内容

概要

前提条件

要件

使用するコンポーネント

関連製品

表記法

背景説明

スーパーバイザ モジュールを交換するステップごとの手順：同一のハイブリッド OS

スーパーバイザ モジュールを交換するステップごとの手順：異なるハイブリッド OS

新しいスーパーバイザ モジュールを取り付ける前の確認

新しいスーパーバイザ モジュールの取り付け

新しいスーパーバイザ モジュールを取り付けた後のスーパーバイザ モジュールの確認

MSFC IOS の確認

スタンバイ スーパーバイザへのフェールオーバーと確認

Catalyst OS の名前変更

関連情報

概要

このドキュメントでは、Catalyst 6500 シリーズ スイッチで障害が発生した冗長スーパーバイザ モジュールを交換する方法について説明しています。このドキュメントで説明しているのは、ハイブリッド OS が稼働しているスーパーバイザ モジュールの場合の手順です。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- 冗長性の設定

- NSF と SSO MSFC 冗長機能の設定

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- Cisco Catalyst 6500 シリーズ スイッチ

- スーパーバイザ モジュール：WS-SUP32-GE-3B

- ハイブリッド OS：

- Catalyst OS（CatOS）8.5(8)

- MSFC IOS® 12.2(18)SXF7

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

関連製品

このドキュメントは、次のバージョンのハードウェアとソフトウェアにも使用できます。

- ハイブリッド OS が稼働する Supervisor Engine 720

- ハイブリッド OS が稼働する Supervisor Engine 2

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

背景説明

次に示すように、冗長スーパーバイザ モジュールに関連して、重要な点がいくつかあります。

- スタンバイ側のスーパーバイザ エンジンでは、コンソール ポートは非アクティブになっています。このモジュールのステータスは「standby」と表示され、アップリンク ポートのステータスは正常であると表示されます。

- 各スーパーバイザ エンジンが別々に起動するのを制御できるようにするために、スーパーバイザ エンジン間でコンフィギュレーション レジスタは同期されません。

- 2 基のスーパーバイザ エンジンでソフトウェア バージョンが異なっているか、NVRAM コンフィギュレーションが異なっていると、アクティブ側のスーパーバイザ エンジンでは、自身のソフトウェア イメージとコンフィギュレーションを自動的にスタンバイ側のスーパーバイザ エンジンへダウンロードします。

- スーパーバイザエンジンでは、次の2つのフラッシュイメージが使用されます。ブートイメージとランタイムイメージが含まれます。ブート イメージ ファイル名は BOOT 環境変数で指定され、このファイルは NVRAM に保存されます。ランタイム イメージは、ROM モニタがスーパーバイザ エンジンを起動するために使用するブート イメージです。システムが起動した後、ランタイム イメージは dynamic RAM（DRAM; ダイナミック RAM）に置かれます。

- 冗長性をサポートするには、冗長スーパーバイザ エンジンの両方が同じモデルのフィーチャ カードを装備する同一タイプである必要があります。WS-X6K-SUP1-2GE と WS-X6K-SUP1A-2GE は、いずれも Policy Feature Card（PFC; ポリシー フィーチャ カード）が装備されておらず、冗長性に関して互換性があります。PFC を搭載したスーパーバイザ エンジンの場合は、冗長性を持たせるには PFC は同一（PFC を 2 枚、PFC2 を 2 枚、PFC3A を 2 枚、PFC3B が 2 枚、または PFC3BXL が 2 枚）である必要があります。

スーパーバイザ モジュールを交換するステップごとの手順：同一のハイブリッド OS

このセクションでは、Catalyst 6500 シリーズ スイッチでの Supervisor Engine 32 の交換手順を、順を追って説明しています。この例では、スロット5と6に2つのスーパーバイザモジュールがあるCisco Catalyst 6509スイッチを使用しています。スロット6のスーパーバイザモジュールに障害が発生しています。そして、故障したスロット 6 のスーパーバイザ モジュールはシャーシから取り外されていると仮定します。ここでは、新しいスーパーバイザ モジュールをスロット 6 に取り付ける手順を説明しています。

別の Cisco Catalyst 6500 シリーズ スイッチがあれば、新しいスーパーバイザをこのスイッチに接続し、ハイブリッド OS をアップグレードまたはダウングレードして、実稼働中のスイッチのスロット 5 にあるスーパーバイザと同じレベルにすることができます。新しいスーパーバイザ モジュールに同じハイブリッド OS が搭載されている場合は、新しいスーパーバイザ モジュールに対して設定を行う必要はありません。スーパーバイザ モジュールをスロット 6 に取り付けると、アクティブなスーパーバイザ エンジンによって設定の同期が自動的に行われます。このセクションでは、スーパーバイザを交換する際の手順と、チェックリストについて説明しています。

このセクションでは、Catalyst 6500 シリーズ スイッチでの Supervisor Engine 32 の交換手順を、順を追って説明しています。

1. スーパーバイザ モジュールをスロット 6 に取り付けます。

スロット 6 のスーパーバイザにコンソール接続している場合は、次の出力が表示されます。

!--- Supervisor module at slot 6

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 524288 Kbytes of main memory

Autoboot executing command: "boot bootdisk:cat6000-sup32pfc3k8.8-5-8.bin"

Self decompressing the image : ############################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

###########################################################################

##################################################### [OK]

System Power On Diagnostics

DRAM Size ..........................512 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Firmware compiled 01-Dec-06 12:57 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor.

次の出力は、スロット 5 にあるアクティブなスーパーバイザのコンソールです。

Access2> (enable)

Access2> (enable)

Access2> (enable) 2007 May 22 19:17:48 %SYS-5-MOD_INSERT:Module

6 has been inserted

Access2> (enable)

Access2> (enable)

Access2> (enable)

%SYS-5-SUP_MODSBY:Module 6 is in standby mode

%SYS-5-SUP_IMGSYNC:File synchronization process will start in 120 seconds

%DIAG-6-RUN_MINIMUM:Module 6: Running Minimal Diagnostics...

%DIAG-6-DIAG_OK:Module 6: Passed Online Diagnostics

%SYS-3-TRANSCEIVER_NOTSUPP: Transceiver on port 6/1 is not supported

%SYS-3-TRANSCEIVER_NOTSUPP: Transceiver on port 6/2 is not supported

%SYS-5-PORT_SSUPOK:Ports on standby supervisor (module 6) are up

%SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync for Module 6

%DIAG-6-RUN_MINIMUM:Module 16: Running Minimal Diagnostics...

%DIAG-6-DIAG_OK:Module 16: Passed Online Diagnostics

%SYS-5-MOD_OK:Module 16(WS-F6K-MSFC2A,SAL1018LQ3C) is online

%MGMT-5-SYS_CONFIG_START_MOD_FAIL:Unable to start system configuration

for module 6

%MGMT-5-SYS_CONFIG_START_MOD_FAIL:Unable to start system configuration for

module 16

%SYS-5-SUP_IMGSYNCSTART:Active supervisor is synchronizing bootdisk:

cat6000-sup32pfc3k8.8-5-8.bin

%SYS-5-SUP_IMGSYNCFINISH:Active supervisor has synchronized bootdisk:

cat6000-sup32pfc3k8.8-5-8.bin

Access2> (enable)

2. スーパーバイザの冗長性のステータスを確認します。

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: ON

Access2> (enable)

3. MSFC の冗長性のステータスを確認します。

Access2> (enable) session 15

Trying Router-15...

Connected to Router-15.

Escape character is '^]'.

LAB-Router>enable

LAB-Router#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 10 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = unsupported

Hardware Mode = Duplex

Configured Redundancy Mode = Stateful SwitchOver - SSO

Operating Redundancy Mode = Stateful SwitchOver - SSO

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 5

Current Software state = ACTIVE

Uptime in current state = 10 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 6

Current Software state = STANDBY HOT

Uptime in current state = 2 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

LAB-Router#

4. スーパーバイザのフェールオーバーを強制的に実行し、テストします。

!--- Supervisor in slot 5

Access2> (enable) switch supervisor

This command will force a switch-over to the standby Supervisor module.

Do you want to continue (y/n) [n]? y

2007 May 21 20:40:37 %SYS-5-MOD_RESET:Module 5 reset from Console//

Access2> (enable)

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 262144 Kbytes of main memory

Autoboot executing command: "boot bootdisk:cat6000-sup32pfc3k8.8-5-8.bin"

Self decompressing the image : ##############################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

##################################################### [OK]

System Power On Diagnostics

DRAM Size ..........................256 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Firmware compiled 01-Dec-06 12:57 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor

5. スーパーバイザ 6 にコンソール接続して、スーパーバイザと MSFC の設定を確認します。

スーパーバイザ モジュールを交換するステップごとの手順：異なるハイブリッド OS

このセクションでは、Catalyst 6500 シリーズ スイッチでの Supervisor Engine 32 の交換手順を、順を追って説明しています。この例では、スロット5と6に2つのスーパーバイザモジュールがあるCisco Catalyst 6509スイッチを使用しています。スロット6のスーパーバイザモジュールに障害が発生しています。そして、故障したスロット 6 のスーパーバイザ モジュールはシャーシから取り外されていると仮定します。ここでは、新しいスーパーバイザ モジュールをスロット 6 に取り付ける手順を説明しています。

新しいスーパーバイザのハイブリッド OS をアクティブなスーパーバイザと同じバージョンにアップグレードすることができない場合は、この手順を実行して、スーパーバイザ モジュールを取り付け、ハイブリッド OS とスイッチ設定を同期させることができます。この手順のほとんどは自動化されています。このドキュメントでは、スーパーバイザを交換する際の手順と、チェックリストについて説明しています。

新しいスーパーバイザ モジュールを取り付ける前の確認

このセクションでは、スロット 6 にスーパーバイザがないスイッチでの次の show コマンドの出力を示しています。

- show module

- Show version

- ブート変数。

1. show module の出力は次のとおりです。

Access2> (enable) show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    0     1000BaseX Ethernet                            no  power-down

2   2    48    10/100BaseTX Ethernet     WS-X6248-RJ-45      no  ok

3   3    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

4   4    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

5   5    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes ok

15  5    1     Multilayer Switch Feature WS-F6K-MSFC2A       no  ok

7   7    5     Communication Media Mod.  WS-SVC-CMM          no  ok

8   8    0     FXS                                           no  power-down

9   9    0     10/100BaseTX Ethernet                         no  power-down

!--- Output suppressed

Mod Sub-Type                Sub-Model           Sub-Serial  Sub-Hw Sub-Sw

--- ----------------------- ------------------- ----------- ------ ------

3   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

4   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

5   L3 Switching Engine III WS-F6K-PFC3B        SAL1012GREU 2.1

Access2> (enable)

2. show version の出力は次のとおりです。

Access2> (enable) show version

WS-C6509 Software, Version NmpSW: 8.5(8)

Copyright (c) 1995-2006 by Cisco Systems

NMP S/W compiled on Dec  1 2006, 23:03:43

System Bootstrap Version: 12.2

System Boot Image File is 'bootdisk:cat6000-sup32pfc3k8.8-5-8.bin'

System Configuration register is 0x2102

Hardware Version: 2.0  Model: WS-C6509  Serial #: SCA034500F5

PS1  Module: WS-CAC-6000W    Serial #: AZS10130G7T

Mod Port Model               Serial #    Versions

--- ---- ------------------- ----------- --------------------------------------

2   48   WS-X6248-RJ-45      SAD03431007 Hw : 1.1

Fw : 4.2(0.24)VAI78

Sw : 8.5(8)

3   48   WS-X6348-RJ-45      SAD04150A2T Hw : 1.1

Fw : 5.3(1)

Sw : 8.5(8)

WS-F6K-VPWR                     Hw : 1.0

Sw : 1.1(1)

4   48   WS-X6348-RJ-45      SAD05070CNX Hw : 2.0

Fw : 5.4(2)

Sw : 8.5(8)

WS-F6K-VPWR                     Hw : 1.0

Sw : 1.1(1)

5   9    WS-SUP32-GE-3B      SAL1010F8KG Hw : 4.2

Fw : 12.2

Fw1: 8.5(8)

Sw : 8.5(8)

Sw1: 8.5(8)

WS-F6K-PFC3B        SAL1012GREU Hw : 2.1

Sw :

7   5    WS-SVC-CMM          SAD100707YJ Hw : 2.8

Fw : 12.4(7a),

Sw : 12.4(7a),

15  1    WS-F6K-MSFC2A       SAL1012GG1X Hw : 3.0

Fw : 12.2(18)SXF7

Sw : 12.2(18)SXF7

DRAM                    FLASH                   NVRAM

Module Total   Used    Free    Total   Used    Free    Total Used  Free

------ ------- ------- ------- ------- ------- ------- ----- ----- -----

5      262144K 124421K 137723K 249772K   9796K 239976K 2048K  366K 1682K

Uptime is 0 day, 0 hour, 3 minutes

Access2> (enable)

3. ブート変数は次のとおりです。

!--- Current working directory

Access2> (enable) pwd

bootdisk

!--- Files in the bootdisk

Access2> (enable) dir

2   -rw-  10029260    Dec 13 2006 15:37:08 cat6000-sup32pfc3k8.8-5-8.bin

245735424 bytes available (10031104 bytes used)

!--- Boot variable

Access2> (enable) show boot

BOOT variable = bootdisk:cat6000-sup32pfc3k8.8-5-8.bin,1;

CONFIG_FILE variable = bootflash:switch.cfg

Configuration register is 0x2102

ignore-config: disabled

auto-config: non-recurring, overwrite, sync disabled

ROMMON console baud: 9600

boot: image specified by the boot system commands

Image auto sync is enabled

Image auto sync timer is 120 seconds

Access2> (enable)

新しいスーパーバイザ モジュールの取り付け

スーパーバイザモジュールがスロット6に挿入されます。新しいスタンバイスーパーバイザモジュールをスイッチに追加したときの、アクティブおよびスタンバイのスーパーバイザモジュールのコンソール出力を次に示します。

1. 新しいスーパーバイザ モジュールをスロット 6 に取り付けます。

アクティブ スーパーバイザ モジュールで次のログ メッセージが表示されます。

Access2> (enable) 2007 May 21 20:21:14 %SYS-5-MOD_INSERT:Module 6 has been

inserted

スロット 6 のスタンバイ側のスーパーバイザにコンソール接続している場合は、次のブート プロセスが表示されます。

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 524288 Kbytes of main memory

Autoboot executing command: "boot bootdisk:cat6000-sup32pfc3k8.8-4-5.bin"

Self decompressing the image : ##############################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

#############################################################################

######################################################################## [OK]

System Power On Diagnostics

DRAM Size ..........................512 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:cat6000-sup32pfc3k8.8-4-5.bin

Firmware compiled 02-Aug-05 16:08 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor

2. スロット 5 のアクティブ側のスーパーバイザ モジュールから、冗長ステータスを確認できます。

Access2> (enable) 2007 May 21 20:23:09 %SYS-5-SUP_MODSBY:Module 6 is in standby

mode

2007 May 21 20:23:11 %SYS-5-SUP_IMGSYNCSTART:Active supervisor is synchronizing

bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: OFF(standby-supervisor-image-incompatible)

アクティブ側のスーパーバイザ モジュールによって CatOS がスタンバイ側のスーパーバイザにコピーされます。また、スタンバイ側のスーパーバイザ エンジンのブート変数が新しい CatOS 用に設定されます。

Access2> (enable)

2007 May 21 20:24:23 %SYS-5-SUP_IMGSYNCFINISH:Active superviso

r has synchronized bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

CatOS イメージがスタンバイ側のスーパーバイザにコピーされた後、スロット 6 にあるスタンバイ側のモジュールは新しいイメージで自動的にリロードされます。

This module is now in standby mode.

Console is disabled for standby supervisor

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 524288 Kbytes of main memory

Autoboot executing command: "boot bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin"

Self decompressing the image : #################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

##################################################### [OK]

System Power On Diagnostics

DRAM Size ..........................512 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin

Firmware compiled 01-Dec-06 12:57 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor

3. スタンバイ側のモジュールが起動すれば、アクティブ側のスーパーバイザ モジュールから冗長ステータスを確認できます。

Access2> (enable) 2007 May 21 20:26:22 %SYS-5-SUP_MODSBY:Module 6 is in standby

mode

2007 May 21 20:26:23 %SYS-5-SUP_IMGSYNC:File synchronization process will start

in 120 seconds

2007 May 21 20:27:08 %SYS-1-SYS_LCPERR1:Module 16: RP requested reset of peer RP

: MSFC on module 16 will be reset

2007 May 21 20:27:24 %DIAG-6-RUN_MINIMUM:Module 6: Running Minimal Diagnostics..

.

2007 May 21 20:27:24 %DIAG-6-DIAG_OK:Module 6: Passed Online Diagnostics

2007 May 21 20:27:25 %SYS-3-TRANSCEIVER_NOTSUPP: Transceiver on port 6/1 is not

supported

2007 May 21 20:27:25 %SYS-3-TRANSCEIVER_NOTSUPP: Transceiver on port 6/2 is not

supported

2007 May 21 20:27:25 %SYS-5-PORT_SSUPOK:Ports on standby supervisor (module 6) a

re up

2007 May 21 20:27:25 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync for Module

6

2007 May 21 20:28:24 %SYS-5-SUP_IMGSYNCSTART:Active supervisor

is synchronizing bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

2007 May 21 20:28:25 %SYS-5-SUP_IMGSYNCFINISH:Active supervisor has synchronized

bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Access2> (enable)

Access2> (enable) dir

2   -rw-  10029260    Dec 13 2006 15:37:08 cat6000-sup32pfc3k8.8-5-8.bin

245735424 bytes available (10031104 bytes used)

Access2> (enable) dir 6/

2   -rw-   9356096    May 11 2006 19:04:09 cat6000-sup32pfc3k8.8-4-5.bin

2287   -rw-  10029260    May 21 2007 20:24:10 RTSYNC_cat6000-sup32pfc3k8.8-5-

8.bin

!--- You can see the copied CatOS name starts with RTSYNC_

236900352 bytes available (19390464 bytes used)

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: ON

新しいスーパーバイザ モジュールを取り付けた後のスーパーバイザ モジュールの確認

次のステップを実行します。

1. show module の出力は次のとおりです。

Access2> (enable) show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    0     1000BaseX Ethernet                            no  power-down

2   2    48    10/100BaseTX Ethernet     WS-X6248-RJ-45      no  ok

3   3    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

4   4    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

5   5    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes ok

15  5    1     Multilayer Switch Feature WS-F6K-MSFC2A       no  ok

6   6    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes standby

7   7    5     Communication Media Mod.  WS-SVC-CMM          no  ok

8   8    0     FXS                                           no  power-down

9   9    0     10/100BaseTX Ethernet                         no  power-down

!--- Output suppressed

Mod Sub-Type                Sub-Model           Sub-Serial  Sub-Hw Sub-Sw

--- ----------------------- ------------------- ----------- ------ ------

3   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

4   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

5   L3 Switching Engine III WS-F6K-PFC3B        SAL1012GREU 2.1

6   L3 Switching Engine III WS-F6K-PFC3B        SAL1017L9WJ 2.1

2. redundancy-history を確認します。

Access2> (enable) show system redundancy-history

Maximum entries of switchover history table = 10

System cold start due to switchover failure = 4

Standby available time (secs*100)          = 33291

Redundant History Switchover Table:

MSFC IOS の確認

CatOS は同期処理中に自動的にコピーされます。しかし、MSFC の IOS は自動的にコピーされません。

1. MSFC の IOS と冗長性を確認します。

!--- 1. Connect to MSFC

Access2> (enable) session 15

Trying Router-15...

Connected to Router-15.

Escape character is '^]'.

LAB-Router>enable

!--- 2. Verify the IOS file in the bootflash

LAB-Router#dir

Directory of bootflash:/

1  -rwx    17966324  Dec 13 2006 15:12:29 +00:00  c6msfc2a-adventerprisek9_w

an-mz.122-18.SXF7.bin

65536000 bytes total (47569548 bytes free)

!--- 3. Show version output

LAB-Router#show version

Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M), Version 12.2(18)SXF7,

RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

Image text-base: 0x40101040, data-base: 0x42638000

ROM: System Bootstrap, Version 12.2(17r)SX3, RELEASE SOFTWARE (fc1)

BOOTLDR: MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M), Version 12.2(18)SXF7,

RELEASE SOFTWARE (fc1)

LAB-Router uptime is 26 minutes

System returned to ROM by power-on

System image file is "bootflash:c6msfc2a-adventerprisek9_wan-mz.122-18.SXF7.bin"

!--- 4. MSFC redundancy status

LAB-Router#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 4 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = unsupported

Hardware Mode = Duplex

Configured Redundancy Mode = Stateful SwitchOver - SSO

Operating Redundancy Mode = Route Processor Redundancy

!--- It is running in the RPR mode because the standby MSFC !--- is running different version of IOS.

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 5

Current Software state = ACTIVE

Uptime in current state = 4 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 6

Current Software state = STANDBY COLD

Uptime in current state = 2 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-IPBASE_WAN-M),

Version 12.2(18)SXF4, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Mar-06 14:53 by tinhuang

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

!--- Note that the boot variable is blank. The MSFC boots the !--- first IOS image in the bootflash:

LAB-Router#

LAB-Router#exit

Access2> (enable)

2. スタンバイ側の MSFC で IOS をアップグレードします。

1. IOS イメージをスタンバイ側の MSFC にコピーします。

LAB-Router#copy c6msfc2a-adventerprisek9_wan-mz.122-18.SXF7.bin slavebootflash:/

Destination filename [c6msfc2a-adventerprisek9_wan-mz.122-18.SXF7.bin]?

Copy in progress...CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

17966324 bytes copied in 44.180 secs (406662 bytes/sec)

LAB-Router#

!--- Delete the old IOS image. Because the boot variable is blank !--- and the MSFC boots the first IOS image in the bootflash:

LAB-Router#cd slavebootflash:

LAB-Router#delete c6msfc2a-ipbase_wan-mz.122-18.SXF4.bin

Delete filename [c6msfc2a-ipbase_wan-mz.122-18.SXF4.bin]?

Delete slavebootflash:c6msfc2a-ipbase_wan-mz.122-18.SXF4.bin? [confirm]

LAB-Router#

2. スタンバイ側のスーパーバイザ モジュールをリロードします。

LAB-Router#exit

Access2> (enable) reset 6

This command will reset module 6.

Do you want to continue (y/n) [n]? y

2007 May 21 21:14:03 %SYS-5-MOD_RESET:Module 6 reset from Console//

Resetting module 6...

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: OFF(standby-supervisor-not-present)

Access2> (enable)

2007 May 21 21:16:01 %SYS-5-SUP_MODSBY:Module 6 is in standby

mode

2007 May 21 21:16:02 %SYS-5-SUP_IMGSYNC:File synchronization

process will start

in 120 seconds

2007 May 21 21:16:03 %DIAG-6-RUN_MINIMUM:Module 6: Running Minimal

Diagnostics..

.

2007 May 21 21:16:05 %DIAG-6-DIAG_OK:Module 6: Passed Online Diagnostics

2007 May 21 21:16:06 %SYS-3-TRANSCEIVER_NOTSUPP:

Transceiver on port 6/1 is not supported

2007 May 21 21:16:06 %SYS-3-TRANSCEIVER_NOTSUPP:

Transceiver on port 6/2 is not supported

2007 May 21 21:16:06 %SYS-5-PORT_SSUPOK:Ports on standby supervisor

(module 6) are up

2007 May 21 21:16:07 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in

sync for Module

6

2007 May 21 21:16:49 %SYS-1-SYS_LCPERR1:Module 16: RP requeste

d reset of peer RP: MSFC on module 16 will be reset

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: ON

Access2> (enable)

3. アップグレード後の MSFC IOS を確認します。

Access2> (enable) session 15

Trying Router-15...

Connected to Router-15.

Escape character is '^]'.

LAB-Router>enable

LAB-Router#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 17 minutes

Switchovers system experienced = 0

Standby failures = 1

Last switchover reason = unsupported

Hardware Mode = Duplex

Configured Redundancy Mode = Stateful SwitchOver - SSO

Operating Redundancy Mode = Stateful SwitchOver - SSO

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 5

Current Software state = ACTIVE

Uptime in current state = 17 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 6

Current Software state = STANDBY HOT

Uptime in current state = 0 minutes

Image Version = Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

BOOT =

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

LAB-Router#

スタンバイ スーパーバイザへのフェールオーバーと確認

この時点で、スーパーバイザ モジュールを、新しく取り付けたスタンバイ側のスーパーバイザ モジュールにフェールオーバーして、テストすることができます。

1. スーパーバイザ モジュールのフェールオーバーを実行します。

Access2> (enable) switch supervisor

This command will force a switch-over to the standby Supervisor module.

Do you want to continue (y/n) [n]? y

2007 May 21 20:40:37 %SYS-5-MOD_RESET:Module 5 reset from Console//

Access2> (enable)

System Bootstrap, Version 12.2(18r)SX2, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 2004 by cisco Systems, Inc.

Cat6k-Sup32 platform with 262144 Kbytes of main memory

Autoboot executing command: "boot bootdisk:cat6000-sup32pfc3k8.8-5-8.bin"

Self decompressing the image : #################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

################################################################################

##################################################### [OK]

System Power On Diagnostics

DRAM Size ..........................256 MB

Testing DRAM .......................Passed

Verifying Text Segment .............Passed

NVRAM Size .........................2048 KB

Level2 Cache .......................Present

Level3 Cache .......................Absent

System Power On Diagnostics Complete

Currently running ROMMON from S (Gold) region

Boot image: bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

Firmware compiled 01-Dec-06 12:57 by integ Build [100]

This module is now in standby mode.

Console is disabled for standby supervisor

2. スロット 6 にあるスーパーバイザにコンソール接続します。これが現在のアクティブなモジュールとなっています。

1. 冗長性のステータスは次のとおりです。

Access2> (enable) show system highavailability

Highavailability: enabled

Highavailability versioning: disabled

Highavailability Operational-status: ON

Access2> (enable) show system redundancy-history

Maximum entries of switchover history table = 10

System cold start due to switchover failure = 4

Standby available time (secs*100)          = 98984

Redundant History Switchover Table:

Index: 1

Previous active supervisor module: 5

Current active supervisor module : 6

Switchover reason                : user initiated

Switchover time                  : Mon May 21 2007, 20:40:37

2. show version :

Access2> (enable) show version

WS-C6509 Software, Version NmpSW: 8.5(8)

Copyright (c) 1995-2006 by Cisco Systems

NMP S/W compiled on Dec  1 2006, 23:03:43

System Bootstrap Version: 12.2

System Boot Image File is 'bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin'

System Configuration register is 0x2102

3. ブート変数は次のとおりです。

Access2> (enable) show boot

BOOT variable = bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin,1;bootdisk:cat6000

-sup32pfc3k8.8-4-5.bin,1;

CONFIG_FILE variable = bootdisk:switch.cfg

Configuration register is 0x2102

ignore-config: disabled

auto-config: non-recurring, overwrite, sync disabled

ROMMON console baud: 9600

boot: image specified by the boot system commands

Image auto sync is enabled

Image auto sync timer is 120 seconds

4. show module の出力は次のとおりです。

Access2> (enable) show module

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1          Unknown Card                                  power-down

2   2    48    10/100BaseTX Ethernet     WS-X6248-RJ-45      no  ok

3   3    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

4   4    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

5   5    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes standby

6   6    9     1000BaseX Supervisor      WS-SUP32-GE-3B      yes ok

16  6    1     Multilayer Switch Feature WS-F6K-MSFC2A       no  ok

7   7    5     Communication Media Mod.  WS-SVC-CMM          no  ok

8   8    0     FXS                                           no  power-down

9   9          Unknown Card                                  power-down

!--- Output suppressed

Mod Sub-Type                Sub-Model           Sub-Serial  Sub-Hw Sub-Sw

--- ----------------------- ------------------- ----------- ------ ------

3   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

4   Inline Power Module     WS-F6K-VPWR                     1.0    1.1(1)

5   L3 Switching Engine III WS-F6K-PFC3B        SAL1012GREU 2.1

6   L3 Switching Engine III WS-F6K-PFC3B        SAL1017L9WJ 2.1

Access2> (enable)

3. MSFC を確認します。

Access2> (enable) session 16

Trying Router-16...

Connected to Router-16.

Escape character is '^]'.

LAB-Router>enable

LAB-Router#show version

Cisco Internetwork Operating System Software

IOS (tm) MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M),

Version 12.2(18)SXF7, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2006 by cisco Systems, Inc.

Compiled Thu 23-Nov-06 01:03 by kellythw

Image text-base: 0x40101040, data-base: 0x42638000

ROM: System Bootstrap, Version 12.2(17r)SX3, RELEASE SOFTWARE (fc1)

BOOTLDR: MSFC2A Software (C6MSFC2A-ADVENTERPRISEK9_WAN-M), Version 12.2(18)SXF7,

RELEASE SOFTWARE (fc1)

LAB-Router uptime is 7 minutes

System returned to ROM by Stateful Switchover

System image file is "bootflash:c6msfc2a-adventerprisek9_wan-mz.122-18.SXF7.bin"

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

cisco MSFC2A (R7000) processor (revision MSFC2A) with 458752K/65536K bytes of me

mory.

Processor board ID MSFC2A

R7000 CPU at 300Mhz, Implementation 0x27, Rev 3.3, 256KB L2, 1024KB L3 Cache

Last reset from power-on

SuperLAT software (copyright 1990 by Meridian Technology Corp).

X.25 software, Version 3.0.0.

Bridging software.

TN3270 Emulation software.

29 Virtual Ethernet/IEEE 802.3 interfaces

509K bytes of non-volatile configuration memory.

65536K bytes of Flash internal SIMM (Sector size 512K).

Configuration register is 0x2102

Catalyst OS の名前変更

交換したスーパーバイザ モジュール内の CatOS の名前は RTSYNC で始まっています。このシステムはこのままにしておくこともできます。また、このファイル名を変更して、次のように標準的な名前にすることもできます。

Access2> (enable) rename RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin

cat6000-sup32pfc3k 8.8-5-8.bin

Access2> (enable) dir

2287   -rw-  10029260    May 21 2007 21:40:01 cat6000-sup32pfc3k8.8-5-8.bin

236900352 bytes available (19390464 bytes used)

Access2> (enable)

ファイルの名前を変更した後は、ブート変数を変更する必要があります。

!--- Verify boot variable

Access2> (enable) show boot

BOOT variable = bootdisk:RTSYNC_cat6000-sup32pfc3k8.8-5-8.bin,1;bootdisk:cat6000

-sup32pfc3k8.8-4-5.bin,1;

CONFIG_FILE variable = bootdisk:switch.cfg

Configuration register is 0x2102

ignore-config: disabled

auto-config: non-recurring, overwrite, sync disabled

ROMMON console baud: 9600

boot: image specified by the boot system commands

Image auto sync is enabled

Image auto sync timer is 120 seconds

!--- Clear all the boot variables

Access2> (enable) clear boot system all

BOOT variable =

Access2> (enable) 2007 May 21 21:41:56 %SYS-5-SUP_IMGSYNC:File synchronization p

rocess will start in 120 seconds

!--- Configure the boot variable

Access2> (enable) set boot system flash bootdisk:cat6000-sup32pfc3k8.8-5-8.bin

BOOT variable = bootdisk:cat6000-sup32pfc3k8.8-5-8.bin,1;

Access2> (enable) 2007 May 21 21:42:14 %SYS-5-SUP_IMGSYNC:File synchronization p

rocess will start in 120 seconds

!--- Verify the boot variable

Access2> (enable) show boot

BOOT variable = bootdisk:cat6000-sup32pfc3k8.8-5-8.bin,1;

CONFIG_FILE variable = bootdisk:switch.cfg

Configuration register is 0x2102

ignore-config: disabled

auto-config: non-recurring, overwrite, sync disabled

ROMMON console baud: 9600

boot: image specified by the boot system commands

Image auto sync is enabled

Image auto sync timer is 120 seconds

関連情報

- 冗長スーパーバイザ エンジン装備の Catalyst 6000/6500 シリーズ スイッチでのソフトウェア イメージ アップグレード設定例

- Cisco Catalyst 6500 シリーズ スイッチに関するサポート ドキュメント

- LAN 製品に関するサポート ページ

- LAN スイッチングに関するサポート ページ

- テクニカル サポートとドキュメント – Cisco Systems