内容

概要

前提条件

要件

使用するコンポーネント

背景説明

起動

設定

確認

関連情報

概要

このドキュメントでは、Catalyst 9600スイッチをセットアップするための初期設定と検証手順について説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

インストレーションガイドに従って、シャーシとスーパーバイザがインストールされていることを確認します。

- シャーシインストールガイド

- スーパーバイザインストールガイド

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいて設定されています。

- Hardware:Catalyst 9600 スイッチ

- ソフトウェア：Cisco IOS® XE 16.12.3a

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

背景説明

Catalyst 9600は、3つの手順で起動、設定、および確認できます。

起動

- コンソールの接続

- システムの電源投入

- コンソールメッセージの確認

- 構成の選択ダイアログオプション

設定

- デバイス管理

- ホスト名

- clock

- 設定の保存

確認

- ソフトウェアのバージョンとパッケージ

- システムハードウェア、電源など

- 管理IP接続

- システムの状態

- 時間

起動

- PCをRJ45またはUSBを搭載したCatalyst 9600のコンソールに接続します

- システムの電源投入

- コンソールにシステムハードウェアの初期化などの情報が画面に表示されます。

初期ブートアップ：

Initializing Hardware...

Initializing Hardware......

System Bootstrap, Version 17.3.1r[FC2], RELEASE SOFTWARE (P)

Compiled 30-04-2020 12:00:00.00 by rel

Current ROMMON image : Primary Rommon Image

Last reset cause:LocalSoft

C9600-SUP-1 platform with 16777216 Kbytes of main memory

Preparing to autoboot. [Press Ctrl-C to interrupt]  0

boot: attempting to boot from [bootflash:packages.conf]

boot: reading file packages.conf

<truncated

###########################################################################

<truncated>

Base Ethernet MAC Address          : 6c:b2:ae:4a:70:c0

Motherboard Assembly Number        : 4C57

Motherboard Serial Number          : FXS230103TN

Model Revision Number              : V02

Motherboard Revision Number        : 3

Model Number                       : C9606R

System Serial Number               : FXS2302Q2EP

[システム構成]ダイアログボックスが表示されるまで待ちます。手動設定モードに入るにはNoオプションを選択し、自動インストールを終了するにはYesを選択して、単純な手動設定を開始します。

--- System Configuration Dialog ---

Would you like to enter the initial configuration dialog? [yes/no]: no

Would you like to terminate autoinstall? [yes]: yes

Press RETURN to get started

*Nov  5 15:40:26.909: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan1, changed state to down

*Nov  5 15:40:26.909: %LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEthernet0/0, changed state to down

設定

注：「イネーブルモードでshow running-configコマンドを任意の時点で使用して、設定されている値を確認します。

管理ポートにネットワークのIPアドレスを設定し、ポートを有効にします。

Switch#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Switch(config)#interface gigabitEthernet 0/0

Switch(config-if)#ip address 10.122.186.8 255.255.255.240

Switch(config-if)#no shutdown

管理ネットワークのデフォルトゲートウェイに到達するには、ネットワークIPとゲートウェイを使用してスタティックルートを設定します。

Switch(config)#ip route vrf Mgmt-vrf 10.122.157.250 255.255.255.255 10.122.186.1

Telnet経由でアクセスし、任意のパスワードを設定するために、回線VTY、仮想端末を設定します。

Switch(config)#line vty 0 4

Switch(config-line)#password cisco

Switch(config-line)#login

Transport input allは、すべてのプロトコルを許可します(例：ssh、telnet)を使用して、VTYセッションを介してデバイスにアクセスします。

Switch(config-line)#transport input all

Switch(config-line)#exit

コンソールアクセス用のユーザモードパスワードを設定します。

Switch(config)#line console 0

Switch(config-line)#password cisco

Switch(config-line)#login

Switch(config-line)#exit

強力なイネーブルモードパスワードを設定します。

Switch(config)#enable secret cisco

システムクロックを設定します。

Switch(config)#clock timezone utc +5 30

*Nov 6 04:34:58.910: %SYS-6-CLOCKUPDATE: System clock has been updated from 10:05:58 utc Fri Nov 6 2020 to 10:04:58 utc Fri Nov 6 2020, configured from console by console.

*Nov 6 04:35:59.634: %SYS-5-CONFIG_I: Configured from console by console

Switch#clock set 04:30:00 6 Nov 2020

*Nov 5 23:00:00.000: %SYS-6-CLOCKUPDATE: System clock has been updated from 10:06:19 utc Fri Nov 6 2020 to 04:30:00 utc Fri Nov 6 2020, configured from console by console.

Nov 5 23:00:00.000: %PKI-6-AUTHORITATIVE_CLOCK: The system clock has been set.

システムのホスト名を設定します。

Switch(config)#hostname Catalyst-9600

これまでに設定した設定をstartup-configに保存します。

Catalyst-9600#write memory

Building configuration...

[OK]

*Nov  5 16:11:46.061: %SYS-2-PRIVCFG_ENCRYPT: Successfully encrypted private config file

確認

システムのソフトウェアバージョンを確認し、稼働時間、システムの詳細などを確認します。

Catalyst-9600#show version

Cisco IOS XE Software, Version 16.12.03a

Cisco IOS Software [Gibraltar], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 16.12.3a, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2020 by Cisco Systems, Inc.

Compiled Tue 28-Apr-20 09:37 by mcpre

Cisco IOS-XE software, Copyright (c) 2005-2020 by cisco Systems, Inc.

All rights reserved.  Certain components of Cisco IOS-XE software are

licensed under the GNU General Public License ("GPL") Version 2.0.  The

software code licensed under GPL Version 2.0 is free software that comes

with ABSOLUTELY NO WARRANTY.  You can redistribute and/or modify such

GPL code under the terms of GPL Version 2.0.  For more details, see the

documentation or "License Notice" file accompanying the IOS-XE software,

or the applicable URL provided on the flyer accompanying the IOS-XE

software.

ROM: IOS-XE ROMMON

BOOTLDR: System Bootstrap, Version 17.3.1r[FC2], RELEASE SOFTWARE (P)

Catalyst-9600 uptime is 36 minutes

Uptime for this control processor is 37 minutes

System returned to ROM by Reload Command

System image file is "bootflash:packages.conf"

Last reload reason: Reload Command

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

Technology Package License Information:

------------------------------------------------------------------------------

Technology-package                                     Technology-package

Current                        Type                       Next reboot

------------------------------------------------------------------------------

network-advantage   Smart License                            network-advantage

dna-advantage            Subscription Smart License     dna-advantage

AIR License Level: AIR DNA Advantage

Next reload AIR license Level: AIR DNA Advantage

Smart Licensing Status: UNREGISTERED/EVAL MODE

cisco C9606R (X86) processor (revision V00) with 1867991K/6147K bytes of memory.

Processor board ID FXS2302Q2EP

1 Virtual Ethernet interface

24 Forty/Hundred Gigabit Ethernet interfaces

48 TwentyFive Gigabit Ethernet interfaces

32768K bytes of non-volatile configuration memory.

16009160K bytes of physical memory.

11161600K bytes of Bootflash at bootflash:.

1638400K bytes of Crash Files at crashinfo:.

0K bytes of WebUI ODM Files at webui:.

Base Ethernet MAC Address          : 6c:b2:ae:4a:70:c0

Motherboard Assembly Number        : 4C57

Motherboard Serial Number          : FXS230103TN

Model Revision Number              : V02

Motherboard Revision Number        : 3

Model Number                       : C9606R

System Serial Number               : FXS2302Q2EP

Configuration register is 0x102

インストールされているパッケージを確認します。

Catalyst-9600#show install summary

[ R0 R1 ] Installed Package(s) Information:

State (St): I - Inactive, U - Activated & Uncommitted,

C - Activated & Committed, D - Deactivated & Uncommitted

--------------------------------------------------------------------------------

Type  St   Filename/Version

--------------------------------------------------------------------------------

IMG   C    16.12.3a.0.4

--------------------------------------------------------------------------------

Auto abort timer: inactive

--------------------------------------------------------------------------------

管理VRFのルートを確認します。

Switch#show ip route vrf Mgmt-vrf

Routing Table: Mgmt-vrf

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, m - OMP

n - NAT, Ni - NAT inside, No - NAT outside, Nd - NAT DIA

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

H - NHRP, G - NHRP registered, g - NHRP registration summary

o - ODR, P - periodic downloaded static route, l - LISP

a - application route

+ - replicated route, % - next hop override, p - overrides from PfR

Gateway of last resort is not set

S*    0.0.0.0/0 [1/0] via 10.122.186.1                       <--- the default gateway

10.0.0.0/8 is variably subnetted, 3 subnets, 2 masks

S        10.122.157.250/32 [1/0] via 10.122.186.1

C        10.122.186.0/28 is directly connected, GigabitEthernet0/0

L        10.122.186.8/32 is directly connected, GigabitEthernet0/0

デフォルトゲートウェイ経由でネットワークへの到達可能性を確認します。

Switch#ping vrf Mgmg-vrf 10.122.186.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.122.186.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

Switch#

システムにインストールされているモジュールを確認します。

Catalyst-9600#show module

Chassis Type: C9606R

Mod Ports Card Type                                   Model          Serial No.

---+-----+--------------------------------------+--------------+--------------

1   24   24-Port 40GE/12-Port 100GE                  C9600-LC-24C     CAT2252L0PY

3   0    Supervisor 1 Module                         C9600-SUP-1      CAT2252L0SH

4   0    Supervisor 1 Module                         C9600-SUP-1      CAT2252L0SU

6   48   48-Port 10GE / 25GE                         C9600-LC-48YL    CAT2302L16G

Mod MAC addresses                    Hw   Fw           Sw                 Status

---+--------------------------------+----+------------+------------------+--------

1   70B3.175A.7580 to 70B3.175A.75FF 0.10 17.3.1r[FC2]  16.12.03a          ok

3   70B3.175A.5680 to 70B3.175A.56FF 0.10 17.3.1r[FC2]  16.12.03a          ok

4   70B3.175A.5600 to 70B3.175A.567F 0.10 17.3.1r[FC2]  16.12.03a          ok

6   6C8B.D307.6680 to 6C8B.D307.66FF 0.10 17.3.1r[FC2]  16.12.03a          ok

Mod Redundancy Role     Operating Redundancy Mode Configured Redundancy Mode

---+-------------------+-------------------------+---------------------------

3   Active              sso                       sso

4   Standby             sso                       sso

Chassis MAC address range: 64 addresses from 6cb2.ae4a.70c0 to 6cb2.ae4a.70ff

電源投入時自己診断テスト(POST)および診断結果を使用して、システムの状態を確認します。

Catalyst-9600#show post

Stored system POST messages:

Switch C9606R

--------------

Thu Nov  5 15:34:27 2020 POST: Module: 6 Mac Loopback Begin

Thu Nov  5 15:34:27 2020 POST: Module: 6 Mac Loopback: loopback Test: End, Status Passed

Thu Nov  5 15:34:27 2020 POST: Module: 1 Mac Loopback Begin

Thu Nov  5 15:34:27 2020 POST: Module: 1 Mac Loopback: loopback Test: End, Status Passed

Catalyst-9600#show diagnostic result module all

Current bootup diagnostic level: minimal

module 1:   SerialNo : CAT2252L0PY

Overall Diagnostic Result for module 1 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestGoldPktLoopback:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

2) TestOBFL ------------------------> U

3) TestThermal ---------------------> .

4) TestPortTxMonitoring:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  .  U  .  U  U  U  U  U  U  U  U  U  U  .  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

module 3:   SerialNo : CAT2252L0SH

Overall Diagnostic Result for module 3 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestOBFL ------------------------> U

2) TestFantray ---------------------> .

3) TestThermal ---------------------> .

4) TestScratchRegister -------------> .

module 4:   SerialNo : CAT2252L0SU

Overall Diagnostic Result for module 4 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestOBFL ------------------------> U

2) TestFantray ---------------------> U

3) TestThermal ---------------------> .

4) TestScratchRegister -------------> U

module 6:   SerialNo : CAT2302L16G

Overall Diagnostic Result for module 6 : PASS

Diagnostic level at card bootup: minimal

Test results: (. = Pass, F = Fail, U = Untested)

1) TestGoldPktLoopback:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U  U

2) TestOBFL ------------------------> U

3) TestThermal ---------------------> .

4) TestPortTxMonitoring:

Port  1  2  3  4  5  6  7  8  9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

----------------------------------------------------------------------------

.  .  U  U  U  .  U  .  U  .  .  .  U  U  .  U  U  U  U  U  U  U  U  U

Port 25 26 27 28 29 30 31 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48

----------------------------------------------------------------------------

U  U  .  U  U  U  U  U  U  U  U  U  U  U  .  U  .  U  U  U  U  .  .  U

クロックが正しく設定されているかどうかを確認します。

Catalyst-9600#show clock

*16:32:55.196 UTC Thu Nov 5 2020

取り付けられている電源モジュールとその状態を確認します。

Catalyst-9600#show power detail

Power                                                       Fan States

Supply  Model No              Type  Capacity  Status        1     2

------  --------------------  ----  --------  ------------  -----------

PS1     C9600-PWR-2KWAC       ac    2000 W    active        good  good

PS4     C9600-PWR-2KWAC       ac    2000 W    active        good  good

PS Current Configuration Mode : none

PS Current Operating State    : none

Power supplies currently active    : 2

Power supplies currently available : 2

Power Summary          Maximum

(in Watts)    Used    Available

-------------  ------  ---------

System Power   2800    3940

-------------  ------  ---------

Total          2800    3940

Power Budget Mode           : Dual Sup

Power                                  Out of  In

Mod  Model No              State     Budget  Instantaneous  Peak  Reset   Reset

---  --------------------  --------  ------  -------------  ----  ------  -----

1    C9600-LC-24C          accepted  300     0              0     300     10

3    C9600-SUP-1           accepted  950     0              0     950     202

4    C9600-SUP-1           accepted  950     0              0     950     202

6    C9600-LC-48YL         accepted  300     0              0     300     10

FM1  C9606-FAN             accepted  300     --             --    300     --

---  --------------------  --------  ------  -------------  ----  ------  -----

Total allocated power:            2800

Total required power: 2800

関連情報

- 詳細な構成オプションについては、システム管理構成ガイドに従ってください。

- テクニカル サポートとドキュメント – Cisco Systems