内容

はじめに

前提条件

要件

最小限のライセンス

その他の要件

使用するコンポーネント

背景説明

xFSUを使用する理由

サポートされているプロトコル

制限事項

スタンドアロンおよびスタック型デバイス

スタック型デバイス

その他の制限

必要な設定

リリースサポート一覧表

EMリリース内/EMからEMリリースへ

同じSMまたはEMバージョン内

手順

高速リロード

確認

基本的なshowコマンド

xFSU関連のログ

トラブルシュート

関連情報

はじめに

このドキュメントでは、Catalyst 9300シリーズスイッチで使用可能なExtended Fast Software Upgrade(xFSU)機能について説明します。

前提条件

要件

最小限のライセンス

- スタンドアロンスイッチのNetwork Essentialライセンスレベル

- スタックスイッチのNetwork Advantageライセンスレベル。

その他の要件

- この機能は、インストールモードで動作するアクセススイッチでのみサポートされます。

- デバイスは、ラピッドスパニングツリープロトコル(RSTP)またはマルチスパニングツリープロトコル(MSTP)のいずれかで設定する必要があります。

- デバイスをルートブリッジにしないでください。STPが設定され、ルートデバイスとして定義されていないデバイスの場合、STPピアに接続されたフォワーディングステートのポート数が1以下の場合にのみ、xFSUがサポートされます。

- NSFタイマー：例：「bgp graceful-restart」が設定されている場合、BGPホールドタイムは10秒に設定することをお勧めします。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- Catalyst 9300、Catalyst 9300L、およびCatalyst 9300Xシリーズスイッチ

- Cisco IOS XE 17.3.2a以降

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

背景説明

拡張ファーストソフトウェアアップグレード(xFSU)は、ソフトウェアのリロードまたはアップグレード操作中のトラフィックのダウンタイムを削減することを目的としたソフトウェア拡張プロセスです。xFSUは、グレースフルリスタート機能（Cisco NSFとも呼ばれる）の原則に基づいています。

この機能の背後にある一般的な考え方は、ソフトウェアアップグレードの一環としてコントロールプレーンがリロードされている間、データ（転送）プレーンが引き続き機能するように維持することです。xFSUの役割は、次に示すように、ASICのフォワーディングステートを新しいコントロールプレーンと調整し、フォワーディングASICのクイックリセット後にフォワーディングステートを復元することです。

次の図は、通常のリロードと比較した、大幅なトラフィックダウンタイムの削減を示しています。

xFSUでは次のコマンドが導入されています。

add file <image URL>をインストールしてxfsuコミットをアクティブにします。

- cisco IOS XE 17.8リリース以降で使用可能

add file <image URL> activate reloadfast commitをインストールします。

- cisco IOS XE 17.3および17.6リリースで使用可能

- ダウンタイムを短縮してソフトウェアバージョンをアップグレード

高速リロード

- 既存のソフトウェアをリロードし、ダウンタイムを短縮

xFSUを使用する理由

Catalyst 9300スイッチのようなシステムでは、真の冗長コントロールプレーンおよびフォワーディングプレーンがない場合、リロードおよびアップグレード時のダウンタイムやトラフィック損失は3 ～ 4分以上になります。

- アクセスネットワークにとって、このダウンタイムはWi-Fiアクセスポイントやロボットなどの重要な要素です。

- xFSUはダウンタイムを最小限に抑えるのに役立ちますが、すべての設定がサポートされているわけではないため、制限が適用されます。

注：スタック構成のシステムの場合、ダウンタイムをさらに短縮するためのベストプラクティスとして、スタック上のアクティブスイッチとスタンバイスイッチ、またはアクティブスイッチとメンバスイッチにアップリンクを分散させます

サポートされているプロトコル

注：ここに記載されていないすべてのプロトコルでは、トラフィックのダウンタイムは通常のリロード/アップグレードの場合と同様になります

- レイヤ 2 スイッチング

- VLAN単位スパニングツリー(PVST)

- STPとRSTPまたはMSTP

- 静的ポートチャネル（モードオン）

- UDLD

- Link Aggregation Control Protocol（LACP）

- BGP（IPv4およびIPv6アドレスファミリ）

- Open Shortest Path First(OSPF)、OSPFv2、またはOSPFv3

- IS-IS

- 仮想ルーティングおよび転送(VRF)

- Flexible NetFlow

- QoS

- IEEE 802.1Xポートベース認証

- MAC認証バイパス

- Web 認証は、

- Internet Group Management Protocol(IGMP)スヌーピング

- マルチキャストリスナー検出(MLD)スヌーピング

制限事項

注意:xFSUは、これらのシナリオとの組み合わせではサポートされません。デバイスにこれらのいずれかが存在する場合は、xFSUを試行しないでください。

スタンドアロンおよびスタック型デバイス

- STPルートデバイスの場合、フォワーディングステートになっているデバイスポートのいずれかがSTPピア（STPが設定されていて、ルートデバイスに直接接続されているデバイス）に接続されている場合

- デバイスに双方向フォワーディング検出(BFD)が設定されている

- デバイスはLISP/VXLANで設定されます。

- デバイスにmacsecが設定されている

- デバイスはSDAおよびEVPNファブリックで設定されます。

- デバイスがMerakiモードまたはDNACとして設定されている

- BGPピアがBGP Openメッセージでサポートされていないホールドタイマーを送信した場合、提示されたホールドタイマーは受け入れられますが、BGPはxFSUイベントではサポートされません。

スタック型デバイス

- スタックされたデバイスは、ハーフリング状態で設定されます。

- スタックデバイスは、MACsec Key Agreement(MKA)またはCisco TrustSec(CTS)で設定されます

- スタックされたデバイスは、スタック上のPIMがまだ設定されていないため、マルチキャストが設定されています。

その他の制限

- Extended Fast Software Upgradeを実行した後、アプリケーションホスティングが自動的に再起動しない場合があります。Cisco IOxの無効化と再有効化、アプリケーションホスティングの設定、アプリケーションのインストール、アクティブ化、再起動が必要になる場合があります。

- 設定された単方向リンク検出(UDLD)メッセージ間隔は、xFSU中は無視されます。xFSUが完了すると、インターバルは設定値に戻ります。

必要な設定

次の表に、各プロトコルで30秒未満のトラフィックダウンタイムを実現するためにxFSUを実行する前に必要な設定を示します。

注：この機能は、すべての設定に適用できるわけではありません。プロトコルがxFSUでサポートされていると記載されている場合でも、他のコンポーネントとの相互対話や時間の影響を受けやすい（ステートフルプロトコル）設定に基づくと、トラフィック損失が増大する可能性があります。この機能を使用する前に、特定の設定をテストすることを推奨します。

スイッチの設定

プロトコル

追加設定

コマンド

スタンドアロンデバイス

IPv6

到達可能性確認イベントが発生した後にリモートIPv6ノードが到達可能と見なされる時間制限を設定します。

Device(config)# ipv6 nd reachable-time 3600000

IPv6とMLD

IPv6 MLDスヌーピングの有効化

Device(config)# ipv6 mld snooping

OSPF

スタック内の再送信の再試行回数を増やします。

Device(config-router)# ip ospf retransmit-interval 10

OSPFv3

スタック内の再送信の再試行回数を増やします。

Device(config-router)# ospfv3 retransmit-interval 10

OSPFv3

- SNMP ifIndexパーシステンスをグローバルに有効にする

- OSPFv3インスタンスの固定ルータIDを設定します。

- SNMP ifIndexパーシステンスの有効化

Device(config)# snmp ifmib ifindex persist

Device(config)# router ospfv3 1

Device(config-router)# router-id 192.0.2.5

デバイス(config-router)#

インターフェイスID SNMP IFインデックス

BGP

デバイスでNSF認識を有効にする

Device(config-router)# bgp graceful-restart

スタック型デバイス

OSPF

スタック内の再送信の再試行回数を増やします。

Device(config-router)# ip ospf retransmit-interval 10

OSPFv3

スタック内の再送信の再試行回数を増やします。

Device(config-router)# ospfv3 retransmit-interval 10

BGP

スタック内のすべてのデバイスでNSF認識を有効にします。

Device(config-router)# bgp graceful-restart all

IS-IS

IS-ISに対するNSF操作を有効にします。

Device(config-router)# nsf ietf

または

Device(config-router)# nsf cisco

リリースサポート一覧表

リリース間の拡張された高速ソフトウェアアップグレードのサポート

EMリリース内/EMからEMリリースへ

開始/終了

17.3.x(em)*

17.4.x(SM)

17.5.x(SM)

17.6.x(EM)

17.7.x(SM)

17.8.x(SM)

17.9.x(EM)

17.3.x(em)*

✓

X

X

✓

X

X

✓

17.4.x(SM)

—

—

X

X

X

X

X

17.5.x(SM)

—

—

—

X

X

X

X

17.6.x(EM)

—

—

—

✓

X

X

✓

17.7.x(SM)

—

—

—

—

—

X

X

17.8.x(SM)

—

—

—

—

—

—

X

17.9.x(EM)

—

—

—

—

—

—

✓

* Cisco IOS XE 17.3.xトレインでは、xFSUは17.3.2バージョン以降でのみサポートされます。

同じSMまたはEMバージョン内

開始/終了

17.3.x(em)*

17.4.x(SM)

17.5.x(SM)

17.6.x(EM)

17.7.x(SM)

17.8.x(SM)

17.9.x(EM)

17.3.x(em)*

✓

—

—

—

—

—

—

17.4.x(SM)

—

✓

—

—

—

—

—

17.5.x(SM)

—

—

✓

—

—

—

—

17.6.x(EM)

—

—

—

✓

—

—

—

17.7.x(SM)

—

—

—

—

✓

—

—

17.8.x(SM)

—

—

—

—

—

✓

—

17.9.x(EM)

—

—

—

—

—

—

✓

* Cisco IOS XE 17.3.xトレインでは、xFSUは17.3.2バージョン以降でのみサポートされます。

注：毎年3つのリリース(2つの標準メンテナンス(SM)と1つの拡張メンテナンス(EM))が計画されています。標準サポートリリースでは、2回のリビルドがスケジュールされており、お客様への最初の出荷(FCS)から12ヵ月のサポート期間が継続されます。延長サポートリリースでは、FCSから48ヵ月のサポート期間が継続され、10回のリビルドがスケジュールされています。

手順

add file <image URL>activate xfsu commitをインストールします。

注：このCLIは、Cisco IOS XE 17.8リリース以降でのみ使用できます。17.3および17.6リリースでは、「install add file <image URL> activate reloadfast commit」を使用します。

- このコマンドは、ダウンタイムを減らしてソフトウェアバージョンをアップグレードします。

- CLIの実行時に自動的に実行される手順を次に示します。

- 追加のインストール：TFTPサーバからイメージをダウンロードし、すべてのスイッチにコピーして、各スイッチのパッケージを展開します。

- xFSUチェック：制限チェックを含むxFSU関連チェックを提供します。

- install activate/commit：インストールされたパッケージをアクティブにしてコミットします。

- アップグレード前のインストール：アップグレード前のMCU、Rommonイメージ

- 高速リロード：スイッチの高速リロード

C9300_Switch#install add file flash:cat9k_iosxe.V178_1A_FC2_2.SSA.bin activate xfsu commit

install_add_activate_commit: START Tue Apr 19 21:54:03 UTC 2022

STACK_GR: Inside xFSU check if switch stack

Checking STP eligibility: Eligible

[1]: Performing xFSU-pre-check

300+0 records in

300+0 records out

307200 bytes (307 kB, 300 KiB) copied, 0.196216 s, 1.6 MB/s

SUCCESS: xFSU-pre-check finished

[1]: xFSU-pre-check package(s) on switch 1

For all other than the below protocols, the traffic downtime will be longer than 30 seconds.

1) Layer 2 Switching, 2) Per VLAN Spanning Tree (PVST), 3) STP with RSTP or MSTP

4) Static Port-channels (Mode on), 5) UDLD, 6) LACP, 7) BGP (IPv4 and IPv6)

Open Shortest Path First (OSPF) or OSPFv2 or OSPFv3, 9) IS-IS,

10) Virtual routing and forwarding (VRF), 11) Flexible NetFlow, 12) QoS

SUCCESS: xFSU requirement pre-check

Downloading file flash:cat9k_iosxe.V178_1A_FC2_2.SSA.bin

Finished downloading file flash:cat9k_iosxe.V178_1A_FC2_2.SSA.bin to flash:cat9k_iosxe.V178_1A_FC2_2.SSA.bin

install_add_activate_commit: Adding PACKAGE

install_add_activate_commit: Checking whether new add is allowed ....

--- Starting initial file syncing ---

Info: Finished copying flash:cat9k_iosxe.V178_1A_FC2_2.SSA.bin to the selected switch(es)

Finished initial file syncing

--- Starting Add ---

Performing Add on all members

[1] Add package(s) on switch 1

[1] Finished Add on switch 1

Checking status of Add on [1]

Add: Passed on [1]

Finished Add

Image added. Version: 17.08.01.0.1516

install_add_activate_commit: Activating PACKAGE

Following packages shall be activated:

/flash/cat9k-wlc.V178_1A_FC2_2.SSA.pkg

/flash/cat9k-webui.V178_1A_FC2_2.SSA.pkg

/flash/cat9k-srdriver.V178_1A_FC2_2.SSA.pkg

/flash/cat9k-sipspa.V178_1A_FC2_2.SSA.pkg

/flash/cat9k-sipbase.V178_1A_FC2_2.SSA.pkg

/flash/cat9k-rpboot.V178_1A_FC2_2.SSA.pkg

/flash/cat9k-rpbase.V178_1A_FC2_2.SSA.pkg

/flash/cat9k-lni.V178_1A_FC2_2.SSA.pkg

/flash/cat9k-guestshell.V178_1A_FC2_2.SSA.pkg

/flash/cat9k-espbase.V178_1A_FC2_2.SSA.pkg

/flash/cat9k-cc_srdriver.V178_1A_FC2_2.SSA.pkg

--- Verifying Platform specific xFSU admission criteria ---

SUCCESS: xFSU image pre-check

This operation requires a fast reload of the system. Do you want to proceed? [y/n]y <-- answer y to continue

--- Starting Activate ---

Performing Activate on all members

[1] Activate package(s) on switch 1

--- Starting list of software package changes ---

Old files list:

Modified cat9k-cc_srdriver.17.08.01a.SPA.pkg

Modified cat9k-espbase.17.08.01a.SPA.pkg

Modified cat9k-guestshell.17.08.01a.SPA.pkg

Modified cat9k-lni.17.08.01a.SPA.pkg

Modified cat9k-rpbase.17.08.01a.SPA.pkg

Modified cat9k-rpboot.17.08.01a.SPA.pkg

Modified cat9k-sipbase.17.08.01a.SPA.pkg

Modified cat9k-sipspa.17.08.01a.SPA.pkg

Modified cat9k-srdriver.17.08.01a.SPA.pkg

Modified cat9k-webui.17.08.01a.SPA.pkg

Modified cat9k-wlc.17.08.01a.SPA.pkg

New files list:

Added cat9k-cc_srdriver.V178_1A_FC2_2.SSA.pkg

Added cat9k-espbase.V178_1A_FC2_2.SSA.pkg

Added cat9k-guestshell.V178_1A_FC2_2.SSA.pkg

Added cat9k-lni.V178_1A_FC2_2.SSA.pkg

Added cat9k-rpbase.V178_1A_FC2_2.SSA.pkg

Added cat9k-rpboot.V178_1A_FC2_2.SSA.pkg

Added cat9k-sipbase.V178_1A_FC2_2.SSA.pkg

Added cat9k-sipspa.V178_1A_FC2_2.SSA.pkg

Added cat9k-srdriver.V178_1A_FC2_2.SSA.pkg

Added cat9k-webui.V178_1A_FC2_2.SSA.pkg

Added cat9k-wlc.V178_1A_FC2_2.SSA.pkg

Finished list of software package changes

[1] Finished Activate on switch 1

Checking status of Activate on [1]

Activate: Passed on [1]

Finished Activate

--- Starting Commit ---

Performing Commit on all members

[1] Commit package(s) on switch 1

[1] Finished Commit on switch 1

Checking status of Commit on [1]

Commit: Passed on [1]

Finished Commit

Send model notification for install_add_activate_commit before reload

Check xFSU support and verification on switch

[1]: xFSU-Verify-Package package(s) on switch 1

Finished preverifying before xFSU

SUCCESS to verify packages

SUCCESS to verify before xFSU

[1]: Finished xFSU-Verify-Package successful on switch 1

(-2) SUCCESS: Finished xFSU-Verify-Package: Success on [1]

[1]: Performing Upgrade_Service

300+0 records in

300+0 records out

307200 bytes (307 kB, 300 KiB) copied, 0.196891 s, 1.6 MB/s

SUCCESS: Upgrade_Service finished

PID TTY TIME CMD

Starting GR:#

Waiting for UDLD processing:UDLD processing complete

cat: /: Is a directory

Wait for ifm backup: Ifm backup is completeApr 19 22:05:04.843: %PMAN-5-EXITACTION: F0/0: pvp: Process manager is exiting: reload fp action requested

Apr 19 22:05:08.099: %PMAN-5-EXITACTION: R0/0: pvp: Process manager is exiting: rp processes exit with reload switch code

Initializing Hardware......

Reload Fast Detected

System Bootstrap, Version 17.9.0.4r, DEVELOPMENT SOFTWARE

Copyright (c) 1994-2022 by cisco Systems, Inc.

Compiled Tue 03/22/2022 10:39:31.69 by mjagatap

Current ROMMON image : Primary

Last reset cause : SoftwareReload

C9300-24T platform with 8388608 Kbytes of main memory

Preparing to autoboot. [Press Ctrl-C to interrupt] 0

boot: attempting to boot from [flash:packages.conf]

boot: reading file packages.conf

#

##############################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################

Loading image in Verbose mode: 0

Both links down, not waiting for other switches

Switch number is 1

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

Cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco IOS Software [Cupertino], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 17.8.1a, RELEASE SOFTWARE (fc2)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2022 by Cisco Systems, Inc.

Compiled Sat 16-Apr-22 18:59 by mcpre

This software version supports only Smart Licensing as the software licensing mechanism.

PLEASE READ THE FOLLOWING TERMS CAREFULLY. INSTALLING THE LICENSE OR

LICENSE KEY PROVIDED FOR ANY CISCO SOFTWARE PRODUCT, PRODUCT FEATURE,

AND/OR SUBSEQUENTLY PROVIDED SOFTWARE FEATURES (COLLECTIVELY, THE

"SOFTWARE"), AND/OR USING SUCH SOFTWARE CONSTITUTES YOUR FULL

ACCEPTANCE OF THE FOLLOWING TERMS. YOU MUST NOT PROCEED FURTHER IF YOU

ARE NOT WILLING TO BE BOUND BY ALL THE TERMS SET FORTH HEREIN.

Your use of the Software is subject to the Cisco End User License Agreement

(EULA) and any relevant supplemental terms (SEULA) found at

http://www.cisco.com/c/en/us/about/legal/cloud-and-software/software-terms.html.

You hereby acknowledge and agree that certain Software and/or features are

licensed for a particular term, that the license to such Software and/or

features is valid only for the applicable term and that such Software and/or

features may be shut down or otherwise terminated by Cisco after expiration

of the applicable license term (e.g., 90-day trial period). Cisco reserves

the right to terminate any such Software feature electronically or by any

other means available. While Cisco may provide alerts, it is your sole

responsibility to monitor your usage of any such term Software feature to

ensure that your systems and networks are prepared for a shutdown of the

Software feature.

FIPS: Flash Key Check : Key Not Found, FIPS Mode Not Enabled

cisco C9300-24T (X86) processor with 1310600K/6147K bytes of memory.

Processor board ID FJC2327E0UB

2048K bytes of non-volatile configuration memory.

8388608K bytes of physical memory.

1638400K bytes of Crash Files at crashinfo:.

11264000K bytes of Flash at flash:.

Base Ethernet MAC Address : d4:ad:bd:f0:38:80

Motherboard Assembly Number : 73-18270-03

Motherboard Serial Number : FJZ23271DDG

Model Revision Number : E0

Motherboard Revision Number : B0

Model Number : C9300-24T

System Serial Number : FJC2327E0UB

CLEI Code Number :

WARNING: Command has been added to the configuration using a type 7 password. However, recommended to migrate to strong type-6 encryption

Press RETURN to get started!

C9300_Switch#sh log | inc FAST

*Apr 19 22:10:05.943: %FED_IPC_MSG-5-FAST_RELOAD_COMPLETE: Switch 1 F0/0: fed: Fast reload operation complete

高速リロード

- このコマンドにより、既存のソフトウェアがリロードされ、ダウンタイムが短縮されます。

- CLIの実行時に自動的に実行される手順を次に示します。

- xFSUチェック：制限チェックを含むxFSU関連チェックを提供します。

- 高速リロード：スイッチの高速リロード

C9300_Switch#reload fast

Reload fast command is being issued on Active unit, this will reload fast the whole stack

Proceed with reload fast? [confirm]

STACK_GR: Inside xFSU check if switch stack

Checking STP eligibility: Eligible

[1]: Performing xFSU-pre-check

300+0 records in

300+0 records out

307200 bytes (307 kB, 300 KiB) copied, 0.196405 s, 1.6 MB/s

SUCCESS: xFSU-pre-check finished

[1]: xFSU-pre-check package(s) on switch 1

For all other than the below protocols, the traffic downtime will be longer than 30 seconds.

1) Layer 2 Switching, 2) Per VLAN Spanning Tree (PVST), 3) STP with RSTP or MSTP

4) Static Port-channels (Mode on), 5) UDLD, 6) LACP, 7) BGP (IPv4 and IPv6)

Open Shortest Path First (OSPF) or OSPFv2 or OSPFv3, 9) IS-IS,

10) Virtual routing and forwarding (VRF), 11) Flexible NetFlow, 12) QoS

SUCCESS: xFSU requirement pre-check

--- Verifying Platform specific xFSU admission criteria ---

SUCCESS: xFSU image pre-check

Check xFSU support and verification on switch

[1]: xFSU-Verify-Package package(s) on switch 1

Finished preverifying before xFSU

SUCCESS to verify packages

SUCCESS to verify before xFSU

[1]: Finished xFSU-Verify-Package successful on switch 1

(-2) SUCCESS: Finished xFSU-Verify-Package: Success on [1]

[1]: Performing Upgrade_Service

300+0 records in

300+0 records out

307200 bytes (307 kB, 300 KiB) copied, 0.196099 s, 1.6 MB/s

mount: /tmp/microcode_update/boot_pkg: WARNING: source write-protected, mounted read-only.

SUCCESS: Upgrade_Service finished

PID TTY TIME CMD

Starting GR:#

Waiting for UDLD processing:UDLD processing complete

cat: /: Is a directory

Wait for ifm backup: Ifm backup is completeApr 19 21:43:03.283: %PMAN-5-EXITACTION: F0/0: pvp: Process manager is exiting: reload fp action requested

Apr 19 21:43:05.337: %PMAN-5-EXITACTION: R0/0: pvp: Process ger is exiting: rp processes exit with reload switch code

Initializing Hardware......

Reload Fast Detected

System Bootstrap, Version 17.9.0.4r, DEVELOPMENT SOFTWARE

Copyright (c) 1994-2022 by cisco Systems, Inc.

Compiled Tue 03/22/2022 10:39:31.69 by mjagatap

Current ROMMON image : Primary

Last reset cause : SoftwareReload

C9300-24T platform with 8388608 Kbytes of main memory

Preparing to autoboot. [Press Ctrl-C to interrupt] 0

boot: attempting to boot from [flash:packages.conf]

boot: reading file packages.conf

#

##############################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################################

Loading image in Verbose mode: 0

Both links down, not waiting for other switches

Switch number is 1

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

Cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco IOS Software [Cupertino], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 17.8.1a, RELEASE SOFTWARE (fc2)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2022 by Cisco Systems, Inc.

Compiled Sat 16-Apr-22 18:59 by mcpre

This software version supports only Smart Licensing as the software licensing mechanism.

PLEASE READ THE FOLLOWING TERMS CAREFULLY. INSTALLING THE LICENSE OR

LICENSE KEY PROVIDED FOR ANY CISCO SOFTWARE PRODUCT, PRODUCT FEATURE,

AND/OR SUBSEQUENTLY PROVIDED SOFTWARE FEATURES (COLLECTIVELY, THE

"SOFTWARE"), AND/OR USING SUCH SOFTWARE CONSTITUTES YOUR FULL

ACCEPTANCE OF THE FOLLOWING TERMS. YOU MUST NOT PROCEED FURTHER IF YOU

ARE NOT WILLING TO BE BOUND BY ALL THE TERMS SET FORTH HEREIN.

Your use of the Software is subject to the Cisco End User License Agreement

(EULA) and any relevant supplemental terms (SEULA) found at

http://www.cisco.com/c/en/us/about/legal/cloud-and-software/software-terms.html.

You hereby acknowledge and agree that certain Software and/or features are

licensed for a particular term, that the license to such Software and/or

features is valid only for the applicable term and that such Software and/or

features may be shut down or otherwise terminated by Cisco after expiration

of the applicable license term (e.g., 90-day trial period). Cisco reserves

the right to terminate any such Software feature electronically or by any

other means available. While Cisco may provide alerts, it is your sole

responsibility to monitor your usage of any such term Software feature to

ensure that your systems and networks are prepared for a shutdown of the

Software feature.

FIPS: Flash Key Check : Key Not Found, FIPS Mode Not Enabled

cisco C9300-24T (X86) processor with 1310600K/6147K bytes of memory.

Processor board ID FJC2327E0UB

2048K bytes of non-volatile configuration memory.

8388608K bytes of physical memory.

1638400K bytes of Crash Files at crashinfo:.

11264000K bytes of Flash at flash:.

Base Ethernet MAC Address : d4:ad:bd:f0:38:80

Motherboard Assembly Number : 73-18270-03

Motherboard Serial Number : FJZ23271DDG

Model Revision Number : E0

Motherboard Revision Number : B0

Model Number : C9300-24T

System Serial Number : FJC2327E0UB

CLEI Code Number :

WARNING: Command has been added to the configuration using a type 7 password. However, recommended to migrate to strong type-6 encryption

Press RETURN to get started!

C9300_Switch>

C9300_Switch>en

C9300_Switch#sh log | inc FAST

*Apr 19 21:48:01.667: %FED_IPC_MSG-5-FAST_RELOAD_COMPLETE: Switch 1 F0/0: fed: Fast reload operation complete

確認

xFSUが正常に完了した後に検証するために収集するコマンド/出力。

基本的なshowコマンド

・ show switch detail - スイッチの詳細情報を表示します

・ show version - スイッチのバージョンを表示します。

.show version | in reason：すべてのスイッチで理由を「Image Install with Reloadfast」または「Reload Fast Command」と表示します。

・ show running-config - スイッチの実行コンフィギュレーションの表示

・ show logging - スイッチのコンソールログを表示します

•show log | in FAST (collect this post xFSU):スイッチコンソールログからFAST_RELOAD_COMPLETEをgrepします。

xFSU関連のログ

show graceful-reload - xFSUグレースフルリロードログを表示します

C9300_Switch#show graceful-reload

Graceful Reload Infra Status: Not running

Minimum required system uptime before fast reload can be supported is 10 seconds

Client OSPFV3 : (0x10203008) Status: Up

Client OSPF : (0x10203007) Status: Up

Client GR_CLIENT_BGP : (0x10203006) Status: Up

Client IS-IS : (0x10203005) Status: Up

Client LACP_xFSU : (0x10203004) Status: Up

Client GR_CLIENT_TOPO : (0x10203003) Status: Up

Client GR_CLIENT_VRF : (0x10203002) Status: Up

Client GR_CLIENT_RIB : (0x10203001) Status: Up

Client GR_CLIENT_FIB : (0x10203000) Status: Up

show xfsu status:xFSUステータスを表示します(このCLIはCisco IOS XE 17.8リリース以降でのみ使用できます。17.3および17.6リリースの場合は、「show reloadfast status」を使用)

C9300_Switch#show xfsu status

Reload Fast PLATFORM Status: Dataplane update done

Graceful Reload Infra Status: Not running

Minimum required system uptime before fast reload can be supported is 10 seconds

Client OSPFV3 : (0x10203008) Status: Up

Client OSPF : (0x10203007) Status: Up

Client GR_CLIENT_BGP : (0x10203006) Status: Up

Client IS-IS : (0x10203005) Status: Up

Client LACP_xFSU : (0x10203004) Status: Up

Client GR_CLIENT_TOPO : (0x10203003) Status: Up

Client GR_CLIENT_VRF : (0x10203002) Status: Up

Client GR_CLIENT_RIB : (0x10203001) Status: Up

Client GR_CLIENT_FIB : (0x10203000) Status: Up

トラブルシュート

xFSUが失敗した場合に収集される出力。

FPGAバージョン

show platform hardware fpga switch <sw_num> | inc Version - display FPGA version

SKU/FRU/アップリンク/ダウンリンクの詳細を含む完全なトポロジ

show inventory - display switch inventory

show cdp neighbor - display switch CDP neighbor

show etherchannel summary - display switch etherchannel  summary

show spanning-tree - display switch spanning-tree configuration

show romvar switch all | in BOARD - display switch board ID

Btraceおよびクラッシュ関連情報

show platform software trace message fed switch <sw-num> - display switch fed trace configuration

request platform software trace rotate all - rotate switch trace logs to archive

Copy logs from crashinfo-<sw_num>:/tracelogs/fed_F0*

If crash happens during xFSU, copy crashinfo-<sw_num>:system-report*

If stack SSO not ready or archive trace generated during bootup, copy crashinfo-<sw_num>:*archive*

インターフェイス関連情報

show interface status | inc connected - display switch connected interface status.

show ip interface brief | inc up - display switch those interfaces which stay up.

show interface <intf-id> status -display interface status for particular interface.

show interface <intf-id> status err-disabled - display interface err-disabled status for particular interface.

XCVR/Phy/アップリンク関連情報

show controllers ethernet-controller <intf-id> phy detail - To display switch phy detail for particular ethernet-controller interface.

show controllers ethernet-controller <intf-id> mac - To display switch mac information for particular ethernet-controller interface.

show controllers ethernet-controller <intf-id> link-status - To display switch link status for particular ethernet-controller interface.

show controllers ethernet-controller <ints-id> - To display information for particular ethernet-controller interface.

xFSUのshow tech-support xfsu

show tech-support xfsu - display xFSU technical support information

注:(このCLIは、Cisco IOS XE 17.8リリース以降でのみ使用できます。17.3および17.6リリースの場合は、「show tech-support reloadfast」を使用)

xFSU資格

注：show xfsu eligibility:xFSU適格性情報を表示します（このCLIは、Cisco IOS XE 17.8リリース以降でのみ使用できます）。

show xfsu eligibility（スタンドアロンスイッチ）

C9300_Switch#show xfsu eligibility

Reload fast supported: Yes

Reload Fast PLATFORM Status: Not started yet

Stack Configuration: No

Eligibility Check         Status

=================         ======

Autoboot Enabled          No

Install Mode              Yes

Check macsec eligibility  Eligible

<-- All the status must be Yes or eligible to continue xFSU

Spanning Tree             Eligible

<-- For STP status must be eligible to continue xFSU

show xfsu eligibility（スタックスイッチ）

Switch#show xfsu eligibility

Reload fast supported: Yes

Reload Fast PLATFORM Status: Not started yet

Stack Configuration: Yes

Eligibility Check         Status

=================         ======

Autoboot Enabled          Yes

Install Mode              Yes

Network Advantage License Yes

Full ring stack           Yes

Check macsec eligibility  Eligible

<-- All the status must be Yes or eligible to continue xFSU

Spanning Tree             Eligible

<-- For STP status must be eligible to continue xFSU

SSO Mode                  Yes

<-- If 'SSO mode' status is 'No', please wait until condition is met, then proceed

関連情報

- テクニカル サポートとドキュメント - Cisco Systems

- サポートされていないプロトコルのリスト：ここのリンクを参照してください。

- サポートされるプロトコルのリスト：ここのリンクを参照してください。