposition=0 tag=0x0)

Mar 28 00:22:55.124: cc_api_bridge_drop_done (confID=0xD,

srcIF=0x61B9ADAC, srcCallID=0x20,

dstCallID=0x21, disposition=0 tag=0x0)

Mar 28 00:22:55.124: sess_appl: ev(29=CC_EV_CONF_DESTROY_DONE), cid(32), disp(0)

Mar 28 00:22:55.124: ssaTraceSct: cid(32)st(6)oldst(5)cfid(–1)

csize(0)in(1)fDest(1)–cid2(33)st2(6)oldst2(4)

Mar 28 00:22:55.124: ccCallDisconnect (callID=0x20, cause=0x10 tag=0x0)

Mar 28 00:22:55.124: ccCallDisconnect (callID=0x21, cause=0x10 tag=0x0)

Mar 28 00:22:55.128: RASlib::ras_sendto: msg length 76 from 172.16.120.2:51726 to

172.16.120.1:1719

Mar 28 00:22:55.128: RASLib::RASSendDRQ: DRQ (seq# 12120) sent to 172.16.120.1

Mar 28 00:22:55.132: RASLib::RASRecvData: successfully rcvd message

of length 3 from 172.16.120.1:1719

Mar 28 00:22:55.132: RASLib::RASRecvData: DCF (seq# 12120) rcvd

from [172.16.120.1:1719] on sock [0x61A18664]

Mar 28 00:22:55.132: cc_api_call_disconnect_done(vdbPtr=0x6174EC64,

callID=0x21, disp=0, tag=0x0)

Mar 28 00:22:55.132: sess_appl: ev(13=CC_EV_CALL_DISCONNECT_DONE),

cid(33), disp(0)

Mar 28 00:22:55.132: ssaTraceSct: cid(33)st(7)oldst(4)cfid(–1)

csize(0)in(0)fDest(0)–cid2(32)st2(7)oldst2(6)

Mar 28 00:22:55.140: cc_api_call_disconnect_done(vdbPtr=0x61B9ADAC,

callID=0x20, disp=0, tag=0x0)

Mar 28 00:22:55.140: sess_appl: ev(13=CC_EV_CALL_DISCONNECT_DONE), cid(32), disp(0)

Mar 28 00:22:55.140: ssaTraceSct: cid(32)st(7)oldst(6)cfid(–1)

csize(1)in(1)fDest(1)

Mar 28 00:22:55.172: ISDN Se0:23: RX <–  RELEASE_COMP pd = 8  callref = 0x30

Mar 28 00:23:14.251: RASlib::ras_sendto: msg length 76 from 172.16.120.2:51726 to

172.16.120.1:1719

Mar 28 00:23:14.251: RASLib::RASSendRRQ: RRQ (seq# 12121) sent to 172.16.120.1

Mar 28 00:23:14.255: RASLib::RASRecvData: successfully rcvd message

of length 52 from 172.16.120.1:1719

Mar 28 00:23:14.255: RASLib::RASRecvData: RCF (seq# 12121) rcvd

from [172.16.120.1:1719] on sock [0x61A18664]

Mar 28 00:23:59.255: RASlib::ras_sendto: msg length 76 from

172.16.120.2:51726 to 172.16.120.1:1719

Mar 28 00:23:59.255: RASLib::RASSendRRQ: RRQ (seq# 12122) sent to 172.16.120.1

Mar 28 00:23:59.259: RASLib::RASRecvData: successfully rcvd message

of length 52 from 172.16.120.1:1719

Mar 28 00:23:59.259: RASLib::RASRecvData: RCF (seq# 12122)

rcvd from [172.16.120.1:1719] on sock [0x61A18664]

Raleigh5300A#

Raleigh5300A# show call active voice brief

<ID>: <start>hs.<index> +<connect> pid:<peer_id> <dir>

<addr> <state>

dur hh:mm:ss tx:<packets>/<bytes> rx:<packets>/<bytes> <state>

IP <ip>:<udp> rtt:<time>ms pl:<play>/<gap>ms lost:<lost>/<early>/<late>

delay:<last>/<min>/<max>ms <codec>

FR <protocol><y/n><y/n><y/n><on/off> [int dici cid] vad: dtmf: seq:

sig: <codec> (payload size)

Tele <int>: tx:<tot>/<v>/<fax>ms <codec> noise:<l> acom:<l> i/o:<l>/<l> dBm

4B   : 54320146hs.1 +1112 pid:1 Answer 9195552010 active

dur 00:00:15 tx:954/15972 rx:259/8288

Tele 0:D:36: tx:24500/5180/0ms g729r8 noise:–55 acom:0  i/0:–56/–44 dBm

4B   : 54320146hs.2 +1112 pid:2 Originate 4085556400 active

dur 00:00:15 tx:259/5180 rx:954/19080

IP 172.16.110.2:17024 rtt:4ms pl:16250/0ms lost:0/0/0 delay:50/50/70ms g729r8

Raleigh5300A# show call active voice

GENERIC:

SetupTime=54320146 ms

Index=1

PeerAddress=9195552010

PeerSubAddress=

PeerId=1

PeerIfIndex=56

LogicalIfIndex=26

ConnectTime=54321258

CallDuration=00:00:24

CallState=4

CallOrigin=2

ChargedUnits=0

InfoType=2

TransmitPackets=1414

TransmitBytes=20900

ReceivePackets=615

ReceiveBytes=19680

TELE:

ConnectionId=[0x1ACB27D8 0x98F4004B 0x0 0x206098B4]

TxDuration=33700 ms

VoiceTxDuration=12300 ms

FaxTxDuration=0 ms

CoderTypeRate=g729r8

NoiseLevel=–55

ACOMLevel=0

OutSignalLevel=–45

InSignalLevel=–55

InfoActivity=2

ERLLevel=19

SessionTarget=

ImgPages=0

GENERIC:

SetupTime=54320146 ms

Index=2

PeerAddress=4085556400

PeerSubAddress=

PeerId=2

PeerIfIndex=57

LogicalIfIndex=0

ConnectTime=54321258

CallDuration=00:00:24

CallState=4

CallOrigin=1

ChargedUnits=0

InfoType=2

TransmitPackets=615

TransmitBytes=12300

ReceivePackets=1415

ReceiveBytes=28300

VOIP:

ConnectionId[0x1ACB27D8 0x98F4004B 0x0 0x206098B4]

RemoteIPAddress=172.16.110.2

RemoteUDPPort=17024

RoundTripDelay=4 ms

SelectedQoS=best–effort

tx_DtmfRelay=inband–voice

SessionProtocol=cisco

SessionTarget=ras

OnTimeRvPlayout=25900

GapFillWithSilence=0 ms

GapFillWithPrediction=0 ms

GapFillWithInterpolation=0 ms

GapFillWithRedundancy=0 ms

HiWaterPlayoutDelay=70 ms

LoWaterPlayoutDelay=50 ms

ReceiveDelay=50 ms

LostPackets=0

EarlyPackets=0

LatePackets=0

VAD = enabled

CoderTypeRate=g729r8

CodecBytes=20

SignalingType=cas

Raleigh5300A#

Raleigh 3640A ルータの検証

Raleigh3640A# show gatekeeper end

GATEKEEPER ENDPOINT REGISTRATION

================================

CallSignalAddr  Port  RASSignalAddr   Port  Zone Name         Type    F

––––––––––––––– ––––– ––––––––––––––– ––––– –––––––––         ––––    ––

172.16.120.2    1720  172.16.120.2    51726 RALgk1            VOIP–GW

H323–ID: RAL5300A@cisco.com

Total number of active registrations = 1

Raleigh3640A# show gatekeeper gw

GATEWAY TYPE PREFIX TABLE

=========================

Prefix: 408#*

Prefix: 919#*

Zone RALgk1 master gateway list:

172.16.120.2:1720 RAL5300A

Raleigh3640A# show log

Syslog logging: enabled (0 messages dropped, 0 flushes, 0 overruns)

Console logging: level debugging, 239 messages logged

Monitor logging: level debugging, 0 messages logged

Buffer logging: level debugging, 239 messages logged

Trap logging: level informational, 106 message lines logged

Log Buffer (50000 bytes):

Mar 28 00:22:48.019: RASLib::RASRecvData: successfully rcvd message of

length 115 from 172.16.120.2:51726

Mar 28 00:22:48.019: RASLib::RASRecvData: ARQ (seq# 12119) rcvd from

[172.16.120.2:51726] on sock [0x60F2F9A0]      RASLib::parse_arq_nonstd: ARQ

Nonstd decode succeeded, remlen = 0

Mar 28 00:22:48.023:  RASlib::ras_sendto: msg length 7 from

172.16.120.1:1719 to 172.16.120.2:51726

Mar 28 00:22:48.023: RASLib::RASSendRIP: RIP (seq# 12119) sent to

172.16.120.2

Mar 28 00:22:48.023: RASLib::RAS_WK_TInit: ipsock [0x612328CC] setup

successful

Mar 28 00:22:48.027:       RASlib::ras_sendto: msg length 79 from

172.16.120.1:52893 to 172.16.110.1:1719

Mar 28 00:22:48.027: RASLib::RASSendLRQ: LRQ (seq# 20) sent to 172.16.110.1

Mar 28 00:22:48.035: RASLib::RASRecvData: successfully rcvd message of length

128 from 172.16.110.1:1719

Mar 28 00:22:48.035:  RASLib::RASRecvData: LCF (seq# 20) rcvd from

[172.16.110.1:1719] on sock [0x612328CC] RASLib::parse_lcf_nonstd:

LCF Nonstd decode succeeded, remlen = 0

Mar 28 00:22:48.039: RASlib::ras_sendto: msg length 24 from 172.16.120.1:1719 to

172.16.120.2:51726

Mar 28 00:22:48.039: RASLib::RASSendACF: ACF (seq# 12119) sent to 172.16.120.2

Mar 28 00:22:55.123: RASLib::RASRecvData: successfully rcvd message of length

76 from 172.16.120.2:51726

Mar 28 00:22:55.123: RASLib::RASRecvData: DRQ (seq# 12120) rcvd from

[172.16.120.2:51726] on sock [0x60F2F9A0]

Mar 28 00:22:55.127: RASlib::ras_sendto: msg length 3 from 172.16.120.1:1719 to

172.16.120.2:51726

Mar 28 00:22:55.127: RASLib::RASSendDCF: DCF (seq# 12120) sent to 172.16.120.2

Mar 28 00:23:14.247: RASLib::RASRecvData: successfully rcvd message of length 76

from 172.16.120.2:51726

Mar 28 00:23:14.251: RASLib::RASRecvData: RRQ (seq# 12121) rcvd from

[172.16.120.2:51726] on sock [0x60F2F9A0]

Mar 28 00:23:14.251: RASlib::ras_sendto: msg length 52 from 172.16.120.1:1719 to

172.16.120.2:51726

Mar 28 00:23:14.251: RASLib::RASSendRCF: RCF (seq# 12121) sent to 172.16.120.2

Mar 28 00:23:59.251: RASLib::RASRecvData: successfully rcvd message of length 76

from 172.16.120.2:51726

Mar 28 00:23:59.251: RASLib::RASRecvData: RRQ (seq# 12122) rcvd from

[172.16.120.2:51726] on sock [0x60F2F9A0]

Mar 28 00:23:59.255: RASlib::ras_sendto: msg length 52 from

172.16.120.1:1719 to 172.16.120.2:51726

Mar 28 00:23:59.255: RASLib::RASSendRCF: RCF (seq# 12122) sent to 172.16.120.2

Mar 28 00:24:44.255: RASLib::RASRecvData: successfully rcvd message of length 76

from 172.16.120.2:51726

Mar 28 00:24:44.255: RASLib::RASRecvData: RRQ (seq# 12123) rcvd from

[172.16.120.2:51726] on sock [0x60F2F9A0]

Mar 28 00:24:44.259: RASlib::ras_sendto: msg length 52 from 172.16.120.1:1719

to 172.16.120.2:51726

Mar 28 00:24:44.259: RASLib::RASSendRCF: RCF (seq# 12123) sent to 172.16.120.2

Raleigh3640A#

Raleigh3640A# show gatekeeper call

Total number of active calls = 1.

GATEKEEPER CALL INFO

====================

LocalCallID                        Age(secs)   BW

18–6872                            41          64(Kbps)

Endpt(s): Alias        E.164Addr     CallSignalAddr  Port  RASSignalAddr   Port

src EP: RAL5300A     9195552010    172.16.120.2    1720  172.16.120.2    51726

dst EP:              408#408555640 172.16.110.2    1720  172.16.110.2    1720

Raleigh3640A#

San Jose 5300A ルータの検証

SanJose5300A# show gatekeeper

Gateway  SJ5300A@cisco.com  is registered to Gatekeeper SJgk1

Alias list (CLI configured)

H323–ID SJ5300A@cisco.com

Alias list (last RCF)

H323–ID SJ5300A@cisco.com

H323 resource thresholding is Disabled

SanJose5300A# show log

Syslog logging: enabled (0 messages dropped, 0 flushes, 0 overruns)

Console logging: level debugging, 1695 messages logged

Monitor logging: level debugging, 0 messages logged

Buffer logging: level debugging, 1695 messages logged

Trap logging: level informational, 96 message lines logged

Log Buffer (50000 bytes):

Mar 28 00:22:48.043: RASlib::ras_sendto: msg length 122 from

172.16.110.2:52521 to 172.16.110.1:1719

Mar 28 00:22:48.043: RASLib::RASSendARQ: ARQ (seq# 12092) sent to

172.16.110.1

Mar 28 00:22:48.047: RASLib::RASRecvData: successfully rcvd message of length

24 from 172.16.110.1:1719

Mar 28 00:22:48.047: RASLib::RASRecvData: ACF (seq# 12092) rcvd from

[172.16.110.1:1719] on sock [0x61752218]

Mar 28 00:22:48.047: cc_api_call_setup_ind (vdbPtr=0x616F8D2C,

callInfo={called=408#4085556400,

calling=9195552010, fdest=1 peer_tag=2}, callID=0x6199B54C)

Mar 28 00:22:48.051: cc_process_call_setup_ind (event=0x619B3954)

handed call to app "SESSION"

Mar 28 00:22:48.051: sess_appl: ev(23=CC_EV_CALL_SETUP_IND), cid(25), disp(0)

Mar 28 00:22:48.051: ccCallSetContext (callID=0x19, context=0x61A643D8)

Mar 28 00:22:48.051: ssaCallSetupInd finalDest cllng(9195552010),

clled(408#4085556400)

Mar 28 00:22:48.051: ssaSetupPeer cid(25) peer list:  tag(1)

called number (408#4085556400)

Mar 28 00:22:48.051: ssaSetupPeer cid(25), destPat(408#4085556400),

matched(11), prefix(6),

peer(61A03B88)

Mar 28 00:22:48.051: ccCallProceeding (callID=0x19, prog_ind=0x0)

Mar 28 00:22:48.051: ccCallSetupRequest (Inbound call = 0x19,

outbound peer =1, dest=,

params=0x61A643EC mode=0, *callID=0x619BB9F0)

Mar 28 00:22:48.051: callingNumber=9195552010, calledNumber=408#4085556400,

redirectNumber=

Mar 28 00:22:48.051: accountNumber=, finalDestFlag=1,

guid=1acb.27d8.98f4.0043.0000.0000.205d.0abc

Mar 28 00:22:48.051: peer_tag=1

Mar 28 00:22:48.051: ccIFCallSetupRequest: (vdbPtr=0x619AC884,

dest=, callParams=

{called=408#4085556400, calling=9195552010, fdest=1, voice_peer_tag=1}, mode=0x0)

Mar 28 00:22:48.051: ccCallSetContext (callID=0x1A, context=0x61A6DCC8)

Mar 28 00:22:48.235: cc_api_call_proceeding(vdbPtr=0x619AC884, callID=0x1A,

prog_ind=0x0)

Mar 28 00:22:48.235: sess_appl: ev(20=CC_EV_CALL_PROCEEDING), cid(26), disp(0)

Mar 28 00:22:48.235: ssaTraceSct: cid(26)st(1)oldst(0)cfid(–1)

csize(0)in(0)fDest(0)–cid2(25)st2(1)oldst2(0)

Mar 28 00:22:48.235: ssaIgnore cid(26), st(1),oldst(1), ev(20)

Mar 28 00:22:49.215: cc_api_call_alert(vdbPtr=0x619AC884,

callID=0x1A, prog_ind=0x8, sig_ind=0x1)

Mar 28 00:22:49.215: sess_appl: ev(7=CC_EV_CALL_ALERT), cid(26), disp(0)

Mar 28 00:22:49.215: ssaTraceSct: cid(26)st(1)oldst(1)cfid(–1)csize(0)in(0)fDest(0)

–cid2(25)st2(1)oldst2(0)

Mar 28 00:22:49.215: ccCallAlert (callID=0x19, prog_ind=0x8, sig_ind=0x1)

Mar 28 00:22:49.215: ccConferenceCreate (confID=0x619BBA38, callID1=0x19,

callID2=0x1A, tag=0x0)

Mar 28 00:22:49.219: cc_api_bridge_done (confID=0xD, srcIF=0x616F8D2C,

srcCallID=0x19,dstCallID=0x1A, disposition=0, tag=0x0)

Mar 28 00:22:49.219: cc_api_bridge_done (confID=0xD, srcIF=0x619AC884,

srcCallID=0x1A, dstCallID=0x19, disposition=0, tag=0x0)

Mar 28 00:22:49.219: cc_api_caps_ind (dstVdbPtr=0x616F8D2C, dstCallId=0x19,

srcCallId=0x1A, caps={codec=0xEBF7, fax_rate=0xFF, vad=0x3,

modem=0x3codec_bytes=1637472312, signal_type=2})

Mar 28 00:22:49.219: sess_appl: ev(28=CC_EV_CONF_CREATE_DONE),

cid(25), disp(0)

Mar 28 00:22:49.219: ssaTraceSct: cid(25)st(3)oldst(0)cfid(13)

csize(0)in(1)fDest(1)–cid2(26)st2(3)oldst2(1)

Mar 28 00:22:49.631: cc_api_caps_ind (dstVdbPtr=0x619AC884,

dstCallId=0x1A, srcCallId=0x19 caps={codec=0x4, fax_rate=0x2, vad=0x2, modem=0x1

codec_bytes=20, signal_type=0})

Mar 28 00:22:49.631: cc_api_caps_ack (dstVdbPtr=0x619AC884,

dstCallId=0x1A, srcCallId=0x19,

caps={codec=0x4, fax_rate=0x2, vad=0x2, modem=0x1

codec_bytes=20, signal_type=0})

Mar 28 00:22:49.635: cc_api_caps_ack (dstVdbPtr=0x616F8D2C,

dstCallId=0x19, srcCallId=0x1A,

caps={codec=0x4, fax_rate=0x2, vad=0x2, modem=0x1

codec_bytes=20, signal_type=0})

Mar 28 00:22:51.491: cc_api_call_connected(vdbPtr=0x619AC884, callID=0x1A)

Mar 28 00:22:51.491: sess_appl: ev(8=CC_EV_CALL_CONNECTED), cid(26), disp(0)

Mar 28 00:22:51.491: ssaTraceSct: cid(26)st(4)oldst(1)cfid(13)

csize(0)in(0)fDest(0)–cid2(25)st2(4)oldst2(3)

Mar 28 00:22:51.491: ccCallConnect (callID=0x19)

Mar 28 00:22:51.491: ssaFlushPeerTagQueue cid(25) peer list: (empty)

Mar 28 00:22:55.119: cc_api_call_disconnected(vdbPtr=0x0, callID=0x19, cause=0x10)

Mar 28 00:22:55.119: sess_appl: ev(12=CC_EV_CALL_DISCONNECTED), cid(25), disp(0)

Mar 28 00:22:55.119: ssaTraceSct: cid(25)st(5)oldst(3)cfid(13)

csize(0)in(1)fDest(1)–cid2(26) st2(5)oldst2(4)

Mar 28 00:22:55.119: ssa: Disconnected cid(25) state(5) cause(0x10)

Mar 28 00:22:55.119: ccConferenceDestroy (confID=0xD, tag=0x0)

Mar 28 00:22:55.119: cc_api_bridge_drop_done (confID=0xD,

srcIF=0x616F8D2C, srcCallID=0x19, dstCallID=0x1A, disposition=0 tag=0x0)

Mar 28 00:22:55.119: cc_api_bridge_drop_done (confID=0xD,

srcIF=0x619AC884, srcCallID=0x1A, dstCallID=0x19, disposition=0 tag=0x0)

Mar 28 00:22:55.119: sess_appl: ev(29=CC_EV_CONF_DESTROY_DONE),

cid(25), disp(0)

Mar 28 00:22:55.119: ssaTraceSct: cid(25)st(6)oldst(5)cfid(–1)

csize(0)in(1)fDest(1)–cid2(26)st2(6)oldst2(4)

Mar 28 00:22:55.119: ccCallDisconnect (callID=0x19, cause=0x10 tag=0x0)

Mar 28 00:22:55.119: ccCallDisconnect (callID=0x1A, cause=0x10 tag=0x0)

Mar 28 00:22:55.123: RASlib::ras_sendto: msg length 76 from

172.16.110.2:52521 to 172.16.110.1:1719

Mar 28 00:22:55.123: RASLib::RASSendDRQ: DRQ (seq# 12093) sent to

172.16.110.1

Mar 28 00:22:55.127: RASLib::RASRecvData: successfully rcvd message

of length 3 from 172.16.110.1:1719

Mar 28 00:22:55.127: RASLib::RASRecvData: DCF (seq# 12093) rcvd

from [172.16.110.1:1719] on sock [0x61752218]

Mar 28 00:22:55.127: cc_api_call_disconnect_done(vdbPtr=0x0,

callID=0x19, disp=0, tag=0x0)

Mar 28 00:22:55.127: sess_appl: ev(13=CC_EV_CALL_DISCONNECT_DONE),

cid(25), disp(0)

Mar 28 00:22:55.127: ssaTraceSct: cid(25)st(7)oldst(6)cfid(–1)

csize(0)in(1)fDest(1)–cid2(26)st2 (7)oldst2(4)

Mar 28 00:22:55.139: cc_api_call_disconnect_done(vdbPtr=0x619AC884,

callID=0x1A, disp=0, tag=0x61A630BC)

Mar 28 00:22:55.139: sess_appl: ev(13=CC_EV_CALL_DISCONNECT_DONE),

cid(26), disp(0)

Mar 28 00:22:55.139: ssaTraceSct: cid(26)st(7)oldst(4)cfid(–1)

csize(1)in(0)fDest(0)

Mar 28 00:22:55.443: RASlib::ras_sendto: msg length 74 from 172.16.110.2:52521 to

172.16.110.1:1719

Mar 28 00:22:55.443: RASLib::RASSendRRQ: RRQ (seq# 12094) sent to 172.16.110.1

Mar 28 00:22:55.447: RASLib::RASRecvData: successfully rcvd message

of length 52 from 172.16.110.1:1719

Mar 28 00:22:55.447: RASLib::RASRecvData: RCF (seq# 12094) rcvd

from [172.16.110.1:1719] on sock [0x61752218]

Mar 28 00:23:40.448: RASlib::ras_sendto: msg length 74 from 172.16.110.2:52521 to

172.16.110.1:1719

Mar 28 00:23:40.448: RASLib::RASSendRRQ: RRQ (seq# 12095) sent to 172.16.110.1

Mar 28 00:23:40.452: RASLib::RASRecvData: successfully rcvd message

of length 52 from 172.16.110.1:1719

Mar 28 00:23:40.452: RASLib::RASRecvData: RCF (seq# 12095) rcvd from

[172.16.110.1:1719] on sock [0x61752218]

Mar 28 00:24:25.452: RASlib::ras_sendto: msg length 74 from 172.16.110.2:52521 to

172.16.110.1:1719

Mar 28 00:24:25.452: RASLib::RASSendRRQ: RRQ (seq# 12096) sent to 172.16.110.1

Mar 28 00:24:25.456: RASLib::RASRecvData: successfully rcvd message of

length 52 from 172.16.110.1:1719

Mar 28 00:24:25.456: RASLib::RASRecvData: RCF (seq# 12096) rcvd

from [172.16.110.1:1719] on sock [0x61752218]

Mar 28 00:25:10.457: RASlib::ras_sendto: msg length 74 from 172.16.110.2:52521 to

172.16.110.1:1719

Mar 28 00:25:10.457: RASLib::RASSendRRQ: RRQ (seq# 12097) sent to 172.16.110.1

Mar 28 00:25:10.461: RASLib::RASRecvData: successfully rcvd message

of length 52 from 172.16.110.1:1719

Mar 28 00:25:10.461: RASLib::RASRecvData: RCF (seq# 12097) rcvd

from [172.16.110.1:1719] on sock [0x61752218]

SanJose5300A#

Raleigh5300A# show call active voice brief

<ID>: <start>hs.<index> +<connect> pid:<peer_id> <dir> <addr> <state>

dur hh:mm:ss tx:<packets>/<bytes> rx:<packets>/<bytes> <state>

IP <ip>:<udp> rtt:<time>ms pl:<play>/<gap>ms lost:<lost>/<early>/<late>

delay:<last>/<min>/<max>ms <codec>

FR <protocol><y/n><y/n><y/n><on/off> [int dici cid] vad: dtmf: seq:

sig: <codec> (payload size)

Tele <int>: tx:<tot>/<v>/<fax>ms <codec> noise:<l> acom:<l> i/o:<l>/<l> dBm

4B   : 54285525hs.1 +1107 pid:2 Answer 9195552010 active

dur 00:00:38 tx:2106/42120 rx:1023/20460

IP 172.16.120.2:17698 rtt:4ms pl:19920/0ms lost:0/0/0 delay:30/30/70ms g729r8

4B   : 54285543hs.1 +1089 pid:1 Originate 408#4085556400 active

dur 00:00:38 tx:1023/–5040 rx:2125/68000

Tele 0:1 (30): tx:47730/42500/0ms g729r8 noise:–72 acom:0  i/0:–41/–41 dBm

SanJose5300A# show call active voice

GENERIC:

SetupTime=54285525 ms

Index=1

PeerAddress=9195552010

PeerSubAddress=

PeerId=2

PeerIfIndex=17

LogicalIfIndex=0

ConnectTime=54286632

CallDuration=00:00:44

CallState=4

CallOrigin=2

ChargedUnits=0

InfoType=2

TransmitPackets=2415

TransmitBytes=48300

ReceivePackets=1055

ReceiveBytes=21100

VOIP:

ConnectionId[0x1ACB27D8 0x98F4004B 0x0 0x206098B4]

RemoteIPAddress=172.16.120.2

RemoteUDPPort=17698

RoundTripDelay=65535 ms

SelectedQoS=best–effort

tx_DtmfRelay=inband–voice

SessionProtocol=cisco

SessionTarget=

OnTimeRvPlayout=21090

GapFillWithSilence=0 ms

GapFillWithPrediction=0 ms

GapFillWithInterpolation=0 ms

GapFillWithRedundancy=0 ms

HiWaterPlayoutDelay=70 ms

LoWaterPlayoutDelay=30 ms

ReceiveDelay=30 ms

LostPackets=0

EarlyPackets=0

LatePackets=0

VAD = enabled

CoderTypeRate=g729r8

CodecBytes=20

SignalingType=cas

GENERIC:

SetupTime=54285543 ms

Index=1

PeerAddress=408#4085556400

PeerSubAddress=

PeerId=1

PeerIfIndex=16

LogicalIfIndex=13

ConnectTime=54286632

CallDuration=00:00:44

CallState=4

CallOrigin=1

ChargedUnits=0

InfoType=2

TransmitPackets=1055

TransmitBytes=–8108

ReceivePackets=2434

ReceiveBytes=77888

TELE:

ConnectionId=[0x1ACB27D8 0x98F4004B 0x0 0x206098B4]

TxDuration=53920 ms

VoiceTxDuration=48690 ms

FaxTxDuration=0 ms

CoderTypeRate=g729r8

NoiseLevel=–72

ACOMLevel=0

OutSignalLevel=–71

InSignalLevel=–43

InfoActivity=2

ERLLevel=9

SessionTarget=

ImgPages=0

SanJose5300A#

San Jose 3640A ルータの検証

SanJose3640A# show gatekeeper end

GATEKEEPER ENDPOINT REGISTRATION

================================

CallSignalAddr  Port  RASSignalAddr   Port  Zone Name         Type    F

––––––––––––––– ––––– ––––––––––––––– ––––– –––––––––         ––––    ––

172.16.110.2    1720  172.16.110.2    52521 SJgk1             VOIP–GW

H323–ID: SJ5300A@cisco.com

Total number of active registrations = 1

SanJose3640A# show gatekeeper gw

GATEWAY TYPE PREFIX TABLE

=========================

Prefix: 919#*

Prefix: 408#*

Zone SJgk1 master gateway list:

172.16.110.2:1720 SJ5300A

SanJose3640A# show log

Syslog logging: enabled (0 messages dropped, 0 flushes, 0 overruns)

Console logging: level debugging, 1266 messages logged

Monitor logging: level debugging, 0 messages logged

Buffer logging: level debugging, 1258 messages logged

Trap logging: level informational, 102 message lines logged

Log Buffer (50000 bytes):

Mar 28 00:22:48.025: RASLib::RASRecvData: successfully rcvd message of

length 79 from 172.16.120.1:52893

Mar 28 00:22:48.029: RASLib::RASRecvData: LRQ (seq# 20) rcvd from

[172.16.120.1:52893] on sock [0x60FE9B04] RASLib::parse_lrq_nonstd: LRQ Nonstd

decode succeeded, remlen = 0

Mar 28 00:22:48.033: RASlib::ras_sendto: msg length 128 from 172.16.110.1:1719

to 172.16.120.1:52893

Mar 28 00:22:48.033: RASLib::RASSendLCF: LCF (seq# 20) sent to 172.16.120.1

Mar 28 00:22:48.049: RASLib::RASRecvData: successfully rcvd message of length

122 from 172.16.110.2:52521

Mar 28 00:22:48.049: RASLib::RASRecvData: ARQ (seq# 12092) rcvd from

[172.16.110.2:52521] on sock [0x60FE9B04] RASLib::parse_arq_nonstd:

ARQ Nonstd decode succeeded, remlen = 0

Mar 28 00:22:48.053: RASlib::ras_sendto: msg length 24 from 172.16.110.1:1719 to

172.16.110.2:52521

Mar 28 00:22:48.053: RASLib::RASSendACF: ACF (seq# 12092) sent to 172.16.110.2

Mar 28 00:22:55.129: RASLib::RASRecvData: successfully rcvd message of length 76

from 172.16.110.2:52521

Mar 28 00:22:55.129: RASLib::RASRecvData: DRQ (seq# 12093) rcvd from

[172.16.110.2:52521] on sock [0x60FE9B04]

Mar 28 00:22:55.129: RASlib::ras_sendto: msg length 3 from 172.16.110.1:1719 to

172.16.110.2:52521

Mar 28 00:22:55.129: RASLib::RASSendDCF: DCF (seq# 12093) sent to 172.16.110.2

Mar 28 00:22:55.449: RASLib::RASRecvData: successfully rcvd message of length 74

from 172.16.110.2:52521

Mar 28 00:22:55.449: RASLib::RASRecvData: RRQ (seq# 12094) rcvd from

[172.16.110.2:52521] on sock [0x60FE9B04]

Mar 28 00:22:55.453: RASlib::ras_sendto: msg length 52 from 172.16.110.1:1719 to

172.16.110.2:52521

Mar 28 00:22:55.453: RASLib::RASSendRCF: RCF (seq# 12094) sent to 172.16.110.2

Mar 28 00:23:40.453: RASLib::RASRecvData: successfully rcvd message of length 74

from 172.16.110.2:52521

Mar 28 00:23:40.457: RASLib::RASRecvData: RRQ (seq# 12095) rcvd from

[172.16.110.2:52521] on sock [0x60FE9B04]

Mar 28 00:23:40.457: RASlib::ras_sendto: msg length 52 from 172.16.110.1:1719 to

172.16.110.2:52521

Mar 28 00:23:40.457: RASLib::RASSendRCF: RCF (seq# 12095) sent to 172.16.110.2

Mar 28 00:24:25.457: RASLib::RASRecvData: successfully rcvd message of length 74

from 172.16.110.2:52521

Mar 28 00:24:25.461: RASLib::RASRecvData: RRQ (seq# 12096) rcvd from

[172.16.110.2:52521] on sock [0x60FE9B04]

Mar 28 00:24:25.461: RASlib::ras_sendto: msg length 52 from 172.16.110.1:1719 to

172.16.110.2:52521

Mar 28 00:24:25.461: RASLib::RASSendRCF: RCF (seq# 12096) sent to 172.16.110.2

Mar 28 00:25:10.465: RASLib::RASRecvData: successfully rcvd message of length

74 from 172.16.110.2:52521

Mar 28 00:25:10.465: RASLib::RASRecvData: RRQ (seq# 12097) rcvd from

[172.16.110.2:52521] on sock [0x60FE9B04]

Mar 28 00:25:10.465: RASlib::ras_sendto: msg length 52 from 172.16.110.1:1719 to

172.16.110.2:52521

Mar 28 00:25:10.469: RASLib::RASSendRCF: RCF (seq# 12097) sent to 172.16.110.2

SanJose3640A#

SanJose3640A# show gatekeeper call

Total number of active calls = 1

ゲートキーパー コールの説明

.

GATEKEEPER CALL INFO

====================

LocalCallID                        Age(secs)   BW

15–6872                            60          64(Kbps)

Endpt(s): Alias        E.164Addr     CallSignalAddr  Port  RASSignalAddr   Port

src EP:              9195552010

dst EP: SJ5300A      408#408555640 172.16.110.2    1720  172.16.110.2    52521

SanJose3640A#

トラブルシュート

ここでは、設定のトラブルシューティングに使用できる情報を示します。

トラブルシューティングのためのコマンド

注：debugコマンドを発行する前に、『debugコマンドの重要な情報』を参照してください。

- debug ras

- debug h245 asn1

- debug h225 asn1

注：ゲートキーパーのTTLとエージングアウトプロセスの説明とトラブルシューティングを参照してください。このドキュメントでは、Cisco ゲートキーパーが、存続可能時間（TTL）値を使用してエンドポイントをエージング アウトする仕組みを説明します。

関連情報

- 音声に関する技術サポート

- 音声と IP 通信製品サポート

- Cisco IP Telephony のトラブルシューティング

- テクニカル サポートとドキュメント – Cisco Systems