内容

概要

前提条件

要件

使用するコンポーネント

関連製品

RTT のテスト

概要

このドキュメントでは、Cisco Video Communication Server（VCS）間の往復時間（RTT）のテスト方法について説明します。クラスタ内の各ピアは、クラスタに追加される他のすべての VCS との間で 15 ms ホップ（30 ms RTT）以内になるように設置する必要があります。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメント内の情報は、Cisco VCS に基づいています。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

関連製品

このドキュメントは、次のバージョンのハードウェアとソフトウェアにも使用できます。

- Cisco TelePresence Conductor

- Cisco Expressway Core

- Cisco Expressway Edge

RTT のテスト

次の手順を実行して、RTT をテストします。

1. root としてクラスタ メンバー VCS にログインし、次のコマンドを使用して他のクラスタ メンバーに ping します。

ping -i 0.03 -s 4000 10.83.23.28

2. ping は 1 ～ 2 分間実行します。

4008 bytes from 10.83.23.28: icmp_req=1 ttl=64 time=0.266 ms

4008 bytes from 10.83.23.28: icmp_req=2 ttl=64 time=0.213 ms

4008 bytes from 10.83.23.28: icmp_req=3 ttl=64 time=0.214 ms

4008 bytes from 10.83.23.28: icmp_req=4 ttl=64 time=0.213 ms

4008 bytes from 10.83.23.28: icmp_req=5 ttl=64 time=0.213 ms

4008 bytes from 10.83.23.28: icmp_req=6 ttl=64 time=0.218 ms

4008 bytes from 10.83.23.28: icmp_req=7 ttl=64 time=0.219 ms

4008 bytes from 10.83.23.28: icmp_req=8 ttl=64 time=0.219 ms

4008 bytes from 10.83.23.28: icmp_req=9 ttl=64 time=0.219 ms

4008 bytes from 10.83.23.28: icmp_req=10 ttl=64 time=0.221 ms

4008 bytes from 10.83.23.28: icmp_req=11 ttl=64 time=0.225 ms

4008 bytes from 10.83.23.28: icmp_req=12 ttl=64 time=0.225 ms

4008 bytes from 10.83.23.28: icmp_req=13 ttl=64 time=0.230 ms

4008 bytes from 10.83.23.28: icmp_req=14 ttl=64 time=0.227 ms

4008 bytes from 10.83.23.28: icmp_req=15 ttl=64 time=0.229 ms

4008 bytes from 10.83.23.28: icmp_req=16 ttl=64 time=0.232 ms

4008 bytes from 10.83.23.28: icmp_req=17 ttl=64 time=0.231 ms

4008 bytes from 10.83.23.28: icmp_req=18 ttl=64 time=0.230 ms

4008 bytes from 10.83.23.28: icmp_req=19 ttl=64 time=0.232 ms

4008 bytes from 10.83.23.28: icmp_req=20 ttl=64 time=0.230 ms

4008 bytes from 10.83.23.28: icmp_req=21 ttl=64 time=0.234 ms

4008 bytes from 10.83.23.28: icmp_req=22 ttl=64 time=0.233 ms

4008 bytes from 10.83.23.28: icmp_req=23 ttl=64 time=0.235 ms

4008 bytes from 10.83.23.28: icmp_req=24 ttl=64 time=0.236 ms

4008 bytes from 10.83.23.28: icmp_req=25 ttl=64 time=0.234 ms

4008 bytes from 10.83.23.28: icmp_req=26 ttl=64 time=0.236 ms

4008 bytes from 10.83.23.28: icmp_req=27 ttl=64 time=0.237 ms

4008 bytes from 10.83.23.28: icmp_req=28 ttl=64 time=0.235 ms

4008 bytes from 10.83.23.28: icmp_req=29 ttl=64 time=0.235 ms

4008 bytes from 10.83.23.28: icmp_req=30 ttl=64 time=0.218 ms

4008 bytes from 10.83.23.28: icmp_req=31 ttl=64 time=0.220 ms

4008 bytes from 10.83.23.28: icmp_req=32 ttl=64 time=0.226 ms

4008 bytes from 10.83.23.28: icmp_req=33 ttl=64 time=0.254 ms

4008 bytes from 10.83.23.28: icmp_req=34 ttl=64 time=0.214 ms

4008 bytes from 10.83.23.28: icmp_req=35 ttl=64 time=0.214 ms

4008 bytes from 10.83.23.28: icmp_req=36 ttl=64 time=0.215 ms

4008 bytes from 10.83.23.28: icmp_req=37 ttl=64 time=0.214 ms

3. 1 ～ 2 分後に Ctrl + C キーを押して ping を停止します。出力の最後に平均 RTT を含むサマリが表示されます。

--- 10.83.23.28 ping statistics ---

159 packets transmitted, 159 received, 0% packet loss, time 4739ms

rtt min/avg/max/mdev = 0.195/0.236/0.283/0.022 ms