内容

はじめに

前提条件

使用するコンポーネント

管理者アカウントのパスワードの回復

手順

確認

関連情報

はじめに

このドキュメントでは、第4世代および第5世代のFabric Interconnectで失われたパスワードを回復する手順に関する包括的なガイドを提供します。

前提条件

ファブリックインターコネクトへの物理的なアクセス

使用するコンポーネント

ファブリックインターコネクト6536

RJ45 to DB9シリアルケーブル。

ラップトップ.

管理者アカウントのパスワードの回復

手順

1. コンソールポートに接続します。 シリアル管理ケーブルのRJ-45側をFabric Interconnectのコンソールポートに差し込み、DB-9オス側をラップトップなどのコンピュータのシリアルポートに接続します。

2. ファブリックインターコネクトの電源を再投入します。

1. Fabric Interconnectの電源をオフにします。

2. ファブリックインターコネクトの電源をオンにします。

3. ブート時にコンソールのキーの組み合わせを押します。 Ctrl+Cキー

4. ローダープロンプトで、コマンドdirで使用されるシステムイメージを探します。

loader > dir

bootflash::

lost+found

ucs-manager-k9.4.2.3e.bin

.rpmstore

ucs_chassis_imgs

installables

ucs-6400-k9-system.9.3.5.I42.3d.bin   <----

nuova-sim-mgmt-nsg.0.1.0.001.bin

5. コマンドcmdline recoverymode=1を実行して、リカバリモードを有効にします。

loader > cmdline recoverymode=1

6. Fabric Interconnect上のシステムイメージをブートします。

loader > boot ucs-6400-k9-system.9.3.5.I42.3d.bin

7. 次に、config terminalモードに入ります。

switch(boot)# config terminal

Enter configuration commands, one per line.  End with CNTL/Z.

switch(boot)(config)#

8. 管理者パスワードをリセットします。

switch(boot)(config)# admin-password

注：少なくとも1つの大文字と1つの数字を含む強力なパスワードを選択してください。パスワードを空白にすることはできません。

注意：新しいパスワードはクリアテキストモードで表示されます。

9. config terminalモードを終了します。

10.システムイメージをロードします。

switch(boot)(config)# exit

switch(boot)# load ucs-6400-k9-system.9.3.5.I42.3d.bin

クラスタ構成の場合。手順を繰り返して、ローダープロンプトに移動します。

1. コンソールポートに接続します。

2. ファブリックインターコネクトの電源を再投入します。

1. Fabric Interconnectの電源をオフにします。

2. ファブリックインターコネクトの電源をオンにします。

3. ブート時にコンソールのキーの組み合わせを押します。 Ctrl+Cキー

4. 下位のファブリックインターコネクトのローダプロンプトで、イメージをブートして起動します。

loader > boot ucs-6400-k9-system.9.3.5.I42.3d.bin

ヒント：クラスタを構成するには、ファブリックインターコネクトが同じファームウェアバージョン上にある必要があります。

確認

SSH経由でファブリックの管理IPへの接続を確立し、更新されたパスワードを使用してログインします。

login as: admin

Pre-authentication banner message from server:

| Cisco UCS 6500 Series Fabric Interconnect

End of banner message from server

admin@X.X.X.X's password: N3wp4ssw0rd

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2009, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1. A copy of each

such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://www.opensource.org/licenses/lgpl-2.1.php

FI-6536-A#

関連情報

https://www.cisco.com/c/en/us/td/docs/unified_computing/ucs/hw/6454-install-guide/6454/6454_chapter_011.html