内容

はじめに

問題

解決方法

検証

はじめに

このドキュメントでは、pingまたはtracerouteの「To」または「From」をNexusスイッチIPに送信する際に予想される遅延について説明します。スイッチからの応答が遅延することは、予期される動作です。

問題

Nexusスイッチ上のスイッチIPとの間でpingを実行すると、遅延が観察されます。

Nexus-1# ping6 fc00::2

64 bytes from fc00::2: icmp_seq=47 time=12.067 ms

64 bytes from fc00::2: icmp_seq=48 time=12.452 ms

64 bytes from fc00::2: icmp_seq=49 time=12.575 ms

64 bytes from fc00::2: icmp_seq=50 time=12.903 ms

64 bytes from fc00::2: icmp_seq=51 time=14.532 ms

64 bytes from fc00::2: icmp_seq=52 time=15.029 ms

64 bytes from fc00::2: icmp_seq=53 time=15.188 ms

64 bytes from fc00::2: icmp_seq=54 time=15.447 ms

64 bytes from fc00::2: icmp_seq=55 time=15.788 ms

64 bytes from fc00::2: icmp_seq=56 time=16.136 ms

64 bytes from fc00::2: icmp_seq=57 time=16.29 ms

----------------------------------------------------------------------------

Nexus-1# ping 10.1.1.1

64 bytes from 10.1.1.1: icmp_seq=21 ttl=254 time=17.397 ms

64 bytes from 10.1.1.1: icmp_seq=22 ttl=254 time=17.977 ms

64 bytes from 10.1.1.1: icmp_seq=23 ttl=254 time=18.668 ms

64 bytes from 10.1.1.1: icmp_seq=24 ttl=254 time=19.613 ms

64 bytes from 10.1.1.1: icmp_seq=25 ttl=254 time=20.018 ms

64 bytes from 10.1.1.1: icmp_seq=26 ttl=254 time=20.539 ms

64 bytes from 10.1.1.1: icmp_seq=27 ttl=254 time=20.647 ms

64 bytes from 10.1.1.1: icmp_seq=28 ttl=254 time=21.02 ms

64 bytes from 10.1.1.1: icmp_seq=29 ttl=254 time=21.504 ms

64 bytes from 10.1.1.1: icmp_seq=30 ttl=254 time=21.622 ms

解決方法

スイッチIPに対してpingテストを実行する代わりに、エンドデバイス/ホスト間でpingテストを実行して遅延を確認することを推奨します。

- ICMP要求がスイッチに対して受信されると、スイッチのCPUまたはスーパーバイザによって処理されます。

- ICMPパケットは、優先順位が低いか、スイッチへの重要でないトラフィックです。

- スイッチのCPUやスーパーバイザは、STP BPDU、UDLD、BFD、LACP、OSFP、BGP、およびその他のコントロールプレーントラフィックなどの重要なトラフィックを優先的に処理する必要があります。

- そのため、スイッチIPにpingを実行すると、遅延が発生する可能性があります。

検証

- ethanalyzerコマンドを使用して、スイッチで受信された異常なICMPトラフィックがあるかどうかを確認できます。

- 次の出力では、複数のホスト/送信元からスイッチIPに対するICMP要求を受信しています。

NEXUS# show ip interface brief

IP Interface Status for VRF "default"(1)

Interface            IP Address      Interface Status

Vlan10               10.1.1.1        protocol-up/link-up/admin-up

NEXUS# ethanalyzer local interface inband display-filter icmp limit-c 0

Capturing on 'ps-inb'

1 2024-05-13 13:05:49.296574516    10.1.1.35 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

2 2024-05-13 13:05:49.298725978    10.1.1.51 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

3 2024-05-13 13:05:49.299935463    10.1.1.60 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

4 2024-05-13 13:05:49.303159980    10.1.1.84 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

5 2024-05-13 13:05:49.305450067   10.1.1.101 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

6 2024-05-13 13:05:49.307596053    10.1.1.17 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

7 2024-05-13 13:05:49.309881152    10.1.1.34 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

8 2024-05-13 13:05:49.313239980    10.1.1.59 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

9 2024-05-13 13:05:49.315391183    10.1.1.75 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

10 2024-05-13 13:05:49.317675859    10.1.1.92 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

11 2024-05-13 13:05:49.319960319   10.1.1.109 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

12 2024-05-13 13:05:49.323185627    10.1.1.33 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

13 2024-05-13 13:05:49.325471951    10.1.1.50 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

14 2024-05-13 13:05:49.327622826    10.1.1.66 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

15 2024-05-13 13:05:49.329906456    10.1.1.83 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

16 2024-05-13 13:05:49.332057200    10.1.1.99 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

17 2024-05-13 13:05:49.334341820    10.1.1.16 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

18 2024-05-13 13:05:49.336626919    10.1.1.33 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64