内容

概要

問題

解決方法

概要

このドキュメントは、Cisco Metro Ethernet 3600X シリーズ スイッチ（ME3600X）のログに従う試みに伴って新しいポリシー マップを作成する際の問題について説明します。

問題

一定の数のポリシー マップを作成後、ME3600X スイッチより、新しいポリシー マップ作成の失敗に伴ってこのログが報告される場合があります。

QOSMGR-3-PROFILE_EXHAUST:

No free scheduler profiles available in hardware

これは、Quality of Service（QoS）の Ternary Content Addressable Memory（TCAM）に空き領域があっても発生する場合があります。

Switch#show platform tcam utilization qos

Nile Tcam Utilization per Application & Region:

ES == Entry size == Number of 80 bit TCAM words

==================================================================

App/Region            Start  Num Avail  ES    Used Range  Num Used

==================================================================

QOS                   36864      4096   2

nile0                                                     2966

nile1

解決方法

このログは、ポリシー マップ設定ですべてのスケジューラ プロファイル（255 個）がなくなった場合に生成されます。これを検証するには、show platform qos scheduler profile queue 0 コマンドを入力します。

Switch#show platform qos scheduler profile queue 0

Asic 01)PIR =1000000 bandwidth =0 eir_ratio=1 ref_count=19 mtu=1500

2)PIR =1000000 bandwidth =0 eir_ratio=1 ref_count=1 mtu=9200

3)PIR =5000 bandwidth =5000 eir_ratio=1 ref_count=0 mtu=1500

So on?.

252)PIR =5083 bandwidth =5083 eir_ratio=1 ref_count=0 mtu=1500

253)PIR =5083 bandwidth =0 eir_ratio=1 ref_count=1 mtu=1500

254)PIR =5083 bandwidth =0 eir_ratio=98 ref_count=0 mtu=1500

255)PIR =1000000 bandwidth =0 eir_ratio=1 ref_count=1 mtu=2000

スケジューラは、別個のハードウェア リソースであり、TCAM 利用率はこの問題に依存しません。スケジューラ利用率は設定によって異なります。より多くの機能（使用可能な帯域幅の割合、シェープ）を使用するポリシー マップは、より多くのスケジューラのリソースを使用します。