内容

はじめに

前提条件

要件

使用するコンポーネント

背景説明

ネットワーク図

設定

トラブルシュート

整合性チェッカー

Q-in-Qの問題を収集してチェックするのに便利なコマンド

関連情報

はじめに

このドキュメントでは、Nexus 9300(EX-FX-GX)モデルで選択的Q-in-Q(PQ)を設定してトラブルシューティングする方法について説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- Q-in-Qカプセル化

- Dot1qスイッチング

- Nexus 9000

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- ハードウェア：N9K-C9336C-FX2

- バージョン：10.2(3)

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

背景説明

Q-in-Q VLANトンネルを使用すると、サービスプロバイダーは、インフラストラクチャ内の異なるユーザのトラフィックを分離できます。また、すでにタグ付けされているフレームに2つ目の802.1Qタグを追加することで、内部使用のための全範囲のVLANを提供できます。

複数のプロバイダーVLANを持つ選択的Q-in-Qは、ポート上のユーザ固有のVLAN範囲を1つの特定のプロバイダーVLANに関連付けることができるトンネリング機能です。

Q-in-Qを使用すると、ポート上で複数のユーザVLANからプロバイダーVLANへのマッピングを行うことができます。

ポート上の設定済みユーザVLANのいずれかに一致するVLANタグが付いたパケットは、サービスプロバイダーVLANのプロパティを使用して、ファブリックを介してトンネリングされます。カプセル化されたパケットは、内部パケットのレイヤ2ヘッダーの一部としてユーザVLANタグを伝送します。

ネットワーク図

設定

選択的Q-in-Qの設定の目的は、N9KFX2およびN9KFX2-1で受信したトラフィックからeth1/1インターフェイスにVLANをマッピングすることです。

Nexusはトラフィックをカプセル化し、Nexus 93180FXでシミュレートされたDOT1QヘッダーVLAN 20を使用してプロバイダーに送信します。

ホストA

interface Ethernet1/1

switchport

switchport mode trunk

no shutdown

interface Vlan10

no shutdown

ip address 192.168.1.1/24

ホストB

interface Ethernet1/1

switchport

switchport mode trunk

no shutdown

interface Vlan10

no shutdown

ip address 192.168.1.2/24

N9KFX2

interface Ethernet1/1

switchport

switchport mode trunk

switchport vlan mapping all dot1q-tunnel 20

switchport trunk allowed vlan 20

spanning-tree port type edge trunk

spanning-tree bpdufilter enable

no shutdown

interface Ethernet1/35

switchport

switchport mode trunk

no shutdown

N93180FX

system dot1q-tunnel transit

interface Ethernet1/17

switchport

switchport mode trunk

no shutdown

interface Ethernet1/18

switchport

switchport mode trunk

no shutdown

N9KFX2-1

interface Ethernet1/1

switchport

switchport mode trunk

switchport vlan mapping all dot1q-tunnel 20

switchport trunk allowed vlan 20

spanning-tree port type edge trunk

spanning-tree bpdufilter enable

no shutdown

interface Ethernet1/35

switchport

switchport mode trunk

no shutdown

トラブルシュート

Q-in-Qプログラミングは、次のコンポーネントを介してコントロールプレーンからハードウェアに移動します。

:

整合性チェッカー

Nexusスイッチの最近のバージョンには、誤プログラミングの場合に使用するConsistency Checkerがあります。

N9KFX2# show consistency-checker selective-qinq

Box level hardware programming checks      : PASS

Fetching ingressVlanXlate entries from slice: 0 HW

Fetching ingressVlanXlate entries from slice: 1 HW

Fetching ingressVlanXlate TCAM entries

Performing port specific checks for intf Eth1/1

Port specific selective QinQ checks for interface  Eth1/1 : PASS

Selective QinQ Overall status      : PASS

コントロール プレーン

ポートでVLANがアクティブであるかどうかを確認します。

N9KFX2#sh vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Eth1/1

20   VLAN0020                         active    Eth1/1, Eth1/35

VLANマッピングが明確に表示されていることを確認します。

N9KFX2# sh vlan internal info mapping

Per Port Vlan Translation Details

================

Entry No                :  0

----------------------

ifindex Eth1/1(0x1a000000)

vlan mapping enabled: TRUE

vlan translation mapping information (count=1):

Original Vlan      Translated Vlan

-------------      ---------------

all                  20

Entry No                :  1

----------------------

ifindex Eth1/35(0x1a004400)

vlan mapping enabled: FALSE

vlan translation mapping information (count=0):

Original Vlan      Translated Vlan

-------------      ---------------

ELTM

エラーが増加しているか、またはゼロ以外であるかを確認します。

N9KFX2# show system internal eltm error count

interface config error: 0

dce error: 0

port struct error: 0

port channel error: 0

tunnel error: 0

tlv count error: 0

vpn count error: 0

SI add to DB error: 0

attach module Xコマンドを実行します。Xは、物理インターフェイスが割り当てられているモジュールです。

N9KFX2# attach module 1

module-1# show system internal eltm info vlan 20

IFTMC Detailed info for VLAN = 20

cr_flags = VLAN , bd = 21(0x15)  stg-id = 0 type = 1 stp:0

shut_state = 2 , oper_state = 1

vni = 0, ipmc_idx = 0x0 ipmc_remap_idx = 0x0 ipmc_remap_idx2 = 0x0 dvif: 0

ipmc_mrouter_idx = 0x0 ipmc_mrouter_remap_idx = 0x0 ipmc_mrouter_remap_idx2 = 0x0

pbp_idx=0

eid[0] = 0, alt_eid[0] = 0eid[1] = 0, alt_eid[1] = 0eid[2] = 0, alt_eid[2] = 0eid[3] = 0, alt_eid[3] = 0eid[4] = 0, alt_eid[4] = 0eid[5] = 0, alt_eid[5] = 0eid[6] = 0, alt_eid[6] = 0eid[7] = 0, alt_eid[7] = 0

Active ports:                                             <<<<< Confirm Active ports are listed for the vlan

Ethernet1/1(0x1a000000)  Ethernet1/35(0x1a004400)

Active Local ports:

Ethernet1/1(0x1a000000)  Ethernet1/35(0x1a004400)

Ports using this VLAN as Provider:                          <<<<< Displays the interface that is doing the tunneling

Ethernet1/1(0x1a000000)

SDB Active ports:

Ethernet1/1

pbp_idx:0

VLAN Features:

prim_vlan      : 0, prim_intf_vlan  : 0, vlan mode      : 0(CE)

pt_cam_en      : 1, ipv4_igmp_snoop  : 1, ipv4_pim_snoop  : 0

ipv6_mld_snoop : 0, ipv6_pim_snoop  : 0, l2l3_lkup_cfg  : 1

v4_table_id    : 1        (0x00000001), v4_vpn_id        : 1 (0x1)

v6_table_id    : 2147483649 (0x80000001), v6_vpn_id      : 1 (0x1)

age_tmr_sel    : 1, sm_en  : 0 fcf  : 0 omf : 1, dhcp_snoop_en  : 0

proxy_learn    : 0, iic_en : 0, use_oxid : 0, age_grp_sel        : 0

disable_learn  : 0, otv_en : 0, global  : FALSE

bc_uc_ftag    : 4095  , mcast_ftag_num : 1, arp_sup: 0x0 ,icmpv6 nd local proxy: 0x0

isdot1qvlan    : 0  , num_dot1q_ports: 0  num_sel_dot1q_qinvni_ports: 0

num_multi_tag_ports: 0,  eid: 0,  xconnect: 0,  mcast_ftag[1]  : {4095}

is_transit    : 0    mdns_en: 0,

TAH:VLAN_CONTROL:

------------------

vrf: 0 forwarding_vlan: 0 forwarding mode: 0

Flags: 0x0

up: 0 vni: 0 is_sr_evpn: 0

インターフェイスプログラミングを確認できます。出力には、ポートプログラミングに関する情報が表示されます。

N9KFX2# attach module 1

module-1# show system internal eltm info interface e1/1

IFTMC Detailed info for Interface Ethernet1/1(0x1a000000)

CR_flags = INTF LIF  (0x3),  LTL = 6144 (0x1800), (S 0x0, P 0x0)

IF_INDEX = Ethernet1/1(0x1a000000), LIF = 4100 (0x1004), SDB LIF = 4100 (0x1004)

State = UP

Layer = L2, Mode = TRUNK, native_vlan = 1 tag_native_vlan = 0   <<< Confirm mode and Layer

AdminMode = 0x100000 is_monitor = 0 src_if_pruning 1

Operational VLAN's (2):                                         <<< Confirm if the VLAN for tunnel and native are correct

1,20

voice vlan = 4096

MVR Configured VLAN's (0):

local_port = 1, ldb_sharing = 1, ilm_sharing = 0x1

ldb_port_flags = 0x0, dsm = 0, dnl = 0

pc_ifindx = 0x0, fpc = 0x0

Interface Features:

ipv4_en        : 0, ipv4_mcast_en : 0, df_mask : 0, mpls_en : 0

ipv6_en        : 0, ipv6_mcast_en : 0  pim_dr_en :0 ipsg_en  : 0

FC port mode:0 vsan: 0 trunk mode: 0 speed: 0

FCF Enabled : 0 FCF MAC:0000:0000:0000

PTP fid = 0

mpls_strip_en    :0

external port :0

Operational VSAN's (0):

v4_table_id    : 1          (0x00000001), v4_vpn_id    : 1 (0x1)

v6_table_id    : 2147483649 (0x80000001), v6_vpn_id    : 1 (0x1)

per_pkt_ls_en  : 0,  bd              : N/A (0x0)

icmp_redirect  : 1, ipv6_redirect    : 1

v4_same_if_chk : 0, v6_same_if_check : 0

mtu_index      : 1    (0x0001), new_mtu_index  : 1    (0x0001)

mtu            : 1500 (0x05dc), port_trust    : 0

v4_rpf_mode    : 0  , v6_rpf_mode            : 0

v4_rpf_mode (sdb) : 0  , v6_rpf_mode (sdb) : 0

intf_type      : 0x0, intf_flags  : 0x20

sub_flags      : 0x0, port_type  : 0x0, is_aida  : 0x0, vpc_dvp_no  : 0x0

fcoe_mac_ip_chk: 0 buffer_boost: 0 openflow_en: 0 span_buffer_cfg: 0 span_mode: 0 outer_bd = 512

interface mac: 00:00:00:00:00:00 old_mac: 00:00:00:00:00:00 mac_index:0

Src-Idx:1

mc_index : 4100, egress_vsl_drop: 0, pv_en : 0, is_selective_qinvni_port 1 ether_type 0x8100 vlan_bmp_State_change : False, policy flood_l2_local 1.  <<<Confirm the ether type is 8100 and is_selective_qinvni_port is 1

is_multi_tag_port 0, nat_realm_id 0

global_id 0

enm_if_type  : 0

pbp_idx  : 0

pinned_ifindex : 0x0

normal_vlan_bmp (0):

arp_suppress inst[0] 0 arp_suppress inst[1] 0 arp_suppress inst[2] 0 arp_suppress inst[3] 0 arp_suppress inst[4] 0 arp_suppress inst[5] 0 arp_suppress inst[6] 0 arp_suppress inst[7] 0 icmpv6 nd local proxy en inst[0] 0 icmpv6 nd local proxy en inst[1] 0 icmpv6 nd local proxy en inst[2] 0 icmpv6 nd local proxy en inst[3] 0 icmpv6 nd local proxy en inst[4] 0 icmpv6 nd local proxy en inst[5] 0 icmpv6 nd local proxy en inst[6] 0 icmpv6 nd local proxy en inst[7] 0 mdns_en inst[0] 0 mdns_en inst[1] 0 mdns_en ins

t[2] 0 mdns_en inst[3] 0 mdns_en inst[4] 0 mdns_en inst[5] 0 mdns_en inst[6] 0 mdns_en inst[7] 0 arp_suppress inst[0] 0 arp_suppress inst[1] 0 arp_suppress inst[2] 0 arp_suppress inst[3] 0 arp_suppress inst[4] 0 arp_suppress inst[5] 0 arp_suppress inst[6] 0 arp_suppress inst[7] 0 icmpv6 nd local proxy en inst[0] 0 icmpv6 nd local proxy en inst[1] 0 icmpv6 nd local proxy en inst[2] 0 icmpv6 nd local proxy en inst[3] 0 icmpv6 nd local proxy en inst[4] 0 icmpv6 nd local proxy en inst[5] 0 icmpv6 nd local prox

y en inst[6] 0 icmpv6 nd local proxy en inst[7] 0 mdns_en inst[0] 0 mdns_en inst[1] 0 mdns_en inst[2] 0 mdns_en inst[3] 0 mdns_en inst[4] 0 mdns_en inst[5] 0 mdns_en inst[6] 0 mdns_en inst[7]

service provider Vlans 0

vlan_xlt_tlb_en_ingress : 1  num_vlan_xlt_ingr : 1

Vlan Translation Table (INGRESS)         <<< This table displays xlt the vlan used to send to the provider

--------------------------------

in_vlan  xlt_vlan

1      20

SDB INFO:

--------------------------------

MVR VLAN's (0):

STATE = UP, is_mcec = 0, is_mct = 0

TAH:L2 INFO: 4100

----------

Flags : 0x41

NIV Index: 1 Source Chip: 1 Source Port: 72

slice: 1 slice_port: 0

is_monitor: 0 lif: 4100 phy_intf_id: 1 vnic_if: 0 learn_en: 1 native_vlan 1

trunk_port: 1 src_if_check: 1

FC info: intf_type = 0x0 port_mode = 0x0 port_vsan = 0 port_speed = 0 fcf_mac = 0:0:0:0:0:0

IFTMC社

IFTMCでは、2つのコマンドを実行できます。attach module 1コマンドを実行してから、次のコマンドを実行します。

N9KFX2# attach module 1

module-1# show system internal iftmc info interface e1/1

module-1# show system internal iftmc info vlan 20

両方のコマンド

- show system internal iftmc info interface ethernet1/1

- show system internal iftmc info vlan 20

ELTM出力と同様の情報が表示されます。ELTMモジュールとIFTMCモジュールの間に同じ値が設定されていることを確認してください。

ハードウェア

ハードウェアで出力が正しくプログラムされていることを確認するには、show hardware internal tah interface ethernet 1/1コマンドを実行します。コマンドの出力から、BdStateTableの部分に移動できます。

N9KFX2-1(config-if)# show hardware internal tah interface ethernet 1/1

BdStateTable:

ENTRY: 1

info_leaf_flood_dst_ptr : 1                 <<<Displays native vlan

info_leaf_igmp_mld_dst_ptr : 4098

info_leaf_fid : 1                           <<<Displays native vlan

info_leaf_vrf : 1

info_leaf_igmp_snp_en : 1

info_leaf_l3_bind_check_en : 1

info_leaf_v4_omf : 1

info_leaf_unknown_uc_flood : 1

info_leaf_unknown_mc_flood : 1

info_leaf_ecn_mark_en : 1

info_leaf_l2_bind_check_en : 1

info_leaf_bd_profile_idx : 1

info_leaf_analytics_en : 1

info_leaf_flow_collect_en : 1

info_spine_info0_gipo_idx : 1              <<<Displays native vlan

info_spine_info0_scope : 64

info_spine_info0_spare : 0x00000000:0x00100044

info_spine_info1_spare : 0x00001000:0x00000000

info_spine_info2_gipo_idx : 512

info_spine_info2_scope : 12416

info_spine_info2_spare : 0x00005000:0x10000000

info_spine_info3_gipo_idx : 384

info_spine_info3_spare : 0x00000000:0x00000000

=========================================

Q-in-Qの問題を収集してチェックするのに便利なコマンド

- show vlan internal info mapping（vlanの内部情報のマッピングを表示）

- consistency-checker selective-qinqを表示する

- show consistency-checker selective-qinq interface <ethX/Y、ポートチャネルX>

- show hardware internal tah interface ethernet x/y（すべてのインターフェイスについて）

- show hardware internal tah interface all（隠しコマンド）

- show hardware internal tah sdk event-historyエラー

- show system internal iftmc info interface <>（システム内部のiftmc情報インターフェイスの表示）

Nexusプラットフォームでは、次の一連のコマンドを提供する一般よりも詳細なshow tech-supportを収集できます。

- 技術的な詳細を表示

- show tech vlan（すべてのコマンド）

- show tech usd-all（隠しコマンド）

- show tech eltm（ベータ版）

- モジュール1を接続し、show tech iftmcを実行します。

注:Nexusで実行しているバージョンの「関連情報」に記載されている設定ガイドのガイドラインと制限事項のセクションを参照して、設定がハードウェアまたはソフトウェアの制限に一致していないことを確認してください。

関連情報

- リリース9.3.X

- リリース10.1.X

- リリース10.2.X

- リリース10.3.X

- リリース10.4.X

- シスコのテクニカルサポートとダウンロード