内容

概要

前提条件

要件

使用するコンポーネント

背景説明

バックアップ手順

復元手順

関連記事

概要

このドキュメントでは、コマンドラインインターフェイス(CLI)を使用して、Cisco Unified Communications Manager(CUCM)のバックアップおよび復元操作にディザスタリカバリシステム(DRS)を使用するプロセスについて説明します。

Joy Pal作成、編集：Alexander LevichevおよびDeepak kumar

前提条件

このドキュメントには前提条件はありません。

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

背景説明

管理者は通常、ディザスタリカバリシステム(DRS)Webグラフィカルユーザインターフェイス(GUI)を介してバックアップおよび復元操作を行います。

ネットワークの問題やCisco Tomcatサービスが実行されていないために、管理者がDisaster Recovery System(DRS)Webページにログインできない場合が多くあります。

このような場合、管理者はDisaster Recovery System(DRS)、Command Line Interface(CLI)コマンドを使用してバックアップまたはリストア操作を実行できます。

バックアップ手順

1.バックアップデバイスを追加します。

構文：

utils disaster_recovery device add network <backup device name> <path> <ip-address of remote server> <username> [バックアップ数]

例：

admin:utils disaster_recovery device add network linuxbox ./ 10.48.53.123 ccmadmin

Please enter password to connect to network server 10.48.53.123:****

drfCliMsg: Backup Device has been saved successfully.

2.追加されたデバイスを確認します。

構文：

utils disaster_recovery device list

例：

admin:utils disaster_recovery device list

Device Name             Device Type             Device Path

--------------------------------------------------------------

linuxbox                NETWORK                 ./

3.バックアップをとります。

構文：

utils disaster_recovery backup network <featurelist> <backup device name>

機能リスト – バックアップする機能のカンマ区切りリスト。登録された機能のリストを表示するには、「utils disaster_recovery show_registration <servername>」を使用します。

例：

admin:utils disaster_recovery backup network UCM,CDR_CAR,PLM linuxbox

drfCliMsg: Backup initiated successfully. Please run 'utils disaster_recovery status backup' command to see the status

<p style="background-image: url('http://www.cisco.com/en/US/i/templates/warn.gif'); background-repeat: no-repeat; background- position: 2px 4px;

height: auto; width: auto; padding: 10px 5px 10px 35px; margin-top: 10px; margin-bottom: 10px; border-top: 1px solid #ccc; border-bottom: 1px

solid #ccc; overflow-x: hidden;"><strong>Warning</strong>: {The DRS Backup archive encryption depends on the current security password (Provided at the time of install). During a restore, you could be prompted to enter this security password if this password has been changed.}</p>

4.バックアップのステータスを確認します。

構文：

utils disaster_recovery status backup

例：

admin:utils disaster_recovery status backup

Status: SUCCESS :Backup Completed...

Tar Filename: 2017-08-18-12-17-19.tar

Storage Location: NETWORK

Operation: backup

Percentage Complete: 100

PLM CUCM160 ELM-AGENT SUCCESS Fri Aug 18 12:17:19 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_plm_elm-agent.log

PLM CUCM160 ELM-SERVER SUCCESS Fri Aug 18 12:17:21 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_plm_elm-server.log

CDR_CAR CUCM160 CAR SUCCESS Fri Aug 18 12:17:27 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_cdr_car_car.log

UCM CUCM160 BAT SUCCESS Fri Aug 18 12:19:23 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_bat.log

UCM CUCM160 CCMPREFS SUCCESS Fri Aug 18 12:19:25 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_ccmprefs.log

UCM CUCM160 PLATFORM SUCCESS Fri Aug 18 12:19:30 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_platform.log

UCM CUCM160 TCT SUCCESS Fri Aug 18 12:19:34 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_tct.log

UCM CUCM160 SYSLOGAGT SUCCESS Fri Aug 18 12:19:35 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_syslogagt.log

UCM CUCM160 CDPAGT SUCCESS Fri Aug 18 12:19:36 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_cdpagt.log

UCM CUCM160 CLM SUCCESS Fri Aug 18 12:19:37 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_clm.log

UCM CUCM160 CCMDB SUCCESS Fri Aug 18 12:19:37 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_ccmdb.log

UCM CUCM160 TFTP SUCCESS Fri Aug 18 12:20:15 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_tftp.log

UCM CUCM160 ANN SUCCESS Fri Aug 18 12:21:33 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_ann.log

UCM CUCM160 MOH SUCCESS Fri Aug 18 12:21:34 CEST 2017 activelog/platform/drf/log/2017-08-18-12-17-19_b_cucm160_ucm_moh.log

復元手順

1. リモートsftpサーバに存在するバックアップファイルを確認します。

構文：

utils disaster_recovery show_backupfiles <backup device name>

例：

admin:utils disaster_recovery show_backupfiles linux123

2017-08-18-14-45-38

2017-08-18-12-17-19

バックアップからシステムを復元する

前の出力からバックアップファイルを選択します。

構文：

utils disaster_recovery restore network <ip-address of remote server> <tarfilename> <backup device name>

例：

admin:utils disaster_recovery restore network 10.48.53.160 2017-08-18-14-45-38 linux123

drfCliMsg: WARNING! There are nodes in current production cluster but NOT present in the backup. These nodes will be removed if you restore the Publisher. If you want to keep these nodes, you will need to manually re-add them after the restore.

Do you want DRS to perform a SHA-1 File Integrity Check of your backup archives y/n ?(n) : y

Please enter the comma seperated features you wish to restore. Valid features for server CUCM160 are PLM,CDR_CAR,UCM:PLM,CDR_CAR,UCM

Do you want to restore database from the subscriber y/n ?(n) : n

drfCliMsg: Restore initiated successfully. Please run 'utils disaster_recovery status restore' command to see the status

ALERT: Please restart the server(s) before performing the next restore for changes to take effect. In case of a cluster, restart the entire cluster.

<p style="background-image: url('http://www.cisco.com/en/US/i/templates/note.gif'); background-repeat: no-repeat; background- position: 2px 4px;

height: auto; width: auto; padding: 10px 5px 10px 35px; margin-top: 10px; margin-bottom: 10px; border-top: 1px solid #ccc; border-bottom: 1px

solid #ccc; overflow-x: hidden;"><strong>Note</strong>: {If you are restoring the system to be in FIPS mode, please note that it will be enabled during this restore, but will not take effect until the next reboot..}</p>

3. 復元ステータスを確認します

復元手順は、データベースサイズによって時間がかかる可能性があります。

構文：

utils disaster_recovery status restore

例：

admin:utils disaster_recovery status restore

Status: SUCCESS :Restore Completed...

Tar Filename: 2017-08-18-14-45-38.tar

Storage Location: NETWORK

Operation: restore

Percentage Complete: 100

CDR_CAR   CUCM160   CAR   SUCCESS   Fri Aug 18 15:20:15 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_cdr_car_car.log

PLM   CUCM160   ELM-AGENT   SUCCESS   Fri Aug 18 15:24:34 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_plm_elm-agent.log

PLM   CUCM160   ELM-SERVER   SUCCESS   Fri Aug 18 15:24:34 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_plm_elm-server.log

UCM   CUCM160   BAT   SUCCESS   Fri Aug 18 15:27:06 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_bat.log

UCM   CUCM160   CCMPREFS   SUCCESS   Fri Aug 18 15:27:06 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_ccmprefs.log

UCM   CUCM160   PLATFORM   SUCCESS   Fri Aug 18 15:27:13 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_platform.log

UCM   CUCM160   TCT   SUCCESS   Fri Aug 18 15:32:15 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_tct.log

UCM   CUCM160   SYSLOGAGT   SUCCESS   Fri Aug 18 15:34:39 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_syslogagt.log

UCM   CUCM160   CDPAGT   SUCCESS   Fri Aug 18 15:34:39 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_cdpagt.log

UCM   CUCM160   CLM   SUCCESS   Fri Aug 18 15:37:03 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_clm.log

UCM   CUCM160   CCMDB   SUCCESS   Fri Aug 18 15:37:05 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_ccmdb.log

UCM   CUCM160   TFTP   SUCCESS   Fri Aug 18 15:45:12 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_tftp.log

UCM   CUCM160   ANN   SUCCESS   Fri Aug 18 15:46:38 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_ann.log

UCM   CUCM160   MOH   SUCCESS   Fri Aug 18 15:46:39 CEST 2017   activelog/platform/drf/log/2017-08-18-15-20-01_r_cucm160_ucm_moh.log

関連記事

『Command Line Interface Reference Guide for Cisco Unified Communications Solutions』

『Disaster Recovery System Administration Guide for Cisco Unified Communications Manager and IM & Presence Service』