内容

概要

前提条件

要件

使用するコンポーネント

表記法

背景説明

設定

ネットワーク図

設定

確認

トラブルシュート

関連情報

概要

このドキュメントでは、ネットワーク全体のリモート モニタリングを提供する、IP ネットワーク経由でミラード トラフィックを伝送する Nexus 5000 シリーズ スイッチ上で Encapsulated Remote Switched Port Analyzer（ERSPAN）セッションを設定する方法について説明します。

前提条件

要件

この設定を行う前に、次の要件が満たされていることを確認します。

- Nexus 5000 シリーズ スイッチの設定に関する基本的な知識がある。

- Nexus 7000 シリーズ スイッチの設定に関する基本的な知識がある。

- ERSPAN に関する基本的な知識がある。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- Nexus 5000 スイッチ：Cisco NX-OS ソフトウェア リリース 5.1(3)N1(1) 以降の Cisco Nexus 5010 シリーズ スイッチ

- Nexus 7000 スイッチ：Cisco NX-OS ソフトウェア リリース 5.1(3) 以降上での Cisco Nexus 7018 シリーズ スイッチ

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細については、『シスコ テクニカル ティップスの表記法』を参照してください。

背景説明

- ERSPAN は、ネットワーク全体における複数のスイッチのリモート モニタリングを可能にします。

- Cisco Nexus 5000 シリーズ スイッチは、ERSPAN 送信元セッションのみをサポートします。宛先セッションは Nexus 5000 スイッチではサポートされません。そのためこのドキュメントでは、Nexus 7000スイッチは ERSPAN 宛先セッションとして使用され、Nexus 5000 スイッチからのミラーリングされたトラフィックをモニタします。

- ERSPAN は、ERSPAN 送信元セッション、ルーティング可能な ERSPAN 総称ルーティング カプセル化（GRE）カプセル化トラフィック、および ERSPAN 宛先セッションで構成されています。

- ERSPAN は、ミラーリングされたトラフィックを異なるスイッチの送信元ポートから、ネットワーク アナライザが接続された宛先ポートに転送します。トラフィックは送信元スイッチでカプセル化され、宛先スイッチに転送されます。この宛先スイッチで、パケットのカプセルが除去され、宛先ポートに送信されます。

- 異なるスイッチで ERSPAN 送信元セッションおよび宛先セッションを個別に設定することができます。

ERSPAN 送信元

- トラフィックをモニタできるモニタ元インターフェイスのことを ERSPAN ソースと呼びます。

- 送信元ポートに対するすべてのパケット、つまり受信（入力）、送信（出力）、または双方向（両方）のパケットをモニタできます。

- ERSPAN 送信元には送信元ポート、送信元 VLAN、または送信元 VSAN が含まれます。VLAN が ERSPAN 送信元として指定されている場合は、VLAN 内でサポートされているすべてのインターフェイスが ERSPAN 送信元になります。

ERSPAN 宛先

- 宛先ポートは ERSPAN 送信元からコピーされたトラフィックを受信します。

- 宛先ポートは、SwitchProbe デバイスやその他のリモート モニタリング（RMON）プローブなどのデバイス、あるいはコピーされたパケットを 1 つまたは複数の送信元ポートから受信したり、解析することができるセキュリティ デバイスに接続されたポートです。

- 宛先ポートはスパニングツリー インスタンスまたはレイヤ 3 プロトコルに参加しません。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：このセクションで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を参照してください。一部ツールについては、ゲスト登録のお客様にはアクセスできない場合がありますことをご了承ください。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

設定

このドキュメントでは、次の構成を使用します。

- Nexus 5000 スイッチ

- Nexus 7000 スイッチ

Nexus 5000 スイッチ

Nexus 5000#configure terminal

!--- Configures an ERSPAN source session

Nexus 5000(config)#monitor session 3 type erspan-source

!--- Configure the sources and traffic direction

Nexus 5000(config-erspan-src)#source interface Ethernet1/10 both

!--- Configure the destination IP address in the ERSPAN session

Nexus 5000(config-erspan-src)#destination ip 10.23.21.8

!--- Configure the ERSPAN ID

Nexus 5000(config-erspan-src)#erspan-id 903

!--- Configure the VRF

Nexus 5000(config-erspan-src)#vrf default

!--- Enable the ERSPAN source session (by default the session is in shutdown state)

Nexus 5000(config-erspan-src)#no shut

Nexus 5000(config-erspan-src)#exit

!--- Configure the ERSPAN global origin IP address

Nexus 5000(config)#monitor erspan origin ip-address 10.254.254.30 global

!--- Configure the IP address for loopback interface, which is used as source of the ERSPAN traffic

Nexus 5000(config)#interface loopback1

Nexus 5000(config-if)#ip address 10.254.254.30/32

Nexus 5000(config-if)#exit

Nexus 5000(config)#interface Ethernet1/1

Nexus 5000(config-if)#switchport

Nexus 5000(config-if)#switchport mode trunk

Nexus 5000(config-if)#no shutdown

Nexus 5000(config)#feature interface-vlan

Nexus 5000(config)#interface Vlan 12

Nexus 5000(config-if)#ip address 10.23.21.7/29

Nexus 5000(config-if)#no ip redirects

Nexus 5000(config-if)#no shutdown

Nexus 5000(config-if)#exit

!--- Save the configurations in the device.

switch(config)#copy running-config startup-config

Switch(config)#exit

Nexus 7000 スイッチ

Nexus 7000#configure terminal

!--- Configures an ERSPAN destination session

Nexus 7000(config)#monitor session 4 type erspan-destination

!--- Configures the source IP address

Nexus 7000(config-erspan-src)#source ip 10.23.21.8

!--- Configures a destination for copied source packets

Nexus 7000(config-erspan-src)#destination interface Ethernet1/24

!--- Configure the ERSPAN ID

Nexus 7000(config-erspan-src)#erspan-id 903

!--- Configure the VRF

Nexus 7000(config-erspan-src)#vrf default

!--- Enable the ERSPAN destination session (by default the session is in shutdown state)

Nexus 7000(config-erspan-src)#no shutdown

Nexus 7000(config-erspan-src)#exit

Nexus 7000(config)#interface Ethernet1/24

Nexus 7000(config-if)#switchport monitor

Nexus 7000(config-if)#exit

Nexus 7000(config)#feature interface-vlan

Nexus 7000(config)#interface Vlan 12

Nexus 7000(config-if)#ip address 10.23.21.8/29

Nexus 7000(config-if)#no ip redirects

Nexus 7000(config-if)#no shutdown

Nexus 7000(config-if)#exit

Nexus 7000(config)#interface Ethernet1/1

Nexus 7000(config-if)#switchport

Nexus 7000(config-if)#switchport mode trunk

Nexus 7000(config-if)#no shutdown

Nexus 7000(config-if)#exit

!--- Save the configurations in the device.

Nexus 7000(config)#copy running-config startup-config

Nexus 7000(config)#exit

確認

ここでは、設定が正常に機能しているかどうかを確認します。

アウトプット インタープリタ ツール（登録ユーザ専用）（OIT）は、特定の show コマンドをサポートします。OIT を使用して、show コマンドの出力の分析を表示します。

Nexus 5000 シリーズ スイッチ：

ERSPAN のセッションの状態を表示するには、show monitor コマンドを使用します。

Nexus 5000# show monitor

Session  State        Reason                  Description

-------  -----------  ----------------------  --------------------------------

3        up           The session is up

ERSPAN セッションの設定を表示するには、show monitor session [session session_number] コマンドを使用します。

Nexus 5000# show monitor session 3

session 3

---------------

type              : erspan-source

state             : up

erspan-id         : 903

vrf-name          : default

destination-ip    : 10.23.21.8

ip-ttl            : 255

ip-dscp           : 0

origin-ip         : 10.254.254.30 (global)

source intf       :

rx            : Eth1/10

tx            : Eth1/10

both          : Eth1/10

source VLANs      :

rx            :

実行中の ERSPAN 設定を表示するには、show running-config monitor コマンドを使用します。

Nexus 5000# show running-config monitor

!Command: show running-config monitor

!Time: Thu Apr 19 09:32:27 2012

version 5.1(3)N1(1)

monitor session 3 type erspan-source

erspan-id 903

vrf default

destination ip 10.23.21.8

source interface Ethernet1/10 both

no shut

monitor erspan origin ip-address 10.254.254.30 global

Nexus 7000 シリーズ スイッチ：

ERSPAN のセッションの状態を表示するには、show monitor コマンドを使用します。

Nexus 7000# show monitor

Session  State        Reason                  Description

-------  -----------  ----------------------  --------------------------------

4        up           The session is up

ERSPAN セッションの設定を表示するには、show monitor session [session session_number] コマンドを使用します。

Nexus 7000# show monitor session 4

session 4

---------------

type              : erspan-destination

state             : up

erspan-id         : 903

vrf-name          : default

source-ip         : 10.23.21.8

destination ports : Eth1/24

Legend: f = forwarding enabled, l = learning enabled

実行中の ERSPAN 設定を表示するには、show running-config monitor コマンドを使用します。

Nexus 7000# show running-config monitor

!Command: show running-config monitor

!Time: Thu Apr 19 11:13:28 2012

version 5.1(3)

monitor session 4 type erspan-destination

erspan-id 903

vrf default

source ip 10.23.21.8

destination interface Ethernet1/24

no shut

トラブルシュート

現在、この設定に関する特定のトラブルシューティング情報はありません。

関連情報

- Cisco Nexus 5000 シリーズ スイッチのサポート

- Cisco Nexus 7000 シリーズ スイッチに関するサポート ページ

- スイッチ製品に関するサポート ページ

- LAN スイッチング テクノロジーに関するサポート ページ

- テクニカル サポートとドキュメント – Cisco Systems